
 cls-file Version 2.0
 GPS week: 1486   Day: 5   MJD: 54651                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD  OFFSET   DRIFT CLKSDV SDVSAT SDVSTA CLKRMS RMSSAT RMSSTA  WEIGHT
     |                              (ps)  (ps/d)   (ps)   (ps)   (ps)   (ps)   (ps)   (ps)     (%)
 ----+--------------------------------------------------------------------------------------------
 brd |    96     0   2974      0    -232     183   2206   2206      0   4308   4308      0    0.00
 cod |   288     0  24147      0    -304    -552     23     30     18     79    105     60   35.98
 emr |   288     0  20955   1120    1241    -307     40     55     25    164    233     96   21.41
 esa |   288     0  24390      2   -6638   -1928     19     24     15     61     77     50   42.60
 iga |    96     0   2974      1    -223     184     90     90      0    113    113      0    0.00
 igu |    96     0   2974      0    -231     184   3056   3056      0   5959   5959      0    0.00
 jpl |   288     1  16746  11995    3402   -1088     58     58     58    171    197    145    0.00
 ngs |    96     0   2974      0    -233     186   2126   2126      0   3957   3957      0    0.00
 usn |   288     0  23978     90    1531    -652     79    110     52   2030   2690   1509    0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    2 |   418   -86    70    39    38 -2207     X   544 -1151 |
    3 |  2367   -95   190   -16    51 12598   -53  1049 -3665 |
    4 | -3599    33  -149    47   -19 -2188     X -2811 -2563 |
    5 |  1486   -71   207   -44   -84 13613    78   309 -3468 |
    6 | -3944   -15    -3    14   -17 -8738     X -5076 -3909 |
    7 | -3034   186  -210   -60    21 -2056     X -1812 -2197 |
    8 |  -338    44   103   -87    39  7614     X -1935 -2999 |
    9 |  1403    44   -13   -31     9 -3366     2   836 -2855 |
   10 | -5905  -135   283   -17     2 -4557     X -5347 -3177 |
   11 |  6616    91  -126   -14   -54   416     X  5955 -2255 |
   12 |  -781  -104     X    88  -149   595  -257  -699 -1859 |
   13 |  3518   104  -414    91    17   754     X  3621 -2525 |
   14 |  4187   -39   -18    40   -12  1401   -96  4118 -3155 |
   15 |   432   190  -331   -14   -52   431  -259   674 -1386 |
   16 |  4158   -38   188   -48   123   -68     X  4000 -3383 |
   17 |    67   248  -111  -157   -55 -2095     X  -441  -913 |
   18 |  3619   -15   322  -144   -58  1567     X  4054 -3430 |
   19 |  1058   -88   368  -111  -124  -251     X  1276 -1825 |
   20 |  5107    10   294  -128   -34  1214     X  4748 -2958 |
   21 |  3630   -22   282  -114    72   796     X  3622 -3302 |
   22 | -3285   -38    50    11    61 -3441     X -2324 -1658 |
   23 |   375    62  -110    -1    25   136     X   525 -1099 |
   24 | -6636   -57   127   -15   -17  3865     X -6636 -3235 |
   25 | -8705   104  -135   -20    68-15009     X -5812 -2595 |
   26 |    29    81  -251    58   -12  -332   -80   -41 -2669 |
   27 | -5312    27    62   -54    18   917     X -5158 -3230 |
   28 |  1445   -39    81    -6    71  3046     X  2124 -2261 |
   29 |  2493   147  -194   -26   -31   122     X  2185 -1812 |
   30 |  3821    97  -403   101     5 -1685  -170  2595 -3192 |
   31 | -2105   130  -367    49    -6  -253     X -1234  -912 |
   32 | -2555   -38     X    32   105 -2848   264 -2884 -3469 |
 -----+-------------------------------------------------------+
 AMC2 |     -   -78     -    65     -     -     -     -  1431 |
 AREQ |     -   -22   -57    48     -     -     4     -  1497 |
 ARTU |     -   -21     -    18     -     -     X     -  1548 |
 BAHR |     -   -24    40     -     -     -     -     -  1484 |
 BILI |     -    -8     -     7     -     -     3     -  1512 |
 BOR1 |     -  -163     -   138     -     -     -     -  1344 |
 BRUS |     -    16   -26     -     -     -     -     -  1419 |
 CAS1 |     -   -84     -    71     -     -     X     -  1555 |
