
 cls-file Version 2.0
 GPS week: 1571   Day: 4   MJD: 55245                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2844      0    -341     492   2467   2467      0   3957   3957      0    0.00
 cod |   288     0  21680    562   -1145     442     29     43     15     84     97     76   26.97
 emr |   288     0  21146    844    1972   -1470     29     45     12     80     77     81   27.50
 esa |   288     0  25730    813     290     544     31     51     14    102    126     87   22.62
 gfz |   281     0  22435  10005    -553    1891     39     42     37    121     99    130    0.00
 iga |    96     0   2844     44    -334     501     89     89      0    161    161      0    0.00
 igu |    96     0   2667     15    -235      15   2041   2041      0   3539   3539      0    0.00
 jpl |   288     0  25729    297    3883   -1244     30     51     14    104    116     98   22.91
 ngs |    96     0   2844      1    -340     516   2153   2153      0   3534   3534      0    0.00
 usn |   288     0  20108    156   -1060    1937     47     63     32    110    122    100    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    2 |   227   -29   -41    96     2    98     -   -12   311    46 |
    3 | -5478    75     X   -90     X   158 -3035     X -5508    87 |
    4 | -1668    20   -66    51    69  -155 -3917     6 -1922   -19 |
    5 |  1457    42   -69   -82     X  -115 -1542   118   986   138 |
    6 |  1806     X    51     X    97   179 -2373   -62   574   199 |
    7 | -1233   102   -13  -131    66  -183  -238    25  -929    85 |
    8 | -5354   -10   -11    58     X   207  -419   -32 -5219   101 |
    9 | -3782  -102    46   106     X   147   982   -40 -2009   162 |
   10 |  1618  -131    74   101     X    59  9564   -35   276   104 |
   11 |  4014   127   -76    -7     X   -88 -1029   -38  4036    51 |
   12 |  -678    34  -110    97   112  -159 -1014    -3  -898  -109 |
   13 |  3840    71  -133   156     X  -133    93   -80  3673    44 |
   14 |  4899     9    78   -61     X    18  -952   -45  4583   -73 |
   15 |   -76    60   -39   -81     X   -67   450    54  -179   113 |
   16 |  2768    23    86  -138     X   163  -377     6  2924   173 |
   17 | -3735   134    15  -252     X  -269 -2988    74 -1735   114 |
   18 |  3827    45    65  -153  -119    42  -419    20  3827    77 |
   19 |  2434   130    -2   -56   -45  -100 -1912   -96  1754  -106 |
   20 |  4121   139     X  -165   -59    -2     -     -  4053   155 |
   21 |  2864    46   -25   -66   -16   156 -1722    42  2604   130 |
   22 | -3659    16     5    29     X    39 -2429   -54 -3168    52 |
   23 |   492   103   -47    15     X   -15 -1253   -84   260    65 |
   24 |  -323   -10   -78    87   -98   106  2034    19  -722   125 |
   26 |   337     X    20     X   101   -87  1253   -24   -54   -35 |
   27 | -4062   -68    35    73   -28   142   608   -34 -3261    95 |
   28 |  4701    61   -37   145   -16   223  4468  -172  4342    51 |
   29 | -3552   104   -38  -243     X  -169 -1394   163 -2818    85 |
   30 |  -850   -24    54    22    55   -17  7577   -58 -1250   -17 |
   31 | -1005    82   -22   -87   208  -121   156    16  -750  -140 |
   32 | -3155  -173   -75  -124    -4    30   972   417 -3230   -17 |
 -----+-------------------------------------------------------------+
 ABPO |     -     -     -    15   -48     -     -   -15     -     - |
 ALGO |     -    42   -42     1    -6     -     -     -     -   -94 |
 AMC2 |     -   -43     -     -     -     -     -    51     -   -42 |
 AREQ |     -     -   -34    99     X     -     -   -45     -  -113 |
 ARTU |     -    -9     -    18   -20     -     -    -6     -     - |
 ASPA |     -     0     -     6     X     -     -    -5     -   -12 |
 AUCK |     -   100     -     -     X     -     -  -117     -     - |
 BAN2 |     -     -    28   -34     -     -     -     -     -   -94 |
 BOGT |     -     -     -   149     X     -     -  -147     -  -257 |
