
 cls-file Version 2.0
 GPS week: 1828   Day: 5   MJD: 57045                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 cod |  2880     0 122209   2995    -377   -1413     17     16     17    128    137    104   11.38
 emr |  2880     0  86149   2637    5728     504     16     16      0    170    170      0   12.67
 esa |  2880     0 119790    298     678    -566      9      8     10    155    171    102   23.33
 gfz |  2871     0 130081  11250     311    -224      9      8     11    159    164    150   21.83
 grg |  2880     0 123056    966     198      36     15     13     19    156    132    198   13.89
 mit |  2880     0 106301   6198    -189    -171     27     26     32    180    182    170    5.49
 igr |   288     0  39949     10    8159    -459     15     25     10     78     78     78    0.00
 jpl |   288     0  23809     24    5760     475     17     22     14    132    179     96   11.40
 ngs |    96     0   2853     19      10   -1452   1175   1175      0   2809   2809      0    0.00
 sio |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   grg   mit   igr   jpl   ngs   sio |
 -----+-------------------------------------------------------------+
    1 |   153   191  -174     X  -152   310   -46   268   450     - |
    2 |  -274  -346   -16   517  -134  -235  -160  -212 -1686     - |
    3 |     7   241  -129     X     -   -19    66    -9  1459     - |
    4 |    73   116   -45    62  -132  -141   -19    10 -4594     - |
    5 |   186   129  -127    15   -94    34    52    27  -305     - |
    6 |   -80   182   -41     X    72  -223    51  -181   612     - |
    7 |    53   125  -159     2    67    81   -19    99 -1659     - |
    9 |    90   172   193  -556   316    12    21   -49  1278     - |
   10 |  -175  -172   250    76  -102  -295    37  -253 -2866     - |
   11 |   -55   -81   -99   114    30   177   -73    82  1667     - |
   12 |   112   178  -121   -69    29    19   -82   244  -168     - |
   13 |   -37    -2   -62     4   186  -154   -77    60  2938     - |
   14 |   -76  -104    91    32    53  -252    55    14  2879     - |
   15 |   153    85  -170   -52    97   147    29   115 -1392     - |
   16 |   -50  -138   142   -41    36   -55    58  -281  1823     - |
   17 |   208    44  -229    26   -14   340   -54   172 -7028     - |
   18 |    75   -65    33   153  -325    63    90    28  3752     - |
   19 |   -85  -259   212   -75    77     X     8  -111  -387     - |
   20 |  -120  -206   227    20  -148   107    71  -224  3569     - |
   21 |   -55  -156   193    -2  -133    12    28   -61  1433     - |
   22 |  -184  -289   383  -115    42  -184   110  -240 -4122     - |
   23 |    54    28   -86     1    -5   180   -55    98    62     - |
   24 |   184   220  -184    27  -127    68   -17   195  4143     - |
   25 |  -167   -21    23    -8    99    73  -116    17   656     - |
   27 |   -24   151   -18  -149   228  -184    -6  -132   -35     - |
   28 |  -154   -58   145   -41   102  -262    27   -12  3325     - |
   29 |   269   173  -264    92  -119    37    47   312 -2370     - |
   30 |     X     X   -31     X    52     X     -    16   592     - |
   31 |    73    68  -218    34    28   377   -94   160 -1909     - |
   32 |  -155  -206   279   -67   -24   -38   101  -120 -1269     - |
 -----+-------------------------------------------------------------+
 ABMF |     -     -   117  -125     -     -     -     -     -     - |
 ALBH |   151     -     -   -76    -5     -     -     -     -     - |
 ALGO |   140     -     -  -135   132   -88     -     -     -     - |
 ALIC |   -25     -    91  -137   107   -49     3    -6     -     - |
 ALRT |   -12     -     -  -134   220     -    -2     -     -     - |
 AMC2 |   150     -     -   -75     -   -12     -     -     -     - |
 AREQ |    33     -     -   -51     -     -    28    64     -     - |
 AREV |     -     -   112  -120     -     -    49     -     -     - |
 ARTU |    47     -   -12  -188   233     -   -34    52     -     - |
 ASPA |     5     -     -    -3     -     -     -     -     -     - |
 AUCK |   -92     -    50   -94   121     -   -19    23     -     - |
 BAKE |     -     -   102  -243   211     -   -29     -     -     - |
 BAKO |    65     -     -    18     -  -209     -     -     -     - |
 BARH |     -     -    41   -74    59     -     -   -15     -     - |
 BJCO |     -     -    97  -160     -     -     2   109     -     - |
 BJFS |   -59     -    63  -122   136     -   -53     -     -     - |
 BJNM |    10     -     -     -     -     -     -   -10     -     - |
 BOGT |    10     -    37  -143   166     -   -46     -     -     - |
 BOR1 |  -180     -     -  -160   399     -     -     -     -     - |
 BRAZ |    65     -     -   -24   -13     -     -     -     -     - |
 BREW |     -     -     -     -   -31    79     -     -     -     - |
 BRFT |   -38     -   136  -310   167   149    -3    82     -     - |
 BRMU |   -58     -    89  -100    31     -    15    31     -     - |
 BRST |   114     -  -125     -   117     -  -150     -     -     - |
 BRUX |   220     -     -  -115     -     -   108     -     -     - |
 BUCU |     -     -    -6     -     9     -     -     -     -     - |
 CAS1 |   -47     -   151  -122    86  -141    12   -66     -     - |
 CEDU |  -110     -   185   -88   -83     -    50     -     -     - |
 CHPI |     -     -   121  -130     -     -    14     -     -     - |
 CHTI |  -125     -    26   -95   177     -   -39    36     -     - |
 CHUM |     -     -     -  -258   406     -     -     -     -     - |
 CHUR |    72     -    63  -236   191     -   -16    20     -     - |
 COCO |     -     -    52     -     -     -   -65  -107     -     - |
 CONZ |     -     -    49  -118     -   263     -     -     -     - |
 CORD |   -67     -   104   -76     -     -   -13     -     -     - |
 CRO1 |   -46     -     -  -178   304    35   -20     -     -     - |
 CUSV |     -     -   262  -280     -     -    80     -     -     - |
 DAEJ |   227     -     -  -139     -    82   141     -     -     - |
