
 GPS week: 1376   Day: 1   MJD: 53877                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2772     44    -0.45     0.50     2.97     0.00      0
 cod |   288     0  27251    493    -0.82    -0.24     0.04    12.68      0
 emr |   288     0  21778     55  1788.09    60.61     0.03    24.78      0
 esa |   288     0  18032   1124     0.15     0.42     0.05    11.13      0
 gfz |   288     0  30495    391     0.09    -0.30     0.03    17.49      0
 iga |    96     0   2772      0    -0.78    -0.21     0.12     0.00      0
 igu |    96     0   2772     81    -1.18     4.86     4.08     0.00      0
 jpl |   288     0  20408      2    -2.65     0.50     0.03    17.46      0
 ngs |    96     0   2772     31    -0.39    -0.11     2.88     0.00      0
 usn |   288     0  35705    376    -2.55     0.44     0.04    16.46      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 | -3539   -25   -55    46    96   -76-18768    -3 -3212   -16 |
    2 | -1779   -71   -28   -51   152    29  3535    75 -1604  -102 |
    3 |  -230   -40  -128   -73    64    15  1698   146   -34    50 |
    4 | -3338   213  -124     X   100   143   509   152 -3088  -205 |
    5 |  -159   -78   -58   -85    57   104 -9684   -14  -425   159 |
    6 | -2974    71  -170     8    86   136 -4890   163 -3003   -69 |
    7 | -1533   -92  -102     1   -86    31  -723    13 -1547   301 |
    8 |  -569   -90   -46  -104   135     1   666   -15  -972    82 |
    9 |  3619   -90   -60    -6    94   -61  4481    91  3222   -34 |
   10 |  5475  -176    43  -123    79   -97  5992   -40  4111   112 |
   11 |  4027   136     3   -86    68   -23  2931    79  3835  -204 |
   13 | -1614   159   -14   133   133   138  -300   133  -565  -474 |
   14 |  5387    20   -46     2    45   -37  2943   115  5196  -118 |
   15 | -4244     X  -106     X   -65   -34  1793    10 -1967   220 |
   16 |  3406  -113  -104   -32    77   -43  2319    64  3390   116 |
   17 | -1295   145  -148    90   115    98  1599    82 -1398  -159 |
   18 |  3986   -38   -40    71   -10   -80  3170   106  3799   -60 |
   19 |  -241  -107   -36   -52    19  -140  2882   -72  -517   226 |
   20 |  3002    -1    -9   -33   -50  -151  2502    -4  2932    94 |
   21 |  2868  -131     1    35   -57    44  2561    80  2949    50 |
   22 | -5647   -38   -10    88    32   -39  1283   144 -4453  -201 |
   23 |  -614   118   -23   107   169   -15  4282    23  -875  -332 |
   24 | -4982   135   -72     X   103   -24 -7993   -47 -3494   -30 |
   25 |-12466    88    34  -196    -2     5-25586   103 -9581   -87 |
   26 |   965    44  -143    92    45   -21   789   188   131  -142 |
   27 |  2694   -79   -64    45   155   -47 13917   -78  2420    45 |
   28 |  4760    -7    22   -83   121    46  6971   -36  4030   -77 |
   29 |  -688    10   -39    -5    53   -17  -178   145  -914  -154 |
   30 |  -585    53  -144   142   207   119-18352   199 -1955  -350 |
 -----+-------------------------------------------------------------+
 ALBH |     -   164   -53     -     -     -     -     9     -   -56 |
 ALGO |     -   137   -34    34   -98     -     -   100     -   -78 |
 ALIC |     -   103     -     -     8     -     -   -83     -     - |
 ALRT |     -   -79     -     -    58     -     -     -     -     - |
 AMC2 |     -   -91   171   -11     -     -     -  -263     -    99 |
 ARTU |     -     -     -   119    49     -     -     -     -  -132 |
 ASPA |     -     -     -     -    98     -     -     -     -  -104 |
 AUCK |     -  -276     -     -   179     -     -     -     -    23 |
 BAHR |     -   -10    46     -   -46     -     -     -     -   -13 |
 BILI |     -   -38     -     -     2     -     -     -     -    27 |
 BJFS |     -     -     -     -   -57     -     -     -     -    60 |