 BRFT |     -    13     -    93   -17     -     -  -106     -     - |
 BRST |     -    33     -   -40     -     -     -     -     -     - |
 BRUS |     -   -54    68     -     -     -     -   -18     -   -48 |
 CAGL |     -     -     -    -5     -     -     -     5     -     - |
 CAS1 |     -   -56     -    67     X     -     -     -     -    18 |
 CEDU |     -   -53     -    87     -     -     -   -20     -     - |
 CHPI |     -     -     -    43     -     -     -   -42     -     - |
 CHUR |     -   -76    78    16   162     -     -   -22     -     - |
 CRO1 |     -     -     6   -49   -40     -     -    39     -   -95 |
 DAEJ |     -    42   -41     -     -     -     -     -     -     - |
 DARW |     -     -  -144   175     X     -     -     -     -     - |
 DRAO |     -    59     X   -70     -     -     -     -     -   -48 |
 FAA1 |     -  -175     -   208  -106     -     -     -     -     - |
 FAIR |     -     -   -82     -  -190     -     -    99     -     - |
 GLPS |     -     -     -    23     X     -     -   -22     -  -148 |
 GLSV |     -    25     -     -     X     -     -   -30     -     - |
 GRAZ |     -  -144   302     -     -     -     -  -193     -     - |
 GUUG |     -     -     -   -18    17     -     -    17     -     - |
 HARB |     -     -    26   -43  -133     -     -     9     -     - |
 HOB2 |     -   205    13    69     X     -     -  -326     -   147 |
 HOFN |     -     -     -   -78    53     -     -    77     -  -113 |
 IENG |     -  -102   100     -     -     -     -     -     -   -55 |
 KARR |     -     -     -   109   -37     -     -  -108     -     - |
 KERG |     -     -    -4     5     X     -     -     -     -   105 |
 KIRU |     -   -57    54   -38     -     -     -    38     -     - |
 KOUR |     -   -27    22    34     X     -     -   -27     -   -57 |
 LPGS |     -     -   -13     -     X     -     -    16     -    79 |
 MAC1 |     -     -     -   -81  -102     -     -    80     -    57 |
 MAL2 |     -    -6     -     7     -     -     -     -     -     - |
 MAS1 |     -    -6   114   -28     X     -     -  -103     -   -22 |
 MAW1 |     -   -59     -    69   100     -     -     1     -     - |
 MDO1 |     -     -  -126   -82  -118     -     -   229     -   -39 |
 MIZU |     -   -15    15     -     -     -     -     -     -   -52 |
 NICO |     -   -22     -     -   134     -     -    25     -     - |
 NNOR |     -     -  -115   178     -     -     -   -37     -  -118 |
 NRIL |     -     -     -  -118     -     -     -   116     -     - |
 NTUS |     -  -125     -   148    56     -     -     -     -  -133 |
 NYA1 |     -  -108     -   129     -     -     -     -     -   -85 |
 NYAL |     -     -   129     -     X     -     -  -155     -     - |
 OHI2 |     -     -     -   -26     X     -     -    25     -     - |
 OUS2 |     -     -     -    54     -     -     -   -54     -     - |
 PDEL |     -    31     -     -     X     -     -   -36     -     - |
 PERT |     -     -   -72    87     -     -     -     -     -    13 |
 PETS |     -     -     -   -99   -60     -     -    98     -     - |
 PICL |     -     -     -   -31     -     -     -    30     -     - |
 PIMO |     -     -     -  -270  -310     -     -   267     -     - |
 POL2 |     -     -     -    42    23     -     -   -41     -     - |
 PRDS |     -  -105    72     -     -     -     -    37     -  -120 |
 PTBB |     -    44   -43     -     -     -     -     -     -    79 |
 QAQ1 |     -  -113    74    45     -     -     -     0     -     - |
 SANT |     -     -     -    28     X     -     -   -27     -     - |
 SCH2 |     -   -36   -36   -50    94     -     -   132     -   -27 |
 SCUB |     -     -     -    57     -     -     -   -56     -     - |
 SEY1 |     -     -     -   -76   111     -     -    75     -   -29 |
 SFER |     -     -     1     -     -     -     -    -1     -   123 |
 SHAO |     -     -     -   -71  -272     -     -    70     -  -142 |
 SPT0 |     -    -4     4     -     -     -     -     -     -   -19 |