 DAKR |     -     -   115  -123     -     -     -     -     -     - |
 DARW |    23     -    88   -56   -56   -65   -48     -     -     - |
 DAV1 |     -     -     0     -     1     -     -     -     -     - |
 DRAG |     -     -   102  -108     X     -     -     -     -     - |
 DRAO |   145     -    61  -160    30     -    97     -     -     - |
 FAIR |   -81     -     -   -76   185     -     -     -     -     - |
 FLIN |   -49     -    38  -217   317     -   -52     -     -     - |
 GLPS |   171     -    29   -98   -35     -    38     -     -     - |
 GLSV |   186     -   -57    60  -179    70    80     -     -     - |
 GMSD |     -     -   102  -106     -   -12    45     -     -     - |
 GODE |    13     -     -  -115   251  -248   -37     -     -     - |
 GOLD |   -56     -    23  -253   392    34  -137     -     -     - |
 GOPE |   240     -     -  -103  -116   206     -     -     -     - |
 GRAS |    31     -   129  -121     -  -132    19     -     -     - |
 GRAZ |   -60     -    55  -167   220     -   -64     -     -     - |
 GUAM |     -     -     -  -139   161     -   -30    93     -     - |
 GUUG |     -     -   -25   -56   151     -     -     -     -     - |
 HARB |   -66     -    62  -235   391  -159   -89     -     -     - |
 HERS |   -39     -    71     -     -  -196     -   -12     -     - |
 HERT |     -     -   -37     -    63     -     -     -     -     - |
 HLFX |     -     -     -     -   110  -279     -     -     -     - |
 HNLC |     -     -     -  -133   209     -     -     -     -     - |
 HNPT |     -     -     -   -73   102    31     -     -     -     - |
 HOB2 |   122     -    95   -95   -62    25    34   -71     -     - |
 HOFN |  -171     -   279  -267    91     -  -142     -     -     - |
 HOLB |    65     -     -  -107   117     -    45     -     -     - |
 HOLM |   173     -   141  -241     -     -     -     -     -     - |
 HRAO |  -267     -     -     -   169   129     -     -     -     - |
 HYDE |   -11     -     5     -     -     -   -51     -     -     - |
 IENG |     7     -     -     -     -   -14     -     -     -     - |
 IISC |   106     -     -  -138     3     -     -   157     -     - |
 INVK |  -127     -     -   -71   231     -   -24   -19     -     - |
 IRKJ |     -     -   100  -176   148   -98     -     -     -     - |
 ISPA |   153     -   -65   -77    58     -    31    58     -     - |
 JOZ2 |     -     -    -2     -     4     -     -     -     -     - |
 KELY |     -     -  -112  -203   526     -   -34   -24     -     - |
 KERG |    81     -    58  -192   165   -62   -17     -     -     - |
 KIRU |    13     -     1  -101   189  -105    12     -     -     - |
 KOKB |    -3     -     -     -    56   -74   -40   -30     -     - |
 KOKV |     -     -   116  -124     -     -    30     -     -     - |
 KOUC |     -     -    44   -99    83     -     -     -     -     - |
 KOUR |   -47     -   162  -160   -27   108    35     -     -     - |
 KRGG |     -     -     -    -9     -     -   181    18     -     - |
 LAMA |    62     -     -   -81    57    49    45     -     -     - |
 LHAZ |     -     -    -2     -     3     -     -     -     -     - |
 LPGS |     -     -    95     -  -160     -    35     -     -     - |
 MAC1 |   -12     -    43  -113    68   129   -18     -     -     - |
 MAG0 |    75     -   114  -161     -     -    24     -     -     - |
 MAL2 |   -32     -   120  -135    44     -    39     -     -     - |
 MAR6 |     -     -   -55     -   125   -80     -     -     -     - |
 MAS1 |   -63     -   141  -107   -18     -    37     -     -     - |
 MATE |     1     -    76  -109    33    27   -11     -     -     - |
 MAW1 |     9     -    53  -155   147     -   -13     1     -     - |
 MBAR |     -     -   -10     -    17     -   -12     -     -     - |
 MCIL |     -     -    70   -75     -     -     -     -     -     - |
 MCM4 |     X     -     -  -252   396     -     -     -     -     - |
 MDVJ |    85     -     X   -44     X     -     -     -     -     - |
 MEDI |   -18     -     -     -     -    37     -     -     -     - |
 METS |   141     -     -   -73     -     -    75     -     -     - |
 MIZU |   230     -     -  -141     -    90     -     -     -     - |
 MOBS |     -     -    36     -   -21  -101     -     -     -     - |
 MONP |  -188     -   171     -  -145    29     -     -     -     - |
 MORP |     -     -     -  -126     -   501     -     -     -     - |
 NAIN |     -     -     -  -168   269     -     -    -7     -     - |
 NANO |    12     -   100  -218   166     -   -72     -     -     - |
 NICO |   -99     -   173    -3  -205     -    24     -     -     - |
 NIUM |     -     -   140  -149     -     -    69     -     -     - |
 NKLG |   -38     -   125  -169    87     -   -24     -     -     - |
 NLIB |     -     -     -  -306   645  -420     -     -     -     - |
 NNOR |     -     -    80     -   -77  -146     -     -     -     - |
 NOVM |     -     -   -87  -237   519     -     -     -     -     - |
 NRC1 |   -38     -     -  -197   347   -16   -71     -     -     - |
 NRIL |    -8     -    52  -183   121     -    -2   106     -     - |
 NRMD |   517     -     -  -270     -     -     -     -     -     - |
 NTUS |    -3     -   110  -104     -   -46    36     -     -     - |
 NYA1 |   114     -    -1  -132   116     -    90     -     -     - |
 NYAL |     -     -     -   -80   168  -217     -    54     -     - |
 OHI2 |     -     -   -42     -    70     -     -     -     -     - |
 OHI3 |     -     -    59     -    69   -76     -  -170     -     - |
 ONSA |    20     -    14  -136   185   -27     5     -     -     - |
 OUS2 |     -     -    19     -   -32     -    19     -     -     - |
 PALM |     -     -     -   -79   123     -     -     -     -     - |
 PARC |     -     -     -   -87   240     -     -  -125     -     - |
 PDEL |    18     -    72  -136   132  -135   -14     -     -     - |
 PENC |   -45     -     -     -    37     -     -     -     -     - |
