
 GPS week: 1358   Day: 4   MJD: 53754                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2688      0     0.17    -1.31     3.77     0.00      0
 cod |   288     0  19570     49     0.32    -2.42     0.05    21.18      0
 emr |   288     0  22657   1576  1916.53    36.97     0.10     7.56      0
 esa |   288     0  18468    569  1916.32    37.17     0.07    12.57      0
 gfz |   284     0  29170     72     0.18     0.55     0.05    17.66      0
 iga |    96     0   2688     10     0.16    -1.31     0.09     0.00      0
 igu |    96     0   2592      4     0.11    -1.01     5.05     0.00      0
 jpl |   288     0  16599      1    -0.72    -1.14     0.04    24.99      0
 ngs |    96     0   2688      0     0.17    -1.31     3.15     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  37423    577    -0.77    -0.95     0.06    16.03      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |-20580   -42   -53   138    31   -17-23284   -49 -9182     -    14 |
    2 | -2509   -26     X  -160    38   112  2852   149 -2570     -  -114 |
    3 |  2171  -100    16   -73   176   -70 11409    -2  1316     -    -6 |
    4 | -1398   109     X    59    36   121  3214     1  -966     -  -231 |
    5 |  1645   -97   -49   118    -7   -29-17761   -18   732     -    93 |
    6 |   315   -18   -89    58    91   118 -5317    46    40     -  -150 |
    8 | -3488    96  -132    25    64   -20  6575   -53 -2447     -   -78 |
    9 |  1137   -22  -115   -33    35     7   766   103  -150     -   -88 |
   10 |  2349  -127   109   113   -16    62     -    44  1503     -    -8 |
   11 |  4678    17    97  -166   116    68  2274    44  4279     -  -133 |
   13 |  5421   168  -100   -50   134   193  3459    64  4777     -  -381 |
   14 |  5245   110    47  -170    43   -95  3065     5  4970     -   -86 |
   15 |   459  -221    80   118   159    28  5888  -106 -1750     -   154 |
   16 |  4215   -44   -77   -78   123   -87  2839   -12  4128     -    41 |
   17 |  1143    92     X   284   -68     3 -1764   -39 -1604     -  -212 |
   18 |  5319    46    18    66    28   -15  3423   -52  5055     -   -69 |
   19 |  -819    -7   -72   -95    74  -272  2224    65 -1099     -   -64 |
   20 |  3658   -51   114   -81   132   -97  2626   -90  3783     -    80 |
   21 |  2437   -87    21   165    41    88  2101    -5  2338     -   -61 |
   22 | -5396   -57    34   103    46   -56  -668    97 -4380     -  -220 |
   23 | -1937    65   -14  -137   102  -115  2179     6 -1921     -   -93 |
   24 |  3801    27     X    35    95    53  2952   -93  2452     -   -22 |
   25 |-10882     3  -137     -   203    30-13739   -25 -9917     -  -125 |
   26 |  -817    33  -266    54   -99     3  2261    95 -1046     -     - |
   27 |  -807    41  -173    83    60  -136  -172    33  -906     -  -155 |
   28 |  7595   -13   -50  -219   150   108  4457    58  6060     -   -40 |
   29 | -3049   -13  -187   -57   -31   -15 -1530   115 -2861     -     X |
   30 |   103   130  -176   143    60    44 -1356    68  -626     -  -373 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -  -131     -     -     -     -    22     -     -    28 |
 ALGO |     -     -  -153     4    -1     -     -    50     -     -    -5 |
 ALRT |     -     -     -     -  -152     -     -     -     -     -   168 |
 AMC2 |     -   -55  -100     -     -     -     -   -38     -     -   163 |
 ARTU |     -   150     -   146   -30     -     -     -     -     -  -279 |
 ASC1 |     -     -     -     -   -84     -     -     -     -     -    92 |
 ASPA |     -     -     -     -    71     -     -     -     -     -   -78 |
 AUCK |     -     -     -  -529   267     -     -     -     -     -    87 |
 BAHR |     -     6   154     -    17     -     -     -     -     -   -99 |
 BILI |     -     -     -     -  -117     -     -     -     -     -   128 |
 BJFS |     -     -     -     -  -133     -     -     -     -     -   146 |
 BOGT |     -    80     -   159     4     -     -     -     -     -  -232 |
 BOR1 |     -     -     -     -     4     -     -     -     -     -    -5 |
 BREW |     -     -   -89     -     -     -     -     -     -     -    42 |
 BRFT |     -    28     -     -   -34     -     -     -     -     -     - |
