
 GPS week: 1302   Day: 6   MJD: 53364                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2872      0     0.01     0.02     3.27     0.00      0
 cod |   288     0  29166    550    -0.10     0.22     0.04    17.14      0
 emr |   288     0  25237     41  1762.22    51.30     0.04    21.04      0
 esa |   288     0  19405   2086  1761.33    51.05     0.07     8.76      0
 gfz |   288     0  20883    363     0.22     0.31     0.04    19.28      0
 iga |    96     0   2872     30    -0.02     0.04     0.08     0.00      0
 igu |    96     0   2872      0     0.00     0.01     3.46     0.00      0
 jpl |   288     0  17752    290    -2.42    -1.29     0.05    13.86      0
 ngs |    96     0   2872     10     0.16    -0.41     3.00     0.00      0
 usn |   288     0  35448   2661  1762.21    51.22     0.04    19.92      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 |  2581    41   -26    81  -101    60  7254    34  2080    31 |
    2 | -1507   -66     3   -57    70  -102 -2139    63 -1588   -30 |
    3 |   375   -96   -89   312    -4    96 -5710    47  -296    10 |
    4 | -1415    98   -58   -41   -92  -151  1410   169 -1546   -41 |
    5 |   301  -174    27   231   133   147 -9614  -110   182   -33 |
    6 |-12852   -89   -94   -68   277  -136-11367     X-11935   -62 |
    7 |  -308    82   -63  -335    78    60  2212    50  -405    32 |
    8 | -2803    97   -19  -267   -39   -22  3936    -8 -1648    97 |
    9 |  -250   -11    14   -38   -28  -167 12491    44   333     7 |
   10 |  -577    91    25  -122     4    32 -1263   -18  -806   -42 |
   11 |  1846   140   -47  -282   -84   -73    38   147  2050    28 |
   13 |   987   235    14  -291  -211   -66  1462    77  1251    61 |
   14 |  5956    32   106   112  -113   133  1026    97  5534  -147 |
   15 |  5092     X    54     X    22   204  5026   -51  4505   -36 |
   16 |  6181  -140   -59   -28   113    16   572   174  6036   -35 |
   17 | -4232     X   -48     X   166   -83  8536     8 -4198   -90 |
   18 |  5001   -66   -33   -71   202   -35   844    19  4211   -86 |
   19 |  3387    49  -131     X    57  1188  2331   198  3600   -97 |
   20 |  3267    35   -54  -199    51   121  1021   120  3591   -17 |
   21 |  6380   -88    16  -174   229   -10  1145    47  6062  -110 |
   22 | -2986   -54    86  -266    26  -210  1268   120 -2635   -36 |
   23 | -1694   155    -8   -29  -203   -41   582   130 -1924    -7 |
   24 |   975    29   -60  -167    63  -152  1055    67 -1252     3 |
   25 |  3220  -147    66   293   -65  -141-13986    58  1480   -51 |
   26 | -4300     0    -1   -20   -28  -284  1834    96 -3714   -30 |
   27 |   705    78  -115   190   -23   -59  2421    18    70   -20 |
   28 | -3015    92   -19  -329    45   -92 -3094    36 -1372    17 |
   29 |  -756    40    46   108  -154  -172 -1921     - -1452    19 |
   30 | -1464  -176   -25   131   149    15 -1292   -23 -1074    -8 |
   31 | -8036    64  -121  -257    49   -61 -5481   114 -6394    60 |
 -----+-------------------------------------------------------------+
 ALBH |     -   127   -88     -     -     -     -    -8     -   -10 |
 ALGO |     -   -85   -23     X     -     -     -   163     -   -16 |
 ALRT |     -   -41     -     -    37     -     -     -     -     - |
 AMC2 |     -    39     9     -     -     -     -  -279     -   151 |
 AREQ |     -    -6    46     -   -90     -     -     -     -    44 |
 ARTU |     -   208     -    80  -136     -     -  -118     -     X |
 ASC1 |     -    12     -     -   -10     -     -     -     -    -1 |
 ASPA |     -     -     -     -   -31     -     -  -224     -   170 |