 PERT |    -7     -   122   -65  -186     -    32   108     -     - |
 PETS |     -     -     -   -78     -     -    52   149     -     - |
 PIE1 |   -51     -    10  -151   263     -   -20     -     -     - |
 PIMO |    60     -    81  -202   151     -    -8   -22     -     - |
 POL2 |    24     -     -  -139   199     -   -13     -     -     - |
 POLV |     -     -     -  -119   187     -     -     -     -     - |
 POTS |     -     -  -103     -   173     -     -     -     -     - |
 POVE |     -     -    95  -101     -     -     -     -     -     - |
 PRDS |   129     -     -   -67     -     -   101     -     -     - |
 PTBB |   -68     -    48     -     -   -65     -     -     -     - |
 QAQ1 |    42     -    40  -108    68     -    15     -     -     - |
 QIKI |     -     -     -  -149   235     -     -     -     -     - |
 QUIN |    -2     -     1     -     -     -     -     -     -     - |
 RABT |    73     -     -   -57   -72     -     -   123     -     - |
 RBAY |   -89     -     -  -114   252     -     -     -     -     - |
 RESO |   142     -     -   -74     -     -    79     -     -     - |
 REUN |    11     -    19   -90   101     -   -50     -     -     - |
 REYK |     -     -     -   -80   126     -   171     -     -     - |
 RIGA |     -     -    89     -     -     -     -  -182     -     - |
 SALU |     -     -   212  -227     -     -     -     -     -     - |
 SANT |   -85     -     -  -353   469     1  -171   189     -     - |
 SAVO |     -     -   165  -176     -     -     -     -     -     - |
 SCH2 |    51     -    97  -223     X   398     1     -     -     - |
 SCOR |     -     -    10  -193   268     -     -    22     -     - |
 SCUB |   120     -     -     -   -98     -   161     -     -     - |
 SEY1 |     -     -     -   -93     -     -    90   179     -     - |
 SFER |     -     -   157   -79  -116   -62     -     -     -     - |
 SIMO |     -     -     -   -68     -     -     -   130     -     - |
 SOFI |     -     -    41  -138   171     -     -   -27     -     - |
 SOLA |     -     -     -   -84     -     -     -   161     -     - |
 SPT0 |   -67     -     -     -   121  -168     -     -     -     - |
 SSIA |    45     -     -   -82    93     -   118     -     -     - |
 STHL |    78     -    38  -114     -     -    12    63     -     - |
 STJO |     5     -     -  -201   314   -21  -104     7     -     - |
 SUTH |    -6     -     -     -     5     -   -15     -     -     - |
 SUTV |     -     -   127  -135     -     -    36     -     -     - |
 SUWN |   118     -   147  -192     -  -102     -     -     -     - |
 SVTL |     -     -   -59     -    99     -     -     -     -     - |
 SYDN |  -115     -    56     -     -     -     -     -     -     - |
 SYOG |    47     -    76  -166    94     -   -62     -     -     - |
 TAH1 |   -54     -     -     -    45     -     -     -     -     - |
 TAH2 |   -11     -     -     -     -     -     -    11     -     - |
 THTI |     -     -   181  -335   253     -     9     -     -     - |
 THU2 |     -     -    89   -96     -     -     -     -     -     - |
 THU3 |  -104     -     -  -211   350     -   -33    81     -     - |
 TIDB |   -85     -     -  -167   241   206    57     -     -     - |
 TIXI |     -     -    27     -   -49     -   -95     4     -     - |
 TLSE |    68     -    43  -182   241  -209   -86     -     -     - |
 TNML |     -     -     -     -   110  -279     -     -     -     - |
 TOW2 |    -7     -    92  -153   165     -   -18   -89     -     - |
 TRO1 |  -157     -    63   -79   183     -   -64   -44     -     - |
 TSKB |   120     -     -   -63     -     -   -19     -     -     - |
 TWTF |    43     -     -  -209   156   149   -37    96     -     - |
 ULAB |     -     -   106     -  -178     -     -     -     -     - |
 USNO |   -13     -     -     -   116   -75     -   -93     -     - |
 USUD |    65     -     -   -79     -   185     -     -     -     - |
 UZHL |     -     -    89   -95     -     -     -     -     -     - |
 VILL |   -11     -    26  -179   248     -   -42     -     -     - |
 VNDP |     -     -     -     -    87     -     -  -105     -     - |
 WAB2 |   130     -     -   -85     -    70     -     -     -     - |
 WES2 |   -24     -    59  -165   161    45    -1     -     -     - |
 WHIT |   -48     -    19  -155   251     -   -40     -     -     - |
 WILL |   -19     -     -  -145   242  -120     -    59     -     - |
 WIND |     -     -    28     -   -48     -    51     -     -     - |
 WSRT |   -91     -     -   111    -1  -250  -120     -     -     - |
 WTZA |    16     -     -     -     -   -33     -     -     -     - |
 WTZR |  -110     -   290  -220   144  -239     -  -123     -     - |
 WUHN |  -101     -   178  -141   225  -524     -     -     -     - |
 XMIS |     -     -    94   -21  -125     -   116     -     -     - |
 YAKT |   -83     -   104   -68     -     -   -12     -     -     - |
 YAR2 |   -18     -     -     9     -     -    74     -     -     - |
 YARR |     -     -     -     -    -3     7     -     -     -     - |
 YEBE |     -     -     -     -    44  -112     -     -     -     - |
 YELL |     8     -     -  -250   439  -143   -45     6     -     - |
 YKRO |    79     -     -   -41     -     -   101     -     -     - |
 YSSK |     2     -     -   -48     -     -    35    90     -     - |
 ZECK |    97     -     8  -150   154   -29   -38     -     -     - |
 ZIMM |     6     -     -   -84   127     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   grg   mit   igr   jpl   ngs   sio | NEPO    RMS
 -----+-------------------------------------------------------------+-------------
    1 |    17    15     7     X    11    22    38    38   433     - | 2880    211
    2 |    16    18     9     6    12    30    35    27   423     - | 2880    227
    3 |    15    14     5     X     -    17    16    14  1147     - | 2880    509
    4 |    16    16    11     6    15    24    10    14  1525     - | 2880    738
    5 |    21    16     8     7    13    20    14    14   703     - | 2880    230
