
 cls-file Version 2.0
 GPS week: 1823   Day: 5   MJD: 57010                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 cod |  2880     0 123765     98    -398   -1563     14     14     14    114    123     86   15.83
 emr |  2880     0  89280      0    4160    -365     13     13      0    145    145      0   16.78
 esa |  2880     0 123313     58   -2275    1781     11     10     12    163    184     92   19.61
 gfz |  2871     0 132127  11574    -609    -211     14     14     15    181    183    176   15.37
 grg |  2880     0 121407   1214    -144     -20     16     14     20    166    155    187   12.89
 mit |  2880     0 118330   1419    -127    -222     25     25     23    157    165    125    7.68
 igr |   288     0  45873     49     407    -359     15     23     13     74     60     77    0.00
 jpl |   288     0  26740    268    4204    -373     17     18     16    118    143    102   11.84
 ngs |    96     0   2976     22    -524   -1416   1277   1277      0   2415   2415      0    0.00
 sio |     0     0      0      0       0       0      0      0      0      0      0      0    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   grg   mit   igr   jpl   ngs   sio |
 -----+-------------------------------------------------------------+
    1 |    92    73  -261     X    83   155   -86   154  1574     - |
    2 |  -205  -170    59   620  -263  -127   -69  -152  -604     - |
    3 |  -136   118   -66     X     -   170   -45   126   526     - |
    4 |    69    46  -134    67    95  -190   -46   -18  -862     - |
    5 |   136   112  -147   -47   -12   -46    92    73  -910     - |
    6 |  -118   295    -8     X   -25  -325    67   -98    38     - |
    8 |    10   -33    39    54     -  -179   146  -112 -3014     - |
    9 |    74   217   152  -600   230  -187   -39  -122   934     - |
   10 |  -169   -92   342    54  -120  -200    30  -180 -2796     - |
   11 |   -22  -161   -29   160     3   121   -63   165  5196     - |
   12 |    58    62  -122   -54   114   -46   -30   127 -1162     - |
   13 |    26    72     5   112  -259  -135    48   113  2058     - |
   14 |   -73  -131    46     4   184     1   -17    16  3230     - |
   15 |   201    52  -195  -113   114   -19    46   151 -1524     - |
   16 |   -33   -59   175    11  -122   -29    64  -235  2374     - |
   17 |   241    78  -274    30  -232   351    11    60 -2432     - |
   18 |   122   -61   -29    38  -218   225    30   127  2851     - |
   19 |  -110  -376   240   -61   277   100   -33   -43  -635     - |
   20 |   -67  -149   292     3   -87  -112    18  -181  3252     - |
   21 |    12   -88   160    -5  -276   235    20   -26  1884     - |
   22 |  -181  -213   307  -119   168    51     3  -258 -2396     - |
   23 |     9   -86   -70    34    99    84   -25   195 -1284     - |
   24 |    85   270  -195    18  -206    18    17   144   762     - |
   25 |  -144   110    40     5   -53    26   -41    46   550     - |
   26 |    18   120   -39    -7   -11  -173   -15    32 -2749     - |
   27 |   -44    63     3  -128   121    10   -56   -86   690     - |
   28 |  -127    -6   148   -86   170  -202    -1   -88  -629     - |
   29 |   284    79  -380    38    16    82    77   188 -1750     - |
   30 |   -49    77   -88     X    34   109   -80   -53    90     - |
   31 |    86   -67  -241    54    95   322   -65   -34 -1759     - |
   32 |   -44  -153   270   -79    16  -130    31   -40 -2191     - |
 -----+-------------------------------------------------------------+
 ABMF |     -     -    99  -126     -     -     -     -     -     - |
 ABPO |     -     -     -   -83     -     -    58   107     -     - |
 ALBH |    11     -     -  -152   202   -58     -     -     -     - |
 ALGO |    17     -     -  -188   216    -3    84   -12     -     - |
 ALIC |   -59     -   116  -197   225  -158   -26     -     -     - |
 ALRT |   -36     -     -  -152   236   -16     1     -     -     - |
 AMC2 |   -55     -     -    57     -     -    28     -     -     - |
 ANKR |     -     -   -34     -    51     -   -36     -     -     - |
 AREQ |     3     -     -  -113     -   168     3    33     -     - |
 AREV |     -     -   150  -191     -     -    34     -     -     - |
 ARTU |    14     -    -3  -228   219     -   -37    44     -     - |
 ASPA |   -73     -    50   -31     -     -    19    51     -     - |
 AUCK |    51     -   123  -121  -228    85     4    69     -     - |
 BAKE |     -     -   105  -173    46     -     4     -     -     - |
 BJCO |     -     -    68  -176     -     -    32   104     -     - |
 BJFS |   -16     -   -49  -127   168     -   -33    84     -     - |
 BOGT |   182     -   126  -226   -79     -   -36   -70     -     - |
 BOR1 |  -129     -     -    39   112     -   -60     -     -     - |
 BRAZ |    77     -    86   -97  -105     -    11     -     -     - |
 BREW |     -     -     -     -    39   -65     -     -     -     - |
 BRFT |   -22     -   145  -362   211   -80    46    81     -     - |
 BRMU |   -62     -    34  -109   118   -35     6    63     -     - |
 BRST |  -102     -  -130     -   371     -  -193     -     -     - |
 BRUX |   136     -     -  -140     -     -    81     -     -     - |
 BUCU |     -     -    13     -    29   -81     -     -     -     - |
 CAS1 |    13     -   123  -176   109  -191    -3     -     -     - |
 CHTI |   -37     -    62   -12   -99     -     3    69     -     - |
 CHUM |     -     -     -  -192   229     -     -     -     -     - |
 CHUR |   120     -    99  -184  -110     -    85    34     -     - |
 CNMR |     -     -     -   -67     -     -     -    87     -     - |
 COCO |     -     -     4     -     -     -   -92    -7     -     - |
 CONZ |     -     -   108  -138     -     -     -     -     -     - |
 CORD |    62     -    62  -164     -     -    31    28     -     - |
 CRO1 |   -67     -     -   -32   104    26    53     -     -     - |
 DAEJ |   174     -     -  -184     -   -10  -140     -     -     - |