 AUCK |     -   -24     -     X     -     -     -     -     -    20 |
 BAHR |     -   -67     0     -    90     -     -   -11     -   -22 |
 BAN2 |     -     -    39     -     -     -     -     -     -   -41 |
 BOGT |     -   -13     -    59    21     -     -     -     -   -35 |
 BOR1 |     -   -20   123     -     -     -     -     -     -  -113 |
 BREW |     -     -    65     -     -     -     -  -186     -    61 |
 BRUS |     -   -45    37     -     -     -     -     -     -     X |
 CAGZ |     -   116     -     -     -     -     -     -     -  -100 |
 CAS1 |     -    13     -   -57   -55     -     -     -     -    67 |
 CEDU |     -  -282     -   579     -     -     -     -     -   -24 |
 CHUR |     -   133   -49     -     -     -     -   -62     -   -16 |
 COCO |     -   -50     -   233  -122     -     -     -     -    59 |
 CRO1 |     -     -    18   129   -12     -     -    24     -   -81 |
 DAEJ |     -     -   -59     -     -     -     -     -     -    62 |
 DAV1 |     -   110     -     -     5     -     -     -     -  -100 |
 DGAR |     -   -49     -     -   -30     -     -   103     -     X |
 DRAO |     -   -25   -44   453     -     -     -   -45     -  -101 |
 DWH1 |     -   230  -104     -     -     -     -     -     -   -89 |
 GLPS |     -    20     -     -   -97     -     -     -     -    77 |
 GMAS |     -     -    26     -     -     -     -     -     -   -27 |
 GODE |     -     -    57    55     -     -     -     -     -   -85 |
 GOL2 |     -     -   -11     -     -     -     -     -     -    12 |
 GOLD |     -   -56     -    18     -     -     -  -111     -   117 |
 GRAZ |     -     -    38     -     -     -     -     -     -   -40 |
 GUAM |     -   135     -  -515    64     -     -  -228     -   196 |
 HLFX |     -     -   229     -     -     -     -  -348     -     X |
 HOB2 |     -  -105   156    56     -     -     -     -     -   -99 |
 HOFN |     -     -     -     -  -163     -     -     -     -   158 |
 HRAO |     -  -103     -     -     -     -     -    30     -    68 |
 IENG |     -  -184   150     -     -     -     -     -     -     - |
 IISC |     -    53     -   -46   -26     -     -     -     -     - |
 INVK |     -     9     -     -     -     -     -   -11     -     X |
 ISPA |     -  -124     -     -   -44     -     -   -57     -   189 |
 JPLM |     -     -    18     -  -121     -     -   -27     -   117 |
 KERG |     -     -   -78    12   211     -     -     -     -  -127 |
 KGN0 |     -   -10   -19     -     -     -     -     -     -    29 |
 KIT3 |     -     -     -  -128    42     -     -   -70     -    64 |
 KOSG |     -   -55     -     -     -     -     -     -     -    48 |
 KOUR |     -     -     -  -244   -18     -     -     -     -   125 |
 LPGS |     -   -41    40  -113     -     -     -     -     -    42 |
 MAC1 |     -  -111     -   -19   -50     -     -     -     -   152 |
 MAD2 |     -     -   -38     -     -     -     -     -     -    40 |
 MADR |     -     -     -     -     -     -     -    76     -   -53 |
 MALI |     -    40     -   150     -     -     -     -     -   -89 |
 MAS1 |     -     -    21   -33  -112     -     -    80     -    45 |
 MATE |     -   162     -  -440   -47     -     -     -     -    99 |
 MBAR |     -   -23     -     -     -     -     -    31     -    -2 |
 MCM4 |     -   245  -199     -     X     -     -     -     -     - |
 MDO1 |     -   -16   -89     -     -     -     -     -     -   107 |
 MEDI |     -    -9     -     -     -     -     -     -     -     7 |
 METS |     -   -42    59     -     -     -     -     -     -   -26 |
 MIZU |     -     -  -103   282     -     -     -     -     -   -15 |
