
 GPS week: 1300   Day: 1   MJD: 53345                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2880      0    -0.07     0.12     3.87     0.00      0
 cod |   288     0  27990     15    -0.12     0.61     0.04    20.48      0
 emr |   288     0  14312    333   797.90    49.91     0.05    15.23      0
 esa |   288     0  19239   1176   796.10    49.91     0.06    14.13      0
 gfz |   288     0  21365    341     0.26    -0.19     0.04    19.03      0
 iga |    96     0   2784     11    -0.10     0.17     0.06     0.00      0
 igu |    96     0   2784      0    -0.10     0.15     2.97     0.00      0
 jpl |   288     0  19070    338    -4.51     0.04     0.06    13.09      0
 ngs |    96     0   2880      0    -0.06     0.11     3.72     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  35935   3134   797.80    49.95     0.05    18.04      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -6558    37   -14    -9    20   -21  -522    -9 -4501     -   -43 |
    2 | -2538    23   -26     -    39     -     -    -2 -3156     -   -42 |
    3 |  1011    44    84   204  -171    43  9410   218   690     -  -259 |
    4 | -3255    81    -5    56   -58  -114 -3738    19 -3247     -   -90 |
    5 |  1175   -31     -   237     2   -16 -2208   -43  1339     -  -120 |
    6 | -1148   -59    30    26    21   -48 -8439    16 -1064     -   -12 |
    7 | -1655   156    56  -418     7   121 -1013   150 -1703     -   -13 |
    8 | -1111   -42   -20   -78   215   -74 -4950  -149 -1631     -     7 |
    9 |   146    -5    45    -8    62   -41  2481    99  -361     -  -163 |
   10 | -4045    -9    76   -33    10   -23 -4072    29 -4231     -   -59 |
   11 |  1893    78   -80  -156   -16   -46  2824   146  2189     -    11 |
   13 |  3356   130  -200   197   -26  -131  -138   -50  3468     -   -70 |
   14 |  5069   -39   -77    30    40   -53   -56    67  4974     -    -3 |
   15 |  -270   -81   367   312  -299   153 -1161   204  -897     -  -303 |
   16 |  5285   -47     X   -38   -19   -23  1369     X  5303     -   111 |
   17 | -2640    32    96     0   -21    87  3128    81 -2760     -  -154 |
   18 |  6960   -21    48    47    64     3  1280   -36  6735     -   -94 |
   19 |  4499   -23  -273     0   123  1039  1737   182  4607     -    -6 |
   20 |  3835    96  -106  -397   103  -122  -701   140  3712     -    81 |
   21 |  2406    53   137    86  -134    65   876   132  2887     -  -205 |
   22 | -3705   -31   -13   -59    16   -26  3872   113 -3212     -    -6 |
   23 | -1058   118  -331  -125     8  -164   -80    78 -1286     -   179 |
   24 | -6924   -16    91    67     1     3-12214     0 -6207     -  -114 |
   25 |  4549  -102   -20   233   -54  -143   220    25  3270     -   -12 |
   26 |   -22   -79   -37   140   120  -212 -1836   -78  -492     -   -35 |
   27 | -2121   -81   -44    21    99  -208  2117  -106 -1966     -    85 |
   28 |  3275   120   -27  -426   145    74  1392   130  3511     -   -27 |
   29 | -4245   -48   -62   138    73     7 -3895   -10 -4077     -   -74 |
   30 | -4128  -122    64   319   -36  -106  2898   -80 -3369     -   -69 |
   31 |  1963   111  -127  -214    29   -17 11419    99  1474     -    47 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    83  -113     -     -     -     -     3     -     -    -1 |
 ALGO |     -     -  -104     X     -     -     -   197     -     -   -56 |
 AMC2 |     -   -80   135     -     -     -     -  -215     -     -   133 |
 AREQ |     -     -    85     -   -75     -     -   -54     -     -    47 |
 ARTU |     -     -     -    19     -     -     -   -21     -     -     - |
 ASPA |     -     -     -     -   102     -     -  -264     -     -    74 |
 AUCK |     -    11     -     X     -     -     -     -     -     -   -13 |
 BAHR |     -     -   305     -    44     -     -     -     -     -  -304 |
 BOGT |     -   -20     -    19     -     -     -     -     -     -     6 |