 BRMU |     -     -     -     -    37     -     -     -     -     -   -41 |
 CAS1 |     -     -     -    36   -51     -     -     -     -     -    26 |
 CEDU |     -   177     -    -3  -222     -     -     -     -     -    22 |
 CHAT |     -   -66     -     -   -26     -     -     -     -     -    81 |
 CHUR |     -     -     X     -   -29     -     -     -     -     -    32 |
 COCO |     -   -35     -   -95    42     -     -     -     -     -    75 |
 CORD |     -   -55     -     -     -     -     -     -     -     -    72 |
 CRO1 |     -     -     -    23    79     -     -    29     -     -  -149 |
 DAEJ |     -    70   213     -     -     -     -     -     -     -  -193 |
 DARW |     -   -64   179     -     -     -     -     -     -     -    -1 |
 DAV1 |     -     -     -     -   107     -     -     -     -     -  -117 |
 DGAR |     -     -     -     -    -3     -     -     1     -     -     1 |
 DRAO |     -     -   -19     -    19     -     -   -21     -     -    20 |
 DWH1 |     -     -    67     -     -     -     -     -     -     -   -32 |
 FAIR |     -     -    42    33   -42     -     -     -     -     -     - |
 FORT |     -   -36   102     -     -     -     -     -     -     -     X |
 GLPS |     -   -52     -     -    14     -     -     -     -     -    53 |
 GMAS |     -     -    71     -     -     -     -     -     -     -   -34 |
 GODE |     -     -  -152     X    24     -     -     -     -     -    45 |
 GODZ |     -     -     -     -     -     -     -    -4     -     -     7 |
 GOLD |     -     -     -   -62   -40     -     -    53     -     -    10 |
 GRAS |     -     -     -     -   -22     -     -     -     -     -    25 |
 GRAZ |     -     -   167     -     -     -     -     -     -     -   -79 |
 GUAM |     -    94     -  -539   138     -     -     -     -     -   138 |
 HERS |     -  -243     -     -     -     -     -     -     -     -   320 |
 HLFX |     -     -   -85     -     -     -     -  -104     -     -   200 |
 HOB2 |     -    -4   291     -   -53     -     -     -     -     -   -75 |
 HOFN |     -     -     -     -    89     -     -   -20     -     -   -66 |
 HRAO |     -     -     -     -   -97     -     -   156     -     -  -138 |
 IISC |     -     -     -    48   -34     -     -     -     -     -     - |
 INVK |     -     -     -     -     -     -     -   -64     -     -   100 |
 ISPA |     -   118     -     -  -127     -     -  -122     -     -   174 |
 JPLM |     -     -   -54     -   -80     -     -  -107     -     -   271 |
 KGN0 |     -   -46   230     -     -     -     -     -     -     -   -48 |
 KIT3 |     -    35     -   -82    22     -     -     -     -     -    -5 |
 KOKB |     -   -23   157     -   -42     -     -    38     -     -   -58 |
 KOUR |     -     -     -  -133   -65     -     -     -     -     -   175 |
 LPGS |     -     -   211  -123     -     -     -   -70     -     -   106 |
 MAC1 |     -   -39     -     X   -77     -     -     -     -     -   116 |
 MAD2 |     -     -   -52     -     -     -     -     -     -     -    24 |
 MAG0 |     -    69     -     -     -     -     -   -58     -     -     - |
 MALI |     -     -     -    54   -38     -     -     -     -     -     - |
 MAS1 |     -    60  -138    19   -54     -     -    64     -     -   -54 |
 MAW1 |     -     -     -     -   -66     -     -     -     -     -    73 |
 MBAR |     -     -     -     -    71     -     -     -     -     -   -78 |
 MCM4 |     -     -   160    52  -133     -     -    19     -     -     - |
 MDO1 |     -     -   104     -  -309     -     -   -70     -     -   310 |
 MKEA |     -    -9     -    39   -78     -     -     -     -     -    66 |
 NAIN |     -     -     -     -     -     -     -   -94     -     -   146 |
 NICO |     -   122     -     -  -147     -     -     -     -     -     - |
 NKLG |     -     -     -     -    30     -     -     -     -     -   -33 |
 NLIB |     -     -  -152     -    50     -     -     -     -     -    17 |
 NNOR |     -     -   -22   -15     -     -     -     -     -     -    22 |
 NPLD |     -   -47   -10     -     -     -     -     -     -     -    55 |
 NRC1 |     -     -  -150     -    56     -     -     -     -     -    10 |
 NRIL |     -     -     -     -   -39     -     -     -     -     -    43 |