 DAKR |     -     -   140  -179     -     -     -     -     -     - |
 DARW |     -     -   210  -186   -49  -118    17     -     -     - |
 DAV1 |   -19     -    58  -127   173  -145     2     -     -     - |
 DGAR |   109     -     -  -123    15     -     -     -     -     - |
 DGAV |     -     -    42  -182     -     -     3   166     -     - |
 DRAG |     -     -    85  -191   152   -88     -     -     -     - |
 DRAO |    12     -    48  -257   178    43     5     -     -     - |
 DUBO |    10     -    70  -203   145   -36    -2     -     -     - |
 FAIR |   -61     -     -  -223   344    -5     -     -     -     - |
 FLIN |   -59     -   125  -195   200  -141    20     -     -     - |
 GLPS |     3     -    66  -106     -     -     -    25     -     - |
 GLSV |    90     -    21   -56   -52   -64    40    16     -     - |
 GMSD |     -     -    77  -157     -   118     7     -     -     - |
 GODE |    20     -     -  -106   161   -99    40     -     -     - |
 GOLD |    38     -    94  -187    76   -72   -15     -     -     - |
 GOPE |   147     -     -  -183   -51   148     -     -     -     - |
 GRAS |   -15     -   109  -111     -   -25   -14     -     -     - |
 GRAZ |  -103     -   163   -72    16   -88   -25     -     -     - |
 GUAT |     -     -     -   -12     -    24     -     -     -     - |
 GUUG |     -     -    50   -17  -190   215     -     -     -     - |
 HARB |  -134     -    79  -282   534  -247  -104     -     -     - |
 HERS |   -59     -   102     -     -  -137   -44     -     -     - |
 HERT |     -     -    13     -   -20     -     -     -     -     - |
 HLFX |     -     -    78     -  -119     -     -     -     -     - |
 HNPT |     -     -     -   -81   128   -53     -     -     -     - |
 HOB2 |   -12     -    80   -97   127  -103    -9   -57     -     - |
 HOFN |  -131     -   203  -231   127     -   -12     -     -     - |
 HOLB |    33     -     -   -97    75     -    18     -     -     - |
 HOLM |    80     -   127  -191     -  -108     -     -     -     - |
 HRAO |   -98     -     -     -    57   109   -58     -     -     - |
 HYDE |    61     -    63  -166    20    11    38     -     -     - |
 IENG |    16     -     -     -     -   -33    14     -     -     - |
 IISC |    77     -     -  -235    85     -   -31   109     -     - |
 INVK |    44     -     -  -162    41    40     9    81     -     - |
 IRKJ |     -     -    98  -190    90  -109     -    57     -     - |
 ISPA |    24     -    91  -103   -54     -    37    11     -     - |
 JOZ2 |     -     -    17     -   -30     7     -     -     -     - |
 JPLM |     -     -     -   -15     -    30   -92     -     -     - |
 KELY |     -     -    55  -145   210  -186    27   -11     -     - |
 KERG |    51     -   -33  -155   162    23   -29     -     -     - |
 KIRI |     -     -     -     -     -   221     -  -144     -     - |
 KIRU |    16     -    -3  -105   111     -     1     -     -     - |
 KOKB |  -129     -     -     -   192   -57   -87     1     -     - |
 KOKV |     -     -    98  -125     -     -   101     -     -     - |
 KOUC |     -     -    45   -58     X     -     -     -     -     - |
 KOUR |   -30     -    90  -212    71     X     3    91     -     - |
 KUUJ |     -     -    15     -     -     -   -29   -25     -     - |
 LAMA |   -37     -     -  -132   231   -46    -7     -     -     - |
 LHAZ |     -     -    -4     -     6     -   -14     -     -     - |
 LPGS |     -     -    33     -   -50     -    48     -     -     - |
 MAC1 |   -14     -    95   -80   -55    -2    20    26     -     - |
 MAG0 |   133     -    65  -192     -     -    -9     -     -     - |
 MAL2 |  -105     -    81  -211   257     -   -51     -     -     - |
 MAR6 |     -     -   -45     -    38    19     -    20     -     - |
 MAS1 |  -114     -    77  -129    93     -   -15    91     -     - |
 MATE |   -30     -    42  -177    42   128   -44    73     -     - |
 MAW1 |    -3     -    57  -126    11    56     0    26     -     - |
 MCIL |     -     -    73   -94     -     -     -     -     -     - |
 MCM4 |  -179     -     -  -215   445    53   -88     -     -     - |
 MDVJ |    61     -    -2  -103   -21   137     -     -     -     - |
 MEDI |     2     -     -     -     -    -5   -40     -     -     - |
 METS |    48     -     -   -50     -     -    94     -     -     - |
 MIZU |    85     -     -  -212     -   251  -126     -     -     - |
 MOBS |     -     -    95     -   -59  -145     -     -     -     - |
 MONP |    26     -   148     -  -303    58     -     -     -     - |
 MORP |     -     -     -  -240     -     -    74   311     -     - |
 NAIN |     -     -     -  -128    35     -     -   127     -     - |
 NAMA |     -     -    86  -233     -     -     -   160     -     - |
 NANO |    -9     -   123  -138   -11     -     3     -     -     - |
 NICO |  -140     -    97   -17    46     -    19     -     -     - |
 NKLG |   -71     -    47  -292   362     -  -162     -     -     - |
 NNOR |     -     -    41     -    56  -198    51     -     -     - |
 NOVM |     -     -    70  -149    82     -     -    -8     -     - |
 NRC1 |    35     -     -  -162   226  -127   -51     -     -     - |
 NRIL |    24     -   123  -173  -212   201    32    90     -     - |
 NYA1 |   -47     -   150  -171    33     -  -137     -     -     - |
 NYAL |     -     -     -  -113   258  -207     -     -     -     - |
 OHI2 |     -     -   -45     -    68     -     -     -     -     - |
 OHI3 |     -     -   -21     -   108  -128     -     -     -     - |
 ONSA |  -105     -    31   -73   170     -    92     -     -     - |
 OPMT |    39     -     -   -79     -    81     -     -     -     - |
 OUS2 |     -     -    -3     -     5     -    43     -     -     - |
 PALM |     -     -     -  -255   372  -114     -     -     -     - |
 PARC |     -     -     -   -34   171     -     -  -142     -     - |
 PBRI |     -     -   139  -177     -     -     -     -     -     - |
