
 cls-file Version 2.0
 GPS week: 1562   Day: 4   MJD: 55182                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2916      0    -396     247   3059   3059      0   4996   4996      0    0.00
 cod |   288     0  22709    558    -482    -177     32     43     22     74     79     71   24.55
 emr |   288     0  23684    585    1314     319     31     47     16     82     86     80   24.81
 esa |   288     0  28992    843   -1550    2995     30     49     16     97    114     90   24.33
 gfz |   277     0  24670  10122      69     936     36     37     35    158    167    152    0.00
 iga |    96     0   2859     10    -298     -18     54     54      0    141    141      0    0.00
 igu |    96     0   2859      0    -337      40   2497   2497      0   4287   4287      0    0.00
 jpl |   288     0  25754    271    4014     448     29     46     14     94     82     99   26.31
 usn |   288     0  23200     48   -1068     699     47     58     41    116    110    120    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   usn |
 -----+-------------------------------------------------------+
    2 |   600    -8    60   -15   -28    42  -679   -35    10 |
    3 | -8910   -65   108   -59   -17   109   362    13   174 |
    4 |   172   -81    32   -46     X  -149  4646    87   105 |
    5 |   935   113   -51  -198   161  -186 -2308   126    37 |
    6 | -1989   -10    65    -4   -56   -20 -6192   -49   130 |
    7 | -1280    29     0  -140     X  -143 -1567   103   -12 |
    8 |   900    18    15    47  -100   211  9212   -74   -26 |
    9 |  4549    42    47     8     X    97  3996   -90   137 |
   10 | -6010     X    30     X   -46   114  -610   -29  -111 |
   11 |  2536    54   -57    10   137     6 -1345    -6   -45 |
   12 |  -554    28  -109    64   113   -49  -411    17    31 |
   13 |  3712   106  -152   122     X   -74 -1576   -70    15 |
   14 |  3346    51   -18    33    -3   108  -440   -61    13 |
   15 |  -549   154  -135   -62    29    24   570    41    -6 |
   16 |  3801     8   117  -162  -143     2  -421    32   120 |
   17 | -1939    20    43  -248   220  -273  1313   170    64 |
   18 |  4437    35    77  -143     X    17  -619    29   -34 |
   19 |  2014   -30    76    21  -157  -128   125   -63    22 |
   20 |  3424    17    43   -75     X     2 -1327    13    11 |
   21 |  3981    73    42   -81    57    99   755   -32    29 |
   22 | -4068   -50    42    34   178   111 -5334   -24    52 |
   23 |    29    54   -41   -18    24    -2 -1489     5   -25 |
   24 |  1508    13   -13     -     -     -     -     -     - |
   25 |  2144    45    45    -7     X   -16 -3873   -77     - |
   26 | -3017    -2   -16    90    16   -27   414   -66   222 |
   27 | -8170    14    61     7   -44   117 -2469   -76   114 |
   28 |  4590   -67   -28   133    18   287  2874   -34    93 |
   29 | -2369     1    75  -174   217  -238 -1054    89   122 |
   30 |  -921   130   -29   -85     X   -95  9068   -15   142 |
   31 |  5343    66  -106    -1   254   -88  3414    39   -42 |
   32 | -8792   -54     X    54     X   183 -5207     X    73 |
 -----+-------------------------------------------------------+
 ALBH |     -     -  -143     -     -     -     -   135    37 |
 ALGO |     -     -    49     1    -8     -     -   -47   127 |
 ALIC |     -     -     -    79     X     -     -   -73     - |
 AMC2 |     -    -7     -   116     -     -     -  -101    24 |
 AREQ |     -   -61    60     -   113     -     -     0     - |
 ARTU |     -   -65     -   -54  -229     -     -   109     - |
 AUCK |     -   157     -     -     X     -     -  -147   226 |
 BOGT |     -    81     -     5     X     -     -   -80   -27 |
 BOR1 |     -   -67     -    68  -116     -     -     -  -202 |
 BRFT |     -    45     -   -46   -26     -     -     -     - |
 BRUS |     -    -5     5     -     -     -     -     -   -34 |
