
 GPS week: 1302   Day: 3   MJD: 53361                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2869      0     0.02    -0.07     2.97     0.00      0
 cod |   288     0  28052    924     0.02     0.32     0.04    17.43      0
 emr |   288     0  26326      1  1606.27    50.37     0.04    19.42      0
 esa |   288     0  18803   2835  1604.98    50.42     0.08     7.35      0
 gfz |   288     0  21285    779    -0.26    -0.26     0.04    19.62      0
 iga |    96     0   2869     10    -0.02     0.01     0.15     0.00      0
 igu |    96     1   2869    123 15370.97   488.60     2.81     0.00      0
 jpl |   288     0  17379     64    -5.52     0.27     0.04    19.31      0
 ngs |    96     0   2869      0     0.03    -0.07     2.72     0.00      0
 usn |   288     0  37354   2885  1606.30    50.31     0.04    16.88      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------------+
    1 | -3870   -12  -100  -102    32   -61-12429   115 -3388     4 |
    2 |  4032    30    -4   -83     9     4     6    23  4258   -26 |
    3 |  4140  -127   -36    -4   -51    46  4850   166  4323    44 |
    4 |   207     X   -49     X   -53  -175 -3599   133   220   -35 |
    5 | -5263   -88    93    63    42   117  8652   -50 -5210   -34 |
    6 |  1440     2  -117   215    65  -186     X   -70   806    42 |
    7 | -3408    13  -148   -85    97    69  -417   143 -3175   -83 |
    8 |  2166    12   -35   -37   109    18 -1470   -45  2005   -32 |
    9 |  1656     0   -80    65    77  -105  7777   -10  1044   -14 |
   10 | -7121    43   -64   -82     9    50  5875   101 -7256   -61 |
   11 |  1405    73   -42  -114    24     9  -409     6  1994   -12 |
   13 |  2664   173   -31    10   -75   -44 -1054    11  2816   -73 |
   14 |  3610    15    45  -118    28   -50  -836     5  3627   -55 |
   15 |  5090     X    -1     X   -95   -37 13826   113  4459   -21 |
   16 |  4460  -156   -31   101   -70    21  -110   221  4489   -18 |
   17 | -3085   -65   -91   141    61   -32   608   176 -3394  -148 |
   18 |  5295    26    54   -53    16   -72  3944   -13  5278   -69 |
   19 |  4174    32  -314  -156   192   833  1469   118  4268    34 |
   20 |  2010    12  -210  -340   158   -18  -331   164  2479     5 |
   21 |  4590   -97    78   348    16    94  1019   -22  5080  -133 |
   22 | -2881   -73    85    94    28  -139 -3504   -29 -2698   -62 |
   23 | -1478    85  -146  -134   129  -129 -3216   -65 -1491    64 |
   24 | -4384    94   -67   -28   -54     6 -4516    53 -5628    12 |
   25 | -8573  -171    38   -15    -3  -160-14043   102 -8420    26 |
   26 |   -19    65   -41    -6    15    32 -2513    -7  -538   -26 |
   27 | -3557    20  -133  -161    62   -75   183    79 -3416    41 |
   28 |   -63    74    11  -193    59    59  5004    -2   510   -71 |
   29 | -5324     0    88   -75   -55   -21   804   -19 -5130    16 |
   30 | -2028   -57    21   240   137    39 -2916  -149 -1997   -59 |
   31 |  4490    11  -122  -207    82   -69 -2050    81  4404    31 |
 -----+-------------------------------------------------------------+
 ALBH |     -   189  -112     -     -     -     -    -2     -   -65 |
 ALGO |     -     -    -2     X     -     -     -    33     -   -34 |
 ALIC |     -   -45     -     -     -     -     -    41     -     - |
 AMC2 |     -   -27   145     -     -     -     -  -224     -   118 |
 AREQ |     -     -   105     -   -59     -     -   -18     -   -32 |
 ARTU |     -   194     -   261   -93     -     -  -181     -     X |
 ASPA |     -     -     -     -    33     -     -  -176     -   157 |
 AUCK |     -   -50     -     X     -     -     -     -     -    52 |
 BAHR |     -    15   -43     -    58     -     -     -     -   -34 |
 BAN2 |     -     -    41     -     -     -     -     -     -   -47 |
 BILI |     -    68     -     -   -60     -     -     -     -     X |
