
 GPS week: 1376   Day: 2   MJD: 53878                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2772      0    -0.21     0.35     3.63     0.00      0
 cod |   288     0  26069    847    -0.83     0.70     0.04    10.56      0
 emr |   288     0  21823    116  1848.10    63.14     0.02    28.85      0
 esa |   288     0  18722   2023     0.30     2.76     0.05     8.02      0
 gfz |   288     0  27782    303    -0.54     0.43     0.02    25.64      0
 iga |    96     0   2772      0    -0.20     0.34     0.10     0.00      0
 igu |    96     0   2772      9    -0.31     0.93     5.20     0.00      0
 jpl |   288     0  18947     50    -2.30     3.05     0.04    13.83      0
 ngs |    96     0   2772      0    -0.20     0.35     3.43     0.00      0
 usn |   288     0  34969    693    -2.26     3.02     0.04    13.10      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 |  4974   -13   -48   109    64    74 17028   -38  2969   -36 |
    2 | -2205   -21   -80  -287   129    -1  3393    99 -2153    22 |
    3 | -3506   -43  -134    62   107     1 -2181    77 -4186     0 |
    4 |  -985     X  -187     X   184   100  2936   195 -1290  -155 |
    5 | -1256   -57   -49    71    59    54-11134   -70 -1632    69 |
    6 | -2376   105  -100    84    41    37 -4134    77 -2166   -78 |
    7 |  -941   -52   -54   246   -67   -37  2454     2 -1106   140 |
    8 |   724  -140    21    23    -5   -60  2136   -27   386    91 |
    9 | -2543   -93   -19    26    25   -18 -6697    93 -2326   -46 |
   10 | -4593  -202    83    82   -22   -98 -5790   -78 -3477    56 |
   11 |  3562   135   -81   -58   120    45  2912    34  3753  -154 |
   13 | -1746   113  -110    -4   155   116  1669   163  -345  -365 |
   14 |  4109    17   -26   -83    33    31  2048    16  3865    13 |
   15 | -8786     X    26     X   -88   -11 -5031   -24 -6227   139 |
   16 |  5068   -12   -75    -3    11    -9  4188    73  5167    78 |
   17 |   182   123  -223  -129   163     3  2743   219  -403   -98 |
   18 |  3780    -9   -33   -56    80   -11  3735    85  3606  -133 |
   19 |  -259    39   -34   226   -76   -54  3305  -129  -655   190 |
   20 |  3254   -36    32   107   -50   -95  2652    -9  3169     X |
   21 |  3756   -46   -39   -73    72     5  3343    54  3763   -32 |
   22 | -4110   -88   -22   -91    82   -47   547   160 -3057  -155 |
   23 | -1573   170  -124   -42   130    37  2518    -4 -2027   -88 |
   24 |  2277     X   -65     X    52   -34  7586    -7  2012    47 |
   25 | 11496   -12    69  -141    29    25-11140    26  7643  -120 |
   26 | -1799     9   -96   -92   144    51  3467   218 -1717  -303 |
   27 | -4470  -142    47    64   -53   -34 -2882    -8 -3456    83 |
   28 |  4794   -65   -33  -160   116   -14  2275    -1  4283    -2 |
   29 | -1279   -18  -110     X   154   -79  2774    81 -1190  -140 |
   30 | -5835   123  -125   -14   173    26-26782   208 -3406  -459 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -   -17     -     -     -     -    21     -    15 |
 ALGO |     -   175   -16   -47   -51     -     -    84     -   -65 |
 ALIC |     -    36     -     -   -15     -     -     -     -     - |
 ALRT |     -  -319     -     -     -     -     -     -     -   257 |
 AMC2 |     -  -165   144    68     -     -     -  -356     -   150 |
 ARTU |     -    60     -    64    15     -     -     -     -  -118 |
 ASPA |     -     -     -     -   164     -     -     -     -  -320 |
 AUCK |     -  -252     -     X    80     -     -     -     -    48 |
 BOGT |     -    96     -    31    16     -     -     -     -  -127 |
