
 cls-file Version 2.0
 GPS week: 1610   Day: 0   MJD: 55514                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   3010      9     -72     108   2303   2303      0   3997   3997      0    0.00
 cod |   288     0  27676   1111    -948     815     26     34     22     97     77    105    9.95
 emr |   288     0  23946   1138     752    2595     14     16     12     63     85     48   22.79
 esa |   288     0  28444   1374     364     207     14     18     12    101    124     88   21.77
 gfz |   288     0  30913    586     -54     268     14     15     13     86     73     90   22.76
 iga |    96     0   2975     99    -250     424     34     34      0     72     72      0    0.00
 igu |    96     0   2975     50    -250     560   1501   1501      0   2412   2412      0    0.00
 jpl |   288     0  24631    657    3030    2780     14     16     12     77     90     69   22.72
 ngs |    96     0   3010     11    -145     251   1979   1979      0   3643   3643      0    0.00
 usn |   288     0  25212    419    -750    1002     49     59     44    149    160    142    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 |  -447    28     -     -   -12     -     -     -  -487     - |
    2 |  -124   -87    -6    93   -76    80  -370    31    24    34 |
    3 | -5134    58     X   -84     X   -50  3744    39 -4774  -494 |
    4 | -4459   -48   -38     6   -97    10 -1105   151 -3757    72 |
    5 | -1666    78   -38   -23   -93    36   112   119  -988    -2 |
    6 | -3296    95   -90   -76    89   -36   163    33 -3999   207 |
    7 |    74    13   -58   -72    43    17  -382    78    56   -32 |
    8 | -6281   -92     X    41   -72   -20 -5850    73 -5579    50 |
    9 | -5887   -30   -74   -72    52  -103   -31   105 -4918   197 |
   10 |   979    42  -180   204   -86   108  5350    45   -94    -1 |
   11 |  3071    29   135  -147    63   -20  -918   -71  3430    11 |
   12 | -1658    28   -33   102   -66    13   610   -11 -1442   -51 |
   13 |  3922    26  -114   145    28    91   150   -63  3815   -46 |
   14 |  4842    95   -28   -94    73   -30  -193     3  4406    30 |
   15 |  -565   123    78  -180   -56    47 -1047    96  -470   218 |
   16 |  2802    34  -130  -200   102   -33   125   205  3208   181 |
   17 |   499   -35   126  -182   -76   -14  -219   139   140    34 |
   18 |  4014   122    58  -220    51    37   323    48  4014   232 |
   19 |  2628    62   -37    14     6   -39  1121    -5  2114  -179 |
   20 |  3510    37   -36   -87    65   -84  1073    42  3513    26 |
   21 |  2300    63   -38  -106    89   -59 -1250    27  2436    14 |
   22 |  -133     X     X    82   -78     X -2243     X -1238     X |
   23 |   939    56   110   -58    13   164   533   -91   908   -32 |
   24 |  1639   -24    66  -117    48   -45  1776     7   952   170 |
   25 |  2350    69     -   -67    35   -37    17     -  2061     - |
   26 | -3546   -46   -79   108   -73    45  1182    69 -2913    49 |
   27 | -1511   -18   -35     1    42   -66  2341     -   -98   202 |
   28 |  6422   -27    11   108    36   110  -233  -139  6202    30 |
   29 | -4410    26   129  -186   -80   -45  -548   118 -3713   112 |
   30 | -2432    91   -57  -135    46   -66 -4178   104 -3274   289 |
   31 |  1023   136    33  -185    90    22  -888    -2   701    99 |
   32 |  -109   -18   -85   -78    92   -33  -837    76  -728    92 |
 -----+-------------------------------------------------------------+
 ABPO |     -     -     -    74   -22     -     -   -50     -     - |
 ADIS |     -     -     -   -93    89     -     -     -     -     - |
 ALBH |     -     -   -57     X     -     -     -    57     -   -57 |
 ALIC |     -   -57     -   104   -71     -     -     -     -     - |
 ALRT |     -    -2     -     -     1     -     -     -     -     - |
 AMC2 |     -     -     -    97     -     -     -   -93     -   -63 |
 ANKR |     -     -     -    31     -     -     -   -29     -     - |
 AREQ |     -     -   -47     X    95     -     -   -59     -     - |
 AUCK |     -     X     -   189  -180     -     -     -     -  -584 |
 BAKE |     -     -     -   -14    13     -     -     -     -     - |
 BJFS |     -  -116     -     -    51     -     -     -     -     - |
 BOGT |     -     -     -   115  -133     -     -    23     -     - |
 BOR1 |     -  -123     -    97   -36     -     -     -     -  -161 |
 BREW |     -     -   -13    67     -     -     -   -51     -   -51 |