 BOGT |     -    68     -   204     -     -     -     -     -  -159 |
 BOR1 |     -     X    15     -     -     -     -     -     -   -17 |
 BRUS |     -   -29    40     -     -     -     -     -     -   -15 |
 CAGZ |     -   145     -     -     -     -     -     -     -  -150 |
 CAS1 |     -    -6     -   -96   -13     -     -     -     -    64 |
 CEDU |     -     -     -     X     -     -     -    37     -   -43 |
 CHAT |     -     -     -     -   -78     -     -     -     -    91 |
 CHUR |     -    59     3     -     -     -     -  -155     -   116 |
 COCO |     -   -67     -   142   -46     -     -     -     -    60 |
 CRO1 |     -     -    -3    29    26     -     -    10     -   -50 |
 DAEJ |     -     -   -55     -     -     -     -     -     -    63 |
 DAKA |     -     -     -     -    76     -     -   -78     -     - |
 DAV1 |     -  -101     -     -   -21     -     -    67     -    51 |
 DGAR |     -   -64     -     -     -     -     -    57     -     X |
 DRAO |     -   118   -84   174     -     -     -   -23     -   -75 |
 DWH1 |     -   271   -76     -     -     -     -     -     -  -196 |
 FORT |     -    26    -5  -125    29     -     -     -     -     X |
 GLPS |     -   -13     -     -    -3     -     -     -     -    17 |
 GMAS |     -     -    71     -     -     -     -     -     -   -82 |
 GODE |     -    14    13   242     -     -     -     -     -  -134 |
 GODZ |     -     -     -     -     -     -     -   -83     -    95 |
 GOL2 |     -     -    64     -     -     -     -     -     -   -73 |
 GOLD |     -    86     -  -140     -     -     -   -79     -    51 |
 GRAZ |     -     -   -26     -     -     -     -     -     -    30 |
 GUAM |     -     -     -     X     X     -     -   -47     -    54 |
 HARB |     -    32     -     -     -     -     -     -     -   -33 |
 HERS |     -   -98    88     -     -     -     -     -     -     X |
 HLFX |     -     -   260     -     -     -     -  -262     -     X |
 HOB2 |     -  -104   192   137     -     -     -     -     -  -173 |
 HOFN |     -     -     -     -  -179     -     -     -     -   208 |
 HRAO |     -     -     -     -     -     -     -    15     -   -17 |
 IENG |     -   -77    70     -     -     -     -     -     -     - |
 IISC |     -     -     -  -153    58     -     -     -     -     - |
 ISPA |     -   -28     -     -    -5     -     -   -17     -    55 |
 JPLM |     -     -    57     -  -104     -     -   -44     -   107 |
 KERG |     -     -   -19  -144     9     -     -     -     -    74 |
 KGN0 |     -    20    -3     -     -     -     -     -     -   -18 |
 KIT3 |     -     -     -   -64    12     -     -   -71     -    96 |
 KOUR |     -    99     -  -546    15     -     -     -     -   109 |
 LAE1 |     -  -127     -     -    45     -     -     -     -    78 |
 LPGS |     -   -18   102  -325     -     -     -     -     -    42 |
 MAC1 |     -    55     -   -12   -44     -     -     -     -     X |
 MAD2 |     -     -     6     -     -     -     -     -     -    -7 |
 MAS1 |     -     -    21  -116   -40     -     -    23     -    48 |
 MATE |     -   115     -  -333     -     -     -     -     -    27 |
 MAW1 |     -     -     -     -   -99     -     -     -     -   115 |
 MBAR |     -   -77     -     -   -78     -     -    46     -   118 |
 MCM4 |     -   227  -203     -     X     -     -     -     -     - |
 MDO1 |     -     -   -25     -     -     -     -     -     -    29 |
 MEDI |     -     -    50     -     -     -     -     -     -   -57 |
 MIZU |     -     -  -148   547     -     -     -     -     -   -56 |
 NISU |     -    56   -51     -     X     -     -     -     -     - |
 NLIB |     -     -    64     -     -     -     -     -     -   -74 |
 NNOR |     -     -    63  -111     -     -     -     -     -   -24 |
 NPLD |     -  -110    82     -     -     -     -     -     -    20 |
 NRC1 |     -    72   -14     -  -119     -     -     -     -    80 |