 NTUS |     -  -106     -  -110    51     -     -     -     -     -   171 |
 NYAL |     -     -   -75     -    36     -     -     -     -     -    -4 |
 ONSA |     -     -     -    73   -52     -     -     -     -     -     - |
 PDEL |     -   -19     -     -    23     -     -     -     -     -     - |
 PERT |     -    47   138  -116     -     -     -     -     -     -   -37 |
 PIE1 |     -     -  -216   -53     -     -     -     -     -     -   143 |
 PIMO |     -     -     -   -28    55     -     -     -     -     -   -38 |
 POL2 |     -     -     -     -    29     -     -   -34     -     -    22 |
 POTS |     -     -     -     -    -7     -     -     -     -     -     8 |
 PRDS |     -     -   -64     -     -     -     -     -     -     -    30 |
 PTBB |     -    98   -16     -     -     -     -     -     -     -   -81 |
 QAQ1 |     -     -  -194     -     -     -     -     -     -     -    92 |
 QUIN |     -   -85     -     -     -     -     -     -     -     -   113 |
 RABT |     -     8     -     -     -     -     -     -     -     -   -10 |
 RBAY |     -     -     -     -  -176     -     -     -     -     -   194 |
 REUN |     -     -     -     -   -25     -     -     -     -     -    27 |
 RIOG |     -    31     -    17    12     -     -     -     -     -   -64 |
 SANT |     -  -115     -   515  -233     -     -     -     -     -     - |
 SCH2 |     -     -  -169     -     3     -     -     -     -     -    76 |
 SCUB |     -     -     -     -     -     -     -  -124     -     -   192 |
 SELE |     -   145     -     -     -     -     -     -     -     -  -192 |
 STJO |     -     -  -160     -    67     -     -     -     -     -     3 |
 STR1 |     -     -    50     -     -     -     -     9     -     -   -37 |
 SUTM |     -     -     -     -  -183     -     -     -     -     -   201 |
 SUWN |     -  -268   410     -     -     -     -     -     -     -   160 |
 THTI |     -     -     -   -29     -     -     -     -     -     -    23 |
 TIDB |     -     -   110   -78    21     -     -     -     -     -   -13 |
 TIXI |     -     -     -   213    35     -     -   -22     -     -  -170 |
 TLSE |     -    48    10     -     -     -     -     -     -     -   -66 |
 TOW2 |     -    61     -     -  -133     -     -     3     -     -    59 |
 TRO1 |     -     -     -     -     -     -     -   -29     -     -    45 |
 TROM |     -     -     -     -   -67     -     -     -     -     -    74 |
 TSKB |     -   -11    92    61    31     -     -     -     -     -  -111 |
 TWTF |     -  -109   251     -     -     -     -     -     -     -    25 |
 UNSA |     -     -     -   309  -140     -     -     -     -     -   -91 |
 USN3 |     -     -  -208     -     -     -     -    35     -     -    43 |
 USNO |     -     -  -123     -     -     -     -     -     -     -    58 |
 USUD |     -  -119   239   -55     -     -     -    43     -     -    19 |
 VILL |     -    80     -   -35   -59     -     -     9     -     -   -22 |
 WES2 |     -     -  -227     -     -     -     -     -     -     -   107 |
 WILL |     -     -   179     -     -     -     -     -     -     -   -84 |
 WTZR |     -     -     -   271  -193     -     -     -     -     -     - |
 WUHN |     -     -   145     -    42     -     -     -     -     -  -114 |
 YAR2 |     -   -76   149     -    94     -     -     -     -     -   -73 |
 YELL |     -     -    21  -219    74     -     -     -     -     -    82 |
 YSSK |     -   -48     -     -    57     -     -     -     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 | 10135    77   126    35    29    51 16554    40  7370     -    86 |  288   5.16
    2 |   431    39     X    33    68    78  1981    45   582     -    29 |  288   0.15
    3 |  7931    51    79    74    25    59  9579    54  6598     -    77 |  288   1.54
    4 |  2845    43     X    63    33    95  2374    39  1712     -    35 |  288   0.96
    5 |  1512    56   124    99    22    70 10505    45  1145     -    48 |  288   1.80
    6 |  2124    44    97   110    26    65  3070    30  1700     -    21 |  288   1.15
    8 |  6658    55   130    95    45   120  5924    47  6068     -    79 |  288   2.73
    9 |  3907    48   155    40    61   126  1874    43  3163     -    65 |  288   2.97