 CEDU |     -    45     -   -38     -     -     X     -  1502 |
 CHAT |     -    31     -   -26     -     -     X     -  1602 |
 CHUR |     -     2    49   -27     -     -   -57     -  1525 |
 COCO |     -    -3     -     2     -     -     X     -  1566 |
 CRO1 |     -     -   -68    34     -     -   189     -  1396 |
 DAEJ |     -   -30     2    24     -     -     -     -  1609 |
 DAV1 |     -   -72     -    61     -     -     X     -     - |
 DRAO |     -     2    -6     2     -     -     -     -  1741 |
 FAA1 |     -   -16     -    14     -     -     -     -     - |
 FAIR |     -   -12    21     -     -     -    50     -  1510 |
 GLSV |     -    61     -   -52     -     -     -     -     - |
 GODE |     -     -  -122    62     -     -     -     -  1518 |
 GRAS |     -    16     -   -14     -     -     -     -  1486 |
 GRAZ |     -  -170   286     -     -     -     -     -  1673 |
 HLFX |     -     -  -101    51     -     -     -     -  1610 |
 HOB2 |     -     -   161   -81     -     -   277     -  1725 |
 HOFN |     -    34     -   -29     -     -     -     -     - |
 HYDE |     -   -47     -    40     -     -     X     -     - |
 IENG |     -   -19    31     -     -     -     -     -     - |
 ISPA |     -    48     -   -41     -     -    40     -  1473 |
 KARR |     -    41     -   -35     -     -     X     -  1482 |
 KIRU |     -     -  -127    64     -     -     -     -  1386 |
 KOKB |     -   -42   -24    48     -     -     -     -  1496 |
 KOUR |     -     -   -35    17     -     -     -     -  1288 |
 LPGS |     -    98   -22   -72     -     -     -     -  1406 |
 MAS1 |     -     -   -50    25     -     -     X     -  1463 |
 MAW1 |     -    19     -   -16     -     -     -     -     - |
 MCM4 |     -     -   114   -57     -     -     X     -  1524 |
 MDO1 |     -     2  -139    71     -     -  -144     -  1487 |
 MIZU |     -   -55    92     -     -     -     -     -     - |
 NICO |     -   -77     -    65     -     -     X     -     - |
 NISU |     -   -11    19     -     -     -     -     -  1396 |
 NNOR |     -     -    86   -43     -     -     -     -  1583 |
 NRIL |     -   -33     -    28     -     -     X     -  1563 |
 NTUS |     -    10     -    -8     -     -     -     -     - |
 ONSA |     -    -8    53   -20     -     -     -     -     - |
 PDEL |     -    26     -   -22     -     -    79     -     - |
 PIE1 |     -     -   -68    34     -     -     -     -  1451 |
 PTBB |     -    43   -72     -     -     -     -     -  1498 |
 QAQ1 |     -   -32    55    -1     -     -     -     -  1480 |
 SANT |     -    -5     -     4     -     -   101     -  1507 |
 SCH2 |     -     -   -14     7     -     -     -     -  1545 |
 SPT0 |     -     1    -1     -     -     -     -     -  1576 |
 STJO |     -     -  -140    70     -     -     X     -  1448 |
 SUTH |     -    -2     -     1     -     -     X     -  1441 |
 SYOG |     -    45  -140    33     -     -     -     -  1545 |
 TIDB |     -     -   -10     5     -     -     X     -  1534 |
 TIXI |     -    43     -   -37     -     -     -     -  1445 |
 TOW2 |     -     0     -     0     -     -     X     -  1494 |
 TSKB |     -   -74    53    37     -     -   -15     -  1434 |
 TWTF |     -   -67   112     -     -     -     -     -  1715 |
 USN3 |     -    26   -43     -     -     -     -     -     - |
 VILL |     -     -    21   -10     -     -     -     -  1514 |
 WHIT |     -   -27    26    10     -     -     -     -  1586 |
 WILL |     -     5    13   -11     -     -     X     -  1490 |
 WSRT |     -    44   -74     -     -     -     -     -  1386 |
 WTZR |     -   -33    26    16     -     -     -     -     - |
 YAR2 |     -   -98   164     -     -     -     -     -  1527 |
 YELL |     -   -57    64    16     -     -     -     -  1488 |
 YSSK |     -   -23     -    19     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   iga   igu   jpl   ngs   usn | NEPO    RMS