 BOGT |     -     -     -   181    66     -     -     -     -  -193 |
 BOR1 |     -    86     -     -   -62     -     -     -     -     - |
 BREW |     -     -    15     -     -     -     -     -     -   -23 |
 BRFT |     -     -     -     -    98     -     -     -     -  -104 |
 BRMU |     -     -     -     -    52     -     -     -     -   -55 |
 CAS1 |     -    40     -    93   -76     -     -    27     -   -42 |
 CHAT |     -   -19     -   -19    28     -     -     -     -    -2 |
 CHUR |     -     -    46     -  -154     -     -    36     -    57 |
 COCO |     -   -28     -  -120    33     -     -   -54     -   125 |
 CRO1 |     -     -   101   -79    44     -     -   -67     -   -75 |
 DAEJ |     -    56   -53     -     -     -     -     -     -    37 |
 DARW |     -    47   109  -297     X     -     -     -     -     - |
 DAV1 |     -     -     -     -   199     -     -     -     -  -212 |
 DGAR |     -     -     -     -   101     -     -     -     -  -108 |
 DRAO |     -   120   -85     -  -103     -     -   147     -   -12 |
 DWH1 |     -   288   137     -     -     -     -  -399     -     X |
 FAIR |     -     -    73  -106    18     -     -   -29     -   -26 |
 FLIN |     -    82     -     -   -60     -     -     -     -     - |
 GLPS |     -    54     -     -    -8     -     -   -98     -    71 |
 GMAS |     -     -   116     -     -     -     -     -     -  -174 |
 GODE |     -    74   -10     -     -     -     -     -     -   -42 |
 GOLD |     -    98     -    56   -34     -     -  -104     -    33 |
 GRAZ |     -  -259   139     -     -     -     -     -     -   -10 |
 GUAT |     -     -     -     -   -25     -     -     -     -    27 |
 HLFX |     -     -   -51     -     -     -     -     -     -    77 |
 HOB2 |     -   123   169  -136  -150     -     -    46     -  -147 |
 HRAO |     -   -15     -     -   -72     -     -    17     -    70 |
 INVK |     -  -175     -     -     -     -     -     -     -   135 |
 ISPA |     -     -     -     -   -14     -     -  -199     -   225 |
 JPLM |     -     -    19     -  -183     -     -     -     -   166 |
 KARR |     -   157     -     -   -52     -     -   -62     -     - |
 KOKB |     -     -    87     -   -22     -     -     9     -  -118 |
 KOUR |     -   -19     -    38  -143     -     -  -138     -   288 |
 LAMA |     -   -20     -     -    14     -     -     -     -     - |
 LHAS |     -   -59     -     -    43     -     -     -     -     - |
 LPGS |     -   -75   138    28    95     -     -  -182     -   -76 |
 MAC1 |     -   488     -  -219  -183     -     -     -     -    52 |
 MAD2 |     -     -    19     -     -     -     -  -170     -   152 |
 MAS1 |     -     -    -2    67   132     -     -   -74     -  -103 |
 MATE |     -     -     -     -   -18     -     -     -     -    19 |
 MAW1 |     -    53     -     -    50     -     -     -     -   -93 |
 MBAR |     -   -26     -     -   -44     -     -     -     -    67 |
 MCM4 |     -     -  -115   -45   257     -     -   -73     -     8 |
 MDO1 |     -    47     -     -  -290     -     -     -     -   272 |
 MEDI |     -     -    73     -     -     -     -     -     -  -111 |
 MKEA |     -    41     -   100   -58     -     -     -     -   -37 |
 NLIB |     -     -     -     -    -6     -     -   -28     -    36 |
 NNOR |     -     -    88   -57     -     -     -  -145     -    60 |
 NOT1 |     -     -     -     -     -     -     -  -131     -   139 |
 NPLD |     -   -39    48     -     -     -     -     -     -   -42 |
 NRC1 |     -   146    -1     -  -147     -     -    24     -    20 |
 NRIL |     -  -106     -     -   -16     -     -     -     -    98 |
 NTUS |     -  -160     -  -113    35     -     -     -     -   162 |