 CAS1 |     -    27     -   203     X     -     -  -204    81 |
 CEDU |     -   -35     -   109     X     -     -   -68     - |
 CHAT |     -     -     -    -5     X     -     -     4   160 |
 CHPI |     -     -     -    57     -     -     -   -53     9 |
 CHUR |     -   -29   123   -69  -140     -     -   -25     - |
 CRO1 |     -     -   -19     2     X     -     -    16   -79 |
 DAEJ |     -    79   -35   -43     -     -     -     -   -62 |
 DAV1 |     -     6     -   178     X     -     -  -164     - |
 DRAO |     -     -    55   -56     -     -     -     -  -156 |
 FAIR |     -     -   -21     -   -85     -     -    20     - |
 FLIN |     -  -163     -   164   167     -     -     -     - |
 GLPS |     -     -     -   -44   -84     -     -    41     - |
 GLSV |     -    80     -  -213   -45     -     -   123     - |
 GODE |     -     -    -2     3     X     -     -     -    -2 |
 GOLD |     -   -74     -    73  -186     -     -    -2   -64 |
 GUAM |     -     -     -    19   -10     -     -   -18   -95 |
 HARB |     -     -    91     X     X     -     -   -86     - |
 HLFX |     -     -     0     0     -     -     -     -  -126 |
 HOB2 |     -     -    30    86    52     -     -  -108   149 |
 ISPA |     -     -     -    27     X     -     -   -25    38 |
 KARR |     -     -     -   -58     X     -     -    54     - |
 KERG |     -     -  -143    -9   -30     -     -   143   188 |
 KIRU |     -     -    -2     3     -     -     -     -     - |
 KIT3 |     -     -     -   -65   -64     -     -    60   113 |
 KOKB |     -     -    -8   -90  -133     -     -    91   -78 |
 KOUR |     -   -72    -7   -29     X     -     -   101   -45 |
 LPGS |     -     -  -117    13     X     -     -    98   -19 |
 MAC1 |     -     -     -   -21     X     -     -    20     - |
 MAL2 |     -   -51     -    52     -     -     -     -     - |
 MAR6 |     -     -    -5     -     -     -     -     4     - |
 MAS1 |     -    33     2    27   -35     -     -   -57     7 |
 MAW1 |     -   -27     -    27     3     -     -     -     - |
 MCM4 |     -     -    54   -55     X     -     -     -   -32 |
 MDO1 |     -   -56   -80   -78     X     -     -   197   134 |
 METS |     -    13     -   -13     -     -     -     -  -144 |
 MIZU |     -     8    -7     -     -     -     -     -   -46 |
 NIST |     -   -26    26     -     -     -     -     -    40 |
 NNOR |     -     -   -49    50     -     -     -     -     4 |
 NRC1 |     -     -   -86    87  -103     -     -     -    -6 |
 NRIL |     -     -     -    -9   -44     -     -     8     - |
 NSSP |     -   -99     -     -     -     -     -    92  -101 |
 NTUS |     -   -43     -   158   135     -     -  -107  -156 |
 NYA1 |     -   -97     -    98     -     -     -     -   -22 |
 NYAL |     -     -   124     -   146     -     -  -117     - |
 ONSA |     -     X    16   -16    16     -     -     -  -112 |
 PDEL |     -     -     -    22     5     -     -   -21     - |
 PERT |     -     -   -60  -117     -     -     -   165    81 |
 PIE1 |     -   -78    66    11     X     -     -     -     - |
 PIMO |     -     -     -   -79  -109     -     -    73     - |
 POL2 |     -     -     -    14     X     -     -   -13     - |
 PTBB |     -    43   -43     -     -     -     -     -    -4 |
 QAQ1 |     -     -    77   -12     -     -     -   -62     - |
 QUIN |     -   -54     -    55     -     -     -     -     - |
 RABT |     -   -68     -   -36     -     -     -    97     - |
 REYK |     -     -     -    89     -     -     -   -82     - |
 SANT |     -  -111     -   -36   -89     -     -   137     - |
 SCH2 |     -    11   -11     -    16     -     -     -   -52 |
 SCUB |     -     -     -    25     -     -     -   -24     - |
 SHAO |     -   -16     -     -     X     -     -    15  -175 |
 SPT0 |     -   -10    10     -     -     -     -     -  -122 |