 BRFT |     -    -1     -     -     0     -     -     -     -     - |
 BRST |     -     5     -    -2     -     -     -     -     -     - |
 BRUS |     -   -86    19    23   -20     -     -    17     -   -80 |
 CAGZ |     -     -     -  -161     -     -     -   154     -    19 |
 CAS1 |     -  -239     -  -172   333     -     -     -     -    13 |
 CCJM |     -     -     -   185  -177     -     -     -     -     - |
 CHPI |     -     -     -    81     -     -     -   -78     -   -86 |
 CHUR |     -   121   -33   -21     -     -     -     -     -    -8 |
 CONZ |     -     -     -   171  -163     -     -     -     -     - |
 CRAO |     -     -     -    82     -     -     -   -79     -     - |
 CRO1 |     -    21    18   -69    -5     -     -    44     -    14 |
 DAEJ |     -   -46    32   119     -     -     -  -117     -   120 |
 DARW |     -     -   -29    70   -35     -     -     -     -     - |
 DAV1 |     -   204     -   -19   -71     -     -     -     -     - |
 DGAR |     -     X     -     6     X     -     -    -6     -     - |
 DLFT |     -     -     -   -26     -     -     -    25     -     - |
 DRAO |     -     -    -4   -19    22     -     -     -     -     2 |
 DUBO |     -    53     -    -6   -18     -     -     -     -     - |
 FAA1 |     -   139     -   259  -303     -     -     -     -     - |
 FAIR |     -     -    60   -47   -31     -     -    15     -     - |
 GLPS |     -     -     -     X    22     -     -   -22     -    10 |
 GLSV |     -     1     -   -95    87     -     -     -     -     - |
 GODE |     -     -     2     -    -2     -     -     -     -    16 |
 GOL2 |     -     -   -20    21     -     -     -     -     -     - |
 GOLD |     -   131     -     -   -28     -     -   -30     -     7 |
 GOPE |     -   -36     -     -     -     -     -    16     -     - |
 GRAS |     -   -86     -    39     -     -     -     -     -     - |
 GRAZ |     -    33     -   -15     -     -     -     -     -     - |
 GUAM |     -     -     -    -9     -     -     -     9     -   -14 |
 GUAO |     -     -     -   -44     -     -     -    42     -     - |
 GUAT |     -  -394     -     -   172     -     -     -     -     - |
 HARB |     -    75     X    67     -     -     -   -95     -     - |
 HERS |     -   -51     -    23     -     -     -     -     -  -135 |
 HLFX |     -     -    -9    51     -     -     -   -40     -   -24 |
 HOB2 |     -     -   173     X  -173     -     -     -     -   372 |
 HOFN |     -     -     -  -176   108     -     -    53     -   -69 |
 HOLB |     -    73     -   -34     -     -     -     -     -     - |
 HRAO |     -    83     -   -38     -     -     -     -     -   -10 |
 IENG |     -    14    23    15     -     -     -   -43     -   -68 |
 IISC |     -     -     -    87   -98     -     -    16     -     6 |
 KARR |     -    38     -     -   -17     -     -     -     -     - |
 KELY |     -     -     -   -71   163     -     -   -94     -     - |
 KIR0 |     -     -     -   -21     -     -     -    20     -     - |
 KIRU |     -     -   -31    -3    34     -     -     -     -     - |
 KIT3 |     -     -     -     -    46     -     -   -46     -  -165 |
 KOSG |     -     -     -    52   -50     -     -     -     -     - |
 KOUR |     -     -    29   140  -119     -     -   -43     -   -51 |
 LAMA |     -   -38     -    -2    18     -     -     -     -     - |
 LEIJ |     -     -     -   118     -     -     -  -113     -     - |
 LHAZ |     -     -     -    56   -54     -     -     -     -     - |
 LPGS |     -   -90   -59     -    78     -     -    19     -     1 |
 MAC1 |     -    37     -    51    14     -     -   -77     -    15 |
 MAD2 |     -     -    51   -54     -     -     -     -     -  -160 |
 MAL2 |     -     -     -    11   -11     -     -     -     -     - |
 MAR6 |     -     -   -34    90     -     -     -   -48     -     - |
 MAS1 |     -     -    89    60   -73     -     -   -74     -   -63 |
 MATE |     -     -    40     X   -40     -     -     -     -    37 |
 MAW1 |     -    -8     -     2     2     -     -     -     -     - |
 MCM4 |     -     -   -96   100     -     -     -     -     -   735 |
 MDO1 |     -   141    23    66    59     -     -  -205     -   -77 |
 MEDI |     -     -    78   -82     -     -     -     -     -    99 |
 METS |     -     -   -52    24    32     -     -     -     -   -84 |
 MIZU |     -    14    27   -36     -     -     -     -     -    60 |