 -----+-------------------------------------------------------+-------------
    2 |  2244    26    60    25    98   736     X  2040   113 |  288    287
    3 |  3789    12    23    12    67  6319    51  3459    71 |  288   1556
    4 |  2657    19    46    17   106   607     X  2355    72 |  288    691
    5 |  2142    34    45    16   103  8139    81  2738   143 |  288   1023
    6 |  4597    16    28    15    71  5084     X  3433    64 |  288    858
    7 |  3101    24    64    39    84   824     X  3113   175 |  288    207
    8 |  4618    26    62    29   105  3304     X  4275    87 |  288   2752
    9 |  1871    49    68    28    74  3564    36  1963   103 |  288   1968
   10 |  1679    51    68    35    94  1962     X  1587    76 |  288   1677
   11 |   847    22    40    32    62   591     X  1104   111 |  288    352
   12 |   512    19     X    16   107   630    85   376   169 |  288    291
   13 |   571    26    68    37    96   610     X   464    83 |  288    385
   14 |   740    25    60    18    65  1278    59   760    91 |  288    167
   15 |  1020    27    66    19    63   607    56   880   125 |  288    235
   16 |   464    37    69    24    68   385     X   445   134 |  288    357
   17 |  2608    31    40    25   100  1247     X  2226    98 |  288    250
   18 |  1151    30    75    17    80  1040     X   734    90 |  288    288
   19 |   709    20    35    15    67   284     X   468    42 |  288    185
   20 |   525    33    72    45    92   730     X   520   111 |  281    270
   21 |   548    42    58    20   125   645     X   456   124 |  288    301
   22 |  2024    22    68    17    74  1796     X  1593   106 |  288    336
   23 |   556    28    72    29   102   627     X   426    95 |  288    185
   24 |  2644    19    45    13    80  3077     X  2764    69 |  288   2549
   25 |  4020    36    52    15    89  9606     X  3806    58 |  288   1488
   26 |   408    23    38    16    62   801    45   587    73 |  288    631
   27 |  3219    24    37    11   130  2821     X  3727   107 |  288   3619
   28 |  1080    32    52    27    89  1253     X  1166   112 |  288    309
   29 |   640    14    38    21   106   585     X   963    61 |  288    187
   30 |  1715    37    60    22    99  1857    36  2870   161 |  288   1501
   31 |  1955    33    68    28    78   996     X  2037    92 |  288    372
   32 |  2079    50     X    42   122  2057    58  1799   218 |  286   1014
 -----+-------------------------------------------------------+-------------
 AMC2 |     -    10     -     9     -     -     -     -    41 |  287     28
 AREQ |     -    13    19    10     -     -    39     -    48 |  288   5996
 ARTU |     -    13     -    11     -     -     X     -    54 |  275  11365
 BAHR |     -    11    19     -     -     -     -     -    32 |  288    465
 BILI |     -    15     -    12     -     -    68     -    26 |  270   6443
 BOR1 |     -    11     -     9     -     -     -     -    53 |  288   3646
 BRUS |     -    11    18     -     -     -     -     -    39 |  288     20
 CAS1 |     -    12     -    11     -     -     X     -    36 |  276   4631
 CEDU |     -    20     -    17     -     -     X     -    41 |  276    212
 CHAT |     -    16     -    13     -     -     X     -   159 |  263   9179
 CHUR |     -    15    19    12     -     -    54     -    37 |  288   6304
 COCO |     -    10     -     9     -     -     X     -    43 |  276   7540
 CRO1 |     -     -    16     8     -     -    67     -    41 |  288     54
 DAEJ |     -    22    58    41     -     -     -     -    46 |  276   5049
 DAV1 |     -    14     -    12     -     -     X     -     - |  276   5723
 DRAO |     -    14    23     7     -     -     -     -    62 |  288   4106
 FAA1 |     -    22     -    19     -     -     -     -     - |  227    >>>