 BOR1 |     -   -18    53     -     -     -     -     -     -     -   -25 |
 BREW |     -     -   -59     -     -     -     -     -     -     -    50 |
 BRUS |     -   -52    45     -     -     -     -     -     -     -    21 |
 CAGZ |     -   108     -     -     -     -     -     -     -     -  -123 |
 CAS1 |     -    45     -   -22   -19     -     -     -     -     -   -14 |
 CEDU |     -  -145     -   117     -     -     -   -56     -     -   112 |
 CHAT |     -    76     -     -   -27     -     -     -     -     -   -58 |
 CHUR |     -   -12    35     -     -     -     -   -66     -     -    34 |
 COCO |     -   -77     -   276   -76     -     -     -     -     -   -49 |
 CRO1 |     -     -   138   -81   -72     -     -    45     -     -    -9 |
 DAEJ |     -   -34     -     -     -     -     -     -     -     -    39 |
 DAV1 |     -    42     -     -  -108     -     -   -77     -     -   122 |
 DGAR |     -   -36     -     -     -     -     -    56     -     -     X |
 DRAO |     -    68   -69     -     -     -     -    53     -     -   -58 |
 DWH1 |     -    88     -     -     -     -     -     -     -     -   -99 |
 FAIR |     -     -     -   108   -81     -     -     -     -     -     - |
 FORT |     -     -   101   147  -190     -     -     -     -     -     X |
 GLPS |     -    34     -     -   -28     -     -     -     -     -    -9 |
 GODE |     -     -     -   186     -     -     -  -104     -     -   -70 |
 GOL2 |     -     -     -     -     -     -     -  -156     -     -   113 |
 GOLD |     -    77     -   114  -134     -     -   -49     -     -     X |
 GUAM |     -   152     -  -466     X     -     -  -232     -     -   362 |
 HARB |     -     -     -     -     -     -     -    -4     -     -     3 |
 HOB2 |     -   -17     -     -     -     -     -     -     -     -    19 |
 HOFN |     -     -     -     -  -165     -     -     -     -     -   174 |
 HOLM |     -    21     -     -     -     -     -   -34     -     -     - |
 HRAO |     -   -64     -     -     -     -     -    48     -     -    38 |
 IISC |     -     -     -  -234   174     -     -     -     -     -     X |
 ISPA |     -   122     -     -  -112     -     -    15     -     -   -29 |
 JPLM |     -     -     -     -     -     -     -  -217     -     -   158 |
 KERG |     -     -   133  -336   214     -     -     -     -     -   -75 |
 KGN0 |     -     9     -     -     -     -     -     -     -     -   -10 |
 KOKB |     -     -     -     -   704     -     -     -     -     -  -742 |
 KOSG |     -   -73     -     -     -     -     -     -     -     -    83 |
 KOUR |     -   197     -  -208  -162     -     -     -     -     -   112 |
 LAE1 |     -   107     -     -  -120     -     -     -     -     -     4 |
 LPGS |     -   185     -  -466     -     -     -     -     -     -   155 |
 MAC1 |     -    11     -    69   -79     -     -     -     -     -    17 |
 MADR |     -     -     -     -     -     -     -    67     -     -   -48 |
 MALI |     -    80     -  -116     -     -     -     -     -     -     - |
 MAS1 |     -   -33     -   -55   -48     -     -   135     -     -    34 |
 MATE |     -     -     -  -485     -     -     -     -     -     -   380 |
 MBAR |     -   -23     -     -   -70     -     -   -33     -     -   123 |
 MCM4 |     -  -197  -596     -   688     -     -     -     -     -     - |
 METS |     -   -98     -     -     -     -     -     -     -     -   111 |
 MIZU |     -     -     -   327     -     -     -     -     -     -  -256 |
 NKLG |     -     -     -   -59     -     -     -     -     -     -    46 |
 NLIB |     -  -105     -     -     -     -     -    32     -     -    96 |
 NNOR |     -     -     -   -39     -     -     -     -     -     -    31 |
 NPLD |     -  -113     -     -     -     -     -     -     -     -   128 |
 NRC1 |     -     -    64     -  -106     -     -     -     -     -    57 |