 MSKU |     -    52     -     -   -46     -     -     -     -     - |
 NANO |     -   161     -     -     -     -     -  -199     -     - |
 NISU |     -    70   -81     -    26     -     -     -     -     - |
 NKLG |     -     -     -   -72     -     -     -     -     -    32 |
 NLIB |     -     -   -49     -     -     -     -     1     -    51 |
 NNOR |     -     -   -52     0     -     -     -     -     -    55 |
 NOT1 |     -   -67     -     -     -     -     -     -     -    58 |
 NPLD |     -  -127    67     -     -     -     -     -     -    39 |
 NRC1 |     -   147   -39     -   -72     -     -     -     -   -16 |
 NSSP |     -   -77     -     -     -     -     -     -     -    66 |
 NTUS |     -  -194     -   -88    36     -     -     -     -   171 |
 ONSA |     -   -83    33   272   -84     -     -     -     -     - |
 PERT |     -     -     2     X   -18     -     -    17     -     3 |
 PIE1 |     -     -  -106   415     -     -     -     -     -   -71 |
 PIMO |     -   335     -   459     -     -     -     -     -  -587 |
 POL2 |     -    50     -     -     -     -     -   -62     -     X |
 POTS |     -   -25     -     -   -15     -     -    51     -     X |
 PRDS |     -   -25   -79     -     -     -     -     -     -   105 |
 RIOG |     -   -11   147     -  -170     -     -     -     -    19 |
 SCH2 |     -    72   -13     -     -     -     -  -132     -    44 |
 SEY1 |     -     -     -     -   591     -     -     -     -  -572 |
 SFER |     -    23   -19     -     -     -     -     -     -     - |
 SPT0 |     -  -171    82     -     -     -     -     -     -    62 |
 STJO |     -   119   -40     -   -70     -     -   -60     -    50 |
 STR1 |     -     -    48     -     -     -     -     -     -   -50 |
 SUTH |     -   -99     -     -     -     -     -     -     -    85 |
 THTI |     -     -    89  -133    32     -     -     -     -   -74 |
 TIDB |     -  -186   114   165     -     -     -     -     -   -32 |
 TLSE |     -     -     0     -     -     -     -     7     -    -5 |
 TOW2 |     -   -47     -     -    42     -     -     -     -     X |
 TSKB |     -   -53    -1    56    20     -     -     -     -     3 |
 TWTF |     -  -171    96     -     -     -     -     -     -    45 |
 UNSA |     -     -     -   133    53     -     -     -     -  -110 |
 USN3 |     -    -9     -     -     -     -     -    -8     -    13 |
 USNO |     -    12   -55     -     -     -     -     -     -    49 |
 USUD |     -     -   -73    57     -     -     -    75     -     X |
 VILL |     -   -13     -     X  -107     -     -     -     -   115 |
 WHIT |     -    25     -     -     4     -     -  -161     -    87 |
 WILL |     -    10    44     -     -     -     -     -     -   -55 |
 WTZR |     -   -55   149   -90     -     -     -     -     -   -70 |
 WUHN |     -     -    27     -    14     -     -     -     -   -41 |
 YAR2 |     -   -61    62     -     -     -     -     -     -   -12 |
 YELL |     -     3    34    35  -104     -     -     -     -    48 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  8918    57    27    46    15    29  6635    37  6995    49 |  288   4.22
    2 |   764    75    41    51    37   102  1571    47   700    46 |  288   0.31
    3 |  1535    40    51   123    33    37  2238   122  1651    28 |  288   1.10
    4 |   926   113    53   149    95    59   900   108   888    86 |  288   0.69
    5 |  2558    24    27    24    21    42  5681    27  2415    42 |  288   1.85
    6 |  5190    26    22    62    18    47  6444     X  5199    21 |  288   3.63
    7 |   661    45    34    71    26    49   515    27   732    49 |  288   0.58