 MKEA |     -     -     -    15   -39     -     -    24     -   -57 |
 NANO |     -     8     -   -31    26     -     -     -     -     - |
 NICO |     -    26     -     7   -18     -     -     -     -     - |
 NNOR |     -     -   -91    96     -     -     -    -1     -   113 |
 NRC1 |     -     -    81     -    22     -     -  -103     -    86 |
 NRMD |     -  -260     -     -   113     -     -     -     -  -109 |
 NTUS |     -  -153     -     -    67     -     -     -     -     - |
 NYA1 |     -   -95     -     -    42     -     -     -     -   -42 |
 OHI2 |     -   -28     -     -    12     -     -     -     -     - |
 ONSA |     -   -60    23     -   -34     -     -    37     -   -49 |
 PDEL |     -    21     -     -    -9     -     -     -     -     - |
 PERT |     -    49    12     -  -137     -     -   104     -   108 |
 PIE1 |     -    62    83     -   -27     -     -   -83     -     - |
 PIMO |     -     -     -     -    68     -     -   -69     -  -100 |
 POTS |     -     5     -     -    -2     -     -     X     -     - |
 PRDS |     -  -125    54     -     -     -     -     -     -  -156 |
 PTBB |     -    50   -11     -     -     -     -   -11     -    23 |
 QAQ1 |     -     -     5     -     -     -     -    -5     -     - |
 QUIN |     -   134     -     -     -     -     -   -59     -     - |
 RESO |     -     3     -     -    -1     -     -     -     -     - |
 REUN |     -    83     -     -   -36     -     -     -     -     - |
 SANT |     -  -138     -     -    60     -     -     -     -     - |
 SCH2 |     -   -66    34     -    -5     -     -     -     -   -91 |
 SEY1 |     -     -     -     -    44     -     -   -44     -     - |
 SPT0 |     -   -11    -5     -     -     -     -     9     -     5 |
 STJO |     -     -    40     -    -4     -     -   -36     -   -13 |
 SUTM |     -     -    44     -   -44     -     -     -     -     - |
 SYOG |     -     0   -19     -    19     -     -     -     -     - |
 THU3 |     -  -155   -27     -   153     -     -   -59     -  -185 |
 TIDB |     -     -    34     -    53     -     -   -87     -   -89 |
 TLSE |     -    -3     1     -     -     -     -     -     -     - |
 TOW2 |     -   -44     -     -    19     -     -     -     -     - |
 TSKB |     -   -37    21     -    -5     -     -     -     -    55 |
 TWTF |     -    42   -19     -     -     -     -     -     -     5 |
 USN3 |     -     2    -1     -     -     -     -     -     -   -38 |
 USUD |     -     -   -25     -     -     -     -    25     -     - |
 VILL |     -     -   -38     -     -     -     -    38     -   -18 |
 WHIT |     -    51   -16     -    -6     -     -     -     -   -53 |
 WILL |     -   -29    21     -     -     -     -    -8     -  -102 |
 WSRT |     -    65    -3     -   -25     -     -     -     -   -34 |
 WTZA |     -     0     -     -     -     -     -     0     -   -60 |
 YAR2 |     -     -    -1     -     1     -     -     -     -   -27 |
 YELL |     -  -251    13     -    97     -     -     -     -     - |
 ZWE2 |     -    15     -     -   -80     -     -    80     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO    RMS
 -----+-------------------------------------------------------------+-------------
    1 |   823    43     -     -    19     -     -     -   625     - |  106    322
    2 |   428    15    12     9    13    30   503    11   483    95 |  288    223
    3 |  1887    31     X    36     X    69  1918    20  1921    41 |  284   1195
    4 |  1196    28    14    21    13    29   763    12  1184    71 |  288    857
    5 |  1826    24    14    15    14    30   544    12  1387    86 |  288    211
    6 |  2475    22    17    17    12    29   877    10  1825    54 |  288   1168
    7 |   585    34    17    12    19    63   600    19   566    60 |  288    235
    8 |  6384    44     X    19    16    35  3972    28  4475    77 |  288   1750
    9 |  3381    21    16    32    12    26  1596    23  3216    43 |  288   2814
   10 |  3509    27    16    27    16    42  3479    16  3210    88 |  288   2160
   11 |   509    39    27    11    16    25   753    19   645    50 |  288    362
   12 |  1421    31    14    14    15    20   640    11   958    49 |  288    312
   13 |   493    37    14     8    11    26   320    11   415    49 |  288    189
   14 |  1470    26    11    15    12    25   454    15  1065    25 |  288    180