 NRIL |     -     -     -     -    19     -     -   -27     -     -     X |
 NTUS |     -  -118     -   -62     -     -     -     -     -     -   182 |
 NYA1 |     -   -25     -     -  -115     -     -     -     -     -   149 |
 OHI2 |     -   117     -    62  -105     -     -     -     -     -   -71 |
 ONSA |     -  -122     -   241   -48     -     -     -     -     -     - |
 PDEL |     -    32     -     -   -35     -     -     -     -     -     X |
 PERT |     -     -   176  -563   190     -     -    89     -     -   -44 |
 PETP |     -    10     -     -   -10     -     -     -     -     -     X |
 PIE1 |     -     -     -  -168     -     -     -     -     -     -   132 |
 PIMO |     -     -     -   563     -     -     -     -     -     -  -441 |
 POL2 |     -     -     -     -     -     -     -  -124     -     -    90 |
 POTS |     -    25     -     -   -27     -     -     -     -     -     X |
 PRDS |     -   -70     -     -     -     -     -     -     -     -    79 |
 PTBB |     -   -41     -     -     -     -     -     -     -     -    47 |
 RABT |     -    42     -     -     -     -     -   -66     -     -     - |
 REYK |     -   -33     -     -     -     -     -     -     -     -    38 |
 RIOG |     -    37     -     -  -132     -     -     -     -     -    97 |
 SANT |     -     0     -    34   -88     -     -     -     -     -    66 |
 SCH2 |     -   -44     -     -     -     -     -  -136     -     -   149 |
 SEY1 |     -     -     -     -   409     -     -     -     -     -  -431 |
 STJO |     -     -    69     -  -109     -     -    78     -     -     X |
 SUTM |     -     -     -     -   -95     -     -   138     -     -     - |
 THTI |     -     -     8   117   136     -     -     -     -     -  -242 |
 THU3 |     -    28     -     -   138     -     -     -     -     -  -177 |
 TID1 |     -     -     -     -     -     -     -  -112     -     -    81 |
 TIDB |     -  -154     -   287     -     -     -     -     -     -   -50 |
 TIXI |     -    33     -     -   -36     -     -     -     -     -     X |
 TLSE |     -     -     -     -     -     -     -   -48     -     -    34 |
 TOW2 |     -    53     -     -     -     -     -     -     -     -   -60 |
 TRO1 |     -   244     -     -  -185     -     -     -     -     -   -82 |
 TSKB |     -  -147   -65   324    -6     -     -     -     -     -   -26 |
 TWTF |     -   -95     -     -     -     -     -     -     -     -   108 |
 UNSA |     -     -     -   -64    62     -     -     -     -     -   -15 |
 URUM |     -   -48     -     -     -     -     -     -     -     -    55 |
 USN3 |     -  -119     -     -     -     -     -     5     -     -   131 |
 USNO |     -  -104    86     -     -     -     -     -     -     -    46 |
 USUD |     -     -     -   101     -     -     -  -109     -     -     X |
 VILL |     -   -80     -     X     -     -     -     -     -     -    91 |
 WHIT |     -    37     -     -     -     -     -  -138     -     -    58 |
 WILL |     -    -7     -     -     -     -     -     -     -     -     8 |
 WTZR |     -   -66     -   152     -     -     -     -     -     -   -45 |
 WUHN |     -     -     -     -   -44     -     -     -     -     -    46 |
 YAKT |     -   -36     -     -     -     -     -     -     -     -    41 |
 YAR2 |     -    48     -     -     -     -     -     -     -     -   -55 |
 YELL |     -    89   -46     X  -124     -     -     -     -     -    69 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  7598   107   100    92   108   188  4104   172  7060     -   114 |  288   4.36
    2 |  1777    70    74     -    35     -     -    41  1470     -    75 |  288   0.71
    3 |  5463    41    87    37    83    60  4436    53  5617     -    42 |  288   3.45
    4 |  1107    55    32    36    32    51  1445    68  1042     -    59 |  288   0.85
    5 |  6221    21     -    23    24    30  4377    54  6165     -    32 |  288   2.17