    8 |  3217    58    32    84    31    57  2545    28  2773    38 |  288   1.79
    9 |  7091    50    36    41    29    45  8140    42  7072    43 |  288   2.91
   10 |  3204    51    67    40    15    54  2934    60  3196    62 |  288   3.09
   11 |  1623    58    64    84    41    81   463    81  1323    54 |  288   0.50
   13 |  1497    43    51    36    29    70   949    79  1085    54 |  288   0.31
   14 |   633    80    20   102    30    49   411    67   443    44 |  288   0.22
   15 |  5091     X    85     X   118   205  6935   114  5697    85 |  276   3.50
   16 |   746    28    46    72    42    22   391    47   556    32 |  288   0.22
   17 |   773     X    74     X   154   187  4342    66   921    71 |  274   0.73
   18 |  1928    51    47    87    50    74   428    34  1617    87 |  288   0.39
   19 |   837    39    36     X    33    99   536    73   932    47 |  288   0.21
   20 |  1257    54    33    71    49    67   416    35  1015    38 |  288   0.22
   21 |  1131    57    39    70    39    71   387    46   734    38 |  288   0.32
   22 |   856    55    33    76    19    39   401    48  1213    45 |  288   0.18
   23 |   614    53    55    39    18    60   404    80   609    70 |  288   0.32
   24 |  6082   113    36   156    51   125  1693    44  3938   107 |  288   2.00
   25 |  5555    49    30    89    22    30  7665    40  5867    26 |  288   1.68
   26 |  2071    52    31    46    22    48  1184    26  1747    64 |  288   0.46
   27 |   872    68    35    55    39    57  1076    62   783    51 |  288   0.52
   28 |  3192    32    22    64    25    99  2084    54  2768    83 |  288   0.55
   29 |  1712    45    34    80    45    93  1101     -  1746    67 |  288   1.13
   30 |  1450    26    28    32    23    35  1773    35  1616    45 |  288   1.28
   31 |  2872    39    28    61    35    48  3927    37  3355    46 |  288   1.35
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    20    23     -     -     -     -    27     -    16 |  288   0.05
 ALGO |     -    37    34     X     -     -     -    20     -     9 |  288   0.01
 ALRT |     -    19     -     -    17     -     -     -     -     - |  288   5.70
 AMC2 |     -    19    32     -     -     -     -    25     -    24 |  288   0.04
 AREQ |     -    31    25     -    24     -     -     -     -    30 |  288  11.97
 ARTU |     -    26     -    31    18     -     -    15     -     X |  288  12.57
 ASC1 |     -    28     -     -    20     -     -     -     -    28 |  288    >>>
 ASPA |     -     -     -     -    24     -     -    32     -    33 |  276    >>>
 AUCK |     -    27     -     X     -     -     -     -     -    23 |  264   9.56
 BAHR |     -    55    37     -    38     -     -    39     -    52 |  288   0.95
 BAN2 |     -     -    25     -     -     -     -     -     -    26 |  288  14.36
 BOGT |     -    28     -    55    28     -     -     -     -    30 |  288  21.13
 BOR1 |     -    15    18     -     -     -     -     -     -    12 |  288   0.52
 BREW |     -     -    18     -     -     -     -    15     -    17 |  288   0.04
 BRUS |     -    19    15     -     -     -     -     -     -     X |  288   0.03
 CAGZ |     -    14     -     -     -     -     -     -     -    12 |  288   0.38
 CAS1 |     -    29     -    89    24     -     -     -     -    31 |  288   8.18
 CEDU |     -    45     -    77     -     -     -     -     -    19 |  184  12.04
 CHUR |     -    44    38     -     -     -     -    49     -    31 |  284   0.08
 COCO |     -    39     -    83    37     -     -     -     -    46 |  288   9.75
 CRO1 |     -     -    57    70    65     -     -    50     -    15 |  287  13.56