   15 |   539    38    21    17    15    39   523    13   613    75 |  288    182
   16 |   699    41    15    10    13    38   565    12   740    52 |  288    300
   17 |  1334    56    13    14    19    15   744    28  1180    39 |  288    299
   18 |   558    42    16    21    14    71   382    11   548    57 |  288    241
   19 |  1222    37    24    20    13    42   987    13  1353    59 |  288    248
   20 |   963    29    19    14    24    22   884    12   838    47 |  288    383
   21 |   905    27    17    19    14    36   498    13  1062    41 |  288    554
   22 |  2882     X     X    29    27     X   813     X  2405     X |  288    354
   23 |   699    53    14    12    12    29   492    19   526    68 |  288    246
   24 |  3727    34    20    14    30    24  3121    12  4129    51 |  288   3543
   25 |   680    49     -    12    14    11   386     -   497     - |  288    231
   26 |  1448    27    17    21    12    19   749    15  1057    17 |  288    542
   27 |  6498    24    24    24    12    18  4090     -  5364    48 |  288   6167
   28 |   608    42    11    12    14    37   953    19   695    47 |  288   1130
   29 |   862    36    18    10     9    25   424    21  1384    67 |  288    254
   30 |  3048    30    13    13     8    19  2471    16  2681    52 |  288   1595
   31 |   752    32    13    14    14    41   508    18   711    79 |  288    234
   32 |  1655    27    15    13    19    20  1175    12  1773    56 |  288    802
 -----+-------------------------------------------------------------+-------------
 ABPO |     -     -     -    14    19     -     -    15     -     - |  288  13543
 ADIS |     -     -     -    11    10     -     -     -     -     - |  276    >>>
 ALBH |     -     -     7     X     -     -     -     7     -    12 |  288   6056
 ALIC |     -    19     -    16    16     -     -     -     -     - |  288   3780
 ALRT |     -    12     -     -     5     -     -     -     -     - |  275   7934
 AMC2 |     -     -     -     6     -     -     -     6     -     9 |  288     13
 ANKR |     -     -     -     8     -     -     -     8     -     - |  276    >>>
 AREQ |     -     -    14     X    15     -     -     7     -     - |  288  14347
 AUCK |     -     X     -    19    18     -     -     -     -    56 |  276   4028
 BAKE |     -     -     -     7     7     -     -     -     -     - |  276   3701
 BJFS |     -    16     -     -     7     -     -     -     -     - |  288  16791
 BOGT |     -     -     -     8     7     -     -     9     -     - |  288  16019
 BOR1 |     -     8     -     7     8     -     -     -     -    36 |  288   5122
 BREW |     -     -    12    11     -     -     -     8     -    20 |  288     23
 BRFT |     -    23     -     -    10     -     -     -     -     - |  288     77
 BRST |     -    17     -     8     -     -     -     -     -     - |  276   3286
 BRUS |     -    10    11     9    12     -     -    12     -    24 |  288   1331
 CAGZ |     -     -     -     8     -     -     -     8     -    35 |  276    >>>
 CAS1 |     -    31     -    27    40     -     -     -     -   118 |  267   6221
 CCJM |     -     -     -    21    20     -     -     -     -     - |  276    842
 CHPI |     -     -     -    12     -     -     -    12     -    50 |  288  18615
 CHUR |     -    23     8     6     -     -     -     -     -    14 |  288   1906
 CONZ |     -     -     -     9     9     -     -     -     -     - |  276     31
 CRAO |     -     -     -     7     -     -     -     7     -     - |  276   6107
 CRO1 |     -    31    11    12    14     -     -    13     -    34 |  288     42
 DAEJ |     -    18    10    14     -     -     -    12     -    16 |  287   1114
 DARW |     -     -    25    22    24     -     -     -     -     - |  287   3842
 DAV1 |     -    25     -    12    11     -     -     -     -     - |  288   3343
 DGAR |     -     X     -    13     X     -     -    13     -     - |  265   6434
 DLFT |     -     -     -     9     -     -     -     9     -     - |  276    >>>
 DRAO |     -     -     7     9    10     -     -     -     -     8 |  288     23
 DUBO |     -    19     -    10     7     -     -     -     -     - |  288   3307
 FAA1 |     -    21     -    25    23     -     -     -     -     - |  282   5618
 FAIR |     -     -    13    12    11     -     -     8     -     - |  288   7065
 GLPS |     -     -     -     X    10     -     -    10     -    92 |  288  16529