    6 |  1980    40    27    29    25    37  4405    55  1924     -    32 |  288   1.25
    7 |  1590    40    47    28    22    60  1164    43  1610     -    75 |  288   0.64
    8 |  3984    52    30    31    22    40  3280    51  3848     -    72 |  288   1.60
    9 |  5789    34    32    45    40    65  2705    60  5757     -    39 |  288   2.88
   10 |  6045    42    23    47    30    46  3213    54  5622     -    56 |  288   1.71
   11 |  1892    71    50    30    24    46  1695    57  1796     -    44 |  288   0.43
   13 |   679    88    51   147   111    51   353    83   602     -    45 |  288   0.36
   14 |   953    66    50    38    36    45   436    50   966     -    43 |  288   0.26
   15 |  6409    60    48    47    27    62  4319    55  6497     -    46 |  288   4.60
   16 |  1274    26     X    73    48    43  1062     X  1165     -   112 |  288   0.23
   17 |  1545    45    27    65    26    40  1738    42  1589     -    60 |  288   0.84
   18 |  1127    36    47    49    26    53   689    28  1113     -    60 |  288   0.38
   19 |  1734    46    95    62    75    54   799    73  1465     -    61 |  288   0.26
   20 |   539    58    76    29    22    87   455    55   536     -    46 |  288   0.26
   21 |  1968    63    39    36    50    57   576    49  1815     -    55 |  288   0.32
   22 |  4441    44   101    48    30    46  2547    74  4181     -    33 |  288   0.25
   23 |  1102    73    77    61    40    44   501    89  1127     -   109 |  288   0.51
   24 |  6639    47    27    60    25    78  7537    46  5617     -    86 |  288   3.11
   25 |  6577    41    59    29    46    63  1573    74  6756     -    56 |  288   1.95
   26 |  2033    87    70    62   138    58  1163    62  1778     -    50 |  288   0.69
   27 |  1406    48    30    40    30    62  1267    42  1248     -    52 |  288   0.93
   28 |  2963    39    27    62    44    61  2074   118  2754     -    64 |  288   0.57
   29 |  2916    71    61    32    25    71  2552    98  2675     -    64 |  288   0.83
   30 |  5121    22    33    25    14    30  1989    68  4926     -    37 |  288   0.54
   31 |  3687    34    50    53    29    36  6326    39  3673     -    59 |  288   1.20
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    19    16     -     -     -     -    13     -     -    28 |  288   0.03
 ALGO |     -     -     9     X     -     -     -    20     -     -    14 |  288   0.02
 AMC2 |     -    22    31     -     -     -     -    29     -     -    27 |  288   0.04
 AREQ |     -     -    37     -    15     -     -    37     -     -    17 |  288  16.38
 ARTU |     -     -     -    14     -     -     -    15     -     -     - |  174  13.31
 ASPA |     -     -     -     -    32     -     -    24     -     -    36 |  288    >>>
 AUCK |     -    25     -     X     -     -     -     -     -     -    28 |  255  14.82
 BAHR |     -     -    56     -    24     -     -     -     -     -    36 |  288   0.32
 BOGT |     -    25     -    48     -     -     -     -     -     -    26 |  274    >>>
 BOR1 |     -   111    93     -     -     -     -     -     -     -    60 |  288  29.65
 BREW |     -     -    10     -     -     -     -     -     -     -     9 |  288   0.05
 BRUS |     -    45    37     -     -     -     -     -     -     -    24 |  288   0.02
 CAGZ |     -    53     -     -     -     -     -     -     -     -    61 |  283   0.36
 CAS1 |     -    55     -    58    27     -     -     -     -     -    56 |  288   7.08
 CEDU |     -    35     -    51     -     -     -    44     -     -    37 |  288  14.22
 CHAT |     -    33     -     -    61     -     -     -     -     -    59 |  251  12.83
 CHUR |     -    36   114     -     -     -     -    40     -     -    40 |  288   0.09
 COCO |     -    21     -    77    31     -     -     -     -     -    54 |  288  11.24
 CRO1 |     -     -    23    41    35     -     -    50     -     -    34 |  288  19.25