 DAEJ |     -     -    41     -     -     -     -     -     -    43 |  287    >>>
 DAV1 |     -    32     -     -    45     -     -     -     -    29 |  288  15.48
 DGAR |     -    21     -     -    29     -     -    26     -     X |  288  17.72
 DRAO |     -    93    49    56     -     -     -    16     -    25 |  288   0.09
 DWH1 |     -    27    16     -     -     -     -     -     -    18 |  288   0.52
 GLPS |     -    23     -     -    19     -     -     -     -    17 |  288  24.55
 GMAS |     -     -    26     -     -     -     -     -     -    27 |  288   1.86
 GODE |     -     -    17    23     -     -     -     -     -    16 |  288   0.12
 GOL2 |     -     -    16     -     -     -     -     -     -    17 |  282 402.35
 GOLD |     -   115     -   130     -     -     -   112     -    53 |  281  11.06
 GRAZ |     -     -    12     -     -     -     -     -     -    13 |  288    >>>
 GUAM |     -    45     -    66    29     -     -    33     -    27 |  288  17.50
 HLFX |     -     -    32     -     -     -     -    48     -     X |  288  22.86
 HOB2 |     -    24    23    60     -     -     -     -     -    47 |  288   0.05
 HOFN |     -     -     -     -    88     -     -     -     -    85 |  265    >>>
 HRAO |     -    61     -     -     -     -     -    75     -    20 |  288   0.30
 IENG |     -    16    13     -     -     -     -     -     -     - |  288   0.53
 IISC |     -    34     -    66    22     -     -     -     -     - |  288  22.37
 INVK |     -    13     -     -     -     -     -    16     -     X |  288   6.76
 ISPA |     -    28     -     -    22     -     -    57     -    35 |  288  15.32
 JPLM |     -     -    46     -    29     -     -    23     -    20 |  288  17.89
 KERG |     -     -    40   102    21     -     -     -     -    19 |  288   2.25
 KGN0 |     -    41    41     -     -     -     -     -     -    23 |  287   0.62
 KIT3 |     -     -     -    22    19     -     -    20     -    21 |  288  13.84
 KOSG |     -    18     -     -     -     -     -     -     -    15 |  288  26.33
 KOUR |     -     -     -    37    21     -     -     -     -    22 |  285   1.69
 LPGS |     -    37    22    62     -     -     -     -     -    28 |  288  29.00
 MAC1 |     -    45     -    51    28     -     -     -     -    49 |  288  20.48
 MAD2 |     -     -    11     -     -     -     -     -     -    11 |  288   0.03
 MADR |     -     -     -     -     -     -     -    10     -     7 |  288  10.38
 MALI |     -    45     -    35     -     -     -     -     -    41 |  288  16.85
 MAS1 |     -     -    35    32    27     -     -    28     -    23 |  288   1.49
 MATE |     -    24     -    39    22     -     -     -     -    37 |  288   0.06
 MBAR |     -    82     -     -     -     -     -   131     -    38 |  288  15.43
 MCM4 |     -    24    19     -     X     -     -     -     -     - |  287  22.93
 MDO1 |     -    57    46     -     -     -     -     -     -     9 |  288  41.83
 MEDI |     -    19     -     -     -     -     -     -     -    16 |  288   0.04
 METS |     -    31    24     -     -     -     -     -     -    12 |  287   9.09
 MIZU |     -     -    42    77     -     -     -     -     -    19 |  288   0.55
 MSKU |     -    32     -     -    28     -     -     -     -     - |  288  13.73
 NANO |     -    27     -     -     -     -     -    33     -     - |  288  44.52
 NISU |     -    19    25     -    23     -     -     -     -     - |  287   0.06
 NKLG |     -     -     -    51     -     -     -     -     -    22 |  287    >>>
 NLIB |     -     -    24     -     -     -     -    29     -    14 |  288 200.95