 NRIL |     -    12     -     -   -22     -     -    12     -     X |
 NSSP |     -   -30     -     -     -     -     -     -     -    31 |
 NTUS |     -  -155     -    -7     -     -     -     -     -   163 |
 NYA1 |     -    82     -     -  -119     -     -     -     -    52 |
 ONSA |     -  -106   102   160   -64     -     -     -     -     - |
 PERT |     -     -   -35     X    65     -     -    -6     -   -29 |
 PIE1 |     -     -    57     X     -     -     -     -     -   -65 |
 POL2 |     -    55     -     -     -     -     -     -     -   -57 |
 POTS |     -  -124     -     -   110     -     -     -     -     X |
 PRDS |     -     -   -13     -     -     -     -     -     -    15 |
 PTBB |     -   -53    68     -     -     -     -     -     -   -24 |
 QAQ1 |     -  -109     -     -     -     -     -     -     -   112 |
 REYK |     -   -19     -     -     -     -     -     -     -    20 |
 RIOG |     -    -7   131     -  -120     -     -     -     -    -5 |
 SCH2 |     -    -2    92     -     -     -     -  -166     -    85 |
 SFER |     -     1    -1     -     -     -     -     -     -     - |
 SPT0 |     -  -151    47     -     -     -     -     -     -   102 |
 STJO |     -    86   -24     -   -94     -     -     3     -    44 |
 STR1 |     -     -    86     -     -     -     -     -     -   -99 |
 SUTH |     -   -68     -     -     -     -     -     -     -    71 |
 SUWN |     -     -   -55     -     -     -     -     -     -    63 |
 THTI |     -     -  -126   165   181     -     -     -     -  -137 |
 THU3 |     -     -     -     -    51     -     -     -     -   -59 |
 TID1 |     -     -     -     -     -     -     -   -30     -    34 |
 TIDB |     -  -128   102   239     -     -     -     -     -   -90 |
 TLSE |     -     -    39     -     -     -     -     -     -   -45 |
 TRO1 |     -   151     -     -  -106     -     -     -     -   -33 |
 TSKB |     -  -140   -28   425    20     -     -     -     -   -31 |
 TWTF |     -   -40    39     -     -     -     -     -     -    -3 |
 UNSA |     -     -     -   -99   -54     -     -     -     -   106 |
 USN3 |     -    42     -     -     -     -     -   -17     -   -24 |
 USNO |     -   -57    33     -     -     -     -     -     -    21 |
 USUD |     -     -  -102   214     -     -     -    21     -     X |
 VILL |     -    13     -     X   -65     -     -     -     -    62 |
 WHIT |     -    18     -     -   -78     -     -     -     -    71 |
 WILL |     -    42    43     -     -     -     -     -     -   -92 |
 WTZR |     -   -27    82    39     -     -     -     -     -   -83 |
 WUHN |     -   -77    24     -    99     -     -     -     -   -63 |
 YAKT |     -   -26     -     -     -     -     -     -     -    27 |
 YAR2 |     -  -157   118     -     -     -     -     -     -    26 |
 YEBE |     -     -    51     -     -     -     -     -     -   -58 |
 YELL |     -   154   -51     X  -157     -     -     -     -    90 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5998    56    48    32    30    71  6893    45  5941    68 |  288   5.55
    2 |  3039    68    37    36    32   135   337    25  2986    39 |  288   0.26
    3 |  3554    30    24    67    43    34  2789    46  3585    34 |  288   2.28
    4 |   781     X    88     X   129   226   967    84   654    74 |  276   0.83
    5 |  2176    20    40    25    23   373  4072    24  2196    34 |  288   1.50
    6 |  4188    24    37    36    26    85     X    39  3238    43 |  285   2.34
    7 |   974    28    47    71    29    39   446    24   915    70 |  288   0.68
    8 |  3252    39    32   111    43    53  3411    33  2623    78 |  288   1.95
    9 |  4336    53    27    45    16   104  2623    54  4082    63 |  288   2.21
   10 |  3859    33    49    45    32    45  2963    28  3695    52 |  288   2.48