 DAEJ |     -    45     -     -     -     -     -     -     -     -    51 |  287   1.44
 DAV1 |     -    24     -     -    22     -     -    45     -     -    35 |  288  13.67
 DGAR |     -    30     -     -     -     -     -    47     -     -     X |  288  17.41
 DRAO |     -    22    20     -     -     -     -    21     -     -    38 |  288   0.09
 DWH1 |     -    15     -     -     -     -     -     -     -     -    17 |  288   0.64
 FAIR |     -     -     -    73    54     -     -     -     -     -     - |  279   0.59
 FORT |     -     -    47    69    48     -     -     -     -     -     X |  288   0.20
 GLPS |     -    22     -     -    25     -     -     -     -     -    11 |  288  22.15
 GODE |     -     -     -    26     -     -     -    18     -     -    17 |  288   0.12
 GOL2 |     -     -     -     -     -     -     -    19     -     -    14 |  288 134.48
 GOLD |     -    25     -    68    28     -     -    36     -     -     X |  288   8.70
 GUAM |     -    33     -    66     X     -     -    62     -     -    70 |  288  19.57
 HARB |     -     -     -     -     -     -     -    26     -     -    19 |  286  27.25
 HOB2 |     -    12     -     -     -     -     -     -     -     -    14 |  288   0.05
 HOFN |     -     -     -     -    22     -     -     -     -     -    23 |  287    >>>
 HOLM |     -    30     -     -     -     -     -    47     -     -     - |  288   7.01
 HRAO |     -    23     -     -     -     -     -    39     -     -    34 |  288   1.77
 IISC |     -     -     -   151   112     -     -     -     -     -     X |  212  20.96
 ISPA |     -    43     -     -    61     -     -    56     -     -    33 |  288  17.78
 JPLM |     -     -     -     -     -     -     -   160     -     -   116 |  281    >>>
 KERG |     -     -    32    54    25     -     -     -     -     -    27 |  288   2.49
 KGN0 |     -    21     -     -     -     -     -     -     -     -    24 |  287   0.49
 KOKB |     -     -     -     -    26     -     -     -     -     -    27 |  128   0.06
 KOSG |     -    20     -     -     -     -     -     -     -     -    22 |  288  24.74
 KOUR |     -    36     -    49    52     -     -     -     -     -    37 |  281   2.67
 LAE1 |     -    32     -     -    42     -     -     -     -     -    31 |  213  17.38
 LPGS |     -    23     -    68     -     -     -     -     -     -    33 |  288  23.92
 MAC1 |     -    43     -    62    42     -     -     -     -     -    57 |  288  16.15
 MADR |     -     -     -     -     -     -     -    22     -     -    16 |  284  14.62
 MALI |     -    28     -    40     -     -     -     -     -     -     - |  283  16.57
 MAS1 |     -   110     -   116    27     -     -    66     -     -    22 |  287   2.73
 MATE |     -     -     -    52     -     -     -     -     -     -    41 |  288   0.12
 MBAR |     -    36     -     -    71     -     -   143     -     -    81 |  288  15.67
 MCM4 |     -    18    14     -    16     -     -     -     -     -     - |  288  10.76
 METS |     -    16     -     -     -     -     -     -     -     -    18 |  287  11.13
 MIZU |     -     -     -    33     -     -     -     -     -     -    25 |  285   0.34
 NKLG |     -     -     -    60     -     -     -     -     -     -    47 |  287    >>>
 NLIB |     -    19     -     -     -     -     -    92     -     -    56 |  287 841.61
 NNOR |     -     -     -    32     -     -     -     -     -     -    25 |  288  17.54
 NPLD |     -    14     -     -     -     -     -     -     -     -    16 |  287   0.02
 NRC1 |     -     -    15     -    15     -     -     -     -     -    12 |  288   0.04
 NRIL |     -     -     -     -    31     -     -    45     -     -     X |  282  10.18
 NTUS |     -    24     -    31     -     -     -     -     -     -    27 |  288  10.18
 NYA1 |     -    40     -     -    30     -     -     -     -     -    23 |  287 119.10
 OHI2 |     -    49     -    63    21     -     -     -     -     -   100 |  288   6.76