 NNOR |     -     -    28   109     -     -     -     -     -    42 |  288  17.37
 NOT1 |     -    23     -     -     -     -     -     -     -    20 |  288   0.15
 NPLD |     -    16    19     -     -     -     -     -     -    15 |  287   0.04
 NRC1 |     -    20    24     -    15     -     -     -     -    11 |  288   0.03
 NSSP |     -    12     -     -     -     -     -     -     -    10 |  288   9.33
 NTUS |     -    51     -    77    31     -     -     -     -    26 |  288   9.35
 ONSA |     -    44    76    48    36     -     -     -     -     - |  288   0.05
 PERT |     -     -    30     X    32     -     -    28     -    28 |  288   1.71
 PIE1 |     -     -    26    29     -     -     -     -     -    25 |  288   0.07
 PIMO |     -    87     -   116     -     -     -     -     -    61 |  287  20.51
 POL2 |     -    17     -     -     -     -     -    21     -     X |  288  11.53
 POTS |     -    20     -     -    24     -     -    21     -     X |  288  13.71
 PRDS |     -    17    18     -     -     -     -     -     -    16 |  288   1.69
 RIOG |     -    27    19     -    30     -     -     -     -    23 |  288  12.22
 SCH2 |     -    20    21     -     -     -     -    20     -    15 |  288  43.83
 SEY1 |     -     -     -     -    17     -     -     -     -    17 |  288  16.24
 SFER |     -    20    16     -     -     -     -     -     -     - |  285   0.61
 SPT0 |     -    46    58     -     -     -     -     -     -    25 |  288   0.07
 STJO |     -    28    24     -    30     -     -    22     -    15 |  288   0.05
 STR1 |     -     -    24     -     -     -     -     -     -    25 |  288   0.77
 SUTH |     -    24     -     -     -     -     -     -     -    20 |  288  15.39
 THTI |     -     -    47    36    62     -     -     -     -    56 |  276   8.74
 TIDB |     -    22    34    50     -     -     -     -     -    29 |  288   0.13
 TLSE |     -     -    10     -     -     -     -    16     -     9 |  287   0.42
 TOW2 |     -    31     -     -    27     -     -     -     -     X |  288  13.39
 TSKB |     -    33    38    55    25     -     -     -     -    29 |  288   0.94
 TWTF |     -    32    27     -     -     -     -     -     -    22 |  288   0.08
 UNSA |     -     -     -    59    48     -     -     -     -    47 |  288  18.66
 USN3 |     -    14     -     -     -     -     -    21     -    13 |  288   0.04
 USNO |     -    26    35     -     -     -     -     -     -    25 |  288   0.02
 USUD |     -     -    40    56     -     -     -    53     -     X |  288   9.35
 VILL |     -    29     -     X    18     -     -     -     -    19 |  288   1.71
 WHIT |     -    94     -     -    37     -     -    23     -    37 |  288  43.75
 WILL |     -    33    50     -     -     -     -     -     -    28 |  288  10.46
 WTZR |     -    28    16    29     -     -     -     -     -    33 |  288   0.05
 WUHN |     -     -    42     -    24     -     -     -     -    30 |  287  13.38
 YAR2 |     -    29    34     -     -     -     -     -     -    21 |  288   4.54
 YELL |     -    60    69    61    66     -     -     -     -    72 |  288   0.06
 -----+-------------------------------------------------------------+--------------
 TOT  |  3274    45    37    71    40    78  3464    52  3004    39 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288    9.95   | 3.93e-14  6.30e-15  2.29e-15 |
 BRUS |   288     0     0   288    9.95   | 3.71e-14  7.12e-15  2.49e-15 |
 NPLD |   287     0     0   286    9.88   | 3.67e-14  6.73e-15  2.20e-15 |
 NRC1 |   288     0     0   288    8.18   | 2.27e-14  5.67e-15  1.72e-15 |