 GLSV |     -    24     -     7     8     -     -     -     -     - |  288   2069
 GODE |     -     -     8     -     8     -     -     -     -    18 |  288    126
 GOL2 |     -     -    12    13     -     -     -     -     -     - |  288     33
 GOLD |     -    16     -     -     8     -     -     9     -    28 |  288   9753
 GOPE |     -    18     -     -     -     -     -     8     -     - |  288    428
 GRAS |     -    14     -     6     -     -     -     -     -     - |  276  12247
 GRAZ |     -    20     -     9     -     -     -     -     -     - |  275   4686
 GUAM |     -     -     -    17     -     -     -    17     -    47 |  281  12541
 GUAO |     -     -     -     5     -     -     -     5     -     - |  288   6497
 GUAT |     -    28     -     -    12     -     -     -     -     - |  285   4027
 HARB |     -    30     X    13     -     -     -    18     -     - |  288   1684
 HERS |     -    10     -     5     -     -     -     -     -    41 |  276     30
 HLFX |     -     -     7    11     -     -     -     9     -    18 |  288 236203
 HOB2 |     -     -    10     X    10     -     -     -     -    43 |  219     28
 HOFN |     -     -     -     8    10     -     -    13     -    29 |  287    >>>
 HOLB |     -    40     -    18     -     -     -     -     -     - |  276   3461
 HRAO |     -    17     -     8     -     -     -     -     -    50 |  276     48
 IENG |     -    23    10    13     -     -     -     8     -    33 |  288     34
 IISC |     -     -     -    11    16     -     -    10     -    18 |  288  14209
 KARR |     -    14     -     -     6     -     -     -     -     - |  288   7137
 KELY |     -     -     -    18    13     -     -    24     -     - |  288   7292
 KIR0 |     -     -     -     6     -     -     -     5     -     - |  276   3120
 KIRU |     -     -    13     6    11     -     -     -     -     - |  288   1675
 KIT3 |     -     -     -     -    11     -     -    11     -    28 |  287  10548
 KOSG |     -     -     -     8     7     -     -     -     -     - |  276   3354
 KOUR |     -     -    13    16    15     -     -    12     -    28 |  288    134
 LAMA |     -    14     -     8     9     -     -     -     -     - |  288   2847
 LEIJ |     -     -     -    11     -     -     -    10     -     - |  276    >>>
 LHAZ |     -     -     -     8     7     -     -     -     -     - |  159    >>>
 LPGS |     -    39    12     -    20     -     -    12     -    58 |  285  11068
 MAC1 |     -    19     -    13    15     -     -    23     -    66 |  288   6921
 MAD2 |     -     -    14    15     -     -     -     -     -    19 |  288     24
 MAL2 |     -     -     -    12    12     -     -     -     -     - |  288    >>>
 MAR6 |     -     -     6     8     -     -     -     8     -     - |  288   3197
 MAS1 |     -     -    11    11    12     -     -    10     -    29 |  288   2719
 MATE |     -     -    36     X    36     -     -     -     -    86 |  288  57335
 MAW1 |     -    19     -     8     8     -     -     -     -     - |  288   3976
 MCM4 |     -     -    10    11     -     -     -     -     -    32 |  176   5474
 MDO1 |     -    14     7     6    10     -     -     7     -    13 |  288   7380
 MEDI |     -     -    10    11     -     -     -     -     -    33 |  276    264
 METS |     -     -    16    29    13     -     -     -     -   106 |  287     30
 MIZU |     -    28    17     9     -     -     -     -     -    20 |  288    437
 MKEA |     -     -     -    16    11     -     -     9     -    48 |  288  15311
 NANO |     -    21     -     8    12     -     -     -     -     - |  288   3484
 NICO |     -    15     -     8     8     -     -     -     -     - |  288   3116
 NNOR |     -     -     9     9     -     -     -    10     -    31 |  288   1052
 NRC1 |     -     -     7     -    13     -     -    10     -    19 |  288     44
 NRMD |     -    13     -     -     5     -     -     -     -    45 |  107   6404
 NTUS |     -    19     -     -     8     -     -     -     -     - |  288   2770
 NYA1 |     -    16     -     -     7     -     -     -     -    30 |  288    407
 OHI2 |     -    18     -     -     8     -     -     -     -     - |  287    >>>
 ONSA |     -    16     8     -    11     -     -    12     -    40 |  288     20
 PDEL |     -    17     -     -     7     -     -     -     -     - |  288   3141
 PERT |     -    20    10     -    15     -     -    13     -    44 |  288   2010