 BOR1 |     -    80     -     -  -108     -     -   152     -     - |
 BREW |     -     -   -20     -     -     -     -     -     -    45 |
 BRMU |     -     -     -     -    47     -     -     -     -   -92 |
 CAS1 |     -    36     -    69   -16     -     -   -21     -   -17 |
 CHAT |     -   -20     -     -   -40     -     -     -     -    94 |
 CHUR |     -   114    42     -  -118     -     -     -     -    48 |
 COCO |     -    -5     -   -55   -31     -     -   -24     -   124 |
 CRO1 |     -   -27    76   -50    52     -     -   -81     -  -130 |
 DAEJ |     -    88     -    14     -     -     -     -     -   -79 |
 DARW |     -  -102   108     -     X     -     -  -121     -   -27 |
 DAV1 |     -     -     -     -   170     -     -     -     -  -332 |
 DGAR |     -     -     -     -     1     -     -     -     -    -2 |
 DRAO |     -   218   -49     -   -96     -     -    36     -    81 |
 DWH1 |     -   167    58     -     -     -     -     -     -  -262 |
 FAIR |     -  -161    -3   139    13     -     -   -61     -    92 |
 FLIN |     -    48     -     -   -20     -     -     -     -     - |
 GLPS |     -   104     -  -115    31     -     -   -87     -    18 |
 GMAS |     -     -    66     -     -     -     -     -     -  -146 |
 GODE |     -    58    -9     -     -     -     -     -     -   -27 |
 GOLD |     -   107     -   152   -84     -     -   -84     -    73 |
 GRAS |     -   -49     -     -    16     -     -     -     -     9 |
 GRAZ |     -     -    13     -     -     -     -     -     -   -29 |
 GUAT |     -     -     -     -   -46     -     -     -     -    90 |
 HARB |     -     -     -     -   -48     -     -     -     -    95 |
 HLFX |     -     -   -12     -     -     -     -     -     -    27 |
 HOB2 |     -    21   144     -  -142     -     -    79     -  -140 |
 HRAO |     -     -     -     -  -226     -     -     -     -   442 |
 HYDE |     -    36     -     -     -     -     -     -     -   -29 |
 IISC |     -     -     -   -84    26     -     -     -     -     X |
 IRKT |     -     -    78  -279     -     -     -     -     -     - |
 JPLM |     -     -    34     -  -119     -     -     -     -   158 |
 KARR |     -   114     -     -   -47     -     -     -     -     - |
 KERG |     -    25  -213   331   173     -     -   -74     -   -14 |
 KOKB |     -   -70   138     -  -125     -     -    10     -   -14 |
 KOUR |     -     -     -   -91     -     -     -   -64     -   123 |
 LHAS |     -     -     -     -    63     -     -  -118     -     - |
 LPGS |     -   -12   129   -53   -17     -     -  -132     -   -69 |
 MAC1 |     -     1     -   -80   -55     -     -     -     -   156 |
 MAD2 |     -     -   103     -     -     -     -  -220     -     5 |
 MAS1 |     -     -   160   -20  -269     -     -   115     -    66 |
 MATE |     -     -     -     -   -36     -     -     -     -    70 |
 MAW1 |     -   170     -     -   -55     -     -     -     -   -35 |
 MBAR |     -   -56     -     -   -49     -     -     -     -   141 |
 MCM4 |     -     -    38   204  -206     -     -   104     -    84 |
 MDO1 |     -     -     -     -  -152     -     -     -     -   297 |
 MEDI |     -     -    16     -     -     -     -     -     -   -35 |
 MKEA |     -   -11     -   165   -61     -     -     -     -    27 |
 NISU |     -    64     -     -     -     -     -     -     -   -52 |
 NKLG |     -     -     -     -   -26     -     -     -     -    51 |
 NLIB |     -     -     -     -   -94     -     -    43     -   139 |
 NNOR |     -     -    76     X     -     -     -  -246     -    92 |
 NOT1 |     -     -     -     -     -     -     -  -103     -   108 |