 PDEL |    12     -    99  -122     0   -40     4     4     -     - |
 PENC |   -63     -     -     -    77     -     -     -     -     - |
 PERT |   -66     -     5  -232   368   -55   -83     -     -     - |
 PETS |     -     -     -  -177     -     -    78   230     -     - |
 PIE1 |    -9     -    38  -145   125     -   -15     -     -     - |
 PIMO |    61     -   108   -89  -169    60    52     1     -     - |
 POHN |     -     -    -8     -     -     -     -    13     -     - |
 POL2 |     2     -     -  -145   171     -     9     -     -     - |
 POLV |     -     -     -    12   -88   124     -     -     -     - |
 POTS |     -     -    44     -   -66     -    77     -     -     - |
 PRDS |   291     -     -  -300     -     -   290     -     -     - |
 PTBB |   -26     -    25     -     -    -8    -8     -     -     - |
 QAQ1 |   -68     -    45  -118   211   -93    24     -     -     - |
 QIKI |     -     -     -    35   -41     -     -     -     -     - |
 QUIN |   -39     -    31     -     -     -     -     -     -     - |
 RABT |    -8     -     -  -236   301     -     -   -11     -     - |
 RBAY |    53     -     -  -347   450     -   -60     -     -     - |
 RECF |     -     -   147  -188     -     -     -     -     -     - |
 RESO |    97     -     -  -100     -     -    63     -     -     - |
 REUN |   -86     -    66  -244   255     -  -132     -     -     - |
 REYK |     -     -     -  -133   159     -     -     -     -     - |
 SALU |     -     -    95  -121     -     -     -     -     -     - |
 SANT |    53     -     -  -217   197    -5   -25     -     -     - |
 SAVO |     -     -   158  -202     -     -     -     -     -     - |
 SCH2 |    86     -     -   -92     -     8     -     -     -     - |
 SEY1 |     -     -     -  -195     -     X    87   253     -     - |
 SFER |     -     -    76   -94    14   -28     -     -     -     - |
 SOFI |     -     -    36  -175   296  -238     -     -     -     - |
 SPT0 |   -55     -     -     -    68     -   -25     -     -     - |
 SSIA |    -2     -     -  -253   224     -   -38    87     -     - |
 STHL |     -     -    22  -113     -     -   -50   109     -     - |
 STJO |    81     -     -  -244   -99   103     -   247     -     - |
 STR2 |     -     -     -     -    95  -159     -     -     -     - |
 SUTH |  -135     -     -     -   166     -     -     -     -     - |
 SUTV |     -     -   142  -182     -     -     -     -     -     - |
 SUWN |    71     -   150  -198     -  -132   -95     -     -     - |
 SVTL |     -     -   -11     -    17     -  -111     -     -     - |
 SYDN |   -66     -    54     -     -     -   128     -     -     - |
 SYOG |   -72     -     1  -238   466  -159  -251     -     -     - |
 TAH1 |    64     -     -     -   -85     -     -     8     -     - |
 THTI |     -     -   205  -342    99     -    34     -     -     - |
 THU2 |     -     -    91  -116     -     -     -     X     -     - |
 THU3 |   -68     -     -  -176   309   -26    -9     -     -     - |
 TIDB |   -33     -     -  -157   113   193     3     -     -     - |
 TIXI |     -     -    43     -  -123     -   -34    63     -     - |
 TLSE |    50     -   -19  -280   373  -120  -161     -     -     - |
 TNML |     -     -     -     -    14   -92     -    44     -     - |
 TOW2 |  -158     -    93  -220   289   -81   -36    82     -     - |
 TRO1 |  -166     -   156  -213   175     -   -37    46     -     - |
 TSKB |   255     -     -  -234     -   -56   -65     -     -     - |
 TUVA |     -     -     5     -     -     -     -    -8     -     - |
 TWTF |    66     -     -  -116     1    93    60     -     -     - |
 URUM |     -     -   -73     -   240     -  -273  -141     -     - |
 USNO |    27     -     -     -     -   -55     -     -     -     - |
 USUD |    26     -     -  -126     -   205    38     -     -     - |
 UZHL |     -     -    44   -56     -     -     -     -     -     - |
 VALP |     -     -     -   -57     -   114     -     -     -     - |
 VILL |   129     -    48  -172    -8   -31    54     -     -     - |
 VNDP |     -     -     -     -   122     -     -  -133     -     - |
 WAB2 |    99     -     -  -164     -   124   118     -     -     - |
 WES2 |   -33     -    93  -184   162   -73    30     -     -     - |
 WHIT |   -13     -    58     -   -92     -    -4     -     -     - |
 WILL |   -55     -     -  -168   269   -15     -    -2     -     - |
 WIND |     -     -   -74     -   113     -   -26     -     -     - |
 WSRT |   -74     -     -   172   -42  -115   -45     -     -     - |
 WTZA |    16     -     -     -     -   -32    29     -     -     - |
 WTZR |  -151     -   142  -222   375  -229  -192     -     -     - |
 WUHN |   -82     -     -  -239   370     -   -92     -     -     - |
 XMIS |     -     -   -74  -263   419     -   -96     -     -     - |
 YAKT |    17     -    64  -162     -     -    32    81     -     - |
 YAR2 |    60     -     -   -62     -     -     -     -     -     - |
 YAR3 |     -     -     -     -     -  -163     -   105     -     - |
 YEBE |     -     -     -     -    14   -23    33     -     -     - |
 YELL |    60     -    53  -327   204     6   -40    29     -     - |
 YIBL |     -     -     -  -244     -   488     -     -     -     - |
 YKRO |   141     -     -  -145     -     -   166     -     -     - |
 YSSK |    59     -     -  -170     -     -    32   143     -     - |
 ZECK |    27     -    19  -195   234  -107   -91     -     -     - |
 ZIMM |   -67     -     -     -    82     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   cod   emr   esa   gfz   grg   mit   igr   jpl   ngs   sio | NEPO    RMS
 -----+-------------------------------------------------------------+-------------
    1 |    13    14    16     X    12    10    24    22   302     - | 2880    106
    2 |    17    11    10    12    13    34    30    19   446     - | 2880    235
    3 |    10    14    10     X     -    16    20    21   297     - | 2880    659