   10 |  2965    71    91    76    66   122     -    79  2723     -   106 |  288   2.67
   11 |   748    73   147    67    79   140  1613    38   636     -   137 |  288   0.43
   13 |   792    69   101    82    27    92  2114    59   750     -    34 |  288   0.30
   14 |  1260   161   106    44    44    55  2659   120   990     -    42 |  288   0.27
   15 |  7620    57   168   139    26   107  2954    45  6080     -   193 |  288   3.25
   16 |  1120    71   107    57    55    63  2267    66   770     -    63 |  288   0.32
   17 |  5397    35     X    42    42    81  1554    53  2602     -    39 |  288   0.50
   18 |   791    69   119    54    24    95  2124    58   569     -    60 |  288   0.30
   19 |   666    50   221   116    19    50  1940    41   492     -    55 |  288   0.23
   20 |  1222    63   101    69    30    69  1930    25   812     -    34 |  288   0.21
   21 |   495    45   164   141   190    76  1766    55   793     -    52 |  288   0.33
   22 |  1864    82    94   121    52    63   609    34  2159     -    32 |  288   0.24
   23 |   845    72   120    82    27   105  1954    60   825     -    69 |  288   0.24
   24 |  3170    33     X    51    22    75  3439    27  4051     -    73 |  288   3.19
   25 |  5060    85   196     -    48   204  9917   103  5863     -    77 |  288   2.08
   26 |   727    54   122    34    27    58  1270    23   777     -     - |  288   0.82
   27 |  2716    54   109   103    43    84  2255    50  2743     -    46 |  288   2.53
   28 |  2780    49   177    41    28   111  1731    26  2500     -   109 |  288   0.43
   29 |  1291    47   161    81    39    59  1454    46  1147     -     X |  288   0.85
   30 |  1239    46    99    62    22    46   757    27  1148     -    27 |  288   0.84
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    66     -     -     -     -     6     -     -    34 |  288   4.04
 ALGO |     -     -    50    52   165     -     -    45     -     -    91 |  288   0.09
 ALRT |     -     -     -     -    15     -     -     -     -     -    17 |  284   5.32
 AMC2 |     -    69    77     -     -     -     -    27     -     -    40 |  288   0.04
 ARTU |     -    30     -    66    34     -     -     -     -     -    45 |  288  10.12
 ASC1 |     -     -     -     -   170     -     -     -     -     -   187 |  265    >>>
 ASPA |     -     -     -     -    30     -     -     -     -     -    33 |  284    >>>
 AUCK |     -     -     -   150    74     -     -     -     -     -   114 |  288    >>>
 BAHR |     -    26    29     -    21     -     -     -     -     -    31 |  288   0.32
 BILI |     -     -     -     -    17     -     -     -     -     -    18 |  283   6.87
 BJFS |     -     -     -     -    24     -     -     -     -     -    27 |  283  13.47
 BOGT |     -    39     -    70    39     -     -     -     -     -    57 |  288  10.77
 BOR1 |     -     -     -     -    29     -     -     -     -     -    32 |  284   0.60
 BREW |     -     -    59     -     -     -     -     -     -     -    28 |  288   0.10
 BRFT |     -    34     -     -    41     -     -     -     -     -     - |  282   0.14
 BRMU |     -     -     -     -    60     -     -     -     -     -    66 |  282    >>>
 CAS1 |     -     -     -    26    30     -     -     -     -     -    34 |  288   7.87
 CEDU |     -    93     -   117    47     -     -     -     -     -    56 |  239    >>>
 CHAT |     -    37     -     -    30     -     -     -     -     -    37 |  283  11.48
 CHUR |     -     -     X     -    55     -     -     -     -     -    60 |  283   0.05
 COCO |     -    36     -    60    36     -     -     -     -     -    24 |  288   7.60
 CORD |     -    21     -     -     -     -     -     -     -     -    27 |  286  10.27
 CRO1 |     -     -     -    84    31     -     -    25     -     -    90 |  288   0.29
 DAEJ |     -    33    28     -     -     -     -     -     -     -    48 |  288   5.71
 DARW |     -    18    94     -     -     -     -     -     -     -    56 |  288   2.97
 DAV1 |     -     -     -     -    79     -     -     -     -     -    87 |  284   4.44
 DGAR |     -     -     -     -    47     -     -    37     -     -    36 |  288  14.57
 DRAO |     -     -    89     -    16     -     -    10     -     -    29 |  288   0.03