   11 |  1696    58    37    48    21    55   550    22  1708    49 |  288   0.47
   13 |   743    50    31   137    27    67   496    35   573    40 |  288   0.21
   14 |   393    60    46    42    15    54   812    28   552    41 |  288   0.36
   15 |  4943     X    87     X   115   330  6111    86  4570    91 |  273   2.88
   16 |   760    46    42   139    42    40   487   126   638    53 |  288   0.29
   17 |  3115   124    97   141   111   363  2051   105  3151   130 |  288   1.16
   18 |   922    49    34    58    37    55  1785    22   933    56 |  288   0.34
   19 |  1171    41    47   144    51   127   347    48  1098    43 |  288   0.20
   20 |  1011    43    33    91    33   113   378    31   887    81 |  288   0.23
   21 |  2586    63    47    51    23    85   894    27  2157    77 |  288   0.47
   22 |   722    51    29    58    22    63  1942    21   772    29 |  288   0.19
   23 |   912   102    66   142    50    78  1841    41   989    45 |  288   0.28
   24 |  6613   114    69   144    30   242  2956    42  4785    64 |  288   1.85
   25 |  2405    51    35   141    27    78  6220    32  2364    37 |  288   2.59
   26 |  2493    55    49    85    21    56  1791    25  2277    60 |  288   1.11
   27 |  1723    45    44    90    42    42   830    24  1585    63 |  288   0.77
   28 |  1851    27    51    33    30    50  3295    44  1822   101 |  288   0.55
   29 |  1184    63    50    67    60   282   745    51  1222    76 |  288   0.76
   30 |  1935    22    53    41    28   108  2242    31  2024   106 |  288   0.28
   31 |  4948    34    47    41    33    29  3170    25  5071    62 |  288   1.65
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    32    19     -     -     -     -    25     -    16 |  288   0.07
 ALGO |     -     -    20     X     -     -     -    21     -    11 |  288   0.04
 ALIC |     -    25     -     -     -     -     -    23     -     - |  288  11.98
 AMC2 |     -    43    36     -     -     -     -    13     -    34 |  288   0.03
 AREQ |     -     -    35     -    24     -     -    25     -    48 |  288  16.53
 ARTU |     -    41     -   100    59     -     -    21     -     X |  284  10.92
 ASPA |     -     -     -     -    30     -     -    25     -    22 |  288    >>>
 AUCK |     -    67     -     X     -     -     -     -     -    69 |  264  12.82
 BAHR |     -    48    38     -    25     -     -     -     -    32 |  288   0.52
 BAN2 |     -     -    29     -     -     -     -     -     -    33 |  288  18.18
 BILI |     -    23     -     -    21     -     -     -     -     X |  287   7.83
 BOGT |     -    20     -    39     -     -     -     -     -    19 |  288  18.47
 BOR1 |     -     X    18     -     -     -     -     -     -    21 |  288   8.95
 BRUS |     -    28    35     -     -     -     -     -     -    22 |  288   0.08
 CAGZ |     -    80     -     -     -     -     -     -     -    82 |  284   0.61
 CAS1 |     -    14     -    88    33     -     -     -     -    59 |  288   6.37
 CEDU |     -     -     -     X     -     -     -    27     -    31 |  288  13.54
 CHAT |     -     -     -     -    23     -     -     -     -    27 |  239  11.78
 CHUR |     -    24    18     -     -     -     -    37     -    38 |  286   0.05
 COCO |     -    30     -    79    29     -     -     -     -    42 |  288  10.38
 CRO1 |     -     -    15    60    41     -     -    26     -    26 |  284  15.96
 DAEJ |     -     -    26     -     -     -     -     -     -    30 |  287    >>>
 DAKA |     -     -     -     -    28     -     -    28     -     - |  288  16.56
 DAV1 |     -    31     -     -    16     -     -    27     -    19 |  288  13.49
 DGAR |     -    32     -     -     -     -     -    29     -     X |  288  14.64
 DRAO |     -    43    34    40     -     -     -    15     -    36 |  288   0.04
 DWH1 |     -    45    34     -     -     -     -     -     -    72 |  288   0.41