 NYA1 |     -    35     -     -     -     -     -     -     -   -27 |
 NYAL |     -     -     -     -   -33     -     -     -     -    35 |
 OHI2 |     -     6     -   121   -81     -     -     -     -     - |
 ONSA |     -  -113     -     X    82     -     -     -     -     - |
 PDEL |     -    49     -     -   -35     -     -     -     -     - |
 PERT |     -     -   140   364  -610     -     -     -     -   183 |
 PIE1 |     -   -39    -2   -26     -     -     -     -     -    50 |
 PIMO |     -     -     -    21     7     -     -     -     -   -22 |
 POL2 |     -     -     -     -   -16     -     -   -19     -    37 |
 POTS |     -     -     -     -    90     -     -     -     -   -95 |
 PRDS |     -     -    38     -     -     -     -   -93     -    41 |
 PTBB |     -    13   -13     -     -     -     -     -     -    10 |
 QAQ1 |     -     -    13     -     -     -     -     -     -   -19 |
 QUIN |     -   -35     -     -     -     -     -     -     -    27 |
 RABT |     -  -194     -     -     -     -     -     -     -   149 |
 RESO |     -    17     -     -    81     -     -   -94     -     - |
 RIOG |     -     3     -   -88   -43     -     -    32     -    69 |
 SANT |     -   -75     -    97    -1     -     -     -     -    -8 |
 SCH2 |     -    50    63     -  -120     -     -   -32     -    27 |
 STJO |     -     -   -25     -   -78     -     -    81     -    34 |
 STR1 |     -     -    10     -     -     -     -     -     -   -15 |
 SUTH |     -   -73     -     -    -4     -     -     -     -    60 |
 SUTM |     -     -     -     -  -679     -     -   207     -   339 |
 SYOG |     -     -    78     -  -131     -     -   -22     -    45 |
 THU3 |     -  -160     -     -   116     -     -     -     -     - |
 TID1 |     -     -     -     -     -     -     -   -31     -    33 |
 TIDB |     -    93   -38   246   -85     -     -     -     -   -90 |
 TIXI |     -   -81     -   -13    28     -     -    69     -   -32 |
 TOW2 |     -    65     -  -188   -16     -     -     8     -    86 |
 TRO1 |     -  -132     -     -     -     -     -     -     -   101 |
 TROM |     -     -     -     -     3     -     -     -     -    -3 |
 TSKB |     -  -129    46   -32   110     -     -   -90     -    30 |
 TWTF |     -  -122    54     -     -     -     -     -     -    13 |
 UNSA |     -     -     -     -  -112     -     -     -     -   119 |
 URUM |     -   -36     -     -    31     -     -     -     -    -6 |
 USN3 |     -    69   -35     -     -     -     -     6     -    -8 |
 USNO |     -   128    24     -     -     -     -     7     -  -143 |
 USUD |     -     -    34   -37     -     -     -     -     -   -26 |
 VILL |     -     -     -     3  -203     -     -     -     -   214 |
 WES2 |     -     -   -77     -     -     -     -     -     -   116 |
 WHIT |     -    48     -     -     -     -     -     -     -   -37 |
 WILL |     -    25   109     -     -     -     -     -     -  -184 |
 WSRT |     -     -    79     -   -26     -     -     -     -   -92 |
 YAR2 |     -   -43    70     -    67     -     -     -     -  -144 |
 YELL |     -    17   -68   164   -78     -     -    55     -     4 |
 YSSK |     -   -74     -     -    54     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5224    52    45    56   130   189  8148    19  5599    49 |  288   4.74
    2 |   393    77    33    38    27    74  1961    41   386    17 |  288   0.19
    3 |  3404    41    47    38    18   110  3085    11  3630    29 |  288   2.58
    4 |  1256   104    52     X    21   164  1207    39  1238    40 |  277   1.03
    5 |   517    36    15    17    18    70  6791    17   609    34 |  288   1.29
    6 |   956    46    17    40    17   120  3768    52  1009    23 |  288   1.51