 DWH1 |     -     -    65     -     -     -     -     -     -     -    31 |  286   0.33
 FAIR |     -     -    62    21    24     -     -     -     -     -     - |  288   6.95
 FORT |     -    31    87     -     -     -     -     -     -     -     X |  262   0.17
 GLPS |     -    32     -     -    36     -     -     -     -     -    16 |  288  16.10
 GMAS |     -     -    48     -     -     -     -     -     -     -    23 |  288   2.30
 GODE |     -     -   200     X    18     -     -     -     -     -    99 |  265 453.32
 GODZ |     -     -     -     -     -     -     -    23     -     -    36 |  288  12.39
 GOLD |     -     -     -    34    21     -     -    30     -     -    24 |  288  11.25
 GRAS |     -     -     -     -    19     -     -     -     -     -    21 |  284   8.69
 GRAZ |     -     -    61     -     -     -     -     -     -     -    29 |  288   3.32
 GUAM |     -    38     -    73    40     -     -     -     -     -    46 |  288  15.96
 HERS |     -    23     -     -     -     -     -     -     -     -    31 |  231  26.21
 HLFX |     -     -    61     -     -     -     -    19     -     -    47 |  288  15.80
 HOB2 |     -    32   106     -    37     -     -     -     -     -    65 |  288   0.08
 HOFN |     -     -     -     -    23     -     -    35     -     -    59 |  287    >>>
 HRAO |     -     -     -     -   205     -     -    89     -     -    91 |  288   0.58
 IISC |     -     -     -    27    19     -     -     -     -     -     - |  284  17.71
 INVK |     -     -     -     -     -     -     -    12     -     -    18 |  288   8.61
 ISPA |     -    46     -     -    53     -     -    37     -     -    43 |  288  12.17
 JPLM |     -     -    48     -    32     -     -    13     -     -    13 |  288  18.88
 KGN0 |     -    15    36     -     -     -     -     -     -     -    24 |  287   0.56
 KIT3 |     -    28     -    26    20     -     -     -     -     -    26 |  288  13.14
 KOKB |     -    23   114     -    43     -     -    42     -     -    67 |  288   0.04
 KOUR |     -     -     -    50    20     -     -     -     -     -    42 |  288  13.05
 LPGS |     -     -   128    93     -     -     -    26     -     -    39 |  288  24.85
 MAC1 |     -    34     -     X    33     -     -     -     -     -    47 |  231  10.56
 MAD2 |     -     -    55     -     -     -     -     -     -     -    26 |  288   0.06
 MAG0 |     -    35     -     -     -     -     -    30     -     -     - |  286   7.42
 MALI |     -     -     -    34    24     -     -     -     -     -     - |  284  16.78
 MAS1 |     -    34    64    25    21     -     -    27     -     -    34 |  288  13.12
 MAW1 |     -     -     -     -    71     -     -     -     -     -    79 |  284   7.72
 MBAR |     -     -     -     -   109     -     -     -     -     -   120 |  284  13.66
 MCM4 |     -     -   142    44    37     -     -    16     -     -     - |  288  43.27
 MDO1 |     -     -    60     -    15     -     -    12     -     -    42 |  288  41.00
 MKEA |     -    18     -    40    12     -     -     -     -     -    19 |  288  13.71
 NAIN |     -     -     -     -     -     -     -     8     -     -    12 |  286   7.30
 NICO |     -    24     -     -    28     -     -     -     -     -     - |  284  12.69
 NKLG |     -     -     -     -   157     -     -     -     -     -   173 |  283    >>>
 NLIB |     -     -    89     -    26     -     -     -     -     -    32 |  288   0.06
 NNOR |     -     -    80    40     -     -     -     -     -     -    62 |  288  13.53
 NPLD |     -    26    76     -     -     -     -     -     -     -    24 |  287   0.05
 NRC1 |     -     -   120     -    71     -     -     -     -     -    43 |  288   0.03
 NRIL |     -     -     -     -    24     -     -     -     -     -    26 |  284   6.29
 NTUS |     -    29     -    98    35     -     -     -     -     -    28 |  288  10.04
 NYAL |     -     -    66     -    24     -     -     -     -     -    11 |  288   0.13
 ONSA |     -     -     -    20    14     -     -     -     -     -     - |  248   0.03
 PDEL |     -    24     -     -    29     -     -     -     -     -     - |  251  54.06
 PERT |     -    24    85    26     -     -     -     -     -     -    42 |  288   3.23