 STJO |     -     -   -86   121    11     -     -   -16     -    49 |
 SUTM |     -     -    26   -35    25     -     -     3     -     - |
 SYOG |     -    41   -40     -   183     -     -     -     -     - |
 THU3 |     -   -95    85     9   146     -     -     -     -   -82 |
 TIDB |     -     -   -15     -     X     -     -    18     -     6 |
 TIXI |     -   -94     -    31     -     -     -    81     -     - |
 TLSE |     -     -    42     -     -     -     -   -50     -   -59 |
 TOW2 |     -   104     -   120     X     -     -  -240     -     - |
 TSKB |     -   -14   -27    45    48     -     -     5     -    62 |
 TWTF |     -    35   -34     -     -     -     -     -     -     - |
 ULAB |     -     -     -   -81  -104     -     -    80     -     - |
 USN3 |     -    23   -22     -     -     -     -     -     -   -92 |
 VILL |     -     -    55   -66     X     -     -     -     -     - |
 VIS0 |     -     -     -   -81     -     -     -    80     -     - |
 WHIT |     -   -19   -66    -9     -     -     -   110     -  -121 |
 WILL |     -   -29    28     -     -     -     -     -     -  -141 |
 WSRT |     -    29   -28     -     X     -     -     -     -    89 |
 YELL |     -    28    84   -60   117     -     -   -74     -     - |
 YSSK |     -   -13     -   -77     -     -     -    88     -     - |
 ZWE2 |     -   -52     -     X  -193     -     -    61     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO    RMS
 -----+-------------------------------------------------------------+-------------
    2 |   704    37    41    55    44    97     -    55   685    45 |  288    245
    3 |  2263    34     X    41     X    91  1862     X  2677   114 |  287   2552
    4 |  1776    21    21    25    22   110  2408    23  1614    68 |  288    791
    5 |   331    44    33    70     X    80   958    49   538    74 |  288    345
    6 |  2323     X    43     X    71   122  1619    51  1665    67 |  259   1083
    7 |  1100    40    47    31    31    67   651    39  1118    43 |  288    226
    8 |  2868    32    48    24     X    87  2834    17  3085    34 |  288   2267
    9 |  5251    44    24    17     X    60  2644    33  4401    52 |  288   3128
   10 |  3905    20    23    33     X    91  2921    26  2964    31 |  288   2256
   11 |   663    47    43    40     X    84   596    41   606    49 |  288    448
   12 |  1120    55    51    49    30    57   852    54   913    60 |  288    312
   13 |  1016    42    42    66     X    99   580    76  1124    35 |  288    257
   14 |   428    30    39    59     X    71   555    51   466    54 |  288    237
   15 |   811    57    65    58     X    83   743    63   560    81 |  288    286
   16 |   694    56    59    66     X    53   518    58   601    52 |  288    320
   17 |  3947    77    82    80     X    69  1284    76  2065    63 |  288    221
   18 |   367    32    34    63    31    85   384    39   519    60 |  288    275
   19 |  1307    31    40    65    49    78   827    68  1114    55 |  288    269
   20 |   757    23     X    28    48   137     -     -   657    54 |  242    276
   21 |  1383    38    57    72    37    69  1034    50  1142    44 |  288    302
   22 |  1464    21    35    50     X    54  1391    38  1691    41 |  288    296
   23 |   593    77    60    84     X    83   714   106   561    76 |  288    234
   24 |  2159    30    32    32    54   107  2414    24  2399    40 |  288   2079
   26 |  1405     X    21     X    81   210  1515    25  1233   169 |  254    866
   27 |  6224    45    31    18    25    67  2587    27  5101    59 |  288   4522
   28 |  2508    52    66    55    37    71  3969    43  2592    62 |  288    786
   29 |  1500    39    29    56     X    50   892    80  1614    37 |  288    237
   30 |  5984    36    33    19    28    49  6841    33  5478    37 |  288   3227
   31 |   423    56    58    54    38   137   800    50   655    60 |  288    343