 FAIR |     -    17    29     -     -     -    66     -    32 |  287   6383
 GLSV |     -     9     -     8     -     -     -     -     - |  276  17814
 GODE |     -     -    20    10     -     -     -     -    48 |  288     38
 GRAS |     -     9     -     7     -     -     -     -    42 |  288   6680
 GRAZ |     -    16    28     -     -     -     -     -    43 |  288   3671
 HLFX |     -     -    27    14     -     -     -     -    57 |  288  44458
 HOB2 |     -     -    32    16     -     -    51     -    47 |  276     38
 HOFN |     -    13     -    11     -     -     -     -     - |  275    >>>
 HYDE |     -    34     -    29     -     -     X     -     - |  275   4169
 IENG |     -    10    18     -     -     -     -     -     - |  288     83
 ISPA |     -    15     -    13     -     -    60     -    56 |  288   7700
 KARR |     -    15     -    12     -     -     X     -    78 |  276   4866
 KIRU |     -     -    18     9     -     -     -     -    32 |  288  27090
 KOKB |     -    24    32    14     -     -     -     -    46 |  288     39
 KOUR |     -     -    37    19     -     -     -     -    69 |  288    163
 LPGS |     -    24    33    26     -     -     -     -    44 |  288  20531
 MAS1 |     -     -    13     7     -     -     X     -    29 |  288  12836
 MAW1 |     -    19     -    16     -     -     -     -     - |  275   4900
 MCM4 |     -     -    13     7     -     -     X     -    39 |  288   7316
 MDO1 |     -     9    25     9     -     -    51     -    37 |  288   6326
 MIZU |     -    18    31     -     -     -     -     -     - |  288    >>>
 NICO |     -    18     -    15     -     -     X     -     - |  276   3031
 NISU |     -    15    26     -     -     -     -     -    46 |  288     64
 NNOR |     -     -    37    18     -     -     -     -    56 |  288    395
 NRIL |     -    41     -    35     -     -     X     -    50 |  264   6493
 NTUS |     -    17     -    14     -     -     -     -     - |  276   3196
 ONSA |     -    14    14    11     -     -     -     -     - |  288     19
 PDEL |     -    12     -    10     -     -    57     -     - |  276   4614
 PIE1 |     -     -    20    10     -     -     -     -    42 |  288     56
 PTBB |     -    16    26     -     -     -     -     -    35 |  288    232
 QAQ1 |     -    13    21    10     -     -     -     -    30 |  288   6773
 SANT |     -    26     -    22     -     -    43     -    40 |  288    909
 SCH2 |     -     -    15     8     -     -     -     -    38 |  288   4483
 SPT0 |     -    19    32     -     -     -     -     -    53 |  288     48
 STJO |     -     -    15     8     -     -     X     -    53 |  288     42
 SUTH |     -    12     -    10     -     -     X     -    86 |  288   5643
 SYOG |     -    14    16    10     -     -     -     -    49 |  288   1207
 TIDB |     -     -    22    11     -     -     X     -    55 |  288   9702
 TIXI |     -    17     -    14     -     -     -     -    35 |  287   6774
 TOW2 |     -     7     -     6     -     -     X     -    49 |  276   5098
 TSKB |     -    19    32    23     -     -    73     -    51 |  288   1582
 TWTF |     -    14    24     -     -     -     -     -    46 |  288     62
 USN3 |     -    11    19     -     -     -     -     -     - |  288     43
 VILL |     -     -    15     7     -     -     -     -    41 |  288  12005
 WHIT |     -    19    17    12     -     -     -     -    42 |  288   3503
 WILL |     -    52    46    25     -     -     X     -    60 |  287  20401
 WSRT |     -    13    22     -     -     -     -     -    66 |  283    214
 WTZR |     -    18    21    15     -     -     -     -     - |  286   3427
 YAR2 |     -    15    25     -     -     -     -     -    74 |  288   5191
 YELL |     -    11    14     7     -     -     -     -    36 |  288    109
 YSSK |     -    13     -    11     -     -     -     -     - |  287  10095