 PIE1 |     -     -   141   148     -     -     -     -     -     -    59 |  288   0.15
 PIMO |     -     -     -    37    29     -     -     -     -     -    34 |  288  18.38
 POL2 |     -     -     -     -    16     -     -    23     -     -    34 |  288   9.50
 POTS |     -     -     -     -    23     -     -     -     -     -    25 |  282  11.90
 PRDS |     -     -    67     -     -     -     -     -     -     -    32 |  288   0.28
 PTBB |     -    32    79     -     -     -     -     -     -     -    22 |  288   0.37
 QAQ1 |     -     -   163     -     -     -     -     -     -     -    77 |  280    >>>
 QUIN |     -    80     -     -     -     -     -     -     -     -   106 |  185   5.50
 RABT |     -    35     -     -     -     -     -     -     -     -    46 |  237  14.02
 RBAY |     -     -     -     -    85     -     -     -     -     -    94 |  283  31.94
 REUN |     -     -     -     -    56     -     -     -     -     -    61 |  282  21.67
 RIOG |     -    41     -   142    48     -     -     -     -     -    88 |  240   8.74
 SANT |     -    19     -    35    26     -     -     -     -     -     - |  288   5.31
 SCH2 |     -     -    50     -    41     -     -     -     -     -    55 |  288 148.75
 SCUB |     -     -     -     -     -     -     -    27     -     -    42 |  274  12.61
 SELE |     -    19     -     -     -     -     -     -     -     -    25 |  288  40.46
 STJO |     -     -    87     -    38     -     -     -     -     -    48 |  288   0.07
 STR1 |     -     -   102     -     -     -     -    18     -     -    58 |  288   0.83
 SUTM |     -     -     -     -    61     -     -     -     -     -    67 |  282  13.41
 SUWN |     -    15    35     -     -     -     -     -     -     -    31 |  288   5.60
 THTI |     -     -     -    40     -     -     -     -     -     -    32 |  288   4.04
 TIDB |     -     -    90    45    19     -     -     -     -     -    70 |  288   0.09
 TIXI |     -     -     -    25    29     -     -    14     -     -    22 |  287   8.00
 TLSE |     -    28    74     -     -     -     -     -     -     -    30 |  288   0.60
 TOW2 |     -    36     -     -    40     -     -    22     -     -    64 |  288   4.19
 TRO1 |     -     -     -     -     -     -     -    18     -     -    28 |  288   8.20
 TROM |     -     -     -     -    10     -     -     -     -     -    11 |  284  11.53
 TSKB |     -    24    43    31    27     -     -     -     -     -    17 |  288   1.29
 TWTF |     -    13    30     -     -     -     -     -     -     -    24 |  288   0.09
 UNSA |     -     -     -    56    25     -     -     -     -     -    42 |  288  16.95
 USN3 |     -     -    48     -     -     -     -    15     -     -    44 |  288   0.03
 USNO |     -     -    80     -     -     -     -     -     -     -    38 |  288   0.04
 USUD |     -    15    49    46     -     -     -    22     -     -    27 |  288   0.10
 VILL |     -    40     -    28    20     -     -    33     -     -    31 |  288  12.03
 WES2 |     -     -    67     -     -     -     -     -     -     -    32 |  286   0.06
 WILL |     -     -    68     -     -     -     -     -     -     -    32 |  288  77.70
 WTZR |     -     -     -    30    22     -     -     -     -     -     - |  283    >>>
 WUHN |     -     -    30     -    26     -     -     -     -     -    26 |  287  17.87
 YAR2 |     -    28    77     -    35     -     -     -     -     -    31 |  288   7.74
 YELL |     -     -    92    65    12     -     -     -     -     -    19 |  288   0.04
 YSSK |     -    21     -     -    25     -     -     -     -     -     - |  280   9.76
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3768    49   102    72    55    92  5049    43  3150     -    59 |


 BEST CLOCK FIT: USN3   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288    9.94   | 3.73e-14  7.03e-15  2.07e-15 |
 NLIB |   288     0     0   288    9.92   | 2.86e-14  5.99e-15  4.92e-15 |
 NPLD |   287     0     0   286    9.87   | 4.04e-14  7.03e-15  2.68e-15 |
 ONSA |   248     0     0   247    7.93   | 4.23e-14  8.66e-15         - |
 AMC2 |   288     0     0   288    7.75   | 1.01e-13  1.35e-14  2.64e-15 |
 WES2 |   286     0     0   285    6.90   | 3.14e-14  7.53e-15  3.70e-15 |