 NPLD |     -   -98    48     -     -     -     -     -     -   -26 |
 NRC1 |     -   128     5     -   -50     -     -     4     -   -19 |
 NTUS |     -  -177     -  -174   153     -     -  -106     -    58 |
 NYA1 |     -    50     -     -     -     -     -     7     -   -48 |
 NYAL |     -     -     -     -    -4     -     -     -     -     9 |
 OHI2 |     -    14     -   127    24     -     -     -     -  -145 |
 ONSA |     -     -     -  -105    33     -     -     -     -     - |
 PERT |     -    97   -32   -73     -     -     -     -     -    37 |
 PIE1 |     -   -58    -4   -35     -     -     -     -     -    76 |
 PIMO |     -   129     -  -261    70     -     -     -     -   -79 |
 POL2 |     -     -     -     -    22     -     -   -24     -   -17 |
 POTS |     -     -     -     -    -9     -     -     -     -    17 |
 PRDS |     -     -    28     -     -     -     -  -112     -    57 |
 PTBB |     -    18    20     -     -     -     -     -     -   -59 |
 QAQ1 |     -  -146    33     -     -     -     -     -     -    44 |
 RABT |     -   -57     -     -     -     -     -     -     -    46 |
 RESO |     -   -39     -     -    16     -     -     -     -     - |
 RIOG |     -   -72     -   113   -33     -     -    51     -     - |
 SANT |     -    -8     -   -13     1     -     -     -     -    12 |
 SCH2 |     -    37    95     -  -157     -     -     -     -    67 |
 STJO |     -   133    -1     -   -76     -     -   -13     -    58 |
 STR1 |     -     -    21     -     -     -     -     -     -   -47 |
 SUTH |     -   -56     -     -   -17     -     -     -     -    79 |
 THTI |     -     -    81  -380     -     -     -     -     -    35 |
 THU3 |     -  -189     -     -    78     -     -     -     -     - |
 TID1 |     -     -     -     -     -     -     -   -72     -    76 |
 TIDB |     -   109   -33   219   -30     -     -     -     -   -90 |
 TLSE |     -     -   -11     -     -     -     -     -     -    25 |
 TOW2 |     -     -     -     -   -78     -     -     9     -   143 |
 TRO1 |     -  -106     -     -     -     -     -     -     -    85 |
 TROM |     -     -     -     -   -65     -     -     -     -   128 |
 URUM |     -   -95     -     -    64     -     -     -     -   -48 |
 USN3 |     -    12     5     -     -     -     -   -25     -     5 |
 USNO |     -    65     5     -     -     -     -   -38     -   -25 |
 USUD |     -     -    34  -201   -14     -     -     -     -    65 |
 VILL |     -     -     -   155   -64     -     -     -     -    31 |
 WES2 |     -     -   -38     -     -     -     -     -     -    83 |
 WILL |     -    54    63     -     -     -     -     -     -  -183 |
 WSRT |     -     -   112     -  -100     -     -    21     -   -74 |
 WTZA |     -   -72     -     -     -     -     -     -     -    58 |
 WTZR |     -    37     -     X   -15     -     -     -     -     - |
 WUHN |     -     -    54  -159     8     -     -     -     -   -38 |
 YAR2 |     -   -62   112     -   -54     -     -     -     -   -90 |
 YELL |     -    34  -106   430   -38     -     -   -19     -   -16 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5484    64    25    36    23   132 10691    27  4737    20 |  288   3.92
    2 |   609    77    27    61    27    95  2349    37   523    32 |  288   0.25
    3 |  8307    39    16    34    17    60  4959    19  6032    32 |  288   1.84
    4 |  1178     X    22     X    26   180  1837    21  1043    50 |  276   1.01
    5 |  1424    53    37    46    20    70  7212    78  1079    85 |  288   1.12