   32 |   451    36    41    35    19    77   423    31   570    43 |  288    620
 -----+-------------------------------------------------------------+-------------
 ABPO |     -     -     -    11    24     -     -    10     -     - |  276  14910
 ALGO |     -    11     8     8    12     -     -     -     -    14 |  288     68
 AMC2 |     -    11     -     -     -     -     -    13     -    12 |  288     23
 AREQ |     -     -    10    12     X     -     -    11     -    71 |  288   6446
 ARTU |     -     8     -     5    78     -     -     7     -     - |  288   8954
 ASPA |     -    19     -    20     X     -     -    18     -    38 |  288  10003
 AUCK |     -    27     -     -     X     -     -    31     -     - |  286   6045
 BAN2 |     -     -    18    22     -     -     -     -     -    25 |  286   8978
 BOGT |     -     -     -    10     X     -     -    10     -    26 |  276  15157
 BRFT |     -    19     -    20    34     -     -    26     -     - |  284     73
 BRST |     -     6     -     7     -     -     -     -     -     - |  276   3860
 BRUS |     -    12     9     -     -     -     -     7     -    34 |  288     23
 CAGL |     -     -     -    59     -     -     -    58     -     - |  141    >>>
 CAS1 |     -    12     -    15     X     -     -     -     -    37 |  288   2895
 CEDU |     -    19     -    14     -     -     -    15     -     - |  288    633
 CHPI |     -     -     -    10     -     -     -    10     -     - |  252  12875
 CHUR |     -    21    13    11    19     -     -     8     -     - |  288   5401
 CRO1 |     -     -    10    17    77     -     -     7     -    25 |  288     41
 DAEJ |     -    19    19     -     -     -     -     -     -     - |  288   1498
 DARW |     -     -    16    19     X     -     -     -     -     - |  276   4012
 DRAO |     -    26     X    30     -     -     -     -     -    24 |  281 235799
 FAA1 |     -    13     -    15    27     -     -     -     -     - |  276  11261
 FAIR |     -     -     6     -    20     -     -     7     -     - |  288   7832
 GLPS |     -     -     -     9     X     -     -     9     -    34 |  276  17545
 GLSV |     -    11     -     -     X     -     -    13     -     - |  288   5704
 GRAZ |     -    12    22     -     -     -     -    19     -     - |  288   5223
 GUUG |     -     -     -    16    38     -     -    16     -     - |  288   6350
 HARB |     -     -    11    12    20     -     -    10     -     - |  288   2400
 HOB2 |     -    17    12    11     X     -     -     9     -    64 |  288     36
 HOFN |     -     -     -     5    37     -     -     5     -    33 |  275    >>>
 IENG |     -    20    20     -     -     -     -     -     -    22 |  288     39
 KARR |     -     -     -     8    31     -     -     8     -     - |  276  12648
 KERG |     -     -    21    26     X     -     -     -     -    23 |  276  54472
 KIRU |     -    11     9     8     -     -     -    10     -     - |  288   3737
 KOUR |     -    19    15    22     X     -     -    12     -    44 |  288    122
 LPGS |     -     -     7     -     X     -     -     9     -    47 |  288  21052
 MAC1 |     -     -     -     9    72     -     -     9     -    53 |  276   8577
 MAL2 |     -    13     -    16     -     -     -     -     -     - |  276    >>>
 MAS1 |     -    23    20    12     X     -     -    16     -    35 |  288   3033
 MAW1 |     -    15     -    11    31     -     -    12     -     - |  288   2954
 MDO1 |     -     -     7     9    76     -     -     7     -    18 |  288   9038
 MIZU |     -    15    14     -     -     -     -     -     -    25 |  287    355
 NICO |     -    15     -     -    58     -     -    18     -     - |  288   3712
 NNOR |     -     -    19    18     -     -     -    14     -    39 |  288   1434
 NRIL |     -     -     -    35     -     -     -    34     -     - |  267   7126
 NTUS |     -    15     -    17    29     -     -     -     -    28 |  276   2514