 ONSA |   288     0     0   288    7.30   | 5.60e-14  1.10e-14  4.48e-15 |
 NISU |   287     0     0   286    6.33   | 4.98e-14  6.74e-15  3.66e-15 |
 CHUR |   284     0     0   283    6.10   | 4.90e-14  9.49e-15  4.12e-15 |
 ALBH |   288     0     0   288    5.66   | 3.35e-14  1.07e-14  3.72e-15 |
 AMC2 |   288     0     0   288    5.35   | 3.34e-14  6.21e-15  2.25e-15 |
 MAD2 |   288     0     0   288    4.08   | 4.31e-14  9.19e-15  2.79e-15 |
 WTZR |   288     0     0   288    3.67   | 3.67e-14  2.66e-14  3.92e-15 |
 NLIB |   288     1     0   287    2.92   | 3.36e-14  5.22e-15  5.08e-15 |
 ALGO |   288     0     0   288    2.88   | 3.52e-14  5.99e-15  3.32e-15 |
 HOB2 |   288     0     0   288    2.54   | 4.52e-14  1.60e-14  6.84e-15 |
 SPT0 |   288     1     0   287    2.32   | 4.15e-14  1.00e-14  3.67e-15 |
 USN3 |   288     0     0   288    2.05   | 7.67e-14  1.11e-14  2.65e-15 |
 DRAO |   288     1     0   287    1.78   | 5.36e-14  1.82e-14  6.61e-15 |
 YELL |   288     0     0   288    1.51   | 4.26e-14  1.17e-14  3.79e-15 |
 PIE1 |   288     0     0   288    1.44   | 3.76e-14  8.23e-15  5.94e-15 |
 GOL2 |   282     1     0   280    1.10   | 3.59e-14  6.09e-15  3.89e-15 |
 MATE |   288     0     0   288    0.98   | 4.67e-14  9.06e-15  5.33e-15 |
 TIDB |   288     0     0   288    0.97   | 1.65e-13  1.88e-14  8.60e-15 |
 BREW |   288     0     0   288    0.61   | 4.07e-14  8.50e-15  2.14e-15 |
 NOT1 |   288     0     0   143    0.42   | 5.10e-14  1.33e-14  1.16e-14 |
 GODE |   288     0     0   288    0.40   | 3.97e-14  8.32e-15  8.15e-15 |
 MEDI |   288     0     0   143    0.18   | 3.55e-14  1.04e-14  6.25e-15 |
 TWTF |   288     0     0   288    0.16   | 4.23e-14  9.16e-15  3.27e-15 |
 HRAO |   288     1     0   287    0.10   | 1.21e-13  3.75e-14  2.34e-14 |
 SFER |   285     0     0   283    0.09   | 3.57e-13  9.52e-14  3.68e-14 |
 MIZU |   288     1     0   287    0.08   | 3.63e-13  9.67e-14  4.69e-14 |
 G26  |   288     1     0   287    0.08   | 3.85e-13  1.12e-13  4.51e-14 |
 G27  |   288     1     0   287    0.08   | 3.49e-13  1.00e-13  5.67e-14 |
 KGN0 |   287     0     0   286    0.08   | 3.64e-13  1.22e-13  6.20e-14 |
 G30  |   288     1     0   287    0.07   | 2.94e-13  9.37e-14  1.09e-13 |
 G07  |   288     1     0   287    0.06   | 3.04e-13  8.23e-14  6.39e-14 |
 BAHR |   288     1     0   287    0.06   | 4.26e-13  6.94e-14  5.67e-14 |
 G04  |   288     1     0   287    0.05   | 4.40e-13  1.36e-13  5.49e-14 |
 DWH1 |   288     1     0   287    0.05   | 5.05e-13  1.48e-13  4.54e-14 |
 G28  |   288     1     1   143    0.05   | 5.92e-13  7.10e-14  3.61e-14 |
 BOR1 |   288     1     0   287    0.05   | 4.81e-13  1.44e-13  5.14e-14 |
 G17  |   274     1     0   269    0.04   | 4.12e-13  1.15e-13  7.75e-14 |
 G02  |   288     1     6    46    0.04   | 5.91e-13  6.71e-14  2.48e-14 |
 G14  |   288     1     5    35    0.04   | 6.30e-13  7.07e-14  2.15e-14 |
 G11  |   288     1     3    87    0.04   | 5.88e-13  7.37e-14  5.75e-14 |
 IENG |   288     1     0   287    0.04   | 5.58e-13  1.67e-13  3.80e-14 |
 TLSE |   287     0     0   142    0.04   | 3.97e-13  1.03e-13  2.50e-14 |
 G31  |   288     1     0   287    0.04   | 2.23e-13  1.25e-13  1.22e-13 |
 STR1 |   288     1     0   287    0.02   | 6.40e-13  1.96e-13  6.82e-14 |
 G29  |   288     1     0   287    0.02   | 4.39e-13  1.48e-13  1.50e-13 |
 TSKB |   288     1     0   287    0.01   | 9.41e-13  2.64e-13  9.08e-14 |
 G03  |   288     1     0   287    0.01   | 1.20e-12  3.31e-13  1.18e-13 |
 GMAS |   288     1     0   287    0.01   | 1.21e-12  3.94e-13  2.10e-13 |
 STJO |   288     0     0   288    0.01   | 9.28e-14  1.40e-14  3.92e-15 |