 ALGO |   288     0     0   288    6.16   | 4.17e-14  1.15e-14  5.30e-15 |
 MAD2 |   288     0     0   288    5.14   | 4.06e-14  6.84e-15  6.37e-15 |
 KOKB |   288     0     0   288    4.70   | 4.33e-14  9.28e-15  3.33e-15 |
 YELL |   288     0     0   288    4.42   | 3.33e-14  5.62e-15  4.54e-15 |
 STJO |   288     0     0   288    3.92   | 6.77e-14  1.65e-14  4.34e-15 |
 DRAO |   288     0     0   288    3.22   | 2.65e-14  7.33e-15  1.85e-15 |
 BREW |   288     0     0   288    3.01   | 5.63e-14  8.05e-15  5.22e-15 |
 USN3 |   288     0     0   288    2.89   | 1.08e-13  1.49e-14  3.55e-15 |
 NRC1 |   288     0     0   288    2.73   | 3.79e-14  1.07e-14  4.42e-15 |
 TWTF |   288     0     0   288    2.27   | 3.94e-14  1.07e-14  1.08e-14 |
 NYAL |   288     0     0   288    2.07   | 3.70e-14  8.54e-15  1.03e-14 |
 HOB2 |   288     0     0   288    1.78   | 1.52e-13  1.97e-14  1.04e-14 |
 BRFT |   282     0     0   279    1.31   | 5.85e-14  1.43e-14  9.57e-15 |
 CHUR |   283     0     0   281    0.85   | 5.20e-14  1.27e-14  7.78e-15 |
 USUD |   288     0     0   260    0.36   | 2.44e-13  3.42e-14  8.49e-15 |
 TIDB |   288     0     0   288    0.31   | 1.05e-13  2.03e-14  6.58e-15 |
 GODE |   265     0     0   264    0.30   | 4.03e-14  1.11e-14  1.35e-14 |
 FORT |   262     0     0   114    0.29   | 7.78e-14  2.12e-14         - |
 G14  |   288     0     1   143    0.28   | 5.72e-13  5.93e-14  2.23e-14 |
 DWH1 |   286     0     0   285    0.15   | 2.93e-13  9.45e-14  2.38e-14 |
 PTBB |   288     0     1   143    0.12   | 3.48e-13  8.23e-14  2.75e-14 |
 PIE1 |   288     1     0   287    0.11   | 8.33e-14  2.51e-14  1.12e-14 |
 G11  |   288     0     0   243    0.11   | 6.76e-13  6.85e-14  4.33e-14 |
 G28  |   288     0     3   107    0.10   | 6.54e-13  6.29e-14  2.73e-14 |
 KGN0 |   287     0     0   286    0.09   | 3.51e-13  1.00e-13  7.44e-14 |
 G23  |   288     0     1    76    0.09   | 4.85e-13  5.71e-14  1.84e-14 |
 TLSE |   288     0     0   288    0.09   | 3.65e-13  1.11e-13  5.78e-14 |
 CRO1 |   288     0     0   288    0.08   | 1.76e-13  4.15e-14  2.66e-14 |
 G30  |   288     0     0   288    0.08   | 2.73e-13  8.17e-14  9.71e-14 |
 G16  |   288     0     1   143    0.07   | 5.55e-13  6.72e-14  3.03e-14 |
 PRDS |   288     0     0   288    0.06   | 3.34e-13  8.22e-14  2.72e-14 |
 G06  |   288     0     0   210    0.06   | 4.04e-13  1.24e-13  8.86e-14 |
 BAHR |   288     0     0   143    0.06   | 3.96e-13  1.06e-13  2.55e-14 |
 G26  |   288     0     0   288    0.06   | 3.68e-13  1.19e-13  1.10e-13 |
 HRAO |   288     0     0   288    0.06   | 1.38e-13  4.80e-14  6.88e-14 |
 G04  |   288     0     0   288    0.05   | 4.44e-13  1.43e-13  1.13e-13 |
 BOR1 |   284     0     0   283    0.05   | 4.62e-13  1.19e-13  6.92e-14 |
 G25  |   288     0     0   288    0.04   | 2.96e-13  9.08e-14  1.68e-13 |
 G29  |   288     0     0   288    0.04   | 4.22e-13  1.37e-13  1.04e-13 |
 G05  |   288     0     0   288    0.03   | 1.78e-13  8.33e-14  1.33e-13 |
 STR1 |   288     0     0   288    0.03   | 6.71e-13  1.86e-13  6.24e-14 |
 TSKB |   288     0     0   288    0.02   | 1.04e-12  2.65e-13  1.38e-13 |
 G08  |   288     0     0   287    0.01   | 1.34e-12  4.31e-13  2.26e-13 |
 G03  |   288     0     0   288    0.01   | 1.29e-12  4.73e-13  1.22e-13 |
 G27  |   288     0     0   288    0.01   | 1.35e-12  4.56e-13  2.41e-13 |
 GMAS |   288     0     0   288    0.00   | 1.15e-12  3.32e-13  2.12e-13 |
 CEDU |   239     0     0   238    0.00   | 3.28e-13  9.96e-14         - |
 THTI |   288     0     0   260    0.00   | 4.06e-13  1.92e-13  3.38e-13 |
 GPST |   288     0     0     0    0.00   | 5.14e-14  8.49e-15  2.59e-15 |
 YSSK |   280     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 WTZR |   283     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 QUIN |   185     0     0     0    0.00   |        -         -         - |
 MAG0 |   286     0     0     0    0.00   |        -         -         - |
 MAC1 |   231     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HERS |   231     0     0     0    0.00   |        -         -         - |
 CHAT |   283     0     0     0    0.00   |        -         -         - |