 ONSA |     -    37     -    27    45     -     -     -     -     -     - |  288   0.04
 PDEL |     -    22     -     -    23     -     -     -     -     -     X |  288  54.97
 PERT |     -     -    30    78    31     -     -    33     -     -    42 |  288   1.40
 PETP |     -    20     -     -    21     -     -     -     -     -     X |  287  10.09
 PIE1 |     -     -     -    22     -     -     -     -     -     -    17 |  288   0.04
 PIMO |     -     -     -   127     -     -     -     -     -     -    99 |  212  25.37
 POL2 |     -     -     -     -     -     -     -    26     -     -    19 |  288  10.21
 POTS |     -    37     -     -    40     -     -     -     -     -     X |  288  13.59
 PRDS |     -    13     -     -     -     -     -     -     -     -    14 |  288   1.43
 PTBB |     -    12     -     -     -     -     -     -     -     -    14 |  288   0.50
 RABT |     -    19     -     -     -     -     -    29     -     -     - |  288  13.19
 REYK |     -    11     -     -     -     -     -     -     -     -    12 |  266   6.75
 RIOG |     -    22     -     -    32     -     -     -     -     -    30 |  288  10.96
 SANT |     -    29     -    43    60     -     -     -     -     -    32 |  285   8.15
 SCH2 |     -    15     -     -     -     -     -    31     -     -    11 |  288  19.39
 SEY1 |     -     -     -     -    18     -     -     -     -     -    19 |  288  18.71
 STJO |     -     -    31     -    29     -     -    21     -     -     X |  287    >>>
 SUTM |     -     -     -     -    24     -     -    35     -     -     - |  288   9.62
 THTI |     -     -    31    43    36     -     -     -     -     -    54 |  288  12.51
 THU3 |     -    18     -     -    10     -     -     -     -     -    14 |  288   7.15
 TID1 |     -     -     -     -     -     -     -    43     -     -    31 |  288   0.09
 TIDB |     -    16     -    24     -     -     -     -     -     -    14 |  288   0.12
 TIXI |     -    22     -     -    24     -     -     -     -     -     X |  284   8.51
 TLSE |     -     -     -     -     -     -     -    35     -     -    26 |  286   0.55
 TOW2 |     -    24     -     -     -     -     -     -     -     -    27 |  288  10.01
 TRO1 |     -    33     -     -    32     -     -     -     -     -    63 |  288   9.26
 TSKB |     -    32    23    38    21     -     -     -     -     -    13 |  288   1.41
 TWTF |     -    39     -     -     -     -     -     -     -     -    45 |  288   0.64
 UNSA |     -     -     -    42    34     -     -     -     -     -    41 |  288  21.92
 URUM |     -    26     -     -     -     -     -     -     -     -    29 |  288  25.77
 USN3 |     -    20     -     -     -     -     -    21     -     -    27 |  288   0.03
 USNO |     -    44    24     -     -     -     -     -     -     -    38 |  288   0.03
 USUD |     -     -     -    48     -     -     -    52     -     -     X |  288   9.70
 VILL |     -    13     -     X     -     -     -     -     -     -    14 |  288   2.73
 WHIT |     -    24     -     -     -     -     -    20     -     -    23 |  288   0.56
 WILL |     -    12     -     -     -     -     -     -     -     -    14 |  288  28.40
 WTZR |     -    32     -    21     -     -     -     -     -     -    33 |  288   0.04
 WUHN |     -     -     -     -    21     -     -     -     -     -    22 |  287  17.16
 YAKT |     -    10     -     -     -     -     -     -     -     -    11 |  286   0.57
 YAR2 |     -    13     -     -     -     -     -     -     -     -    14 |  287  10.87
 YELL |     -    53    80     X    81     -     -     -     -     -    77 |  288   0.04
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3866    42    52    58    44    63  2969    60  3719     -    46 |


 BEST CLOCK FIT: BRUS   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 USNO |   288     0     0   288   10.38   | 3.91e-14  8.63e-15  2.89e-15 |