    6 |   740    35    22    35    19    80  3169    53   615    48 |  288   1.14
    7 |  1049    44    26    31    14    67  1267    28  1214    24 |  288   0.78
    8 |  2413    45    24    31    14    40  2135    28  2357    24 |  288   2.33
    9 |  7240    52    25    38    19    79  3285    46  5094    26 |  288   3.81
   10 |  3576    40    30    52    11   109  1887    38  3794    32 |  288   2.74
   11 |   771    91    30    49    23   115  2131    41   875    38 |  288   0.37
   13 |  3382    55    28    84    22    83  2047    32  2822    73 |  288   0.44
   14 |   855    51    13    45    23   110  1630    43   749    42 |  288   0.20
   15 |  2845     X    26     X    23   177  2433    93  3655    53 |  276   2.45
   16 |  1070    25    25    55    19    66  2668    23   973    37 |  288   0.14
   17 |  1716    44    21    35    18    66  2236    53  1270    89 |  288   0.30
   18 |   719    53    19    34    24   127  2351    24   850    49 |  288   0.32
   19 |   455    56    33   108    30    67  2461    76   753    68 |  288   0.19
   20 |   582    36    24    30    15    73  1987    24   577     X |  288   0.26
   21 |  1052    89    21    49    24    66  2154    56  1016    74 |  288   0.37
   22 |  2123    55    25    51    31    85   883    36  1453    28 |  288   0.21
   23 |  1000    74    30    48    13    88  1954    47   915    32 |  288   0.26
   24 |  3374     X    25     X    22   189  5114    32  3086    46 |  276   2.63
   25 |  9976    84    31    86    35    55 15105    40 12167    48 |  288   6.35
   26 |   761    51    18    52    20   114  2091    49   721    55 |  288   0.58
   27 |  4359    57    18    25    18    53  2126    24  3707    42 |  288   2.75
   28 |  2646    97    15    42    25    72  2374    39  3092    54 |  288   2.08
   29 |  1955    50    23     X    28   175  2411    56  1761    82 |  288   0.80
   30 |  6016    56    27    35    26    81 15912    85  4520    73 |  288   1.76
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    14     -     -     -     -    31     -    16 |  288   8.65
 ALGO |     -    21    11    55    18     -     -    16     -    11 |  288   0.02
 ALIC |     -    19     -     -     8     -     -     -     -     - |  288   6.18
 ALRT |     -    18     -     -     -     -     -     -     -    14 |  288   6.52
 AMC2 |     -    28    14    36     -     -     -    17     -    24 |  288   0.04
 ARTU |     -    53     -    47    23     -     -     -     -    47 |  288   9.38
 ASPA |     -     -     -     -    24     -     -     -     -    48 |  288    >>>
 AUCK |     -    29     -     X    18     -     -     -     -    47 |  287    >>>
 BOGT |     -    39     -    38    24     -     -     -     -    37 |  288  14.78
 BOR1 |     -    39     -     -    17     -     -    29     -     - |  288   0.52
 BREW |     -     -    13     -     -     -     -     -     -    29 |  288   0.06
 BRMU |     -     -     -     -    21     -     -     -     -    40 |  288    >>>
 CAS1 |     -    18     -    68    13     -     -    23     -    29 |  288   7.48
 CHAT |     -    21     -     -    13     -     -     -     -    23 |  287  12.88
 CHUR |     -    33    34     -    39     -     -     -     -    21 |  288   0.10
 COCO |     -    22     -    55    23     -     -    36     -    34 |  288   8.13
 CRO1 |     -    34    13    24    22     -     -    20     -    11 |  288   0.06
 DAEJ |     -    82     -    91     -     -     -     -     -    17 |  288   6.41
 DARW |     -    26    15     -     X     -     -    22     -    40 |  288   3.99
 DAV1 |     -     -     -     -    24     -     -     -     -    46 |  288   5.08