    7 |  1234    48    27    36    26    80   810    30  1145    33 |  288   0.57
    8 |  1899    59    23    27    22    65  2130    35  1709    32 |  288   1.83
    9 |  2324    56    25    32    22    83  2676    16  2650    21 |  288   2.27
   10 |  1954    45    25    24    25    62  2085    26  2119    38 |  288   1.92
   11 |  1194    59    70    45    58   102  1574    63  1012    49 |  288   0.39
   13 |  2168    54    41    17    46   131   836    37  1788    44 |  288   0.21
   14 |   645    81    19    53    19   134  1673    23   551    42 |  288   0.30
   15 |  5563     X    26     X    21   226  4331    40  4711    47 |  276   2.49
   16 |   598    49    24    63    41    74  1536    14   615    47 |  288   0.28
   17 |   678    37    27    51    18   102  1102    40   609    31 |  288   0.27
   18 |   790    43    44    30    31    75  1600    27   714    49 |  288   0.29
   19 |   570    62    23    78    30    95  1827    47   631    30 |  288   0.29
   20 |   377    47    15    22    23    76  1542    46   469    24 |  288   0.24
   21 |   774    99    86   101   118   130  1423   126   678    74 |  288   0.36
   22 |  2603    52    34    69    29    74   847    40  1866    39 |  288   0.28
   23 |   330    83    21    41    34   145  2292    62   548    38 |  288   0.25
   24 |  5671    80    25     X    40   150  4188    56  4733    35 |  277   3.02
   25 | 10028    53    18    81    33    97 14331    60  9418    83 |  288   2.00
   26 |  3130    55    20    28    28   154  1248    25  2717    82 |  288   0.71
   27 |  3151    62    23    43    23    92  5830    36  3530    48 |  288   3.64
   28 |  1212    80    17    41    21   163  4251    33  1003   100 |  288   0.33
   29 |  1321    52    24    34    24    98  1493    25  1257    20 |  288   0.75
   30 |  6643    47    25    68    40    46 12165    21  6300    58 |  288   3.10
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    27    12     -     -     -     -    20     -    24 |  288   7.29
 ALGO |     -    26    10    21    25     -     -    14     -    16 |  288   0.01
 ALIC |     -    29     -     -    28     -     -    15     -     - |  288   6.73
 ALRT |     -    10     -     -     7     -     -     -     -     - |  288   6.43
 AMC2 |     -    20    17    35     -     -     -    16     -    14 |  288   0.03
 ARTU |     -     -     -    85    38     -     -     -     -    35 |  287   8.97
 ASPA |     -     -     -     -    30     -     -     -     -    31 |  288    >>>
 AUCK |     -    21     -     -    17     -     -     -     -    19 |  288    >>>
 BAHR |     -    20    23     -    24     -     -     -     -    15 |  288   0.62
 BILI |     -    20     -     -    19     -     -     -     -    20 |  287   8.43
 BJFS |     -     -     -     -    20     -     -     -     -    22 |  262   8.78
 BOGT |     -     -     -    33    30     -     -     -     -    34 |  288  11.05
 BOR1 |     -    21     -     -    15     -     -     -     -     - |  288   0.59
 BREW |     -     -    16     -     -     -     -     -     -    23 |  288   0.04
 BRFT |     -     -     -     -    37     -     -     -     -    39 |  216   0.11
 BRMU |     -     -     -     -    30     -     -     -     -    31 |  288    >>>
 CAS1 |     -    12     -    52    16     -     -    37     -    21 |  288   6.58
 CHAT |     -    30     -    17    14     -     -     -     -    21 |  287  10.64
 CHUR |     -     -    16     -    17     -     -    19     -     8 |  288   0.05
 COCO |     -    23     -    42    27     -     -    35     -    17 |  288   6.02
 CRO1 |     -     -    21    37    50     -     -    24     -    28 |  288   0.06
 DAEJ |     -    40    20     -     -     -     -     -     -    48 |  288   6.39