 FORT |     -    55    35    84    41     -     -     -     -     X |  279   0.08
 GLPS |     -    57     -     -    32     -     -     -     -    35 |  284  21.65
 GMAS |     -     -    29     -     -     -     -     -     -    34 |  288   1.49
 GODE |     -    33    23    34     -     -     -     -     -    22 |  288   0.14
 GODZ |     -     -     -     -     -     -     -    12     -    14 |  288  12.56
 GOL2 |     -     -    13     -     -     -     -     -     -    15 |  286   0.14
 GOLD |     -    25     -   135     -     -     -    25     -    29 |  288   9.67
 GRAZ |     -     -    28     -     -     -     -     -     -    32 |  288    >>>
 GUAM |     -     -     -     X     X     -     -    41     -    47 |  174  10.39
 HARB |     -    26     -     -     -     -     -     -     -    27 |  287  27.84
 HERS |     -    44    40     -     -     -     -     -     -     X |  239  10.35
 HLFX |     -     -    37     -     -     -     -    37     -     X |  288   6.76
 HOB2 |     -    42    56    63     -     -     -     -     -    18 |  288   0.04
 HOFN |     -     -     -     -    24     -     -     -     -    28 |  287    >>>
 HRAO |     -     -     -     -     -     -     -    34     -    39 |  288   0.20
 IENG |     -    24    21     -     -     -     -     -     -     - |  288   0.46
 IISC |     -     -     -    98    37     -     -     -     -     - |  286  21.53
 ISPA |     -    37     -     -    33     -     -    39     -    67 |  288  12.61
 JPLM |     -     -    36     -    16     -     -    16     -    26 |  288  10.57
 KERG |     -     -    36    79    31     -     -     -     -    23 |  288   1.57
 KGN0 |     -    14    23     -     -     -     -     -     -    20 |  287   0.44
 KIT3 |     -     -     -    31    13     -     -    28     -    36 |  288  11.83
 KOUR |     -    40     -    38    44     -     -     -     -    37 |  288   1.49
 LAE1 |     -    42     -     -    45     -     -     -     -    18 |  287  16.36
 LPGS |     -    38    37    47     -     -     -     -     -    60 |  288  29.08
 MAC1 |     -    21     -    59    19     -     -     -     -     X |  288  18.17
 MAD2 |     -     -    24     -     -     -     -     -     -    28 |  288   0.08
 MAS1 |     -     -    39    34    25     -     -    34     -    21 |  288   2.90
 MATE |     -    18     -    40     -     -     -     -     -    20 |  288   0.15
 MAW1 |     -     -     -     -    11     -     -     -     -    13 |  287   7.38
 MBAR |     -    27     -     -    22     -     -    24     -    26 |  288  13.26
 MCM4 |     -    32    29     -     X     -     -     -     -     - |  288  37.27
 MDO1 |     -     -    33     -     -     -     -     -     -    38 |  288  21.28
 MEDI |     -     -    21     -     -     -     -     -     -    25 |  288   0.09
 MIZU |     -     -    26    74     -     -     -     -     -    25 |  288   0.35
 NISU |     -    75    67     -     X     -     -     -     -     - |  286   0.07
 NLIB |     -     -    65     -     -     -     -     -     -    75 |  288   0.03
 NNOR |     -     -    22    66     -     -     -     -     -    31 |  287  19.27
 NPLD |     -    47    40     -     -     -     -     -     -    15 |  287   0.04
 NRC1 |     -    46    14     -    36     -     -     -     -    19 |  288   0.04
 NRIL |     -    24     -     -    12     -     -    19     -     X |  288 707.41
 NSSP |     -    26     -     -     -     -     -     -     -    27 |  288   8.35
 NTUS |     -    22     -    35     -     -     -     -     -    20 |  288   9.89
 NYA1 |     -    27     -     -    24     -     -     -     -    25 |  288    >>>
 ONSA |     -    26    64    37    42     -     -     -     -     - |  288   0.07
 PERT |     -     -    32     X    16     -     -    36     -    26 |  288   1.25
 PIE1 |     -     -    43     X     -     -     -     -     -    49 |  288   0.05