 PIE1 |     -    22    15     -    11     -     -     7     -     - |  288     31
 PIMO |     -     -     -     -    19     -     -    19     -    74 |  288  12825
 POTS |     -    12     -     -     5     -     -     X     -     - |  288    >>>
 PRDS |     -    13     6     -     -     -     -     -     -    12 |  288   6554
 PTBB |     -    20    11     -     -     -     -     8     -    31 |  288     20
 QAQ1 |     -     -     8     -     -     -     -     8     -     - |  288   6705
 QUIN |     -    41     -     -     -     -     -    18     -     - |  288   6559
 RESO |     -    15     -     -     7     -     -     -     -     - |  288   8328
 REUN |     -    27     -     -    12     -     -     -     -     - |  288   5408
 SANT |     -    10     -     -     4     -     -     -     -     - |  288   1066
 SCH2 |     -    14    11     -    10     -     -     -     -    14 |  288   5425
 SEY1 |     -     -     -     -    18     -     -    18     -     - |  288  14615
 SPT0 |     -    26    11     -     -     -     -    11     -    46 |  288     37
 STJO |     -     -     7     -    15     -     -    12     -    22 |  288   8272
 SUTM |     -     -     9     -     9     -     -     -     -     - |  288  10673
 SYOG |     -    12    13     -    13     -     -     -     -     - |  288    601
 THU3 |     -    23     9     -    12     -     -    11     -    26 |  288   5854
 TIDB |     -     -    10     -    14     -     -    10     -    85 |  288     44
 TLSE |     -    21     9     -     -     -     -     -     -     - |  288   9660
 TOW2 |     -    17     -     -     7     -     -     -     -     - |  288   3229
 TSKB |     -    51    16     -    15     -     -     -     -    22 |  288    756
 TWTF |     -    23    10     -     -     -     -     -     -    37 |  288     61
 USN3 |     -    21     9     -     -     -     -     -     -    21 |  288     21
 USUD |     -     -     9     -     -     -     -     9     -     - |  288     29
 VILL |     -     -    10     -     -     -     -    10     -    26 |  288   7789
 WHIT |     -    23     5     -    10     -     -     -     -    14 |  288   3021
 WILL |     -    29    24     -     -     -     -    33     -    97 |  287  19044
 WSRT |     -    25     9     -    12     -     -     -     -    28 |  288     18
 WTZA |     -    11     -     -     -     -     -     5     -    44 |  288    707
 YAR2 |     -     -    12     -    12     -     -     -     -    27 |  288   8491
 YELL |     -    29    14     -     8     -     -     -     -     - |  271     17
 ZWE2 |     -    21     -     -    25     -     -    33     -     - |  288    >>>
 -----+-------------------------------------------------------------+-------------
 TOT  |  2304    27    14    15    14    35  1501    14  1980    49 |




CLOCK JUMP CORRECTIONS APPLIED
------------------------------

CEN | STA/SAT | EPOCH           |     JUMP(ps)
----+---------+-----------------+-------------
cod |   DGAR  | 1610-0  0:15:00 |       -2661
cod |   DGAR  | 1610-0  0:25:00 |       -1879
cod |   DGAR  | 1610-0  0:30:00 |         656
cod |   DGAR  | 1610-0  0:35:00 |       -1039
cod |   DGAR  | 1610-0  0:40:00 |        2656
cod |   DGAR  | 1610-0  0:55:00 |       -3881
cod |   DAV1  | 1610-0 18:55:00 |       -1222
esa |   GLPS  | 1610-0  4:30:00 |        2156
esa |   AREQ  | 1610-0  4:35:00 |       -7081
gfz |   DGAR  | 1610-0  0:15:00 |       -2626
gfz |   DGAR  | 1610-0  0:25:00 |       -1902
gfz |   DGAR  | 1610-0  0:30:00 |         672
gfz |   DGAR  | 1610-0  0:35:00 |       -1039
gfz |   DGAR  | 1610-0  0:40:00 |        2662
gfz |   DGAR  | 1610-0  0:55:00 |       -3875
gfz |   CAS1  | 1610-0  8:05:00 |        -782



---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USN3 |   288     0     0   287    9.84   | 3.48e-14  4.44e-15  2.28e-15 |
 CONZ |   276     0     0   275    9.49   | 2.88e-14  6.58e-15  2.52e-15 |
 ONSA |   288     0     0   288    9.18   | 3.55e-14  6.85e-15  9.15e-16 |
 PIE1 |   288     0     0   288    8.88   | 5.21e-14  6.45e-15  2.84e-15 |
 SPT0 |   288     0     0   288    8.27   | 3.75e-14  9.32e-15  2.40e-15 |
 AMC2 |   288     0     0   288    7.58   | 3.22e-14  4.69e-15  1.79e-15 |
 IENG |   288     0     0   288    7.15   | 4.28e-14  5.67e-15  1.87e-15 |
 WSRT |   288     1     0   287    5.94   | 2.98e-14  1.16e-14  1.68e-15 |
 TWTF |   288     0     0   287    4.91   | 4.26e-14  7.69e-15  3.33e-15 |