 STJO |     -     2    88    55  -108     -     -  -136     - |
 SUTM |     -     -    18     -     X     -     -   -17     - |
 SUWN |     -     -   189     -     -     -     -  -178  -385 |
 SYOG |     -     0  -140   191   -37     -     -     -     - |
 THTI |     -     -    63  -156     X     -     -    85   -39 |
 THU3 |     -   -70    91   -22   -14     -     -     -   -43 |
 TIDB |     -     -  -163    57   -35     -     -   101    24 |
 TOW2 |     -    46     -   200     X     -     -  -226     - |
 TSKB |     -    31   -31     X   122     -     -     -     - |
 TWTF |     -     8    -8     -     -     -     -     -   -72 |
 ULAB |     -     -     -   -90     X     -     -    84     - |
 USN3 |     -    -1     1     -     -     -     -     -   -62 |
 USUD |     -     -  -193     -     -     -     -   182     - |
 VILL |     -     -   -51    92   262     -     -   -37     - |
 WHIT |     -   -36    37    12     -     -     -   -11   -81 |
 WILL |     -    -9    77   -69     -     -     -     -  -148 |
 WSRT |     -    87   -87     -     X     -     -     -    36 |
 WTZR |     -   -93     X    94     X     -     -     -  -115 |
 YAKT |     -   -69   -48    -3     -     -     -   112   -28 |
 YELL |     -    79   -15   -82     X     -     -    18     - |
 YKRO |     -     -     -    72    -6     -     -   -67     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   usn | NEPO    RMS
 -----+-------------------------------------------------------+-------------
    2 |   758    29    35    50    28    29   382    43    62 |  288    201
    3 |  4997    34    22    28    15    26  3632    22    39 |  288   1950
    4 |  1584    34    29    28     X    23  2072    26    55 |  288    497
    5 |   613    53    50    51    64    25  1685    57    83 |  288    595
    6 |  1655    23    22    27    14    41  2790    23    57 |  286    797
    7 |   979    71    68    60     X    77   920    50    50 |  288    412
    8 |  3826    42    44    29    25    43  3798    33    55 |  288   1911
    9 |  1873    35    40    46     X    40  2538    33    51 |  288   1894
   10 |  4042     X    46     X   101   195  2584    43   123 |  228   2421
   11 |  1150    22    30    17    23    32  1145    28    46 |  288    419
   12 |   789    46    63    79    38    32   703    58    44 |  288    390
   13 |  1066    47    58    59     X    30   991    54    53 |  288    461
   14 |  1507    52    43    59    24    72   705    50    63 |  288    356
   15 |   539    52    59    67    37    24   648    49    73 |  288    200
   16 |   567    46    78    78    32    28   265    45    46 |  288    353
   17 |  4106    19    27    32    35    51  2826    25    73 |  288    997
   18 |   525    68    72    95     X    74   515    90    62 |  288    247
   19 |  1494    17    30    25    21    32   263    25    42 |  288    214
   20 |  1333    33    52    30     X    30  1017    54    45 |  288    269
   21 |   723    28    31    54    23    64   448    49    34 |  288    364
   22 |  1332    65    36    50    37    33  3013    95    61 |  288    372
   23 |   650    49    58    59    42    27   796    47    50 |  288    175
   24 |  3463    34    34     -     -     -     -     -     - |  166   1609
   25 |  1776    37    45    33     X    51  2745    26     - |  288    520
   26 |  2631    42    33    19    35    14  1435    28    52 |  288   1258
   27 |  9660    39    48    36    42    48  5922    31    47 |  288   5251
   28 |   502    62    70    55    42    51  1376    54    59 |  288    226
   29 |  1688    15    18    38    19    41   597    32    54 |  288    215
   30 |  8395    59    48    32     X    29  7404    40    49 |  288   2636
   31 |  2222    37    44    57    29    32  2007    56    48 |  288    389
   32 |  2297    30     X    31     X    94  1945     X    83 |  288   1248