    6 |    11    14     8     X    13    29    25    28   436     - | 2880    316
    7 |    11    18     7    10    15    19    20    20   705     - | 2880    236
    9 |     9    19     7     6    12    22    16    17   501     - | 2880    340
   10 |    18    16     8    13    13    38    30    28  2295     - | 2880   1382
   11 |    15    14    10     6    13    29    12    15  1238     - | 2880    583
   12 |    25    18     8     5    11    25    34    28   503     - | 2880    296
   13 |    31    18    13     5    14    13    27    20   382     - | 2880    257
   14 |    20    14     6     8    13    15    33    14   392     - | 2880    258
   15 |    18    21     5    11    12    15    27    19   865     - | 2880    211
   16 |    17    16     7     7    11    37    33    32   433     - | 2880    337
   17 |    13    17     8     8    14    23    25    21  3781     - | 2880    415
   18 |    13    17     9    11    17    19    22    11   548     - | 2880    230
   19 |    13    14     8     8    14     X    17    16   245     - | 2880    226
   20 |    10    13     8     7     9    31    32    25   398     - | 2880    232
   21 |    20    19    11     9    17    33    18    19  1126     - | 2880    430
   22 |    11    14     8    11    18    23    28    28  1467     - | 2880    172
   23 |    13    14     9     7    11    19    28    18   361     - | 2880    193
   24 |    14    28    12    10    14    19    31    27  2559     - | 2880   1832
   25 |    18    13     7     7    11    14    14    13   240     - | 2880    175
   27 |    16    13     8     7    15    42    21    19   435     - | 2880    191
   28 |    21    23     9    13    12    53    17    15   874     - | 2880    781
   29 |    14    17     8    13    13    25    39    34   570     - | 2880    468
   30 |     X     X     6     X    11     X     -    20   499     - | 2632    414
   31 |    21    17    12     7    15    14    26    24   707     - | 2880    443
   32 |    13    14     7     9    12    21    22    16  1430     - | 2880    556
 -----+-------------------------------------------------------------+-------------
 ABMF |     -     -    10    10     -     -     -     -     -     - |  288   5950
 ALBH |    19     -     -    11    20     -     -     -     -     - |  288  13243
 ALGO |    21     -     -     9    15    38     -     -     -     - |  288     90
 ALIC |    13     -    12    13    15    19     9    10     -     - |  288   2795
 ALRT |    10     -     -     7    15     -     8     -     -     - |  288   7446
 AMC2 |    13     -     -    10     -    46     -     -     -     - |  288     35
 AREQ |    13     -     -    11     -     -    11    11     -     - |  288  11586
 AREV |     -     -     8     8     -     -     7     -     -     - |  288  11575
 ARTU |     9     -     5     6    11     -     4     8     -     - |  287  16761
 ASPA |    25     -     -    13     -     -     -     -     -     - |  288  10383
 AUCK |    19     -    11    14    17     -     6    13     -     - |  288   6136
 BAKE |     -     -     5     7    14     -     6     -     -     - |  288   3866
 BAKO |    13     -     -    10     -    21     -     -     -     - |  288   2595
 BARH |     -     -     7    12    27     -     -    15     -     - |  288   3265
 BJCO |     -     -    10    12     -     -     7    17     -     - |  288   7764
 BJFS |     8     -     8     7    15     -     8     -     -     - |  288   6212
 BJNM |     9     -     -     -     -     -     -     9     -     - |  288     31
 BOGT |    15     -    11    15    33     -     9     -     -     - |  284  18753
 BOR1 |    10     -     -     6    10     -     -     -     -     - |  288   6860
 BRAZ |    20     -     -    14    20     -     -     -     -     - |  222   9844
 BREW |     -     -     -     -     7    18     -     -     -     - |  288     47
 BRFT |    46     -    13    19    31    32    13    23     -     - |  288   2909
 BRMU |    19     -     9    16    25     -     8    12     -     - |  288   6284
 BRST |    19     -    11     -    28     -    15     -     -     - |  216   1514
 BRUX |    13     -     -     7     -     -     7     -     -     - |  288    430
 BUCU |     -     -     6     -    11     -     -     -     -     - |  288   6025
 CAS1 |    25     -    11     8    17    36     7    11     -     - |  288   4697
 CEDU |    18     -    12    12    16     -     5     -     -     - |  288   5581
 CHPI |     -     -     9    10     -     -     5     -     -     - |  288   9573
 CHTI |    22     -    10    14    19     -     7    11     -     - |  288   5529
 CHUM |     -     -     -     8    13     -     -     -     -     - |  288   7618
 CHUR |    11     -     8     8    15     -     8    18     -     - |  288  10897
 COCO |     -     -     7     -     -     -     9    15     -     - |  288    >>>
 CONZ |     -     -    13    14     -    29     -     -     -     - |  288   3772
 CORD |    16     -    11    13     -     -    12     -     -     - |  288   8075
 CRO1 |    22     -     -    15    21    32    11     -     -     - |  288     40
 CUSV |     -     -     8     9     -     -     5     -     -     - |  288   8693
 DAEJ |    10     -     -     4     -    24    19     -     -     - |  288   3612
 DAKR |     -     -     8     8     -     -     -     -     -     - |  288   8613
 DARW |    33     -    20    29    42    38    16     -     -     - |  288   4109
 DAV1 |     -     -    23     -    38     -     -     -     -     - |  191   7454
 DRAG |     -     -     6     6     X     -     -     -     -     - |  167   3347
 DRAO |    13     -     9     9    22     -    12     -     -     - |  288   4759
 FAIR |    17     -     -     7    19     -     -     -     -     - |  288  16710
 FLIN |    19     -     9     8    18     -    12     -     -     - |  288   3612
 GLPS |    15     -     9    14    17     -     6     -     -     - |  288  20559
 GLSV |    27     -    15     8    17    26     7     -     -     - |  288   2224