 PTBB |   288     0     0   288    4.66   | 4.27e-14  6.71e-15  1.70e-15 |
 MAD2 |   288     0     0   143    4.09   | 3.32e-14  8.37e-15  1.76e-15 |
 YELL |   271     0     0   270    3.72   | 2.71e-14  5.13e-15  1.09e-15 |
 DRAO |   288     0     0   288    3.45   | 3.31e-14  6.89e-15  2.33e-15 |
 NRC1 |   288     1     1   186    2.70   | 5.57e-14  1.28e-14  4.11e-15 |
 HRAO |   276     0     0   131    1.50   | 4.27e-14  2.17e-14  4.12e-15 |
 BREW |   288     0     2    96    1.40   | 8.21e-14  9.27e-15  1.99e-15 |
 HOB2 |   219     0     0    73    1.24   | 3.98e-14  7.62e-15         - |
 CRO1 |   288     0     0   288    1.23   | 8.05e-14  1.21e-14  3.35e-15 |
 HERS |   276     0     0   275    0.89   | 3.52e-14  1.33e-14  2.35e-15 |
 TIDB |   288     1     2   144    0.79   | 1.02e-13  1.48e-14  2.79e-15 |
 MATE |   288     1     0   286    0.57   | 3.45e-14  7.01e-15  5.50e-15 |
 GODE |   288     0     0   288    0.41   | 5.22e-14  8.54e-15  8.37e-15 |
 METS |   287     0     0   138    0.39   | 8.99e-14  9.55e-15  1.59e-15 |
 MEDI |   276     0     0   275    0.38   | 3.15e-14  1.29e-14  1.95e-14 |
 BRFT |   288     0     0   288    0.32   | 4.94e-14  1.44e-14  8.37e-15 |
 USUD |   288     0     2    30    0.27   | 9.49e-14  8.99e-15  2.86e-15 |
 G25  |   288     0     0   288    0.20   | 6.74e-14  2.49e-14  2.49e-14 |
 KOUR |   288     0     0   288    0.19   | 4.59e-14  1.59e-14  1.16e-14 |
 MIZU |   288     0     0   288    0.04   | 4.08e-13  1.24e-13  3.16e-14 |
 WTZA |   288     0     0   288    0.04   | 4.81e-13  1.12e-13  4.96e-14 |
 G16  |   288     0     4   102    0.03   | 6.38e-13  6.39e-14  2.78e-14 |
 GOPE |   288     0     0   143    0.03   | 3.02e-13  8.62e-14  3.78e-14 |
 G04  |   288     0     0   288    0.03   | 4.51e-13  1.34e-13  9.32e-14 |
 G06  |   288     0     0   288    0.03   | 5.13e-13  1.90e-13  9.82e-14 |
 G26  |   288     0     0   288    0.02   | 4.72e-13  1.26e-13  4.34e-14 |
 G32  |   288     0     0   288    0.02   | 2.21e-13  9.62e-14  9.36e-14 |
 SYOG |   288     0     0   288    0.02   | 6.80e-13  1.95e-13  4.46e-14 |
 DAEJ |   287     0     0   286    0.01   | 7.90e-13  2.21e-13  9.20e-14 |
 CCJM |   276     0     0   276    0.01   | 9.10e-13  2.58e-13  6.83e-14 |
 TSKB |   288     0     0   288    0.01   | 1.14e-12  2.80e-13  8.08e-14 |
 BRUS |   288     0     0   288    0.01   | 1.13e-12  3.18e-13  1.08e-13 |
 G03  |   284     0     0   282    0.01   | 1.40e-12  3.30e-13  1.34e-13 |
 NYA1 |   288     0     0   288    0.01   | 7.96e-13  1.85e-13  3.29e-14 |
 G30  |   288     0     0   288    0.01   | 1.31e-12  5.08e-13  1.44e-13 |
 HARB |   288     0     0   288    0.00   | 1.15e-12  3.17e-13  1.04e-13 |
 MAR6 |   288     0     0   288    0.00   | 2.61e-13  8.09e-14  1.89e-13 |
 PERT |   288     0     0   288    0.00   | 1.25e-13  3.35e-13  1.28e-13 |
 G08  |   288     0     0   288    0.00   | 1.43e-12  4.01e-13  1.82e-13 |
 SANT |   288     0     0   143    0.00   | 1.08e-12  2.69e-13  1.00e-13 |
 G10  |   288     0     0   287    0.00   | 1.23e-12  4.32e-13  1.79e-13 |
 CHUR |   288     0     0   288    0.00   | 7.88e-13  3.19e-13  1.27e-13 |
 GPST |   288     0     0     0    0.00   | 1.88e-14  4.25e-15  8.87e-16 |
 LHAZ |   159     0     0     0    0.00   |        -         -         - |
 G01  |   106     1     1     0    0.00   | 4.66e-13  6.13e-14         - |
 NRMD |   107     0     0     0    0.00   |        -         -         - |
 CAS1 |   267     1     0     0    0.00   |        -         -         - |
 OHI2 |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 GRAZ |   275     0     0     0    0.00   |        -         -         - |
 G31  |   288     0     6     0    0.00   | 5.18e-13  5.44e-14  2.89e-14 |
 G29  |   288     0     6     0    0.00   | 5.49e-13  6.55e-14  2.78e-14 |
 G28  |   288     0     2     0    0.00   | 5.83e-13  7.76e-14  7.68e-14 |
 G27  |   288     0     0     0    0.00   | 1.47e-12  6.65e-13  7.89e-13 |
 G24  |   288     0     0     0    0.00   | 1.45e-12  4.64e-13  4.88e-13 |
 G23  |   288     0     6     0    0.00   | 5.01e-13  5.76e-14  2.45e-14 |
 G22  |   288     0     6     0    0.00   | 8.76e-13  8.55e-14  2.99e-14 |
 G21  |   288     0     6     0    0.00   | 9.57e-13  1.34e-13  3.23e-14 |
 G20  |   288     0     6     0    0.00   | 7.97e-13  8.69e-14  3.18e-14 |
 G19  |   288     1     6     0    0.00   | 6.01e-13  6.89e-14  2.92e-14 |