 -----+-------------------------------------------------------+-------------
 ALBH |     -     -    12     -     -     -     -    12    32 |  288   4097
 ALGO |     -     -    15     8    45     -     -     9    12 |  288    148
 ALIC |     -     -     -    14     X     -     -    13     - |  288   4497
 AMC2 |     -    28     -    15     -     -     -    16    20 |  288     20
 AREQ |     -    16    11     -    18     -     -     9     - |  288   3285
 ARTU |     -    20     -    12    65     -     -    14     - |  288   9774
 AUCK |     -    22     -     -     X     -     -    20    46 |  287   5988
 BOGT |     -    24     -    12     X     -     -    17    18 |  288   9401
 BOR1 |     -    22     -    23    28     -     -     -    34 |  288   3772
 BRFT |     -    13     -    13    63     -     -     -     - |  240     45
 BRUS |     -     8     8     -     -     -     -     -    25 |  288     26
 CAS1 |     -    29     -    20     X     -     -    12    32 |  288   3193
 CEDU |     -    31     -    18     X     -     -    21     - |  288  21202
 CHAT |     -     -     -    12     X     -     -    11    35 |  263  12450
 CHPI |     -     -     -    16     -     -     -    15    52 |  288  14666
 CHUR |     -    27    14    12    50     -     -     9     - |  288   4375
 CRO1 |     -     -    12    11     X     -     -     8    17 |  288     30
 DAEJ |     -    30     9    26     -     -     -     -    32 |  287   1485
 DAV1 |     -    30     -    21     X     -     -    13     - |  288   3196
 DRAO |     -     -     9     9     -     -     -     -    15 |  288   4474
 FAIR |     -     -     6     -    46     -     -     6     - |  288   5552
 FLIN |     -     9     -     9    28     -     -     -     - |  215   3789
 GLPS |     -     -     -     7    16     -     -     6     - |  288  11478
 GLSV |     -    23     -    18    15     -     -    10     - |  288   7934
 GODE |     -     -    11    11     X     -     -     -    26 |  288     46
 GOLD |     -    26     -    15    57     -     -    14    22 |  288  11636
 GUAM |     -     -     -     9    22     -     -     8    34 |  288  12517
 HARB |     -     -    17     X     X     -     -    16     - |  288   1228
 HLFX |     -     -     9     9     -     -     -     -    27 |  288   9075
 HOB2 |     -     -    14    17    22     -     -    10    33 |  288    209
 ISPA |     -     -     -    11     X     -     -    10    69 |  288  13880
 KARR |     -     -     -    17     X     -     -    16     - |  287   9496
 KERG |     -     -     8    12    16     -     -     9    25 |  288   1057
 KIRU |     -     -    16    16     -     -     -     -     - |  288   1060
 KIT3 |     -     -     -     9    22     -     -     8    74 |  288  13992
 KOKB |     -     -    17    16    31     -     -    13    22 |  288     60
 KOUR |     -    16    28    18     X     -     -    25    27 |  288    110
 LPGS |     -     -    14    15     X     -     -     9    70 |  288  34435
 MAC1 |     -     -     -    11     X     -     -    10     - |  264   7151
 MAL2 |     -    20     -    20     -     -     -     -     - |  288   5448
 MAR6 |     -     -    20     -     -     -     -    19     - |  288    793
 MAS1 |     -    26    15    15    30     -     -    16    19 |  288   4309
 MAW1 |     -    15     -    15    17     -     -     -     - |  288   3738
 MCM4 |     -     -     9    10     X     -     -     -    37 |  288   7076
 MDO1 |     -    19    14    11     X     -     -    10    23 |  288   4896
 METS |     -    26     -    26     -     -     -     -    28 |  287     37
 MIZU |     -    20    20     -     -     -     -     -    22 |  288    531
 NIST |     -    12    12     -     -     -     -     -    24 |  288     31
 NNOR |     -     -    13    14     -     -     -     -    25 |  288    720