 BJFS |   283     0     0     0    0.00   |        -         -         - |
 BILI |   283     2     0     0    0.00   |        -         -         - |
 G24  |   288     0     0     0    0.00   | 1.32e-12  3.77e-13  4.15e-13 |
 G22  |   288     0     6     0    0.00   | 6.38e-13  6.23e-14  2.04e-14 |
 G21  |   288     0     6     0    0.00   | 1.12e-12  1.32e-13  3.36e-14 |
 G20  |   288     0     5     0    0.00   | 6.35e-13  7.15e-14  1.89e-14 |
 G19  |   288     0     4     0    0.00   | 5.67e-13  6.26e-14  1.67e-14 |
 G18  |   288     0     6     0    0.00   | 9.65e-13  9.21e-14  3.37e-14 |
 G17  |   288     0     6     0    0.00   | 5.37e-13  5.91e-14  2.79e-14 |
 G15  |   288     0     0     0    0.00   | 1.57e-12  5.84e-13  4.20e-13 |
 G13  |   288     0     4     0    0.00   | 6.11e-13  6.44e-14  2.35e-14 |
 G10  |   288     0     0     0    0.00   | 1.20e-12  4.67e-13  2.73e-13 |
 G09  |   288     0     0     0    0.00   | 1.38e-12  4.55e-13  3.41e-13 |
 G02  |   288     0     6     0    0.00   | 5.50e-13  5.75e-14  1.41e-14 |
 G01  |   288     0     0     0    0.00   |        -         -         - |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TROM |   284     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   | 4.21e-13  5.43e-13  4.19e-13 |
 SUWN |   288     1     0     0    0.00   |        -         -         - |
 SUTM |   282     0     0     0    0.00   |        -         -         - |
 SELE |   288     0     0     0    0.00   |        -         -         - |
 SCUB |   274     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     2     0    0.00   | 1.83e-12  9.15e-13  5.55e-13 |
 RIOG |   240     0     0     0    0.00   |        -         -         - |
 REUN |   282     0     0     0    0.00   |        -         -         - |
 RBAY |   283     0     0     0    0.00   |        -         -         - |
 RABT |   237     0     0     0    0.00   |        -         -         - |
 QAQ1 |   280     0     1     0    0.00   | 2.96e-13  4.40e-13  1.32e-12 |
 POTS |   282     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.96e-12  5.87e-13  2.94e-13 |
 PDEL |   251     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   284     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 NKLG |   283     2     0     0    0.00   |        -         -         - |
 NICO |   284     0     0     0    0.00   |        -         -         - |
 NAIN |   286     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     1     0    0.00   | 6.80e-13  6.20e-13  2.56e-12 |
 MBAR |   284     0     0     0    0.00   |        -         -         - |
 MAW1 |   284     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     2     0     0    0.00   |        -         -         - |
 MALI |   284     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOUR |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     2     0     0    0.00   |        -         -         - |
 IISC |   284     0     0     0    0.00   |        -         -         - |
 HLFX |   288     0     1     0    0.00   | 2.32e-13  3.38e-13  1.10e-12 |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GRAS |   284     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GODZ |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 FAIR |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   284     0     0     0    0.00   | 2.51e-13  7.73e-13  3.86e-13 |
 DARW |   288     0     0     0    0.00   | 2.40e-13  5.42e-13  2.92e-13 |
 DAEJ |   288     0     0     0    0.00   |        -         -         - |
 CORD |   286     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.20e-13  7.01e-13  7.53e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BRMU |   282     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 AUCK |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   284     0     0     0    0.00   |        -         -         - |
 ASC1 |   265     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   284     0     0     0    0.00   |        -         -         - |
 ALBH |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.70e-17  3.24e-16  1.94e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     DRAO      YELL      DRAO |
------------------------------------------+------------------------------+