 GMSD |     -     -     6     7     -    20     5     -     -     - |  288   3325
 GODE |    18     -     -     9    15    43    13     -     -     - |  288     80
 GOLD |    16     -    10    10    20    29     9     -     -     - |  288   2962
 GOPE |    13     -     -     8     9    42     -     -     -     - |  288    346
 GRAS |    12     -     9    10     -    31     8     -     -     - |  288   2502
 GRAZ |    12     -     6     9    14     -     9     -     -     - |  288   5180
 GUAM |     -     -     -    23    31     -    20    26     -     - |  287   6534
 GUUG |     -     -    17    17    36     -     -     -     -     - |  288   6614
 HARB |    22     -    14    16    27    28    12     -     -     - |  288   1459
 HERS |    12     -     7     -     -    32     -    10     -     - |  288    120
 HERT |     -     -    12     -    20     -     -     -     -     - |  288   3625
 HLFX |     -     -     -     -    12    31     -     -     -     - |  288   4523
 HNLC |     -     -     -    14    22     -     -     -     -     - |  288  11273
 HNPT |     -     -     -    15    13    46     -     -     -     - |  288   2752
 HOB2 |    28     -    15    17    25    28     8    11     -     - |  288    111
 HOFN |     9     -     9    10    20     -    10     -     -     - |  276   5101
 HOLB |    33     -     -    15    30     -    20     -     -     - |  288   4491
 HOLM |     8     -     6     6     -     -     -     -     -     - |  288   7574
 HRAO |    18     -     -     -    18    30     -     -     -     - |  288     63
 HYDE |     9     -     5     -     -     -     8     -     -     - |  261   3051
 IENG |    14     -     -     -     -    28     -     -     -     - |  287     78
 IISC |    21     -     -    15    18     -     -    16     -     - |  288  21492
 INVK |    15     -     -    10    12     -    12    26     -     - |  288   8202
 IRKJ |     -     -    12    25    18    29     -     -     -     - |  288    113
 ISPA |    20     -    12    20    21     -    11    18     -     - |  288  21210
 JOZ2 |     -     -     7     -    12     -     -     -     -     - |  227   5385
 KELY |     -     -     8    10    13     -     9    18     -     - |  288   9761
 KERG |    22     -    11    14    30    24    21     -     -     - |  288   3677
 KIRU |    14     -     8    11    17    36     7     -     -     - |  288   4025
 KOKB |    21     -     -     -    15    34    13    13     -     - |  288     62
 KOKV |     -     -     9    10     -     -     5     -     -     - |  288     78
 KOUC |     -     -    13    11    19     -     -     -     -     - |  285   6553
 KOUR |    22     -    16    22    34    42    13     -     -     - |  288     28
 KRGG |     -     -     -     8     -     -     8    15     -     - |  288   3461
 LAMA |    10     -     -     9    12    25     9     -     -     - |  288   2594
 LHAZ |     -     -    30     -    50     -     -     -     -     - |  267    >>>
 LPGS |     -     -    19     -    33     -    20     -     -     - |  287    >>>
 MAC1 |    26     -    17    20    29    38     7     -     -     - |  288   3078
 MAG0 |    15     -    14    10     -     -    22     -     -     - |  287   6623
 MAL2 |    14     -    11    13    21     -     7     -     -     - |  288   8313
 MAR6 |     -     -     9     -     9    28     -     -     -     - |  288   2340
 MAS1 |    12     -     8    12    25     -     9     -     -     - |  288  13578
 MATE |     9     -     9    13    18    42     7     -     -     - |  288    227
 MAW1 |    16     -    12     9    15     -     5     9     -     - |  288   4825
 MBAR |     -     -    11     -    19     -     8     -     -     - |  288    >>>
 MCIL |     -     -    12    13     -     -     -     -     -     - |  288  10637
 MCM4 |     X     -     -    11    18     -     -     -     -     - |  288   7315
 MDVJ |    11     -     X     6     X     -     -     -     -     - |  280    >>>
 MEDI |    13     -     -     -     -    27     -     -     -     - |  287     18
 METS |    11     -     -     6     -     -     8     -     -     - |  287  10356
 MIZU |    19     -     -     9     -    39     -     -     -     - |  288   1059
 MOBS |     -     -    13     -    19    47     -     -     -     - |  288   3463
 MONP |    20     -    15     -    25    42     -     -     -     - |  288   3491
 MORP |     -     -     -     9     -    37     -     -     -     - |  281   4687
 NAIN |     -     -     -     8    12     -     -    11     -     - |  288  10477
 NANO |    20     -     8    13    21     -     8     -     -     - |  288   2769
 NICO |    14     -     7     9    13     -    11     -     -     - |  288   5837
 NIUM |     -     -    11    12     -     -    11     -     -     - |  288  10156
 NKLG |    21     -    14    12    20     -     8     -     -     - |  288   7635
 NLIB |     -     -     -    13    15    38     -     -     -     - |  288     28
 NNOR |     -     -    13     -    19    30     -     -     -     - |  288    275
 NOVM |     -     -     8     9    17     -     -     -     -     - |  288     55
 NRC1 |    13     -     -    11    15    29    10     -     -     - |  288     34
 NRIL |    15     -     8     6    16     -     5     8     -     - |  288   7207
 NRMD |    13     -     -     7     -     -     -     -     -     - |  190   6735
 NTUS |    13     -     7    10     -    28     8     -     -     - |  288   2687
 NYA1 |    17     -    10    10    23     -    10     -     -     - |  288   8735
 NYAL |     -     -     -    12    15    31     -    13     -     - |  288    315
 OHI2 |     -     -    20     -    33     -     -     -     -     - |  230    >>>
 OHI3 |     -     -    10     -    23    39     -    22     -     - |  288     61
 ONSA |    13     -     9    10    13    36     8     -     -     - |  288     64
 OUS2 |     -     -     9     -    16     -    10     -     -     - |  288    >>>
 PALM |     -     -     -    11    18     -     -     -     -     - |  288   7461