    4 |     9    13     9     8    11    26    20     8  2269     - | 2880    524
    5 |    15    11     8    13    10    15    15    12   362     - | 2880    239
    6 |    10    12    12     X    13    36    15    19   361     - | 2880    173
    8 |    16    18    16    18     -    55    29    19  2905     - | 2880   3937
    9 |    13    13     7     9    13    16    16    19   442     - | 2880    355
   10 |    12    10     7    16     9    32    22    21  2187     - | 2880   1276
   11 |    13    12    12     9    16     9    27    20   747     - | 2880    508
   12 |    16    10     8    17    15    25    29    20   399     - | 2880    337
   13 |    14    15    15    39    23    20    23    26  1742     - | 2880    709
   14 |    12    14    12    17    16    27    20    12   694     - | 2880    183
   15 |    19    14    11    11    14    20    20    21   261     - | 2880    254
   16 |    14    17     8    13    17    24    36    27   449     - | 2880    328
   17 |    11    19    12     7    15    20    20    13  1087     - | 2880    320
   18 |    11    12     7    15    15    33    20    17   819     - | 2880    251
   19 |    16    18    11     8    15    26    21    11   322     - | 2880    214
   20 |    12    17     8    10     9    24    21    22   509     - | 2880    236
   21 |    16    15     7     8    17    25    12    16   597     - | 2880    296
   22 |    11    15     8     7    15    22    32    29  1119     - | 2880    319
   23 |     9    14    10     9    14    13    27    24   415     - | 2880    213
   24 |    17    13    10    12    16    20    23    20  2730     - | 2880   1226
   25 |    25    12     9    12    14    28    23    15   391     - | 2880    212
   26 |    18    12    13     9    16    24    24    14   608     - | 2880    473
   27 |    13    20    14    13    17    31    26    13   732     - | 2880    252
   28 |    13    10    12    14    14    29    15    16  3274     - | 2880    496
   29 |    11    11    10    14    12    18    32    25   888     - | 2880    302
   30 |    19     9    13     X    14    19    11    21   323     - | 2880    350
   31 |    13    17     9    13    21    26    24    11   518     - | 2880    455
   32 |    11    14     8    12    10    26    13    12  2138     - | 2880    836
 -----+-------------------------------------------------------------+-------------
 ABMF |     -     -    13    17     -     -     -     -     -     - |  288  13378
 ABPO |     -     -     -     9     -     -     7    12     -     - |  288  18289
 ALBH |    12     -     -    14    16    19     -     -     -     - |  288   9874
 ALGO |    18     -     -    14    15    16    11     8     -     - |  288     86
 ALIC |    16     -    12    16    24    25    10     -     -     - |  288   2892
 ALRT |     7     -     -     8    10    14    10     -     -     - |  288   7973
 AMC2 |     9     -     -     9     -     -    16     -     -     - |  288     15
 ANKR |     -     -     8     -    13     -    15     -     -     - |  288    >>>
 AREQ |    16     -     -    19     -    23    14    11     -     - |  288  10748
 AREV |     -     -    10    12     -     -     6     -     -     - |  288  10731
 ARTU |     9     -     7    11    14     -     9     9     -     - |  287  19428
 ASPA |    17     -    13    20     -     -    11    15     -     - |  288  14616
 AUCK |    14     -    12    17    19    21    13    12     -     - |  288   8627
 BAKE |     -     -     8     8    14     -     8     -     -     - |  288   8962
 BJCO |     -     -     8    11     -     -     5    12     -     - |  288  11811
 BJFS |    16     -    12    10    25     -    11     6     -     - |  288  14285
 BOGT |    22     -    26    22    27     -    20    22     -     - |  288  28067
 BOR1 |    13     -     -    14    16     -    11     -     -     - |  288  17579
 BRAZ |    28     -    17    32    27     -    20     -     -     - |  268  12464
 BREW |     -     -     -     -    11    19     -     -     -     - |  288     50
 BRFT |    35     -    13    17    22    19     9    20     -     - |  288   2518
 BRMU |    13     -    15    15    27    22     9     7     -     - |  288   5645
 BRST |    13     -    11     -    20     -    12     -     -     - |  235   1545
 BRUX |     9     -     -     9     -     -     9     -     -     - |  288    379
 BUCU |     -     -     9     -    14    12     -     -     -     - |  288   5056
 CAS1 |    11     -    10    15    14    31    12     -     -     - |  288   6559
 CHTI |    12     -     8    13    17     -    10     9     -     - |  288   8417
 CHUM |     -     -     -    13    15     -     -     -     -     - |  288  19174
 CHUR |    13     -    10     9    21     -     8     8     -     - |  288  47248
 CNMR |     -     -     -    15     -     -     -    19     -     - |  256  25903
 COCO |     -     -     7     -     -     -    13    11     -     - |  288    >>>
 CONZ |     -     -    14    18     -     -     -     -     -     - |  288   2829
 CORD |    14     -    10    20     -     -    11    15     -     - |  288  11735
 CRO1 |    25     -     -    21    25    21    12     -     -     - |  288     31
 DAEJ |    10     -     -    14     -    25    10     -     -     - |  288   4547
 DAKR |     -     -     7     8     -     -     -     -     -     - |  288  15063
 DARW |     -     -    24    37    37    42    21     -     -     - |  288   3679
 DAV1 |    11     -     8    15    20    19     8     -     -     - |  288   6003
 DGAR |    20     -     -    22    21     -     -     -     -     - |  288  27138
 DGAV |     -     -    17    18     -     -    12    21     -     - |  288  13530
 DRAG |     -     -    13    12    18    23     -     -     -     - |  288   3529
 DRAO |    13     -    10    11    16    16    11     -     -     - |  288  10630
 DUBO |     9     -    11    11    13    37     6     -     -     - |  287   7295
 FAIR |     7     -     -    10    15    28     -     -     -     - |  288  11176