 DGAR |     -     -     -     -    18     -     -     -     -    36 |  288  12.00
 DRAO |     -    43    19     -    39     -     -    31     -    43 |  287  57.76
 DWH1 |     -    41    13     -     -     -     -     -     -    13 |  288   0.28
 FAIR |     -    18     9    25    13     -     -    23     -    14 |  288  11.14
 FLIN |     -    30     -     -    12     -     -     -     -     - |  288  11.31
 GLPS |     -    26     -    66    16     -     -    18     -    27 |  288  10.83
 GMAS |     -     -    10     -     -     -     -     -     -    22 |  288   6.60
 GODE |     -    85    12     -     -     -     -     -     -    82 |  287   0.18
 GOLD |     -    42     -    41    13     -     -    19     -    42 |  288  12.25
 GRAS |     -    25     -     -    14     -     -     -     -    26 |  288   8.02
 GRAZ |     -     -     6     -     -     -     -     -     -    14 |  288   6.42
 GUAT |     -     -     -     -     8     -     -     -     -    16 |  288    >>>
 HARB |     -     -     -     -    19     -     -     -     -    38 |  287  40.24
 HLFX |     -     -    13     -     -     -     -     -     -    30 |  286   4.17
 HOB2 |     -    30    20     -    12     -     -    28     -    22 |  288   0.10
 HRAO |     -     -     -     -    13     -     -     -     -    25 |  165   0.65
 HYDE |     -    20     -     -     -     -     -     -     -    16 |  285  13.46
 IISC |     -     -     -    42    13     -     -     -     -     X |  105   8.69
 IRKT |     -     -     9    33     -     -     -     -     -     - |  288   0.08
 JPLM |     -     -    29     -    23     -     -     -     -    29 |  288  17.74
 KARR |     -    27     -     -    11     -     -     -     -     - |  288   8.83
 KERG |     -    40    15    56    29     -     -    37     -    42 |  288   1.13
 KOKB |     -    32    17     -    24     -     -    27     -    78 |  288   0.05
 KOUR |     -     -     -    58     -     -     -    51     -    37 |  288  13.34
 LHAS |     -     -     -     -    11     -     -    21     -     - |  288   8.55
 LPGS |     -    17    17    74    15     -     -    23     -    32 |  288  25.84
 MAC1 |     -    19     -    38    17     -     -     -     -    27 |  288   7.59
 MAD2 |     -     -     9     -     -     -     -    31     -    30 |  288   0.09
 MAS1 |     -     -    15    28    17     -     -    17     -    27 |  288  13.96
 MATE |     -     -     -     -    20     -     -     -     -    39 |  288   0.08
 MAW1 |     -    37     -     -    16     -     -     -     -    30 |  240   6.98
 MBAR |     -    42     -     -    23     -     -     -     -    29 |  288  25.04
 MCM4 |     -     -    17    53    15     -     -    30     -    60 |  288 107.78
 MDO1 |     -     -     -     -    13     -     -     -     -    26 |  288  19.31
 MEDI |     -     -    12     -     -     -     -     -     -    26 |  288   0.06
 MKEA |     -    63     -    53    11     -     -     -     -    38 |  288  26.47
 NISU |     -    40     -     -     -     -     -     -     -    33 |  281   0.06
 NKLG |     -     -     -     -    15     -     -     -     -    29 |  287    >>>
 NLIB |     -     -     -     -    18     -     -    26     -    29 |  288   0.03
 NNOR |     -     -    10     X     -     -     -    24     -    21 |  288  12.87
 NOT1 |     -     -     -     -     -     -     -    20     -    21 |  288   0.09
 NPLD |     -    21    11     -     -     -     -     -     -    30 |  287   0.03
 NRC1 |     -    28     8     -    15     -     -    15     -    10 |  288   0.03
 NTUS |     -    28     -    53    28     -     -    23     -    43 |  288   9.76