 G18  |   288     0     6     0    0.00   | 6.75e-13  6.95e-14  2.34e-14 |
 G17  |   288     0     6     0    0.00   | 6.32e-13  6.71e-14  2.03e-14 |
 G15  |   288     1     6     0    0.00   | 6.23e-13  7.27e-14  2.76e-14 |
 G14  |   288     1     6     0    0.00   | 6.03e-13  7.36e-14  2.39e-14 |
 G13  |   288     0     6     0    0.00   | 5.81e-13  5.83e-14  2.20e-14 |
 G12  |   288     0     6     0    0.00   | 6.37e-13  7.23e-14  2.85e-14 |
 G11  |   288     0     6     0    0.00   | 7.19e-13  6.70e-14  3.61e-14 |
 G09  |   288     0     0     0    0.00   | 1.38e-12  4.12e-13  3.03e-13 |
 G07  |   288     0     6     0    0.00   | 5.69e-13  5.94e-14  1.84e-14 |
 G05  |   288     0     6     0    0.00   | 5.85e-13  6.67e-14  1.84e-14 |
 G02  |   288     0     6     0    0.00   | 5.45e-13  6.17e-14  2.16e-14 |
 ZWE2 |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   287     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 1.39e-12  4.59e-13  2.68e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 TLSE |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 STJO |   288     0     1     0    0.00   | 1.01e-12  7.63e-13  7.24e-13 |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 REUN |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 QUIN |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PRDS |   288     0     1     0    0.00   | 6.92e-13  6.94e-13  4.62e-13 |
 POTS |   288     2     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     6     0    0.00   | 1.33e-12  2.29e-13  8.65e-14 |
 NICO |   288     0     0     0    0.00   |        -         -         - |
 NANO |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   176     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 3.99e-13  4.79e-13  3.49e-13 |
 MAL2 |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   285     0     0     0    0.00   |        -         -         - |
 LEIJ |   276     0     0     0    0.00   |        -         -         - |
 LAMA |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   276     0     0     0    0.00   |        -         -         - |
 KIT3 |   287     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   | 7.76e-13  6.08e-13  1.42e-13 |
 KIR0 |   276     0     0     0    0.00   |        -         -         - |
 KELY |   288     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOLB |   276     0     0     0    0.00   |        -         -         - |
 HLFX |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   285     0     0     0    0.00   |        -         -         - |
 GUAO |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   281     0     0     0    0.00   |        -         -         - |
 GRAS |   276     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GOL2 |   288     0     2     0    0.00   | 7.97e-14  9.69e-15  2.34e-15 |
 GLSV |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 FAA1 |   282     0     0     0    0.00   |        -         -         - |
 DUBO |   288     0     0     0    0.00   | 7.26e-13  2.94e-13  2.98e-13 |
 DLFT |   276     2     0     0    0.00   |        -         -         - |
 DGAR |   265     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   287     0     0     0    0.00   |        -         -         - |
 CRAO |   276     0     0     0    0.00   |        -         -         - |
 CHPI |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   276     0     0     0    0.00   |        -         -         - |
 BRST |   276     0     0     0    0.00   |        -         -         - |
 BOR1 |   288     2     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BJFS |   288     0     0     0    0.00   |        -         -         - |
 BAKE |   276     0     0     0    0.00   |        -         -         - |
 AUCK |   276     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ANKR |   276     0     0     0    0.00   |        -         -         - |
 ALRT |   275     2     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
 ALBH |   288     0     0     0    0.00   |        -         -         - |
 ADIS |   276     0     0     0    0.00   |        -         -         - |
 ABPO |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.20e-17  3.84e-16  2.31e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     YELL      USN3      ONSA |
------------------------------------------+------------------------------+