 FLIN |    13     -    10    10    19    37    10     -     -     - |  288   8799
 GLPS |    10     -     8     9     -     -     -    10     -     - |  288  28799
 GLSV |    15     -    11    12    15    18     7    10     -     - |  288   2158
 GMSD |     -     -    11    12     -    26     8     -     -     - |  288   5924
 GODE |    11     -     -    11    13    13    11     -     -     - |  288     94
 GOLD |    10     -    13    20    18    17    10     -     -     - |  288   3108
 GOPE |    12     -     -    19    26    30     -     -     -     - |  288    718
 GRAS |    15     -     8    14     -    16     8     -     -     - |  288   2587
 GRAZ |    12     -     8    11    19    20    11     -     -     - |  288   2848
 GUAT |     -     -     -    10     -    21     -     -     -     - |  288   2679
 GUUG |     -     -    20    27    37    37     -     -     -     - |  288   8990
 HARB |    13     -    16    16    25    31    21     -     -     - |  288   1443
 HERS |    12     -    12     -     -    21    18     -     -     - |  288     24
 HERT |     -     -    11     -    17     -     -     -     -     - |  288   2784
 HLFX |     -     -     7     -    11     -     -     -     -     - |  176   2947
 HNPT |     -     -     -    11    13    13     -     -     -     - |  288   2627
 HOB2 |    18     -    14    19    25    34    22    15     -     - |  288    136
 HOFN |    13     -     7    11    17     -     9     -     -     - |  288  16454
 HOLB |    21     -     -    14    25     -    13     -     -     - |  288  11347
 HOLM |    10     -    10     8     -    14     -     -     -     - |  288  10313
 HRAO |    19     -     -     -    27    40    19     -     -     - |  288     42
 HYDE |    11     -    11    11    16    18     9     -     -     - |  288   2867
 IENG |     5     -     -     -     -    11    10     -     -     - |  288     65
 IISC |    14     -     -    12    15     -    13    14     -     - |  288  29780
 INVK |     7     -     -    10    12    16    10    10     -     - |  288   9141
 IRKJ |     -     -     7     9    17    16     -     7     -     - |  288    169
 ISPA |    17     -    18    18    27     -     7    13     -     - |  288  22606
 JOZ2 |     -     -    10     -    11    22     -     -     -     - |  288   5228
 JPLM |     -     -     -     8     -    16    13     -     -     - |  288   5194
 KELY |     -     -     8    10    12    19    13     7     -     - |  288   9883
 KERG |    19     -    24    24    36    34    19     -     -     - |  288   7891
 KIRI |     -     -     -     -     -    20     -    13     -     - |  288  10850
 KIRU |    12     -     8     7    16     -     8     -     -     - |  288  13933
 KOKB |    20     -     -     -    19    21    17    11     -     - |  288    152
 KOKV |     -     -    13    17     -     -     7     -     -     - |  288    149
 KOUC |     -     -    12    15     X     -     -     -     -     - |  286  11396
 KOUR |    15     -    15    19    28     X     9    15     -     - |  288     41
 KUUJ |     -     -     4     -     -     -     5     7     -     - |  288   5891
 LAMA |    11     -     -    15    18    24    10     -     -     - |  288   2680
 LHAZ |     -     -    25     -    38     -    10     -     -     - |  266    >>>
 LPGS |     -     -    20     -    30     -    19     -     -     - |  287    >>>
 MAC1 |    19     -    11    18    18    27     8    10     -     - |  288   2259
 MAG0 |    23     -    22    27     -     -    37     -     -     - |  279   6537
 MAL2 |    11     -    10    13    22     -     9     -     -     - |  288  13328
 MAR6 |     -     -    10     -    19    13     -     8     -     - |  288    264
 MAS1 |    13     -     9    13    20     -     4     8     -     - |  288  17859
 MATE |    11     -     9    12    17    12     7     9     -     - |  288    196
 MAW1 |    15     -     7    15    16    17    13    16     -     - |  288   3627
 MCIL |     -     -     9    12     -     -     -     -     -     - |  288   9060
 MCM4 |    18     -     -    12    20    30    15     -     -     - |  288  10393
 MDVJ |    18     -    12    10    30    47     -     -     -     - |  288     43
 MEDI |     8     -     -     -     -    17    14     -     -     - |  288     22
 METS |     7     -     -     8     -     -    13     -     -     - |  287  14365
 MIZU |    14     -     -    12     -    21    12     -     -     - |  288    902
 MOBS |     -     -    12     -    14    25     -     -     -     - |  288   2949
 MONP |    25     -    21     -    41    34     -     -     -     - |  288   8627
 MORP |     -     -     -     8     -     -     6    11     -     - |  273  17322
 NAIN |     -     -     -    31    21     -     -    20     -     - |  288  13092
 NAMA |     -     -     8    10     -     -     -     8     -     - |  288  11725
 NANO |    13     -     9    12    18     -    10     -     -     - |  288   3022
 NICO |    15     -    13    13    20     -    12     -     -     - |  288  16683
 NKLG |    13     -    13    15    27     -    14     -     -     - |  288  11914
 NNOR |     -     -    11     -    16    18    19     -     -     - |  288    535
 NOVM |     -     -     9    11    25     -     -    10     -     - |  288     52
 NRC1 |     8     -     -     9    12    13     8     -     -     - |  288     20
 NRIL |    10     -     9    10    15    19     9     8     -     - |  288  12053
 NYA1 |    11     -     6     8    16     -     6     -     -     - |  288  21869
 NYAL |     -     -     -     9     8    11     -     -     -     - |  288    408
 OHI2 |     -     -    13     -    20     -     -     -     -     - |  287    >>>
 OHI3 |     -     -    12     -    14    26     -     -     -     - |  288    188
 ONSA |    11     -     9    13    24     -    11     -     -     - |  288     33
 OPMT |     7     -     -    13     -    19     -     -     -     - |  288     20
 OUS2 |     -     -    14     -    22     -    20     -     -     - |  288    >>>