 NYA1 |     -     9     -    10     -     -     -     -     -    22 |  276   4917
 NYAL |     -     -     6     -     X     -     -     7     -     - |  288   5010
 OHI2 |     -     -     -    10     X     -     -    10     -     - |  275    >>>
 OUS2 |     -     -     -    15     -     -     -    15     -     - |  288   1230
 PDEL |     -    10     -     -     X     -     -    12     -     - |  288   2996
 PERT |     -     -     7     8     -     -     -     -     -    25 |  287   2728
 PETS |     -     -     -    12    15     -     -    12     -     - |  276   6109
 PICL |     -     -     -     5     -     -     -     5     -     - |  276  13610
 PIMO |     -     -     -     9    67     -     -     8     -     - |  276  11376
 POL2 |     -     -     -     5    10     -     -     5     -     - |  276   8425
 PRDS |     -    13    11     -     -     -     -    11     -    11 |  288   7562
 PTBB |     -    14    14     -     -     -     -     -     -    21 |  288     64
 QAQ1 |     -    10     6    10     -     -     -    11     -     - |  288   7109
 SANT |     -     -     -     9     X     -     -     8     -     - |  288    963
 SCH2 |     -    11    11    11    15     -     -    11     -    24 |  288   5568
 SCUB |     -     -     -    10     -     -     -    10     -     - |  288  15954
 SEY1 |     -     -     -    12    32     -     -    11     -    39 |  276  18921
 SFER |     -     -     7     -     -     -     -     8     -    25 |  288     44
 SHAO |     -     -     -     8    11     -     -     8     -    31 |  276     75
 SPT0 |     -    12    11     -     -     -     -     -     -    23 |  288     33
 STJO |     -     -     7     9    16     -     -     6     -    39 |  288 453204
 SUTM |     -     -    11    14    18     -     -    11     -     - |  288  10977
 SYOG |     -    16    15     -    28     -     -     -     -     - |  288    735
 THU3 |     -    13     9    10    13     -     -     -     -    25 |  288  10182
 TIDB |     -     -     8     -     X     -     -     9     -    58 |  288   1828
 TIXI |     -    10     -    16     -     -     -    19     -     - |  287   5755
 TLSE |     -     -     8     -     -     -     -    10     -    21 |  288   5055
 TOW2 |     -    19     -    14     X     -     -    18     -     - |  288   3703
 TSKB |     -    10    12    15    13     -     -    12     -    16 |  288   1691
 TWTF |     -    10    10     -     -     -     -     -     -     - |  288     22
 ULAB |     -     -     -     6     7     -     -     6     -     - |  288   9140
 USN3 |     -    10    10     -     -     -     -     -     -    16 |  288     16
 VILL |     -     -     8     9     X     -     -     -     -     - |  288   9060
 VIS0 |     -     -     -     4     -     -     -     4     -     - |  276  12358
 WHIT |     -    13    11    11     -     -     -     9     -    11 |  288   4210
 WILL |     -    14    13     -     -     -     -     -     -    10 |  286  10482
 WSRT |     -    13    13     -     X     -     -     -     -    15 |  288     18
 YELL |     -    18    12    11    19     -     -    10     -     - |  288     50
 YSSK |     -    12     -     8     -     -     -    16     -     - |  287   7790
 ZWE2 |     -    19     -     X    32     -     -    22     -     - |  268    >>>
 -----+-------------------------------------------------------------+-------------
 TOT  |  2467    29    30    32    39    90  2042    31  2154    48 |




CLOCK JUMP CORRECTIONS APPLIED
------------------------------

CEN | STA/SAT | EPOCH           |     JUMP(ps)
----+---------+-----------------+-------------
gfz |   TIDB  | 1571-4  4:15:00 |         637
gfz |   TOW2  | 1571-4  4:15:00 |         504
gfz |   SANT  | 1571-4  6:30:00 |       -1176
gfz |   HOB2  | 1571-4  8:05:00 |        1862
gfz |   DARW  | 1571-4  8:05:00 |         908
gfz |   WTZR  | 1571-4 10:20:00 |       16852
gfz |   ASPA  | 1571-4 16:05:00 |        -700
gfz |   BOGT  | 1571-4 16:20:00 |       -1086
gfz |   SUTM  | 1571-4 22:05:00 |         656