 PARC |     -     -     -    12    20     -     -    16     -     - |  288   7736
 PDEL |    13     -     8    10    17    31     9     -     -     - |  288   2582
 PENC |    13     -     -     -    11     -     -     -     -     - |  288   4019
 PERT |    21     -    11    12    18     -     9    11     -     - |  288   6865
 PETS |     -     -     -     3     -     -    10     6     -     - |  287   8104
 PIE1 |    13     -     6     7    14     -     4     -     -     - |  288     23
 PIMO |    15     -     9     8    14     -     5     8     -     - |  288   6501
 POL2 |     8     -     -     6    10     -     6     -     -     - |  288   9438
 POLV |     -     -     -     7    10     -     -     -     -     - |  270   2820
 POTS |     -     -     6     -    10     -     -     -     -     - |  155    >>>
 POVE |     -     -    11    12     -     -     -     -     -     - |  288   8955
 PRDS |    11     -     -     6     -     -     9     -     -     - |  287     82
 PTBB |    10     -     5     -     -    17     -     -     -     - |  288     18
 QAQ1 |    18     -    12     9    19     -     6     -     -     - |  288  10020
 QIKI |     -     -     -     8    12     -     -     -     -     - |  288   8547
 QUIN |     8     -     4     -     -     -     -     -     -     - |  288  10484
 RABT |    15     -     -     9    18     -     -    12     -     - |  288  15290
 RBAY |    18     -     -    13    24     -     -     -     -     - |  193   7204
 RESO |     6     -     -     3     -     -     9     -     -     - |  288   7364
 REUN |    27     -    15    22    24     -    10     -     -     - |  288   6884
 REYK |     -     -     -    17    27     -    16     -     -     - |  288   4921
 RIGA |     -     -     5     -     -     -     -     9     -     - |  288   4841
 SALU |     -     -    12    12     -     -     -     -     -     - |  288  10519
 SANT |    19     -     -    21    25    35    17    19     -     - |  288   1583
 SAVO |     -     -    12    12     -     -     -     -     -     - |  288   9204
 SCH2 |    10     -     7     7     X    42    11     -     -     - |  288   3600
 SCOR |     -     -     7    10    12     -     -    13     -     - |  288   7043
 SCUB |    21     -     -     -    18     -    22     -     -     - |  286    >>>
 SEY1 |     -     -     -    13     -     -    13    25     -     - |  287   9604
 SFER |     -     -    10    12    14    31     -     -     -     - |  288     55
 SIMO |     -     -     -     7     -     -     -    14     -     - |  288   2792
 SOFI |     -     -     8    13    19     -     -    16     -     - |  288   5631
 SOLA |     -     -     -     5     -     -     -    10     -     - |  288   9053
 SPT0 |    17     -     -     -     7    31     -     -     -     - |  288     49
 SSIA |    29     -     -    14    34     -    14     -     -     - |  288  11886
 STHL |    15     -     9    14     -     -     6    14     -     - |  288  22174
 STJO |    18     -     -    14    25    18    10    16     -     - |  288    345
 SUTH |    17     -     -     -    14     -    11     -     -     - |  288  14713
 SUTV |     -     -     7     8     -     -     4     -     -     - |  288   6250
 SUWN |    11     -     8     8     -    18     -     -     -     - |  288   3951
 SVTL |     -     -     6     -     9     -     -     -     -     - |  288     15
 SYDN |    42     -    21     -     -     -     -     -     -     - |  287    727
 SYOG |    12     -    12     8    13     -    12     -     -     - |  288   4788
 TAH1 |    28     -     -     -    23     -     -     -     -     - |  272   1086
 TAH2 |    14     -     -     -     -     -     -    14     -     - |  279   1028
 THTI |     -     -    18    24    32     -    17     -     -     - |  288  14407
 THU2 |     -     -     7     8     -     -     -     -     -     - |  288  35255
 THU3 |     9     -     -     8    15     -     8    13     -     - |  288   7887
 TIDB |    27     -     -    17    23    39    21     -     -     - |  288     54
 TIXI |     -     -     9     -    15     -     7    10     -     - |  288    >>>
 TLSE |    14     -     8    13    13    33    10     -     -     - |  288   1491
 TNML |     -     -     -     -    10    24     -     -     -     - |  288   2095
 TOW2 |    21     -    16    19    33     -     8    17     -     - |  288   6626
 TRO1 |    13     -     8     7    14     -     6    14     -     - |  288   6833
 TSKB |    11     -     -     6     -     -    11     -     -     - |  287   6785
 TWTF |    11     -     -     9    17    31     9     9     -     - |  288     22
 ULAB |     -     -     7     -    12     -     -     -     -     - |  288    >>>
 USNO |    22     -     -     -    12    29     -    12     -     - |  288     30
 USUD |    18     -     -    12     -    19     -     -     -     - |  288     39
 UZHL |     -     -     8     9     -     -     -     -     -     - |  288   1675
 VILL |     9     -    10    13    22     -     6     -     -     - |  288   6678
 VNDP |     -     -     -     -     8     -     -    10     -     - |  288   4863
 WAB2 |    13     -     -    11     -    24     -     -     -     - |  288     13
 WES2 |    12     -     7     9    13    30     8     -     -     - |  288   4064
 WHIT |    15     -     7     8    16     -     5     -     -     - |  288  35194
 WILL |    23     -     -    11    19    31     -     9     -     - |  288   4497
 WIND |     -     -     8     -    13     -    13     -     -     - |  288    >>>
 WSRT |    16     -     -    11    14    45    10     -     -     - |  288     16
 WTZA |    14     -     -     -     -    29     -     -     -     - |  288    452
 WTZR |    15     -     9    10    10    27     -    12     -     - |  288     23
 WUHN |    22     -     9    10    23    20     -     -     -     - |  288   3018
 XMIS |     -     -    10    12    22     -     7     -     -     - |  288   8402
 YAKT |    11     -     8     9     -     -    12     -     -     - |  287   9120