 -----+-------------------------------------------------------+-------------
 TOT  |  2207    23    40    19    90  3057    58  2126    79 |




CLOCK JUMP CORRECTIONS APPLIED
------------------------------

CEN | STA/SAT | EPOCH           |     JUMP(ps)
----+---------+-----------------+-------------
esa |   JOZE  | 1486-5  5:00:00 |        -512
esa |   JOZE  | 1486-5  8:00:00 |        -613
esa |   JOZE  | 1486-5  9:00:00 |         687
esa |   NRIL  | 1486-5  9:25:00 |       -2439
esa |   NRIL  | 1486-5  9:30:00 |        2342
esa |   NRIL  | 1486-5 10:00:00 |       -4763
esa |   NRIL  | 1486-5 10:05:00 |        4790
esa |   JOZE  | 1486-5 12:00:00 |        2142
esa |   JOZE  | 1486-5 13:00:00 |        -674
esa |   JOZE  | 1486-5 14:00:00 |       -1036
jpl |   NICO  | 1486-5  3:40:00 |        1906
jpl |   NICO  | 1486-5  3:45:00 |       -1897
jpl |   NICO  | 1486-5  4:15:00 |        2220
jpl |   NICO  | 1486-5 22:25:00 |       -1384
jpl |   NICO  | 1486-5 22:30:00 |        1443
jpl |   NICO  | 1486-5 22:40:00 |       -1483



---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ONSA |   288     0     0   288   14.65   | 3.63e-14  1.59e-14  2.00e-15 |
 STJO |   288     0     0   288   11.37   | 2.93e-14  1.32e-14  3.31e-15 |
 AMC2 |   287     0     1   235   10.78   | 4.62e-14  9.27e-15  2.33e-15 |
 BRUS |   288     0     0   288    9.62   | 3.28e-14  7.08e-15  2.32e-15 |
 SPT0 |   288     0     0   288    7.89   | 4.08e-14  1.34e-14  3.27e-15 |
 PIE1 |   288     0     0   288    7.21   | 5.53e-14  1.07e-14  2.69e-15 |
 YELL |   288     0     0   288    6.94   | 2.90e-14  1.20e-14  8.12e-15 |
 USN3 |   288     0     0   288    6.08   | 4.36e-14  1.50e-14  2.47e-15 |
 WSRT |   283     0     0   143    5.95   | 3.77e-14  9.24e-15  3.88e-15 |
 GODE |   288     0     0   288    4.62   | 6.27e-14  1.63e-14  2.46e-15 |
 NISU |   288     0     0   143    3.44   | 6.36e-14  1.07e-14  5.05e-15 |
 IENG |   288     0     0   288    3.08   | 4.52e-14  1.48e-14  7.77e-15 |
 TWTF |   288     0     0   288    2.75   | 4.87e-14  8.15e-15  7.11e-15 |
 KOKB |   288     0     0   229    2.72   | 9.84e-14  1.70e-14  2.82e-15 |
 CRO1 |   288     0     3    83    0.90   | 1.11e-13  2.34e-14  4.97e-15 |
 KOUR |   288     0     0   288    0.51   | 6.08e-14  2.56e-14  1.84e-14 |
 HOB2 |   276     0     1    56    0.38   | 1.51e-13  1.53e-14  2.81e-15 |
 CEDU |   276     0     0   275    0.28   | 1.69e-13  5.22e-14  2.03e-14 |
 PTBB |   288     0     0   288    0.26   | 2.73e-13  6.07e-14  1.88e-14 |
 G25  |   288     0     0   288    0.08   | 2.63e-13  7.57e-14  9.94e-14 |
 G04  |   288     0     0   288    0.08   | 4.94e-13  1.30e-13  6.79e-14 |
 G05  |   288     0     0   288    0.08   | 1.90e-13  7.62e-14  9.40e-14 |
 G26  |   288     0     0   288    0.07   | 4.18e-13  1.06e-13  7.86e-14 |
 G14  |   288     0     6    15    0.05   | 5.38e-13  5.80e-14  1.44e-14 |
 SANT |   288     0     0   288    0.04   | 7.40e-13  2.58e-13  9.55e-14 |
 G32  |   286     0     0   284    0.03   | 2.47e-13  1.02e-13  1.22e-13 |
 BAHR |   288     0     0   288    0.03   | 3.57e-13  1.21e-13  4.33e-14 |
 G13  |   288     0     6    12    0.03   | 5.36e-13  6.69e-14  2.91e-14 |
 G06  |   288     0     0   288    0.02   | 3.63e-13  1.79e-13  7.91e-14 |
 SYOG |   288     0     0   288    0.02   | 9.36e-13  2.47e-13  1.10e-13 |
 DRAO |   288     0     0   288    0.01   | 3.85e-13  1.15e-13  2.80e-13 |
 G24  |   288     0     0   288    0.01   | 1.36e-12  3.58e-13  2.11e-13 |
 G09  |   288     0     0   288    0.01   | 1.44e-12  4.45e-13  1.80e-13 |
 TSKB |   288     0     0   288    0.01   | 1.08e-12  3.10e-13  1.92e-13 |
 G30  |   288     0     0   288    0.01   | 1.40e-12  4.24e-13  1.22e-13 |
 G10  |   288     0     0   288    0.01   | 1.37e-12  3.68e-13  1.46e-13 |
 GPST |   288     0     0     0    0.00   | 1.91e-14  6.98e-15  1.34e-15 |