 NRC1 |     -     -     6     6    50     -     -     -    14 |  288     24
 NRIL |     -     -     -    34    34     -     -    32     - |  269   7058
 NSSP |     -    13     -     -     -     -     -    12    86 |  288   7705
 NTUS |     -    15     -    12    21     -     -    15    31 |  288   3088
 NYA1 |     -    17     -    17     -     -     -     -    15 |  288   6953
 NYAL |     -     -     9     -    29     -     -     8     - |  288   6954
 ONSA |     -     X    41    42    17     -     -     -   166 |  275     74
 PDEL |     -     -     -    11    53     -     -    10     - |  288   3623
 PERT |     -     -    11    14     -     -     -     7    26 |  288   4945
 PIE1 |     -    16    11    10     X     -     -     -     - |  287     26
 PIMO |     -     -     -    11    16     -     -    11     - |  288  10139
 POL2 |     -     -     -     9     X     -     -     8     - |  276   6554
 PTBB |     -    11    11     -     -     -     -     -    33 |  288    222
 QAQ1 |     -     -    10     8     -     -     -     9     - |  288   8479
 QUIN |     -    14     -    14     -     -     -     -     - |  288   6657
 RABT |     -    25     -    23     -     -     -    12     - |  288   9965
 REYK |     -     -     -     9     -     -     -     9     - |  287    >>>
 SANT |     -    33     -    19    19     -     -    20     - |  288    992
 SCH2 |     -    15    15     -    41     -     -     -    11 |  288   3550
 SCUB |     -     -     -    15     -     -     -    14     - |  288  11509
 SHAO |     -    35     -     -     X     -     -    33    18 |  288    457
 SPT0 |     -     9     9     -     -     -     -     -    33 |  288     27
 STJO |     -    24     8    11    23     -     -    20     - |  288  14033
 SUTM |     -     -    17     -     X     -     -    16     - |  286  11386
 SUWN |     -     -    10     -     -     -     -    10    45 |  288   5549
 SYOG |     -    28    16    22    14     -     -     -     - |  288   1181
 THTI |     -     -    22    21     X     -     -    11    65 |  288   9647
 THU3 |     -    19    10    22    50     -     -     -    10 |  288   7555
 TIDB |     -     -    25    24    36     -     -    12    43 |  288  10333
 TOW2 |     -    30     -    20     X     -     -    19     - |  288   3836
 TSKB |     -    24    24     X    18     -     -     -     - |  288   1904
 TWTF |     -    24    23     -     -     -     -     -    20 |  288     22
 ULAB |     -     -     -     7     X     -     -     7     - |  288  10183
 USN3 |     -    19    18     -     -     -     -     -    12 |  288     15
 USUD |     -     -    12     -     -     -     -    11     - |  288     26
 VILL |     -     -    25    21    55     -     -    11     - |  288   7739
 WHIT |     -    12    23    10     -     -     -    13    22 |  288   2644
 WILL |     -    23    13    18     -     -     -     -    36 |  288  17224
 WSRT |     -    25    25     -     X     -     -     -    18 |  288     29
 WTZR |     -    22     X    22     X     -     -     -    12 |  281     26
 YAKT |     -    29    39    30     -     -     -    29    29 |  288   6954
 YELL |     -    36    13    26     X     -     -    10     - |  288    123
 YKRO |     -     -     -    12    22     -     -    11     - |  288  11357
 -----+-------------------------------------------------------+-------------
 TOT  |  3059    32    32    30    36    54  2498    29    48 |




CLOCK JUMP CORRECTIONS APPLIED
------------------------------

CEN | STA/SAT | EPOCH           |     JUMP(ps)
----+---------+-----------------+-------------
gfz |   CHAT  | 1562-4  6:10:00 |        1217
gfz |   LPGS  | 1562-4 12:10:00 |        1071
gfz |   YELL  | 1562-4 12:10:00 |         930
gfz |   CEDU  | 1562-4 14:10:00 |         975
gfz |   BOGT  | 1562-4 14:30:00 |       -1851
gfz |   PIE1  | 1562-4 16:20:00 |   473566269
gfz |   PIE1  | 1562-4 16:25:00 |  -473566815