jpl |   DGAR  | 1571-4  0:10:00 |        -572
jpl |   DGAR  | 1571-4  0:15:00 |       -4676
jpl |   DGAR  | 1571-4  0:20:00 |        9903
jpl |   DGAR  | 1571-4  0:25:00 |       -7975
jpl |   DGAR  | 1571-4  0:30:00 |       -4483
jpl |   DGAR  | 1571-4  0:35:00 |        2088



---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288   14.63   | 3.20e-14  5.77e-15  1.27e-15 |
 USN3 |   288     0     0   288   13.63   | 3.35e-14  4.40e-15  2.58e-15 |
 DRAO |   281     0     0   279   12.30   | 2.86e-14  5.40e-15  1.14e-15 |
 SPT0 |   288     0     0   288   11.61   | 3.57e-14  6.51e-15  1.43e-15 |
 WSRT |   288     1     0   287   10.28   | 2.03e-14  4.67e-15  7.66e-16 |
 AMC2 |   288     0     0   288    8.58   | 3.87e-14  5.54e-15  1.99e-15 |
 PTBB |   288     0     0   288    7.08   | 3.88e-14  8.07e-15  5.29e-15 |
 IENG |   288     0     0   288    6.10   | 3.69e-14  1.22e-14  3.55e-15 |
 HOB2 |   288     0     0   288    4.13   | 4.22e-14  8.48e-15  2.87e-15 |
 ALGO |   288     0     0   288    4.04   | 2.45e-14  5.23e-15  5.17e-15 |
 TWTF |   288     0     0   143    2.47   | 3.82e-14  5.87e-15  2.90e-15 |
 BRFT |   284     0     0   283    2.15   | 6.19e-14  3.24e-14  7.44e-15 |
 SFER |   288     1     0   143    1.55   | 5.23e-14  1.33e-14  3.00e-15 |
 KOUR |   288     0     0   288    0.52   | 5.41e-14  1.91e-14  1.13e-14 |
 YELL |   288     0     0   288    0.22   | 2.98e-14  6.18e-15  2.05e-15 |
 TIDB |   288     0     1   271    0.10   | 1.06e-13  4.76e-14  1.34e-13 |
 G32  |   288     0     0   288    0.09   | 2.20e-13  7.19e-14  5.87e-14 |
 CEDU |   288     0     0   288    0.07   | 2.19e-13  6.53e-14  4.11e-14 |
 G23  |   288     0     3    60    0.07   | 5.42e-13  5.73e-14  2.52e-14 |
 MIZU |   287     0     0   286    0.06   | 4.40e-13  1.35e-13  2.70e-14 |
 G29  |   288     0     1   143    0.06   | 5.74e-13  7.15e-14  1.50e-14 |
 G19  |   288     0     1   143    0.05   | 5.70e-13  7.80e-14  1.93e-14 |
 G06  |   259     0     0   253    0.05   | 5.38e-13  1.23e-13         - |
 G26  |   254     0     0   247    0.04   | 4.53e-13  1.45e-13         - |
 SYOG |   288     0     0   288    0.03   | 6.47e-13  1.87e-13  7.38e-14 |
 G04  |   288     0     0   288    0.02   | 4.72e-13  1.82e-13  9.30e-14 |
 G16  |   288     0     4    34    0.01   | 6.17e-13  6.55e-14  3.35e-14 |
 TSKB |   288     0     0   288    0.01   | 1.05e-12  3.21e-13  1.18e-13 |
 G31  |   288     0     5    13    0.01   | 5.92e-13  6.62e-14  2.53e-14 |
 NNOR |   288     0     0   288    0.01   | 1.15e-12  4.95e-13  1.23e-13 |
 G10  |   288     0     0   288    0.01   | 1.44e-12  4.10e-13  1.41e-13 |
 KERG |   276     1     0   131    0.00   | 8.50e-13  2.47e-13  1.24e-13 |
 OUS2 |   288     0     0   143    0.00   | 4.98e-13  1.66e-13  1.38e-13 |
 HARB |   288     0     0   288    0.00   | 1.20e-12  4.31e-13  2.73e-13 |
 G08  |   288     0     0   288    0.00   | 1.37e-12  4.67e-13  2.56e-13 |
 SANT |   288     0     0   143    0.00   | 9.72e-13  2.80e-13  1.09e-13 |
 G03  |   287     0     0   285    0.00   | 1.33e-12  4.16e-13  3.01e-13 |
 G13  |   288     0     4     8    0.00   | 6.05e-13  7.62e-14  2.61e-14 |
 DAEJ |   288     0     0   288    0.00   | 1.67e-12  5.20e-13  1.58e-13 |
 KIRU |   288     0     0   288    0.00   | 7.40e-13  7.07e-13  4.34e-13 |
 GPST |   288     0     0     0    0.00   | 1.73e-14  2.91e-15  1.56e-15 |
 CAGL |   141     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 OHI2 |   275     0     0     0    0.00   |        -         -         - |
 HOFN |   275     0     0     0    0.00   |        -         -         - |
 AUCK |   286     0     0     0    0.00   |        -         -         - |
 G30  |   288     0     0     0    0.00   | 1.51e-12  5.28e-13  2.81e-13 |
 G28  |   288     0     6     0    0.00   | 5.87e-13  6.93e-14  5.24e-14 |
 G27  |   288     0     0     0    0.00   | 1.33e-12  4.73e-13  5.59e-13 |