 DARW |     -    22    16    37     X     -     -     -     -     - |  288   2.68
 DAV1 |     -     -     -     -    29     -     -     -     -    31 |  260   4.46
 DGAR |     -     -     -     -    44     -     -     -     -    47 |  288  10.68
 DRAO |     -    24    14     -    25     -     -    16     -    29 |  288   0.04
 DWH1 |     -    41    35     -     -     -     -    28     -     X |  288   0.27
 FAIR |     -     -    19    33    14     -     -    18     -    23 |  288   9.04
 FLIN |     -    20     -     -    14     -     -     -     -     - |  288   9.61
 GLPS |     -    15     -     -    19     -     -    17     -    27 |  288   9.58
 GMAS |     -     -    11     -     -     -     -     -     -    17 |  288  11.33
 GODE |     -    68     8     -     -     -     -     -     -    55 |  288   0.15
 GOLD |     -    23     -    34    32     -     -    14     -    26 |  288  12.82
 GRAZ |     -    28    12     -     -     -     -     -     -    15 |  288   5.66
 GUAT |     -     -     -     -    15     -     -     -     -    16 |  288    >>>
 HLFX |     -     -    21     -     -     -     -     -     -    32 |  286  32.44
 HOB2 |     -    22    22    35    12     -     -    34     -    28 |  288   0.07
 HRAO |     -    41     -     -    18     -     -    37     -    16 |  288   0.87
 INVK |     -    20     -     -     -     -     -     -     -    15 |  288   6.46
 ISPA |     -     -     -     -    41     -     -    66     -    45 |  288  12.09
 JPLM |     -     -    33     -    41     -     -     -     -    55 |  288    >>>
 KARR |     -    26     -     -    24     -     -    14     -     - |  288   7.44
 KOKB |     -     -    24     -    37     -     -    31     -    92 |  288   0.05
 KOUR |     -    31     -    49    42     -     -    30     -    35 |  288  12.29
 LAMA |     -    26     -     -    19     -     -     -     -     - |  288  11.37
 LHAS |     -    16     -     -    12     -     -     -     -     - |  288   8.96
 LPGS |     -    21    17    31    18     -     -    17     -    44 |  288  25.50
 MAC1 |     -    38     -    51    42     -     -     -     -    17 |  287   8.24
 MAD2 |     -     -    14     -     -     -     -    19     -    15 |  288   0.06
 MAS1 |     -     -    12    27    23     -     -    13     -    31 |  288  13.60
 MATE |     -     -     -     -    15     -     -     -     -    16 |  288   0.11
 MAW1 |     -    14     -     -    42     -     -     -     -    48 |  238   7.75
 MBAR |     -    96     -     -    49     -     -     -     -    91 |  288  23.30
 MCM4 |     -     -    22    64    16     -     -    29     -    19 |  288 204.38
 MDO1 |     -    27     -     -    16     -     -     -     -    29 |  288  13.49
 MEDI |     -     -    12     -     -     -     -     -     -    18 |  288   0.04
 MKEA |     -    29     -    49    13     -     -     -     -    24 |  288  23.80
 NLIB |     -     -     -     -    19     -     -    16     -    19 |  288   0.04
 NNOR |     -     -    23    32     -     -     -    28     -    28 |  288  12.64
 NOT1 |     -     -     -     -     -     -     -    16     -    17 |  288   0.17
 NPLD |     -    34    17     -     -     -     -     -     -    17 |  287   0.05
 NRC1 |     -    22     5     -    17     -     -    16     -    14 |  288   0.02
 NRIL |     -    30     -     -    19     -     -     -     -    38 |  288   6.15
 NTUS |     -    37     -    43    37     -     -     -     -    24 |  288   9.19
 NYA1 |     -    13     -     -     -     -     -     -     -    10 |  286   0.08
 NYAL |     -     -     -     -    12     -     -     -     -    13 |  288   0.08
 OHI2 |     -    23     -    48    21     -     -     -     -     - |  288   6.91
 ONSA |     -    31     -     X    22     -     -     -     -     - |  288   0.12