 POL2 |     -    32     -     -     -     -     -     -     -    33 |  288  10.66
 POTS |     -    22     -     -    19     -     -     -     -     X |  280  15.88
 PRDS |     -     -    20     -     -     -     -     -     -    23 |  288   2.98
 PTBB |     -    30    49     -     -     -     -     -     -    30 |  288   0.20
 QAQ1 |     -    22     -     -     -     -     -     -     -    22 |  287   7.37
 REYK |     -    21     -     -     -     -     -     -     -    21 |  283   6.68
 RIOG |     -    35    33     -    31     -     -     -     -    50 |  288  11.32
 SCH2 |     -    44    17     -     -     -     -    17     -    27 |  288  56.02
 SFER |     -    38    34     -     -     -     -     -     -     - |  285   0.42
 SPT0 |     -    32    39     -     -     -     -     -     -    43 |  288   0.06
 STJO |     -    32    32     -    25     -     -    15     -    16 |  288   0.07
 STR1 |     -     -    23     -     -     -     -     -     -    26 |  288   0.56
 SUTH |     -    27     -     -     -     -     -     -     -    28 |  288  10.76
 SUWN |     -     -    19     -     -     -     -     -     -    22 |  286   1.03
 THTI |     -     -    29    82    24     -     -     -     -    28 |  288   9.13
 THU3 |     -     -     -     -    19     -     -     -     -    22 |  276   6.92
 TID1 |     -     -     -     -     -     -     -    17     -    20 |  288   0.11
 TIDB |     -    40    47    53     -     -     -     -     -    19 |  288   0.14
 TLSE |     -     -    38     -     -     -     -     -     -    43 |  287   0.35
 TRO1 |     -    23     -     -    39     -     -     -     -    46 |  288   8.35
 TSKB |     -    22    15    73    27     -     -     -     -    19 |  288   1.33
 TWTF |     -    21    17     -     -     -     -     -     -    27 |  288   0.15
 UNSA |     -     -     -    43    20     -     -     -     -    20 |  288  21.82
 USN3 |     -    44     -     -     -     -     -    26     -    25 |  288   0.05
 USNO |     -    26    17     -     -     -     -     -     -    29 |  288   0.05
 USUD |     -     -    33    59     -     -     -    40     -     X |  288   8.76
 VILL |     -    23     -     X    26     -     -     -     -    18 |  287   4.21
 WHIT |     -    33     -     -    29     -     -     -     -    21 |  288   2.62
 WILL |     -    27    31     -     -     -     -     -     -    19 |  288 111.83
 WTZR |     -    30    39    65     -     -     -     -     -    22 |  288   0.06
 WUHN |     -    26    24     -    33     -     -     -     -    20 |  287  16.25
 YAKT |     -    86     -     -     -     -     -     -     -    89 |  288   0.61
 YAR2 |     -    38    28     -     -     -     -     -     -    18 |  288   6.60
 YEBE |     -     -    20     -     -     -     -     -     -    23 |  288 105.08
 YELL |     -    29    45     X    66     -     -     -     -    53 |  286   0.12
 -----+-------------------------------------------------------------+--------------
 TOT  |  2965    44    40    77    39   151  2810    39  2724    44 |


 BEST CLOCK FIT: AMC2   288   0.03 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288    9.95   | 4.29e-14  7.54e-15  1.83e-15 |
 BRUS |   288     0     0   288    9.95   | 3.16e-14  5.09e-15  2.41e-15 |
 NPLD |   287     0     0   286    9.88   | 3.65e-14  5.56e-15  2.17e-15 |
 NISU |   286     0     0   285    9.09   | 5.09e-14  8.03e-15  3.01e-15 |
 AMC2 |   288     0     0   288    7.30   | 4.32e-14  6.07e-15  3.59e-15 |
 CHUR |   286     0     0   284    6.04   | 4.66e-14  9.66e-15  3.37e-15 |
 ONSA |   288     0     0   288    5.94   | 4.24e-14  9.01e-15  1.63e-15 |
 MAD2 |   288     0     0   288    4.26   | 3.64e-14  6.20e-15  5.44e-15 |
 ALBH |   288     0     0   288    3.90   | 4.01e-14  8.90e-15  2.81e-15 |
 SPT0 |   288     0     0   288    3.77   | 4.03e-14  6.67e-15  2.83e-15 |
 WTZR |   288     0     0   288    3.67   | 4.23e-14  6.75e-15  3.01e-15 |