 G24  |   288     0     0     0    0.00   | 1.24e-12  4.35e-13  2.06e-13 |
 G22  |   288     4     6     0    0.00   | 1.19e-12  1.70e-13  6.10e-14 |
 G21  |   288     1     6     0    0.00   | 9.88e-13  1.26e-13  3.67e-14 |
 G20  |   242     0     6     0    0.00   | 8.00e-13  9.53e-14         - |
 G18  |   288     0     6     0    0.00   | 6.51e-13  6.64e-14  2.88e-14 |
 G17  |   288     0     4     0    0.00   | 6.21e-13  7.20e-14  1.60e-14 |
 G15  |   288     0     5     0    0.00   | 7.06e-13  6.83e-14  2.05e-14 |
 G14  |   288     0     6     0    0.00   | 6.14e-13  7.66e-14  1.76e-14 |
 G12  |   288     0     6     0    0.00   | 6.85e-13  7.29e-14  2.20e-14 |
 G11  |   288     0     6     0    0.00   | 6.83e-13  7.41e-14  5.16e-14 |
 G09  |   288     0     0     0    0.00   | 1.34e-12  3.98e-13  3.27e-13 |
 G07  |   288     0     6     0    0.00   | 5.77e-13  5.59e-14  2.54e-14 |
 G05  |   288     2     5     0    0.00   | 6.17e-13  1.38e-13  6.76e-14 |
 G02  |   288     0     6     0    0.00   | 5.66e-13  6.34e-14  2.56e-14 |
 ZWE2 |   268     2     0     0    0.00   |        -         -         - |
 WILL |   286     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   |        -         -         - |
 VIS0 |   276     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 ULAB |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 TLSE |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     2     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 STJO |   288     1     0     0    0.00   |        -         -         - |
 SHAO |   276     0     0     0    0.00   | 7.15e-14  8.45e-15  8.85e-15 |
 SEY1 |   276     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PRDS |   288     0     2     0    0.00   | 5.40e-13  6.52e-13  7.31e-13 |
 POL2 |   276     0     0     0    0.00   |        -         -         - |
 PIMO |   276     0     0     0    0.00   |        -         -         - |
 PICL |   276     0     0     0    0.00   |        -         -         - |
 PETS |   276     0     0     0    0.00   |        -         -         - |
 PERT |   287     0     0     0    0.00   | 4.43e-13  5.31e-13  2.91e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NYAL |   288     0     0     0    0.00   |        -         -         - |
 NYA1 |   276     0     0     0    0.00   |        -         -         - |
 NTUS |   276     0     0     0    0.00   |        -         -         - |
 NRIL |   267     0     0     0    0.00   |        -         -         - |
 NICO |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     1     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 3.33e-13  4.59e-13  2.41e-13 |
 MAL2 |   276     0     0     0    0.00   |        -         -         - |
 MAC1 |   276     0     0     0    0.00   |        -         -         - |
 LPGS |   288     1     0     0    0.00   |        -         -         - |
 KARR |   276     0     0     0    0.00   |        -         -         - |
 GUUG |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GLSV |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   276     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 FAA1 |   276     0     0     0    0.00   |        -         -         - |
 DARW |   276     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     4     0    0.00   | 1.31e-13  1.22e-14  3.52e-15 |
 CHUR |   288     0     0     0    0.00   | 4.79e-13  1.96e-13  4.40e-13 |
 CHPI |   252     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRST |   276     0     0     0    0.00   |        -         -         - |
 BOGT |   276     0     0     0    0.00   |        -         -         - |
 BAN2 |   286     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   | 1.30e-12  1.16e-12  6.52e-13 |
 ABPO |   276     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.12e-17  3.74e-16  2.25e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      USN3      WSRT |
------------------------------------------+------------------------------+