 PDEL |     -    24     -     -    17     -     -     -     -     - |  288  58.47
 PERT |     -     -    20    38    21     -     -     -     -    19 |  229    >>>
 PIE1 |     -    19    26    36     -     -     -     -     -    27 |  288   0.04
 PIMO |     -     -     -    62    29     -     -     -     -    44 |  288   9.03
 POL2 |     -     -     -     -    54     -     -    32     -    68 |  288   7.81
 POTS |     -     -     -     -    21     -     -     -     -    22 |  285  14.39
 PRDS |     -     -    11     -     -     -     -    23     -    22 |  288  11.71
 PTBB |     -    35    12     -     -     -     -     -     -    18 |  288   0.16
 QAQ1 |     -     -    10     -     -     -     -     -     -    16 |  288   6.44
 QUIN |     -    45     -     -     -     -     -     -     -    35 |  288   7.83
 RABT |     -    46     -     -     -     -     -     -     -    35 |  288  13.04
 RESO |     -    18     -     -    10     -     -    14     -     - |  288   6.65
 RIOG |     -    30     -    62    28     -     -    18     -    47 |  288   9.39
 SANT |     -    24     -    27    27     -     -     -     -    42 |  288   7.81
 SCH2 |     -    19     9     -    17     -     -    19     -    28 |  288   7.16
 STJO |     -     -    13     -    44     -     -    33     -    15 |  288   0.06
 STR1 |     -     -    12     -     -     -     -     -     -    18 |  288   0.71
 SUTH |     -    23     -     -    13     -     -     -     -    14 |  288   7.27
 SUTM |     -     -     -     -    60     -     -    42     -    31 |  288  13.33
 SYOG |     -     -    11     -    17     -     -    34     -    22 |  286   0.92
 THU3 |     -    92     -     -    67     -     -     -     -     - |  285  14.76
 TID1 |     -     -     -     -     -     -     -    31     -    32 |  288   7.14
 TIDB |     -    27    17    32    16     -     -     -     -    25 |  288   0.16
 TIXI |     -    22     -    27    32     -     -    16     -    26 |  287   8.08
 TOW2 |     -    23     -    41    21     -     -    26     -    11 |  288   1.23
 TRO1 |     -    23     -     -     -     -     -     -     -    17 |  287   7.84
 TROM |     -     -     -     -    27     -     -     -     -    28 |  288   9.66
 TSKB |     -    30    20    66    31     -     -    15     -    17 |  288   1.70
 TWTF |     -    41    13     -     -     -     -     -     -    18 |  288   0.09
 UNSA |     -     -     -     -    38     -     -     -     -    40 |  288  14.35
 URUM |     -    41     -     -    46     -     -     -     -    26 |  288  18.50
 USN3 |     -    19     7     -     -     -     -    12     -    18 |  288   0.02
 USNO |     -    33    10     -     -     -     -    14     -    24 |  288   0.02
 USUD |     -     -    19    42     -     -     -     -     -    31 |  288   0.08
 VILL |     -     -     -    32    33     -     -     -     -    25 |  288  12.94
 WES2 |     -     -     6     -     -     -     -     -     -     9 |  286   0.04
 WHIT |     -    24     -     -     -     -     -     -     -    18 |  288  25.08
 WILL |     -    20    12     -     -     -     -     -     -    19 |  288 128.00
 WSRT |     -     -    21     -    29     -     -     -     -    22 |  288   0.04
 YAR2 |     -    27    19     -    23     -     -     -     -    21 |  288  10.97
 YELL |     -    25    16    39    26     -     -    20     -    23 |  288   0.04
 YSSK |     -    20     -     -    14     -     -     -     -     - |  287  10.24
 -----+-------------------------------------------------------------+--------------
 TOT  |  2971    43    25    46    33   116  4075    34  2875    35 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 NRC1 |   288     0     0   288    9.58   | 3.77e-14  6.02e-15  1.17e-15 |