 NLIB |   288     0     0   288    3.64   | 6.17e-14  9.83e-15  2.87e-15 |
 ALGO |   288     1     0   287    3.62   | 3.64e-14  6.89e-15  4.91e-15 |
 USN3 |   288     0     0   248    2.98   | 8.03e-14  1.14e-14  2.95e-15 |
 NRC1 |   288     1     0   287    1.74   | 2.93e-14  6.55e-15  1.59e-15 |
 MATE |   288     0     0   288    1.74   | 3.52e-14  9.67e-15  1.52e-14 |
 TID1 |   288     0     0   288    1.69   | 5.09e-14  1.12e-14  8.31e-15 |
 YELL |   286     0     0   285    1.62   | 4.10e-14  8.41e-15  2.52e-15 |
 DRAO |   288     0     0   288    1.55   | 6.19e-14  1.49e-14  4.09e-15 |
 HOB2 |   288     0     0   288    1.40   | 3.66e-14  9.41e-15  4.99e-15 |
 GOL2 |   286     0     0   285    1.24   | 3.01e-14  9.03e-15  3.09e-15 |
 TIDB |   288     0     0   288    0.81   | 2.19e-13  2.53e-14  1.37e-14 |
 HRAO |   288     0     0   288    0.56   | 1.23e-13  3.22e-14  2.13e-14 |
 FORT |   279     0     0   270    0.55   | 7.96e-14  2.00e-14  1.09e-14 |
 PIE1 |   288     1     0   287    0.54   | 4.32e-14  7.86e-15  3.66e-15 |
 GODE |   288     0     0   288    0.39   | 3.66e-14  1.09e-14  1.14e-14 |
 MEDI |   288     0     0   288    0.36   | 4.26e-14  9.23e-15  9.24e-15 |
 PTBB |   288     0     0   288    0.22   | 3.02e-13  6.25e-14  1.29e-14 |
 G30  |   288     0     0   288    0.16   | 3.40e-13  1.05e-13  2.56e-14 |
 G23  |   288     0     0   202    0.15   | 4.95e-13  6.41e-14  1.82e-14 |
 SFER |   285     0     0   283    0.09   | 3.73e-13  1.10e-13  3.79e-14 |
 KGN0 |   287     0     0   286    0.08   | 3.60e-13  9.64e-14  3.13e-14 |
 MIZU |   288     0     0   288    0.08   | 3.86e-13  1.04e-13  3.81e-14 |
 BAHR |   288     0     0   288    0.08   | 5.19e-13  1.10e-13  3.76e-14 |
 TLSE |   287     0     0   286    0.08   | 4.25e-13  9.81e-14  2.48e-14 |
 TWTF |   288     0     0   288    0.08   | 4.24e-14  1.04e-14  6.73e-15 |
 G26  |   288     0     0   288    0.08   | 3.99e-13  1.20e-13  8.10e-14 |
 NYA1 |   288     1     0   287    0.07   | 3.65e-14  2.76e-14  8.63e-15 |
 YAKT |   288     0     0   288    0.06   | 4.46e-13  1.30e-13  6.25e-14 |
 G07  |   288     0     0   288    0.06   | 3.15e-13  8.34e-14  9.15e-14 |
 CAGZ |   284     0     0   283    0.06   | 8.02e-13  1.38e-13  4.61e-14 |
 G27  |   288     0     0   288    0.05   | 2.91e-13  1.16e-13  9.65e-14 |
 BOR1 |   288     1     0   287    0.04   | 4.78e-13  1.15e-13  3.19e-14 |
 DWH1 |   288     0     0   288    0.04   | 5.12e-13  1.31e-13  4.68e-14 |
 G29  |   288     0     0   288    0.04   | 4.31e-13  1.23e-13  6.78e-14 |
 STR1 |   288     0     0   288    0.03   | 6.45e-13  1.47e-13  6.85e-14 |
 G04  |   276     0     0   274    0.03   | 4.63e-13  1.54e-13  8.26e-14 |
 IENG |   288     0     0   288    0.03   | 5.43e-13  1.54e-13  4.52e-14 |
 G02  |   288     0     3    41    0.03   | 5.23e-13  6.48e-14  1.65e-14 |
 G17  |   288     0     0   288    0.02   | 3.90e-13  1.38e-13  1.22e-13 |
 G31  |   288     0     0   288    0.02   | 1.99e-13  1.26e-13  1.13e-13 |
 TSKB |   288     0     0   288    0.01   | 1.07e-12  3.40e-13  1.21e-13 |
 G05  |   288     0     0   288    0.01   | 1.41e-12  3.96e-13  1.17e-13 |
 G25  |   288     0     0   288    0.01   | 1.36e-12  4.05e-13  1.88e-13 |
 STJO |   288     0     0   288    0.01   | 2.99e-14  8.89e-15  3.16e-15 |
 G24  |   288     0     0   288    0.01   | 1.40e-12  3.43e-13  1.85e-13 |
 SUWN |   286     0     0   140    0.01   | 9.35e-13  2.77e-13  6.75e-14 |
 KOUR |   288     0     0   288    0.01   | 1.42e-12  4.53e-13  1.75e-13 |
 G06  |   285     0     1   138    0.01   | 4.48e-13  1.80e-13  1.61e-13 |
 GMAS |   288     0     0   143    0.00   | 1.12e-12  3.13e-13  1.40e-13 |
 G08  |   288     0     0   288    0.00   | 1.42e-12  4.38e-13  2.20e-13 |
 PRDS |   288     0     0   288    0.00   | 1.49e-12  4.02e-13  2.37e-13 |