 FAA1 |   227     1     0     0    0.00   |        -         -         - |
 BILI |   270     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   275     0     0     0    0.00   |        -         -         - |
 CHAT |   263     0     0     0    0.00   |        -         -         - |
 G31  |   288     0     6     0    0.00   | 5.89e-13  6.66e-14  2.96e-14 |
 G29  |   288     0     6     0    0.00   | 4.46e-13  5.03e-14  1.75e-14 |
 G28  |   288     0     6     0    0.00   | 6.70e-13  7.65e-14  3.45e-14 |
 G27  |   288     0     0     0    0.00   | 1.41e-12  4.51e-13  4.29e-13 |
 G23  |   288     0     5     0    0.00   | 5.19e-13  6.55e-14  1.60e-14 |
 G22  |   288     1     6     0    0.00   | 1.20e-12  1.28e-13  3.80e-14 |
 G21  |   288     0     6     0    0.00   | 9.92e-13  1.20e-13  2.13e-14 |
 G20  |   281     0     6     0    0.00   | 6.36e-13  7.35e-14  1.99e-14 |
 G19  |   288     0     6     0    0.00   | 5.84e-13  6.00e-14  1.72e-14 |
 G18  |   288     0     6     0    0.00   | 7.32e-13  7.12e-14  3.33e-14 |
 G17  |   288     0     6     0    0.00   | 5.85e-13  6.28e-14  3.07e-14 |
 G16  |   288     0     5     0    0.00   | 6.49e-13  7.79e-14  3.20e-14 |
 G15  |   288     0     6     0    0.00   | 6.83e-13  6.73e-14  2.91e-14 |
 G12  |   288     0     6     0    0.00   | 5.84e-13  5.89e-14  3.47e-14 |
 G11  |   288     0     6     0    0.00   | 6.97e-13  7.06e-14  4.20e-14 |
 G08  |   288     0     0     0    0.00   | 1.35e-12  4.43e-13  3.15e-13 |
 G07  |   288     2     6     0    0.00   | 7.24e-13  7.26e-14  2.11e-14 |
 G03  |   288     0     0     0    0.00   | 1.35e-12  4.90e-13  1.70e-13 |
 G02  |   288     0     6     0    0.00   | 5.75e-13  6.38e-14  2.43e-14 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WTZR |   286     0     0     0    0.00   |        -         -         - |
 WILL |   287     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 5.57e-13  4.50e-13  3.64e-13 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   276     0     0     0    0.00   |        -         -         - |
 TIDB |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     1     0    0.00   | 5.19e-13  3.02e-13  3.96e-13 |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   276     0     0     0    0.00   |        -         -         - |
 NTUS |   276     0     0     0    0.00   |        -         -         - |
 NRIL |   264     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     6     0    0.00   | 1.40e-12  1.80e-13  3.29e-14 |
 NICO |   276     0     0     0    0.00   |        -         -         - |
 MIZU |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     2     0     0    0.00   |        -         -         - |
 MAW1 |   275     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 KARR |   276     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 HYDE |   275     0     0     0    0.00   |        -         -         - |
 HLFX |   288     0     2     0    0.00   | 1.98e-13  5.06e-13  3.05e-12 |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   288     0     0     0    0.00   |        -         -         - |
 GLSV |   276     0     0     0    0.00   |        -         -         - |
 FAIR |   287     0     0     0    0.00   |        -         -         - |
 DAV1 |   276     0     0     0    0.00   |        -         -         - |
 DAEJ |   276     0     0     0    0.00   |        -         -         - |
 COCO |   276     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   | 2.93e-13  1.86e-13  5.86e-13 |
 CAS1 |   276     0     0     0    0.00   |        -         -         - |
 BOR1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   275     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.46e-17  2.96e-16  1.78e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     YELL      BRUS      ONSA |
------------------------------------------+------------------------------+