 NYA1 |     -    18     -     -     -     -     -    20     -    14 |  288   0.10
 NYAL |     -     -     -     -     9     -     -     -     -    18 |  288   0.06
 OHI2 |     -    44     -    59    39     -     -     -     -    99 |  288  10.79
 ONSA |     -     -     -    35    11     -     -     -     -     - |  288   0.07
 PERT |     -    30    15    71     -     -     -     -     -    31 |  288   3.32
 PIE1 |     -    35    20    34     -     -     -     -     -    53 |  288   0.04
 PIMO |     -    40     -    43    14     -     -     -     -    35 |  288  10.76
 POL2 |     -     -     -     -    23     -     -    25     -    23 |  288   7.28
 POTS |     -     -     -     -    14     -     -     -     -    27 |  286  14.34
 PRDS |     -     -    10     -     -     -     -    21     -    17 |  288  12.76
 PTBB |     -    40    23     -     -     -     -     -     -    22 |  288   0.34
 QAQ1 |     -    26    12     -     -     -     -     -     -    14 |  288   7.30
 RABT |     -    43     -     -     -     -     -     -     -    35 |  288  21.46
 RESO |     -    17     -     -     7     -     -     -     -     - |  288   9.75
 RIOG |     -    30     -    61    20     -     -    32     -     - |  288   9.56
 SANT |     -    26     -    58    25     -     -     -     -    46 |  288  16.73
 SCH2 |     -    23    13     -    22     -     -     -     -    15 |  288  16.50
 STJO |     -    30    11     -    29     -     -    19     -    12 |  288   0.05
 STR1 |     -     -    13     -     -     -     -     -     -    28 |  288   1.00
 SUTH |     -    35     -     -    11     -     -     -     -    38 |  288   6.34
 THTI |     -     -    21    55     -     -     -     -     -    43 |  276   1.84
 THU3 |     -    25     -     -    10     -     -     -     -     - |  288   6.34
 TID1 |     -     -     -     -     -     -     -    20     -    21 |  288   6.98
 TIDB |     -    28    18    41    23     -     -     -     -    20 |  288   0.09
 TLSE |     -     -    10     -     -     -     -     -     -    23 |  288   0.37
 TOW2 |     -     -     -     -    19     -     -    24     -    20 |  288   2.40
 TRO1 |     -    21     -     -     -     -     -     -     -    17 |  288   7.88
 TROM |     -     -     -     -    14     -     -     -     -    28 |  288   8.02
 URUM |     -    28     -     -    16     -     -     -     -    25 |  288  15.64
 USN3 |     -    23    10     -     -     -     -    13     -    10 |  288   0.03
 USNO |     -    23    11     -     -     -     -    16     -     9 |  288   0.03
 USUD |     -     -    31    71    43     -     -     -     -    26 |  288   0.09
 VILL |     -     -     -    50     7     -     -     -     -    28 |  288  13.91
 WES2 |     -     -     8     -     -     -     -     -     -    18 |  286   0.05
 WILL |     -    25    10     -     -     -     -     -     -    11 |  288 130.38
 WSRT |     -     -    13     -    16     -     -    17     -    27 |  288   0.04
 WTZA |     -    25     -     -     -     -     -     -     -    20 |  270   0.37
 WTZR |     -    22     -     X     9     -     -     -     -     - |  281    >>>
 WUHN |     -     -    15    41    22     -     -     -     -    16 |  287  10.63
 YAR2 |     -    34    18     -    35     -     -     -     -    25 |  288  11.73
 YELL |     -    42    13    41    36     -     -    21     -    84 |  288   0.03
 -----+-------------------------------------------------------------+--------------
 TOT  |  3631    43    20    52    21   103  5203    36  3433    38 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 NRC1 |   288     0     0   288    9.92   | 5.26e-14  8.48e-15  2.75e-15 |