 KERG |   288     0     0   288    0.00   | 1.18e-12  2.87e-13  1.27e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.88e-12  5.28e-13  2.14e-13 |
 GPST |   288     0     0     0    0.00   | 2.50e-14  5.37e-15  2.80e-15 |
 THU3 |   276     0     0     0    0.00   |        -         -         - |
 G15  |   273     0     0     0    0.00   | 1.51e-12  5.92e-13  2.15e-13 |
 WUHN |   287     2     0     0    0.00   |        -         -         - |
 POTS |   280     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HERS |   239     0     0     0    0.00   |        -         -         - |
 HARB |   287     0     0     0    0.00   |        -         -         - |
 DAEJ |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   239     0     0     0    0.00   |        -         -         - |
 BILI |   287     2     0     0    0.00   |        -         -         - |
 AUCK |   264     2     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.91e-13  6.71e-14  3.82e-14 |
 G22  |   288     1     6     0    0.00   | 6.37e-13  7.38e-14  2.69e-14 |
 G21  |   288     0     6     0    0.00   | 1.19e-12  1.23e-13  4.44e-14 |
 G20  |   288     0     6     0    0.00   | 6.55e-13  6.93e-14  1.64e-14 |
 G19  |   288     1     5     0    0.00   | 6.44e-13  9.47e-14  2.44e-14 |
 G18  |   288     1     6     0    0.00   | 1.45e-12  1.60e-13  4.66e-14 |
 G16  |   288     0     4     0    0.00   | 4.74e-13  4.70e-14  3.23e-14 |
 G14  |   288     0     6     0    0.00   | 6.61e-13  7.82e-14  4.17e-14 |
 G13  |   288     0     5     0    0.00   | 5.56e-13  6.15e-14  1.49e-14 |
 G11  |   288     0     5     0    0.00   | 7.57e-13  7.10e-14  5.34e-14 |
 G10  |   288     0     0     0    0.00   | 1.10e-12  4.45e-13  3.23e-13 |
 G09  |   288     0     0     0    0.00   | 1.26e-12  4.12e-13  1.54e-13 |
 G03  |   288     0     0     0    0.00   | 1.21e-12  4.12e-13  2.75e-13 |
 G01  |   288     0     0     0    0.00   | 1.48e-12  7.70e-13  6.33e-13 |
 YEBE |   288     1     5     0    0.00   | 1.81e-13  1.58e-14  5.07e-15 |
 YAR2 |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 WHIT |   288     0     0     0    0.00   | 4.87e-13  1.96e-13  1.37e-13 |
 VILL |   287     0     0     0    0.00   | 1.03e-12  7.22e-13  4.07e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.94e-13  2.54e-13  6.59e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   283     0     0     0    0.00   |        -         -         - |
 QAQ1 |   287     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 2.07e-12  4.93e-13  1.14e-13 |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     1     0     0    0.00   |        -         -         - |
 NNOR |   287     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   | 6.85e-13  3.88e-13  2.21e-12 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   287     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     1     0    0.00   | 5.88e-13  3.96e-13  9.69e-13 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   286     0     0     0    0.00   |        -         -         - |
 HLFX |   288     1     1     0    0.00   | 2.05e-13  1.28e-13  5.30e-13 |
 GUAM |   174     0     0     0    0.00   |        -         -         - |
 GRAZ |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GODZ |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   284     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DAKA |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   284     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   | 2.26e-13  8.30e-13  9.58e-13 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   284     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALIC |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.48e-17  1.77e-16  1.06e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      BRUS      NRC1 |
------------------------------------------+------------------------------+