 PALM |     -     -     -    12    12    17     -     -     -     - |  288  10034
 PARC |     -     -     -    13    19     -     -    12     -     - |  288  13996
 PBRI |     -     -     8    10     -     -     -     -     -     - |  288   3953
 PDEL |    12     -     8     9    12    11     7     7     -     - |  288   2831
 PENC |    15     -     -     -    18     -     -     -     -     - |  288   3303
 PERT |    17     -    13    18    19    23    10     -     -     - |  288   9697
 PETS |     -     -     -     6     -     -     7     8     -     - |  287   8913
 PIE1 |    18     -     9    10    13     -     5     -     -     - |  288     27
 PIMO |    22     -    16    17    30    35    12    14     -     - |  288  10581
 POHN |     -     -    31     -     -     -     -    51     -     - |  173  10987
 POL2 |     8     -     -     7    13     -    10     -     -     - |  288  12813
 POLV |     -     -     -    12    12    17     -     -     -     - |  288   2137
 POTS |     -     -    11     -    17     -    16     -     -     - |  288    >>>
 PRDS |    11     -     -    11     -     -     9     -     -     - |  257    114
 PTBB |    10     -    14     -     -    22    17     -     -     - |  288     18
 QAQ1 |    20     -    11    12    22    30    13     -     -     - |  288   4386
 QIKI |     -     -     -     8    10     -     -     -     -     - |  288  13432
 QUIN |     8     -     7     -     -     -     -     -     -     - |  288  16206
 RABT |     7     -     -    10    14     -     -     6     -     - |  288  19130
 RBAY |    24     -     -    26    38     -    19     -     -     - |  145   8345
 RECF |     -     -    11    15     -     -     -     -     -     - |  288  12547
 RESO |     6     -     -     7     -     -     8     -     -     - |  288   9918
 REUN |    21     -    42    45    28     -    35     -     -     - |  233   6130
 REYK |     -     -     -    16    19     -     -     -     -     - |  267  15754
 SALU |     -     -    19    24     -     -     -     -     -     - |  288  11118
 SANT |    21     -     -    19    18    17    14     -     -     - |  288   1158
 SAVO |     -     -    11    14     -     -     -     -     -     - |  283  12552
 SCH2 |    14     -     -     9     -    22     -     -     -     - |  288   6312
 SEY1 |     -     -     -    26     -     X    27    34     -     - |  268  11450
 SFER |     -     -     6    12    14    19     -     -     -     - |  288     32
 SOFI |     -     -     9    11    14    18     -     -     -     - |  288   6573
 SPT0 |    17     -     -     -    20     -    11     -     -     - |  192     42
 SSIA |    14     -     -    14    20     -     9    15     -     - |  288  11915
 STHL |     -     -    16    25     -     -    12    43     -     - |  288  28159
 STJO |    22     -     -    25    33    32     -    18     -     - |  288    329
 STR2 |     -     -     -     -    16    27     -     -     -     - |  288   5339
 SUTH |     9     -     -     -    11     -     -     -     -     - |  288  25586
 SUTV |     -     -    10    12     -     -     -     -     -     - |  288  11807
 SUWN |     9     -     8     9     -    23     7     -     -     - |  288   4582
 SVTL |     -     -     8     -    12     -    12     -     -     - |  288     39
 SYDN |    15     -    12     -     -     -    23     -     -     - |  287    778
 SYOG |    10     -     8    12    14    17    13     -     -     - |  288   7467
 TAH1 |    22     -     -     -    25     -     -    25     -     - |  288    412
 THTI |     -     -    18    18    27     -    14     -     -     - |  288  16326
 THU2 |     -     -     6     7     -     -     -     X     -     - |  288  47759
 THU3 |    11     -     -    13    16    17    12     -     -     - |  288   8371
 TIDB |    19     -     -    20    22    34    20     -     -     - |  288     40
 TIXI |     -     -    10     -    16     -    13    25     -     - |  288    >>>
 TLSE |     9     -     9    13    18    21    10     -     -     - |  288   1657
 TNML |     -     -     -     -    15    23     -    20     -     - |  288   2644
 TOW2 |    21     -    12    19    25    24     8    15     -     - |  288   5350
 TRO1 |     9     -     6     9    17     -    11    13     -     - |  288  19467
 TSKB |    12     -     -    11     -    20    11     -     -     - |  288  11250
 TUVA |     -     -    34     -     -     -     -    56     -     - |  172  13238
 TWTF |    14     -     -    15    20    24    12     -     -     - |  288    126
 URUM |     -     -    11     -    20     -    17     8     -     - |  288    >>>
 USNO |     6     -     -     -     -    13     -     -     -     - |  288     45
 USUD |    25     -     -    15     -    40    17     -     -     - |  288     27
 UZHL |     -     -     5     7     -     -     -     -     -     - |  288   1449
 VALP |     -     -     -    15     -    31     -     -     -     - |  281  11131
 VILL |    13     -    11    15    19    24     9     -     -     - |  288   4030
 VNDP |     -     -     -     -    14     -     -    15     -     - |  288  13167
 WAB2 |    10     -     -    13     -    13    14     -     -     - |  288     45
 WES2 |     9     -     8    13    14    31     6     -     -     - |  288   3527
 WHIT |    16     -    13     -    11     -    18     -     -     - |  285    >>>
 WILL |    10     -     -    11    17    38     -    14     -     - |  288  10635
 WIND |     -     -    11     -    16     -    11     -     -     - |  288    >>>
 WSRT |    25     -     -    49    30    13    34     -     -     - |  288     21
 WTZA |    14     -     -     -     -    29    14     -     -     - |  288    802
 WTZR |    12     -    11    17    20    31    13     -     -     - |  288     25
 WUHN |    16     -     -    16    17     -    12     -     -     - |  240   3265
 XMIS |     -     -    19    27    30     -    13     -     -     - |  288  15123