 USNO |   288     0     0   288    8.33   | 3.57e-14  6.70e-15  1.64e-15 |
 ONSA |   288     0     0   288    7.36   | 4.80e-14  1.15e-14  3.47e-15 |
 NLIB |   288     0     0   288    6.83   | 4.11e-14  1.03e-14  2.14e-15 |
 AMC2 |   288     0     0   288    6.80   | 5.13e-14  1.51e-14  1.88e-15 |
 BREW |   288     0     0   288    6.41   | 6.51e-14  9.11e-15  4.48e-15 |
 ALGO |   288     1     0   287    6.07   | 3.11e-14  7.36e-15  2.18e-15 |
 NPLD |   287     0     0   286    6.07   | 4.47e-14  1.09e-14  2.69e-15 |
 USN3 |   288     0     0   288    5.66   | 5.43e-14  6.86e-15  2.90e-15 |
 STJO |   288     0     0   288    4.88   | 3.72e-14  1.08e-14  3.51e-15 |
 PIE1 |   288     0     0   288    4.48   | 5.32e-14  7.13e-15  3.10e-15 |
 CHUR |   288     0     0   288    4.07   | 4.80e-14  1.47e-14  1.03e-14 |
 MAD2 |   288     0     0   288    3.94   | 4.53e-14  9.11e-15  6.47e-15 |
 KOKB |   288     0     0   288    2.73   | 4.02e-14  8.16e-15  4.61e-15 |
 CRO1 |   288     0     0   288    2.27   | 1.12e-13  1.33e-14  5.43e-15 |
 NISU |   281     0     0   133    2.17   | 7.24e-14  1.52e-14  3.79e-15 |
 NYAL |   288     0     0   288    1.85   | 3.18e-14  6.48e-15  3.84e-15 |
 HOB2 |   288     0     0   288    1.45   | 1.43e-13  1.37e-14  1.13e-14 |
 NYA1 |   288     0     0   288    1.33   | 2.51e-14  9.98e-15  6.76e-15 |
 WSRT |   288     1     0   287    1.30   | 2.91e-14  7.32e-15  3.26e-15 |
 DRAO |   287     0     0   286    1.04   | 3.43e-14  9.06e-15  4.86e-15 |
 WES2 |   286     0     0   285    0.74   | 3.15e-14  9.76e-15  3.46e-15 |
 IRKT |   288     0     0   143    0.70   | 7.98e-14  1.68e-14  5.56e-15 |
 GODE |   287     1     0   285    0.67   | 4.02e-14  8.68e-15  8.75e-15 |
 YELL |   288     0     0   288    0.60   | 4.03e-14  7.94e-15  2.35e-15 |
 TIDB |   288     0     0   288    0.41   | 1.13e-13  1.75e-14  8.46e-15 |
 USUD |   288     0     0   288    0.40   | 2.60e-13  3.29e-14  6.97e-15 |
 NOT1 |   288     0     0   288    0.30   | 5.18e-14  2.07e-14  7.59e-15 |
 MEDI |   288     0     0   288    0.26   | 4.47e-14  1.19e-14  5.33e-15 |
 PTBB |   288     0     0   288    0.23   | 2.93e-13  6.86e-14  3.77e-14 |
 DWH1 |   288     0     0   288    0.11   | 3.39e-13  9.14e-14  2.10e-14 |
 G05  |   288     0     0   288    0.11   | 1.90e-13  6.02e-14  7.43e-14 |
 G26  |   288     0     0   288    0.08   | 3.98e-13  9.86e-14  7.12e-14 |
 BOR1 |   288     0     0   288    0.05   | 4.48e-13  1.65e-13  3.67e-14 |
 G28  |   288     0     1   163    0.05   | 6.27e-13  8.29e-14  1.34e-13 |
 TLSE |   288     0     0   143    0.04   | 3.91e-13  1.39e-13  3.58e-14 |
 G29  |   288     0     0   288    0.04   | 4.24e-13  1.12e-13  1.00e-13 |
 G07  |   288     0     0   288    0.03   | 2.69e-13  1.02e-13  7.77e-14 |
 G30  |   288     0     0   288    0.03   | 5.80e-13  1.38e-13  1.19e-13 |
 G04  |   276     0     0   274    0.03   | 4.26e-13  1.28e-13  6.46e-14 |
 HRAO |   165     0     0   165    0.03   | 1.24e-13  3.77e-14         - |
 WTZA |   270     0     0   131    0.03   | 4.82e-13  1.47e-13  3.87e-14 |
 STR1 |   288     0     0   288    0.03   | 6.72e-13  2.07e-13  9.01e-14 |
 G06  |   288     0     3    75    0.02   | 5.67e-13  1.27e-13  6.90e-14 |
 G03  |   288     0     0   288    0.01   | 1.27e-12  3.38e-13  1.86e-13 |
 G11  |   288     0     5    12    0.01   | 6.62e-13  8.07e-14  4.22e-14 |
 TOW2 |   288     0     0   288    0.00   | 4.31e-13  1.46e-13  2.40e-13 |
 G27  |   288     0     0   288    0.00   | 1.22e-12  3.83e-13  3.50e-13 |