 YAR2 |    17     -     -     9     -     -    15     -     -     - |  288   8323
 YARR |     -     -     -     -    10    27     -     -     -     - |  288   4159
 YEBE |     -     -     -     -    10    26     -     -     -     - |  287    211
 YELL |    21     -     -    12    13    38     8    13     -     - |  288     26
 YKRO |    17     -     -     9     -     -    19     -     -     - |  288  19839
 YSSK |     9     -     -     6     -     -     9     7     -     - |  287   7964
 ZECK |    12     -     9    10    15    36     7     -     -     - |  288     15
 ZIMM |    11     -     -     8    11     -     -     -     -     - |  288   5180
 -----+-------------------------------------------------------------+-------------
 TOT  |    17    17     9    10    16    28    15    18  1176     - |




CLOCK JUMP CORRECTIONS APPLIED
------------------------------

CEN | STA/SAT | EPOCH           |     JUMP(ps)
----+---------+-----------------+-------------
cod |      8  | 1828-5 14:15:00 |        -500
emr |      5  | 1828-5  8:57:00 |        2652
emr |      5  | 1828-5  9:00:00 |       -2663
grg |   DRAG  | 1828-5 11:25:00 |  -200838686
mit |     19  | 1828-5  0:01:00 |        -825
mit |     19  | 1828-5  0:28:00 |         520
mit |     19  | 1828-5  0:43:30 |        -542
mit |     19  | 1828-5  0:48:00 |         557
mit |     19  | 1828-5 14:51:00 |        -629
mit |     19  | 1828-5 14:55:00 |         632
mit |   SCH2  | 1828-5 19:50:00 |       -2304



-----------------------------------------------------------------------------------------------------
-----------------------------------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN     MEAN     MEAN     MEAN   | HADAMARD DEVIATION AT TAU =  |
      | NREPO NBEPO  BRKS  USED    WGT1(%)  WGT2(%)  WGT3(%)  WGT4(%) |     300s     3600s    21600s |
------+---------------------------------------------------------------+------------------------------+
 AMC2 |   288   285     1   288     3.65     3.93     3.90     3.90   | 6.62e-14  9.14e-15  4.34e-15 |
 GODE |   288   288     0   288     2.59     3.93     2.33     2.33   | 4.72e-14  6.73e-15  7.09e-15 |
 MATE |   288   285     1   288     3.07     3.93     3.40     3.40   | 3.93e-14  7.29e-15  2.37e-14 |
 ONSA |   288   288     0   288     3.17     3.93     3.90     3.90   | 3.21e-14  7.46e-15  2.36e-15 |
 PIE1 |   288   288     1   288     3.88     3.93     2.90     2.90   | 2.10e-14  4.51e-15  1.44e-15 |
 PTBB |   288   288     0   288     3.84     3.93     3.90     3.90   | 2.82e-14  4.20e-15  1.99e-15 |
 SFER |   288   285     1   288     2.56     3.93     1.87     1.87   | 5.50e-14  8.37e-15  5.97e-15 |
 SPT0 |   288   288     0   288     3.49     3.93     3.90     3.90   | 3.22e-14  5.17e-15  3.21e-15 |
 TWTF |   288   288     0   288     3.01     3.93     3.90     3.90   | 3.56e-14  5.29e-15  1.08e-15 |
 WTZR |   288   288     0   288     2.59     3.93     0.42     0.42   | 4.91e-14  8.81e-15  1.92e-15 |
 YELL |   288   285     1   288     3.88     3.93     3.17     3.17   | 3.57e-14  3.93e-15  2.03e-15 |
 ZECK |   288   288     0   288     3.65     3.93     3.90     3.90   | 3.05e-14  4.80e-15  2.55e-15 |
 USNO |   288   288     0   288     2.81     3.93     1.17     1.17   | 3.80e-14  4.89e-15  1.30e-15 |
 HERS |   288   286     1   288     3.64     3.93     3.90     3.90   | 4.16e-14  6.87e-15  4.78e-15 |
 KOKV |   288   285     1   288     2.49     3.93     0.68     0.68   | 7.77e-14  1.06e-14  4.09e-15 |
 BJNM |   288   288     0   288     2.88     3.93     3.90     3.90   | 4.43e-14  6.53e-15  2.78e-15 |
 MEDI |   287   286     1   287     3.37     3.91     1.32     1.32   | 3.69e-14  6.55e-15  1.86e-15 |
 ALGO |   288   287     1   272     3.63     3.70     2.17     2.17   | 2.63e-14  1.03e-14  9.20e-15 |
 STJO |   288   285     1   288     2.05     3.55     0.38     0.38   | 7.02e-14  2.03e-14  2.82e-14 |
 PRDS |   287   287     0   287     1.99     3.40     1.01     1.01   | 4.40e-14  1.04e-14  6.20e-15 |
 SVTL |   288   285     1   288     1.89     3.05     0.90     0.90   | 5.39e-14  5.27e-15  1.35e-15 |
 IENG |   287   287     0   287     1.73     2.57     0.92     0.92   | 6.66e-14  1.43e-14  7.40e-15 |
 NOVM |   288   288     0   288     1.53     2.01     0.90     0.90   | 1.15e-13  1.89e-14  6.39e-15 |
 KOKB |   288   285     1   288     1.46     1.82     3.90     3.90   | 1.29e-13  1.50e-14  3.57e-15 |
 CRO1 |   288   288     0   288     1.42     1.72     1.25     1.25   | 8.64e-14  1.72e-14  4.59e-15 |
 BREW |   288   288     0   288     1.35     1.58     3.90     3.90   | 1.38e-13  1.31e-14  2.52e-15 |
 USUD |   288   288     0   288     1.33     1.52     3.56     3.56   | 1.02e-13  1.21e-14  2.96e-15 |
 TIDB |   288   288     0   288     1.21     1.25     1.99     1.99   | 1.17e-13  1.37e-14  4.22e-15 |
 MDVJ |   280   271     4    84     1.09     1.16     1.17     1.17   | 6.54e-08  2.01e-08  7.23e-09 |
 OHI3 |   288   288     0   288     1.01     0.87     0.06     0.06   | 4.07e-14  9.67e-15  6.94e-15 |
 HRAO |   288   287     1   288     0.82     0.58     0.05     0.05   | 5.43e-14  1.72e-14  4.52e-15 |
 WSRT |   288   288     0   288     0.79     0.53     0.19     0.19   | 2.69e-14  5.07e-15  2.97e-15 |
 WAB2 |   288   288     0   288     0.74     0.46     0.86     0.86   | 3.11e-14  5.44e-15  2.97e-15 |
 G01  |   288   285     1   288     3.87     0.38     3.90     3.90   | 7.88e-14  2.15e-14  2.73e-14 |
 YEBE |   287   287     0   287     0.66     0.38     0.51     0.51   | 1.04e-13  3.32e-14  1.93e-14 |
 G27  |   288   288     0   288     2.39     0.37     0.99     0.99   | 4.70e-14  1.80e-14  2.30e-14 |
 NLIB |   288   288     0   288     0.59     0.30     0.30     0.30   | 1.37e-13  1.21e-14  3.21e-15 |
 G30  |   212   211     0   212     2.77     0.30     2.84     2.84   | 1.24e-12  1.04e-13         - |
 G06  |   288   288     0   288     3.87     0.30     3.90     3.90   | 6.92e-14  2.61e-14  3.12e-14 |
 NRC1 |   288   288     0   288     0.50     0.21     0.36     0.36   | 3.47e-14  7.14e-15  2.13e-15 |