gfz |   TOW2  | 1562-4 20:30:00 |        -608
gfz |   GOLD  | 1562-4 22:30:00 |         648
gfz |   VILL  | 1562-4 23:00:00 |        -615
gfz |   VILL  | 1562-4 23:05:00 |         635
jpl |   DGAR  | 1562-4  0:10:00 |        4278
jpl |   DGAR  | 1562-4  0:20:00 |       -4618
jpl |   DGAR  | 1562-4  0:25:00 |       -8287
jpl |   DGAR  | 1562-4  0:30:00 |        9625
jpl |   DGAR  | 1562-4  0:35:00 |       -5293
jpl |   DGAR  | 1562-4  0:40:00 |        2443



---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 NIST |   288     0     0   288   11.88   | 3.48e-14  4.79e-15  1.23e-15 |
 USN3 |   288     0     0   288   11.63   | 3.16e-14  4.72e-15  2.19e-15 |
 PIE1 |   287     0     0   286   11.00   | 4.17e-14  4.87e-15  1.03e-15 |
 ONSA |   275     0     0   274    9.17   | 3.23e-14  5.04e-15  1.01e-15 |
 NRC1 |   288     1     0   287    8.02   | 3.85e-14  5.35e-15  1.11e-15 |
 AMC2 |   288     0     0   288    7.91   | 3.19e-14  6.31e-15  1.36e-15 |
 WSRT |   288     0     0   288    7.61   | 2.06e-14  3.55e-15  1.60e-15 |
 WTZR |   281     0     0   276    7.32   | 3.15e-14  6.85e-15  1.75e-15 |
 TWTF |   288     0     0   288    6.56   | 3.52e-14  5.35e-15  1.61e-15 |
 SPT0 |   288     0     0   288    4.81   | 3.85e-14  5.99e-15  2.01e-15 |
 BRUS |   288     0     0   288    4.02   | 3.62e-14  4.63e-15  1.60e-15 |
 BRFT |   240     1     0   239    2.64   | 4.91e-14  9.62e-15         - |
 HOB2 |   288     2     0   286    1.26   | 8.14e-14  2.53e-14  1.28e-14 |
 USUD |   288     0     2    96    1.10   | 9.10e-14  9.02e-15  1.45e-15 |
 KOKB |   288     0     0   288    1.01   | 9.35e-14  1.85e-14  3.71e-15 |
 YELL |   288     1     0   287    0.91   | 3.98e-14  2.27e-14  9.12e-15 |
 CRO1 |   288     0     0   288    0.91   | 1.14e-13  1.32e-14  4.12e-15 |
 ALGO |   288     1     0   287    0.61   | 2.76e-14  4.91e-15  1.02e-14 |
 GODE |   288     0     0   288    0.58   | 5.51e-14  7.18e-15  2.66e-15 |
 KOUR |   288     0     0   288    0.35   | 4.88e-14  1.46e-14  1.13e-14 |
 PTBB |   288     0     0   288    0.22   | 2.60e-13  6.82e-14  1.70e-14 |
 METS |   287     0     1    35    0.13   | 1.13e-13  1.20e-14  3.13e-15 |
 G16  |   288     0     0   288    0.05   | 5.93e-13  7.31e-14  3.15e-14 |
 MIZU |   288     0     0   288    0.04   | 4.16e-13  1.57e-13  4.53e-14 |
 G04  |   288     0     0   288    0.03   | 4.37e-13  1.47e-13  4.86e-14 |
 G25  |   288     0     0   288    0.03   | 2.01e-13  9.00e-14  4.14e-14 |
 G05  |   288     1     4    94    0.03   | 6.93e-13  1.29e-13  4.36e-14 |
 G12  |   288     0     1   144    0.03   | 7.05e-13  8.41e-14  3.88e-14 |
 G06  |   286     0     0   285    0.02   | 4.52e-13  1.48e-13  9.84e-14 |
 SHAO |   288     0     0   288    0.02   | 7.74e-14  3.60e-14  3.13e-14 |
 G26  |   288     0     0   288    0.01   | 4.43e-13  1.56e-13  1.42e-13 |
 G31  |   288     0     6    16    0.01   | 5.49e-13  5.92e-14  4.51e-14 |
 KERG |   288     0     0   288    0.01   | 8.32e-13  2.22e-13  9.35e-14 |
 TSKB |   288     0     0   287    0.01   | 1.05e-12  2.78e-13  1.23e-13 |
 HARB |   288     0     0   288    0.01   | 1.14e-12  3.31e-13  1.12e-13 |
 G32  |   288     0     0   288    0.01   | 2.26e-13  1.48e-13  1.55e-13 |
 SANT |   288     0     0   288    0.01   | 9.60e-13  2.53e-13  9.82e-14 |
 SYOG |   288     0     0   143    0.00   | 9.49e-13  2.40e-13  1.07e-13 |
 G03  |   288     0     0   288    0.00   | 1.36e-12  3.93e-13  1.42e-13 |
 G24  |   166     0     0   160    0.00   | 1.41e-12  3.31e-13         - |
 KIRU |   288     0     0   288    0.00   | 6.73e-13  4.11e-13  9.60e-14 |
 DAEJ |   287     0     0   286    0.00   | 1.66e-12  4.61e-13  1.44e-13 |
 G08  |   288     0     0   288    0.00   | 1.40e-12  4.67e-13  2.05e-13 |
 NNOR |   288     0     2    94    0.00   | 1.05e-12  1.74e-13  6.75e-14 |