 AMC2 |   288     0     0   288    8.69   | 4.96e-14  1.58e-14  1.64e-15 |
 ONSA |   288     1     0   287    8.52   | 4.18e-14  1.61e-14  2.78e-15 |
 USNO |   288     0     0   288    7.30   | 4.16e-14  7.73e-15  2.47e-15 |
 BREW |   288     0     0   288    6.31   | 4.86e-14  9.78e-15  3.75e-15 |
 NPLD |   287     0     0   286    6.01   | 4.12e-14  1.34e-14  4.54e-15 |
 NLIB |   288     0     0   288    5.55   | 3.95e-14  8.62e-15  4.06e-15 |
 CHUR |   288     0     0   288    5.42   | 4.65e-14  1.09e-14  4.65e-15 |
 ALGO |   288     0     0   288    4.86   | 3.13e-14  7.39e-15  1.63e-15 |
 USN3 |   288     0     0   288    4.75   | 4.98e-14  8.05e-15  2.30e-15 |
 PIE1 |   288     0     0   288    4.58   | 5.59e-14  1.56e-14  2.69e-15 |
 MAD2 |   288     0     0   288    4.10   | 4.90e-14  9.91e-15  5.79e-15 |
 STJO |   288     0     0   288    3.80   | 4.09e-14  1.24e-14  5.53e-15 |
 TWTF |   288     0     0   288    3.43   | 5.04e-14  1.28e-14  5.17e-15 |
 NYAL |   288     0     0   288    2.29   | 2.77e-14  6.94e-15  6.34e-15 |
 NYA1 |   286     0     0   284    2.06   | 2.72e-14  7.37e-15  6.03e-15 |
 CRO1 |   288     0     0   288    2.04   | 1.16e-13  1.52e-14  5.95e-15 |
 KOKB |   288     0     0   288    1.87   | 4.03e-14  8.96e-15  3.23e-15 |
 HOB2 |   288     0     0   288    1.23   | 1.31e-13  1.34e-14  7.16e-15 |
 WSRT |   288     0     0   288    1.21   | 5.44e-14  1.49e-14  2.66e-15 |
 GODE |   288     1     0   287    1.10   | 5.17e-14  8.85e-15  5.65e-15 |
 DRAO |   288     0     0   288    1.03   | 3.25e-14  1.04e-14  3.26e-15 |
 TIDB |   288     0     0   288    0.84   | 1.19e-13  1.93e-14  1.12e-14 |
 WES2 |   286     0     0   285    0.54   | 5.33e-14  1.69e-14  4.02e-15 |
 YELL |   288     0     0   288    0.54   | 3.94e-14  7.75e-15  2.61e-15 |
 USUD |   288     0     0   288    0.37   | 2.83e-13  3.07e-14  7.06e-15 |
 NOT1 |   288     0     0   288    0.27   | 5.94e-14  3.17e-14  1.51e-14 |
 MEDI |   288     0     0   288    0.27   | 3.92e-14  1.16e-14  3.96e-15 |
 BRFT |   216     0     0    71    0.25   | 6.99e-14  2.01e-14         - |
 PTBB |   288     0     0   287    0.23   | 2.71e-13  5.45e-14  1.43e-14 |
 G05  |   288     0     0   288    0.19   | 1.92e-13  5.07e-14  8.24e-14 |
 DWH1 |   288     0     0   288    0.10   | 3.08e-13  9.38e-14  1.99e-14 |
 G29  |   288     0     0   288    0.08   | 4.10e-13  1.13e-13  8.61e-14 |
 G11  |   288     0     2   146    0.08   | 6.08e-13  7.41e-14  3.78e-14 |
 BAHR |   288     0     0   288    0.08   | 3.92e-13  1.24e-13  6.46e-14 |
 G26  |   288     0     0   288    0.06   | 3.85e-13  9.83e-14  7.91e-14 |
 HRAO |   288     0     0   288    0.06   | 1.13e-13  3.58e-14  9.28e-14 |
 G07  |   288     0     0   288    0.05   | 3.01e-13  8.84e-14  7.18e-14 |
 G06  |   288     0     0   288    0.05   | 5.24e-13  1.26e-13  1.12e-13 |
 BOR1 |   288     0     0   288    0.05   | 4.17e-13  1.46e-13  4.71e-14 |
 G30  |   288     0     0   205    0.04   | 5.92e-13  1.85e-13  1.71e-13 |
 STR1 |   288     0     0   288    0.03   | 6.76e-13  1.83e-13  7.42e-14 |
 G04  |   277     0     0   275    0.03   | 4.80e-13  1.24e-13  1.10e-13 |
 SYOG |   286     0     0   284    0.02   | 7.18e-13  2.05e-13  1.06e-13 |
 G25  |   288     0     0   288    0.01   | 2.93e-13  2.31e-13  2.42e-13 |
 G08  |   288     0     0   288    0.01   | 1.39e-12  4.61e-13  2.08e-13 |
 TSKB |   288     0     0   288    0.01   | 9.83e-13  2.80e-13  1.65e-13 |
 TOW2 |   288     0     0   288    0.01   | 4.68e-13  1.57e-13  9.25e-14 |
 G10  |   288     0     0   288    0.01   | 1.23e-12  3.44e-13  2.06e-13 |
 G03  |   288     0     0   288    0.00   | 1.28e-12  5.02e-13  3.34e-13 |
 MATE |   288     0     0   288    0.00   | 3.80e-14  1.11e-14  1.27e-14 |