 YAKT |    11     -     9    13     -     -     9    10     -     - |  287 191440
 YAR2 |    16     -     -    16     -     -     -     -     -     - |  288  13866
 YAR3 |     -     -     -     -     -    24     -    15     -     - |  288   5936
 YEBE |     -     -     -     -     7    11    18     -     -     - |  287    148
 YELL |     8     -     7     8     9    18     5    11     -     - |  288     16
 YIBL |     -     -     -    10     -    19     -     -     -     - |  282  11705
 YKRO |    13     -     -    13     -     -    19     -     -     - |  288  27632
 YSSK |    10     -     -    11     -     -    11    10     -     - |  287   7051
 ZECK |     6     -    10     9    13    21    10     -     -     - |  288     41
 ZIMM |    34     -     -     -    42     -     -     -     -     - |  219  13741
 -----+-------------------------------------------------------------+-------------
 TOT  |    14    14    11    15    17    25    16    17  1278     - |




CLOCK JUMP CORRECTIONS APPLIED
------------------------------

CEN | STA/SAT | EPOCH           |     JUMP(ps)
----+---------+-----------------+-------------
esa |   BJFS  | 1823-5 21:35:00 |         621
grg |     13  | 1823-5 13:00:00 |         759
grg |   SOFI  | 1823-5 23:55:00 |        -699
mit |   KOUR  | 1823-5  0:55:00 |        1513



-----------------------------------------------------------------------------------------------------
-----------------------------------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN     MEAN     MEAN     MEAN   | HADAMARD DEVIATION AT TAU =  |
      | NREPO NBEPO  BRKS  USED    WGT1(%)  WGT2(%)  WGT3(%)  WGT4(%) |     300s     3600s    21600s |
------+---------------------------------------------------------------+------------------------------+
 ALGO |   288   287     1   288     3.98     4.05     2.29     2.29   | 2.69e-14  8.93e-15  1.01e-14 |
 AMC2 |   288   285     1   288     3.72     4.05     4.04     4.04   | 4.31e-14  5.49e-15  1.38e-15 |
 GODE |   288   287     1   288     2.63     4.05     2.27     2.27   | 4.60e-14  1.05e-14  9.71e-15 |
 MDVJ |   288   285     1   288     3.66     4.05     4.04     4.04   | 6.89e-14  8.20e-15  5.62e-15 |
 ONSA |   288   285     1   288     3.30     4.05     4.04     4.04   | 4.94e-14  1.10e-14  1.94e-15 |
 OPMT |   288   288     0   288     3.35     4.05     4.04     4.04   | 4.61e-14  7.61e-15  2.30e-15 |
 PIE1 |   288   288     1   288     3.99     4.05     2.68     2.68   | 2.44e-14  4.53e-15  2.24e-15 |
 PTBB |   288   288     0   288     3.98     4.05     4.04     4.04   | 3.04e-14  7.26e-15  1.97e-15 |
 TWTF |   288   285     1   288     3.03     4.05     4.04     4.04   | 5.69e-14  8.38e-15  9.47e-15 |
 WTZR |   288   288     0   288     2.67     4.05     0.40     0.40   | 5.07e-14  1.36e-14  1.56e-15 |
 YELL |   288   288     0   288     3.99     4.05     2.99     2.99   | 2.86e-14  4.42e-15  9.15e-16 |
 ZECK |   288   288     0   288     3.40     4.05     4.04     4.04   | 2.89e-14  5.31e-15  3.86e-15 |
 MEDI |   288   287     1   288     3.43     4.05     1.21     1.21   | 3.65e-14  8.29e-15  1.80e-15 |
 USNO |   288   285     1   288     2.66     4.05     1.07     1.07   | 4.32e-14  7.63e-15  2.80e-15 |
 HERS |   288   288     0   288     3.70     4.05     4.04     4.04   | 3.37e-14  8.27e-15  2.66e-15 |
 SFER |   288   288     0   288     2.46     4.05     1.72     1.72   | 3.66e-14  6.51e-15  3.15e-15 |
 KOUR |   288   288     0   288     2.47     4.00     0.67     0.67   | 5.06e-14  8.26e-15  4.71e-15 |
 IRKJ |   288   285     1   288     2.30     3.69     1.05     1.05   | 6.02e-14  8.86e-15  5.68e-15 |
 KOKV |   288   287     1   288     2.27     3.60     0.60     0.60   | 3.56e-14  9.51e-15  3.35e-15 |
 STJO |   288   285     1   269     1.95     2.85     0.36     0.36   | 6.78e-14  2.57e-14  3.31e-14 |
 SPT0 |   192   189     1   192     2.44     2.69     2.68     2.68   | 5.29e-14  1.27e-14         - |
 IENG |   288   288     0   288     1.83     2.33     0.87     0.87   | 6.55e-14  1.39e-14  3.56e-15 |
 SVTL |   288   285     1   288     1.63     1.84     0.74     0.74   | 6.68e-14  7.73e-15  2.06e-15 |
 PRDS |   257   254     1   257     1.53     1.84     0.84     0.84   | 2.47e-13  8.00e-14  2.64e-14 |
 NOVM |   288   288     0   288     1.58     1.74     0.89     0.89   | 1.04e-13  1.03e-14  3.12e-15 |
 KOKB |   288   287     1   288     1.54     1.66     4.04     4.04   | 1.03e-13  1.20e-14  4.99e-15 |
 CRO1 |   288   288     0   288     1.49     1.55     1.26     1.26   | 1.17e-13  1.39e-14  2.86e-15 |
 BREW |   288   288     0   288     1.45     1.47     4.04     4.04   | 1.11e-13  1.06e-14  2.85e-15 |
 USUD |   288   288     0   288     1.41     1.38     3.61     3.61   | 1.01e-13  1.02e-14  1.81e-15 |
 TIDB |   288   288     1   288     1.32     1.21     2.08     2.08   | 1.24e-13  1.60e-14  3.81e-15 |
 OHI3 |   288   288     0   288     0.80     0.45     0.04     0.04   | 4.78e-14  6.69e-15  2.39e-14 |
 G01  |   288   288     0   288     3.99     0.32     4.04     4.04   | 5.86e-14  1.60e-14  1.02e-14 |
 HRAO |   288   288     0   288     0.67     0.32     0.04     0.04   | 6.00e-14  1.43e-14  3.80e-15 |
 G30  |   288   288     0   288     3.99     0.31     4.04     4.04   | 5.66e-14  2.99e-14  3.89e-14 |
 WSRT |   288   288     0   288     0.62     0.27     0.14     0.14   | 3.53e-14  1.29e-14  2.97e-15 |
 WAB2 |   288   288     0   288     0.59     0.24     0.66     0.66   | 3.91e-14  7.89e-15  1.32e-15 |
 YEBE |   287   284     1   287     0.58     0.23     0.47     0.47   | 1.36e-13  2.49e-14  1.63e-14 |
 NRC1 |   288   288     0   288     0.40     0.11     0.28     0.28   | 3.20e-14  5.97e-15  1.34e-15 |
 HOB2 |   288   288     0   288     0.38     0.10     0.07     0.07   | 1.00e-13  2.94e-14  1.60e-14 |
 G18  |   288   288     0   288     0.26     0.09     1.01     1.01   | 8.75e-13  7.68e-14  3.21e-14 |
 G32  |   288   288     0   288     0.54     0.08     0.95     0.95   | 2.17e-13  6.95e-14  1.25e-13 |