 DRAO |   288     0     0   288    0.00   | 7.98e-13  2.14e-13  2.46e-13 |
 MAR6 |   288     0     2    71    0.00   | 2.66e-13  9.22e-14  4.79e-14 |
 G10  |   228     0     0    92    0.00   | 1.41e-12  3.72e-13         - |
 MAS1 |   288     0     0   288    0.00   | 3.02e-13  5.80e-13  5.37e-13 |
 CHUR |   288     0     1   138    0.00   | 4.62e-13  1.69e-13  2.52e-13 |
 GPST |   288     0     0     0    0.00   | 3.39e-14  4.29e-15  2.02e-15 |
 REYK |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   263     0     0     0    0.00   |        -         -         - |
 AUCK |   287     0     0     0    0.00   |        -         -         - |
 G30  |   288     0     1     0    0.00   | 1.42e-12  4.72e-13  1.73e-13 |
 G29  |   288     1     6     0    0.00   | 5.47e-13  6.81e-14  2.14e-14 |
 G28  |   288     0     6     0    0.00   | 6.60e-13  7.02e-14  2.35e-14 |
 G27  |   288     0     0     0    0.00   | 1.34e-12  4.44e-13  5.88e-13 |
 G23  |   288     0     6     0    0.00   | 5.82e-13  6.24e-14  1.24e-14 |
 G22  |   288     2     6     0    0.00   | 1.52e-12  1.74e-13  5.04e-14 |
 G21  |   288     0     6     0    0.00   | 9.80e-13  1.14e-13  4.12e-14 |
 G20  |   288     0     6     0    0.00   | 8.44e-13  9.84e-14  2.16e-14 |
 G19  |   288     0     6     0    0.00   | 5.57e-13  6.57e-14  1.81e-14 |
 G18  |   288     0     6     0    0.00   | 7.84e-13  7.96e-14  2.24e-14 |
 G17  |   288     1     6     0    0.00   | 6.95e-13  8.21e-14  7.06e-14 |
 G15  |   288     0     6     0    0.00   | 6.88e-13  6.72e-14  1.65e-14 |
 G14  |   288     0     6     0    0.00   | 5.72e-13  6.52e-14  2.62e-14 |
 G13  |   288     1     6     0    0.00   | 7.14e-13  2.01e-13  4.14e-14 |
 G11  |   288     0     6     0    0.00   | 6.90e-13  7.36e-14  3.92e-14 |
 G09  |   288     0     0     0    0.00   | 1.30e-12  4.74e-13  8.71e-14 |
 G07  |   288     0     6     0    0.00   | 6.76e-13  6.57e-14  3.39e-14 |
 G02  |   288     0     6     0    0.00   | 6.10e-13  6.14e-14  2.05e-14 |
 YKRO |   288     0     0     0    0.00   |        -         -         - |
 YAKT |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 ULAB |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 TIDB |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     2     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   |        -         -         - |
 SUWN |   288     0     0     0    0.00   |        -         -         - |
 SUTM |   286     0     0     0    0.00   |        -         -         - |
 STJO |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 QUIN |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   276     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 5.00e-13  5.13e-13  3.65e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NYAL |   288     0     0     0    0.00   |        -         -         - |
 NYA1 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   269     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MAL2 |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   264     0     0     0    0.00   |        -         -         - |
 LPGS |   288     1     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KARR |   287     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLSV |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   215     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CHPI |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOR1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     2     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   | 9.36e-13  7.72e-13  1.75e-13 |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
 ALBH |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.63e-17  3.15e-16  1.89e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      WSRT      ONSA |
------------------------------------------+------------------------------+