 PERT |   229     0     0   226    0.00   | 1.88e-12  5.85e-13         - |
 GPST |   288     0     0     0    0.00   | 2.39e-14  4.28e-15  9.60e-16 |
 BJFS |   262     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.12e-13  6.32e-14  2.93e-14 |
 G27  |   288     0     0     0    0.00   | 1.24e-12  4.07e-13  5.00e-13 |
 G24  |   277     0     0     0    0.00   | 1.19e-12  3.47e-13  2.44e-13 |
 G23  |   288     0     6     0    0.00   | 5.76e-13  5.82e-14  2.70e-14 |
 G22  |   288     0     6     0    0.00   | 6.45e-13  6.69e-14  2.62e-14 |
 G21  |   288     0     6     0    0.00   | 1.09e-12  1.48e-13  3.41e-14 |
 G20  |   288     0     6     0    0.00   | 7.00e-13  7.55e-14  2.17e-14 |
 G19  |   288     0     6     0    0.00   | 6.48e-13  6.48e-14  2.90e-14 |
 G18  |   288     0     6     0    0.00   | 7.53e-13  8.51e-14  3.34e-14 |
 G17  |   288     0     6     0    0.00   | 5.65e-13  6.34e-14  1.20e-14 |
 G16  |   288     0     6     0    0.00   | 4.74e-13  4.68e-14  1.94e-14 |
 G15  |   276     0     0     0    0.00   | 1.49e-12  6.17e-13  2.06e-13 |
 G14  |   288     0     6     0    0.00   | 5.88e-13  6.69e-14  2.96e-14 |
 G13  |   288     0     5     0    0.00   | 5.40e-13  6.01e-14  1.61e-14 |
 G09  |   288     0     0     0    0.00   | 1.56e-12  4.29e-13  2.87e-13 |
 G02  |   288     0     6     0    0.00   | 5.87e-13  5.78e-14  2.20e-14 |
 G01  |   288     0     0     0    0.00   | 1.62e-12  7.95e-13  4.77e-13 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     2     0    0.00   | 5.50e-13  6.35e-13  2.34e-12 |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TROM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   287     0     0     0    0.00   |        -         -         - |
 TID1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   285     2     0     0    0.00   |        -         -         - |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   | 5.74e-13  5.94e-13  8.22e-13 |
 SANT |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 QUIN |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     0     0     0    0.00   |        -         -         - |
 PRDS |   288     0     0     0    0.00   |        -         -         - |
 POTS |   285     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     2     0    0.00   | 7.74e-13  9.07e-13  9.98e-13 |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   238     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   287     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 LAMA |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     0     0     0    0.00   |        -         -         - |
 KARR |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     1     0     0    0.00   | 7.43e-13  3.23e-13  7.07e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   286     0     1     0    0.00   | 2.01e-13  4.09e-13  2.01e-12 |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GMAS |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FLIN |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   260     0     0     0    0.00   | 2.49e-13  7.59e-13  4.94e-13 |
 DARW |   288     0     0     0    0.00   | 1.96e-13  4.22e-13  2.22e-13 |
 DAEJ |   288     1     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.16e-13  6.76e-13  3.50e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 AUCK |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   287     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
 ALBH |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 3.09e-17  3.71e-16  2.23e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      NRC1      NRC1 |
------------------------------------------+------------------------------+