 HOB2 |   288   288     0   288     0.46     0.18     0.09     0.09   | 4.80e-14  2.55e-14  8.68e-15 |
 MAR6 |   288   288     0   186     0.31     0.13     0.01     0.01   | 2.60e-13  6.09e-14  4.35e-14 |
 G18  |   288   288     0   288     0.25     0.11     1.00     1.00   | 7.46e-13  7.18e-14  2.05e-14 |
 G32  |   288   288     0   288     0.51     0.09     0.94     0.94   | 2.16e-13  7.05e-14  7.64e-14 |
 TAH1 |   272   272     0   272     0.30     0.08     0.29     0.29   | 4.62e-13  1.05e-13  4.11e-14 |
 BRUX |   288   288     0   288     0.28     0.07     0.42     0.42   | 4.49e-13  1.16e-13  3.54e-14 |
 MIZU |   288   288     0   288     0.26     0.06     0.04     0.04   | 4.98e-13  1.06e-13  4.32e-14 |
 GOPE |   288   288     0   288     0.24     0.05     0.03     0.03   | 4.85e-13  1.50e-13  2.55e-14 |
 WTZA |   288   288     0   288     0.23     0.05     0.44     0.44   | 5.02e-13  1.47e-13  4.78e-14 |
 G04  |   288   288     0   288     0.25     0.04     0.25     0.25   | 4.61e-13  1.22e-13  9.03e-14 |
 G09  |   288   288     0   288     0.28     0.04     0.04     0.04   | 5.98e-14  1.83e-14  2.10e-14 |
 G23  |   288   288     0   288     0.27     0.04     1.60     1.60   | 5.89e-13  5.97e-14  1.66e-14 |
 G02  |   288   288     0   288     0.26     0.03     1.27     1.27   | 5.70e-13  6.25e-14  1.19e-14 |
 G31  |   288   288     0   288     0.25     0.03     0.35     0.35   | 6.05e-13  7.87e-14  3.62e-14 |
 G14  |   288   288     0   288     0.24     0.03     1.04     1.04   | 6.58e-13  5.76e-14  2.72e-14 |
 G19  |   288   288     0   288     0.23     0.03     0.42     0.42   | 6.92e-13  8.37e-14  2.13e-14 |
 G07  |   288   288     0   288     0.23     0.03     0.38     0.38   | 6.45e-13  6.82e-14  1.32e-14 |
 G15  |   288   288     0   288     0.23     0.03     1.07     1.07   | 7.28e-13  6.01e-14  1.62e-14 |
 G29  |   288   288     0   288     0.22     0.03     0.13     0.13   | 7.61e-13  6.70e-14  4.38e-14 |
 G16  |   288   288     0   288     0.22     0.03     0.69     0.69   | 8.29e-13  6.50e-14  4.50e-14 |
 G05  |   288   288     0   288     0.22     0.03     0.56     0.56   | 6.61e-13  5.80e-14  2.07e-14 |
 G12  |   288   288     0   288     0.21     0.02     1.52     1.52   | 7.09e-13  7.29e-14  4.52e-14 |
 G22  |   288   288     0   185     0.20     0.02     2.42     2.42   | 6.52e-13  6.20e-14  1.18e-14 |
 NYAL |   288   276     4    82     0.07     0.01     0.01     0.01   | 7.88e-13  1.26e-13  2.22e-14 |
 G03  |   288   288     0   288     0.33     0.01     0.46     0.46   | 6.52e-14  2.08e-14  1.56e-14 |
 G13  |   288   288     0   288     0.22     0.01     0.05     0.05   | 7.33e-13  7.16e-14  3.12e-14 |
 G10  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.39e-12  4.08e-13  1.01e-13 |
 G11  |   288   287     0     0     0.00     0.00     0.00     0.00   | 7.61e-13  7.52e-14  8.98e-14 |
 G17  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.10e-13  8.06e-14  5.01e-14 |
 G20  |   288   288     0     0     0.00     0.00     0.00     0.00   | 9.08e-13  9.65e-14  2.28e-14 |
 G21  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.05e-12  1.48e-13  4.73e-14 |
 G24  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.10e-12  3.08e-13  1.92e-13 |
 G25  |   288   288     1     0     0.00     0.00     0.00     0.00   | 4.70e-14  2.09e-14  1.41e-14 |
 G28  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.04e-13  7.52e-14  7.36e-14 |
 GLSV |   286    98   120     0     0.00     0.00     0.00     0.00   | 9.13e-11  7.98e-12  1.15e-12 |
 GRAS |   288   260    10     0     0.00     0.00     0.00     0.00   | 3.08e-12  7.25e-13  1.34e-13 |
 HARB |   288   288     0     0     0.00     0.00     0.00     0.00   | 3.34e-13  4.47e-13  1.06e-13 |
 KOUR |   288   287     1     0     0.00     0.00     0.00     0.00   | 5.89e-14  1.15e-14  2.47e-15 |
 MAC1 |   288   267    10     0     0.00     0.00     0.00     0.00   | 3.79e-12  1.29e-12  3.30e-13 |
 NNOR |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.19e-12  1.34e-13  2.39e-14 |
 SANT |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.20e-12  3.84e-13  1.30e-13 |
 SYDN |   287   287     0     0     0.00     0.00     0.00     0.00   | 5.86e-13  1.43e-13  5.14e-14 |
 TLSE |   288   283     2     0     0.00     0.00     0.00     0.00   | 2.00e-12  6.80e-13  1.20e-13 |
 VILL |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.01e-12  1.12e-12  2.27e-13 |
 WHIT |   288   286     3     0     0.00     0.00     0.00     0.00   | 1.69e-12  1.01e-12  8.42e-13 |
 GPST |   288   287     1     0     0.00     0.00     0.00     0.00   | 1.51e-14  3.02e-15  2.06e-15 |
 GOLD |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.41e-12  3.17e-13  1.11e-13 |
 IRKJ |   288   288     0     0     0.00     0.00     0.00     0.00   | 3.48e-14  8.61e-15  1.00e-14 |
 BAKO |   288   208    42     0     0.00     0.00     0.00     0.00   | 3.08e-11  3.45e-12  3.91e-13 |
 POLV |   270     0    90     0     0.00     0.00     0.00     0.00   | 4.89e-12  1.35e-12  2.61e-13 |
 BRST |   216   216     0     0     0.00     0.00     0.00     0.00   | 1.50e-12  7.88e-13         - |
 MONP |   288   288     0     0     0.00     0.00     0.00     0.00   | 2.24e-12  4.93e-13  2.85e-13 |
 UZHL |   288   211    41     0     0.00     0.00     0.00     0.00   | 1.01e-11  1.34e-12  2.16e-13 |
 YARR |   286   247    17     0     0.00     0.00     0.00     0.00   | 4.00e-12  7.92e-13  4.29e-13 |
 KRGG |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
------+---------------------------------------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:                                         | 3.73e-22  4.90e-20  7.43e-19 |
----------------------------------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                                                   |     KRGG      KRGG      KOUR |
----------------------------------------------------------------------+------------------------------+