 G06  |   288   288     0   288     2.36     0.08     4.04     4.04   | 7.53e-14  2.27e-14  1.07e-14 |
 TAH1 |   288   288     0   288     0.33     0.08     0.24     0.24   | 3.52e-13  7.61e-14  3.86e-14 |
 BRUX |   288   288     0   288     0.29     0.06     0.43     0.43   | 3.84e-13  1.14e-13  2.77e-14 |
 MIZU |   288   288     0   288     0.28     0.05     0.04     0.04   | 4.85e-13  1.51e-13  5.04e-14 |
 G26  |   288   288     0   288     0.76     0.05     0.04     0.04   | 1.80e-13  5.69e-14  4.28e-14 |
 GOPE |   288   288     0   288     0.25     0.04     0.03     0.03   | 5.15e-13  9.50e-14  3.02e-14 |
 WTZA |   288   288     0   288     0.25     0.04     0.45     0.45   | 5.26e-13  1.44e-13  5.76e-14 |
 G04  |   288   288     0   288     0.27     0.04     0.26     0.26   | 4.82e-13  1.31e-13  4.95e-14 |
 G23  |   288   288     0   288     0.28     0.03     1.59     1.59   | 5.50e-13  6.24e-14  1.66e-14 |
 G02  |   288   288     0   288     0.28     0.03     1.28     1.28   | 5.96e-13  6.52e-14  2.09e-14 |
 G31  |   288   288     0   288     0.27     0.03     0.36     0.36   | 6.16e-13  6.44e-14  3.23e-14 |
 G14  |   288   288     0   288     0.25     0.03     1.04     1.04   | 5.93e-13  7.16e-14  1.94e-14 |
 G19  |   288   288     0   288     0.25     0.03     0.43     0.43   | 7.17e-13  7.85e-14  1.93e-14 |
 G15  |   288   288     0   288     0.24     0.02     1.23     1.23   | 6.45e-13  6.89e-14  2.77e-14 |
 G29  |   288   288     0   288     0.23     0.02     0.13     0.13   | 7.55e-13  7.26e-14  1.86e-14 |
 G22  |   288   288     0   288     0.34     0.02     3.06     3.06   | 6.02e-13  6.30e-14  1.10e-14 |
 G16  |   288   288     0   288     0.23     0.02     0.69     0.69   | 7.02e-13  7.00e-14  3.84e-14 |
 G05  |   288   288     0   288     0.22     0.02     0.55     0.55   | 7.07e-13  6.87e-14  1.56e-14 |
 G12  |   288   288     0   288     0.22     0.02     1.53     1.53   | 7.16e-13  6.92e-14  4.38e-14 |
 G11  |   288   288     0   288     0.21     0.02     0.20     0.20   | 7.37e-13  7.42e-14  6.22e-14 |
 G09  |   288   288     0   288     0.21     0.02     0.02     0.02   | 6.90e-14  2.83e-14  3.30e-14 |
 G03  |   288   288     0     0     0.00     0.00     0.00     0.00   | 5.73e-14  1.46e-14  2.83e-15 |
 G08  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.51e-12  5.54e-13  4.05e-13 |
 G10  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.27e-12  3.85e-13  1.67e-13 |
 G13  |   288   263    11     0     0.00     0.00     0.00     0.00   | 1.38e-12  1.90e-13  4.82e-14 |
 G17  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.63e-13  1.03e-13  2.81e-14 |
 G20  |   288   288     0     0     0.00     0.00     0.00     0.00   | 8.78e-13  9.02e-14  2.41e-14 |
 G21  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.02e-12  1.07e-13  3.07e-14 |
 G24  |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.06e-12  2.59e-13  8.81e-14 |
 G25  |   288   288     3     0     0.00     0.00     0.00     0.00   | 5.38e-14  2.15e-14  2.67e-14 |
 G27  |   288   284     3     0     0.00     0.00     0.00     0.00   | 6.11e-14  4.36e-14  3.36e-14 |
 G28  |   288   288     0     0     0.00     0.00     0.00     0.00   | 7.75e-13  1.03e-13  5.06e-14 |
 GLSV |   288   229    20     0     0.00     0.00     0.00     0.00   | 4.70e-12  7.44e-13  1.12e-13 |
 GRAS |   288   249    14     0     0.00     0.00     0.00     0.00   | 3.44e-12  8.59e-13  1.35e-13 |
 GRAZ |   288   238    11     0     0.00     0.00     0.00     0.00   | 4.44e-12  1.11e-12  2.73e-13 |
 HARB |   288   288     0     0     0.00     0.00     0.00     0.00   | 3.31e-13  4.21e-13  6.12e-14 |
 MAC1 |   288   277     3     0     0.00     0.00     0.00     0.00   | 3.20e-12  8.33e-13  1.80e-13 |
 MAR6 |   288   288     0     0     0.00     0.00     0.00     0.00   | 2.25e-13  5.81e-14  1.26e-14 |
 MATE |   288   286     1     0     0.00     0.00     0.00     0.00   | 3.49e-14  7.21e-15  2.09e-14 |
 NNOR |   288   267     8     0     0.00     0.00     0.00     0.00   | 1.63e-12  2.90e-13  4.20e-14 |
 NYAL |   288   271     4     0     0.00     0.00     0.00     0.00   | 7.60e-13  1.78e-13  3.68e-14 |
 PDEL |   288   237    18     0     0.00     0.00     0.00     0.00   | 5.21e-12  1.17e-12  3.01e-13 |
 SANT |   288   288     0     0     0.00     0.00     0.00     0.00   | 1.11e-12  3.51e-13  7.21e-14 |
 SYDN |   287   287     0     0     0.00     0.00     0.00     0.00   | 6.18e-13  1.64e-13  8.34e-14 |
 TLSE |   288   285     1     0     0.00     0.00     0.00     0.00   | 2.59e-12  9.36e-13  1.32e-13 |
 VILL |   288   287     1     0     0.00     0.00     0.00     0.00   | 1.30e-12  1.01e-12  2.80e-13 |
 WHIT |   285   276     7     0     0.00     0.00     0.00     0.00   | 2.11e-08  6.49e-09  1.88e-09 |
 GPST |   288   285     1     0     0.00     0.00     0.00     0.00   | 5.14e-14  4.71e-15  1.90e-15 |
 GOLD |   288   288     3     0     0.00     0.00     0.00     0.00   | 6.34e-13  8.42e-13  1.82e-13 |
 POLV |   288   233    21     0     0.00     0.00     0.00     0.00   | 1.58e-11  1.11e-12  2.16e-13 |
 BRST |   235   233     0     0     0.00     0.00     0.00     0.00   | 2.11e-12  6.78e-13  1.56e-13 |
 HERT |   288   217    37     0     0.00     0.00     0.00     0.00   | 2.14e-11  2.56e-12  4.50e-13 |
 MONP |   288     0     0     0     0.00     0.00     0.00     0.00   | 0.00e+00  0.00e+00  0.00e+00 |
 UZHL |   286   124   106     0     0.00     0.00     0.00     0.00   | 6.96e-11  6.70e-12  9.47e-13 |
------+---------------------------------------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:                                         | 9.41e-22  1.38e-19  5.05e-18 |
----------------------------------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                                                   |     MONP      MONP      G03 |
----------------------------------------------------------------------+------------------------------+