 G24  |   276     0     0   274    0.00   | 1.36e-12  3.62e-13  3.43e-13 |
 MATE |   288     0     0   288    0.00   | 4.54e-14  1.20e-14  9.90e-15 |
 PERT |   288     0     0   287    0.00   | 1.79e-12  4.86e-13  2.92e-13 |
 KERG |   288     0     0   143    0.00   | 1.19e-12  3.75e-13  9.14e-14 |
 GPST |   288     0     0     0    0.00   | 2.12e-14  3.75e-15  7.46e-16 |
 IISC |   105     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     2     0     0    0.00   |        -         -         - |
 HYDE |   285     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 G25  |   288     0     0     0    0.00   | 3.04e-13  3.18e-13  4.70e-13 |
 G23  |   288     0     6     0    0.00   | 5.63e-13  6.09e-14  1.80e-14 |
 G22  |   288     0     6     0    0.00   | 6.37e-13  5.93e-14  2.05e-14 |
 G21  |   288     0     6     0    0.00   | 1.03e-12  1.43e-13  3.25e-14 |
 G20  |   288     0     6     0    0.00   | 6.73e-13  7.04e-14  2.68e-14 |
 G19  |   288     0     6     0    0.00   | 6.58e-13  6.94e-14  1.55e-14 |
 G18  |   288     0     6     0    0.00   | 7.59e-13  8.21e-14  3.82e-14 |
 G17  |   288     0     6     0    0.00   | 6.11e-13  6.88e-14  3.24e-14 |
 G16  |   288     0     6     0    0.00   | 5.38e-13  5.19e-14  1.48e-14 |
 G15  |   276     0     0     0    0.00   | 1.64e-12  5.61e-13  2.92e-13 |
 G14  |   288     0     6     0    0.00   | 5.94e-13  6.45e-14  1.96e-14 |
 G13  |   288     0     6     0    0.00   | 5.17e-13  6.02e-14  2.79e-14 |
 G10  |   288     0     0     0    0.00   | 1.23e-12  4.14e-13  3.23e-13 |
 G09  |   288     0     0     0    0.00   | 1.49e-12  4.65e-13  3.91e-13 |
 G08  |   288     0     0     0    0.00   | 1.36e-12  4.46e-13  2.70e-13 |
 G02  |   288     0     6     0    0.00   | 4.79e-13  4.86e-14  2.64e-14 |
 G01  |   288     0     0     0    0.00   | 1.42e-12  6.46e-13  3.44e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WTZR |   281     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TROM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TID1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   276     0     0     0    0.00   | 4.01e-13  1.97e-13  1.78e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   | 5.49e-13  5.56e-13  1.03e-12 |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     2     0     0    0.00   |        -         -         - |
 RABT |   288     2     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PRDS |   288     0     0     0    0.00   |        -         -         - |
 POTS |   286     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     2     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     1     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   240     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 8.02e-13  5.72e-13  2.03e-12 |
 HLFX |   286     0     0     0    0.00   | 2.16e-13  2.68e-13  4.61e-13 |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GMAS |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   288     2     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   | 3.05e-13  1.40e-12  4.54e-13 |
 DARW |   288     0     0     0    0.00   | 1.93e-13  5.88e-13  2.55e-13 |
 DAEJ |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.06e-13  7.49e-13  8.01e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 AUCK |   287     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
 ALBH |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.22e-17  3.86e-16  2.32e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      NYAL      USNO |
------------------------------------------+------------------------------+