 KOUR |   285     1     0   284    0.01   | 1.37e-12  3.88e-13  1.64e-13 |
 G06  |   288     1     0   287    0.01   | 6.55e-13  2.31e-13  2.56e-13 |
 G08  |   288     1     0   287    0.00   | 1.40e-12  3.86e-13  1.53e-13 |
 PRDS |   288     1     0   287    0.00   | 1.54e-12  4.60e-13  1.52e-13 |
 KERG |   288     1     0   287    0.00   | 1.29e-12  3.62e-13  2.51e-13 |
 G05  |   288     1     0   287    0.00   | 1.41e-12  4.52e-13  1.78e-13 |
 MAS1 |   288     1     0   287    0.00   | 1.98e-12  3.93e-13  9.56e-14 |
 CAGZ |   288     1     2     8    0.00   | 6.33e-13  1.19e-13  2.66e-14 |
 GPST |   288     0     0     0    0.00   | 2.88e-14  5.58e-15  2.47e-15 |
 CEDU |   184     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   265     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 G25  |   288     1     0     0    0.00   | 1.28e-12  4.71e-13  1.68e-13 |
 G24  |   288     1     0     0    0.00   | 1.21e-12  3.93e-13  2.28e-13 |
 G23  |   288     1     3     0    0.00   | 5.49e-13  5.69e-14  2.60e-14 |
 G22  |   288     1     6     0    0.00   | 6.02e-13  6.18e-14  1.39e-14 |
 G21  |   288     1     6     0    0.00   | 1.23e-12  1.34e-13  2.74e-14 |
 G20  |   288     1     6     0    0.00   | 6.56e-13  8.65e-14  1.98e-14 |
 G19  |   288     1     4     0    0.00   | 5.38e-13  5.64e-14  1.89e-14 |
 G18  |   288     2     6     0    0.00   | 1.72e-12  1.71e-13  6.36e-14 |
 G16  |   288     1     5     0    0.00   | 4.88e-13  5.14e-14  2.80e-14 |
 G15  |   276     1     0     0    0.00   | 1.58e-12  5.02e-13  3.36e-13 |
 G13  |   288     1     3     0    0.00   | 5.64e-13  5.60e-14  1.87e-14 |
 G10  |   288     1     0     0    0.00   | 1.14e-12  3.73e-13  2.80e-13 |
 G09  |   288     1     0     0    0.00   | 1.47e-12  3.94e-13  3.29e-13 |
 G01  |   288     1     0     0    0.00   | 1.58e-12  6.92e-13  3.96e-13 |
 YAR2 |   288     1     0     0    0.00   | 7.88e-13  1.06e-12  3.83e-13 |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     1     1     0    0.00   | 5.94e-13  9.79e-13  2.85e-12 |
 VILL |   288     1     0     0    0.00   | 1.13e-12  5.46e-13  1.75e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   276     1     0     0    0.00   | 3.83e-13  2.63e-13  6.39e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   287     0     0     0    0.00   |        -         -         - |
 PERT |   288     1     0     0    0.00   | 1.60e-12  6.36e-13  1.75e-13 |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 NANO |   288     0     0     0    0.00   |        -         -         - |
 MSKU |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   287     1     0     0    0.00   | 6.50e-13  4.35e-13  1.68e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.44e-13  8.21e-13  1.45e-12 |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     1     1     0    0.00   | 5.95e-13  5.06e-13  1.65e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 INVK |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HLFX |   288     1     1     0    0.00   | 1.87e-13  3.50e-13  1.35e-12 |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   281     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   287     0     0     0    0.00   |        -         -         - |
 COCO |   288     1     0     0    0.00   | 2.70e-13  1.46e-12  9.85e-13 |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   276     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.09e-17  2.51e-16  1.51e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      NLIB      NRC1 |
------------------------------------------+------------------------------+