 BRUS |   288     0     0   288   10.38   | 3.32e-14  5.51e-15  1.49e-15 |
 AMC2 |   288     0     0   288   10.38   | 3.69e-14  7.21e-15  2.53e-15 |
 NPLD |   287     0     0   286   10.31   | 3.64e-14  5.63e-15  1.62e-15 |
 ALGO |   288     1     0   287    8.97   | 3.05e-14  6.50e-15  2.23e-15 |
 ONSA |   288     0     0   288    8.89   | 4.09e-14  1.18e-14  3.98e-15 |
 CHUR |   288     0     0   288    5.45   | 8.77e-14  1.54e-14  6.09e-15 |
 BREW |   288     0     0   143    5.15   | 3.91e-14  5.98e-15  3.35e-15 |
 USN3 |   288     0     0   288    4.50   | 7.62e-14  1.20e-14  2.38e-15 |
 HOB2 |   288     0     0   288    3.45   | 3.65e-14  8.64e-15  4.09e-15 |
 WTZR |   288     0     0   288    3.31   | 4.28e-14  9.76e-15  3.25e-15 |
 ALBH |   288     0     0   143    2.46   | 3.63e-14  8.26e-15  3.07e-15 |
 YELL |   288     0     0   288    2.28   | 2.99e-14  6.71e-15  2.49e-15 |
 NLIB |   287     0     0   141    1.99   | 3.71e-14  8.59e-15  3.40e-15 |
 MATE |   288     0     0   288    1.92   | 7.66e-14  1.34e-14  1.00e-14 |
 DRAO |   288     0     0   288    1.62   | 5.80e-14  1.77e-14  5.76e-15 |
 PIE1 |   288     0     0   288    1.61   | 4.31e-14  8.34e-15  2.12e-15 |
 NRC1 |   288     1     0   287    1.20   | 3.40e-14  7.07e-15  3.42e-15 |
 TID1 |   288     0     0   143    0.91   | 4.74e-14  1.70e-14  5.38e-15 |
 GOL2 |   288     1     0   143    0.83   | 5.70e-14  1.66e-14  6.13e-15 |
 NYA1 |   287     0     0   143    0.78   | 2.47e-14  7.09e-15  1.07e-14 |
 KOKB |   128     0     0   128    0.54   | 5.89e-14  1.60e-14         - |
 FORT |   288     0     0   143    0.40   | 9.23e-14  3.12e-14  1.25e-14 |
 GODE |   288     0     0   288    0.37   | 4.85e-14  1.09e-14  7.08e-15 |
 PTBB |   288     0     0   288    0.25   | 3.50e-13  7.87e-14  6.38e-14 |
 G23  |   288     0     1   105    0.21   | 5.60e-13  6.71e-14  3.42e-14 |
 G30  |   288     0     0   288    0.15   | 3.56e-13  1.05e-13  6.66e-14 |
 MIZU |   285     0     0   284    0.13   | 3.97e-13  1.07e-13  2.77e-14 |
 TWTF |   288     0     0   288    0.12   | 4.56e-13  1.36e-13  4.94e-14 |
 G16  |   288     0     2    64    0.12   | 4.69e-13  4.82e-14  2.93e-14 |
 BOR1 |   288     2     0   286    0.09   | 4.74e-13  1.49e-13  5.65e-14 |
 G26  |   288     0     0   288    0.09   | 3.38e-13  9.83e-14  8.24e-14 |
 KGN0 |   287     0     0   286    0.09   | 3.74e-13  1.06e-13  5.18e-14 |
 DWH1 |   288     0     0   288    0.07   | 4.97e-13  1.55e-13  5.42e-14 |
 YAKT |   286     0     0   284    0.07   | 4.34e-13  1.10e-13  5.15e-14 |
 G06  |   288     0     0   288    0.06   | 4.38e-13  1.32e-13  9.47e-14 |
 G07  |   288     0     0   288    0.06   | 2.78e-13  8.72e-14  7.16e-14 |
 G27  |   288     0     0   288    0.06   | 3.29e-13  9.64e-14  1.21e-13 |
 FAIR |   279     0     0   278    0.05   | 2.27e-13  5.44e-14  3.82e-14 |
 G31  |   288     0     0   288    0.05   | 2.16e-13  1.14e-13  1.52e-13 |
 G17  |   288     0     0   288    0.04   | 4.15e-13  1.36e-13  7.41e-14 |
 G04  |   288     0     0   288    0.04   | 4.36e-13  1.33e-13  1.13e-13 |
 G29  |   288     0     0   288    0.03   | 4.05e-13  1.33e-13  7.79e-14 |
 TLSE |   286     0     0   141    0.02   | 4.64e-13  1.13e-13  3.78e-14 |
 TSKB |   288     0     0   288    0.02   | 1.01e-12  2.95e-13  1.08e-13 |
 HRAO |   288     0     0   143    0.02   | 1.00e-13  3.83e-14  1.14e-13 |
 G02  |   288     0     2    24    0.02   | 5.44e-13  6.76e-14  4.03e-14 |
 G25  |   288     0     0   288    0.01   | 1.36e-12  4.26e-13  1.63e-13 |
 CAGZ |   283     0     3    45    0.01   | 7.81e-13  1.22e-13  2.87e-14 |
 KERG |   288     0     0   288    0.01   | 1.28e-12  3.77e-13  2.15e-13 |
 G08  |   288     0     0   288    0.01   | 1.39e-12  4.16e-13  1.56e-13 |
 G05  |   288     0     0   288    0.01   | 1.41e-12  4.51e-13  1.46e-13 |
 G13  |   288     0     3    15    0.01   | 6.80e-13  1.43e-13  2.88e-14 |
 MAS1 |   287     0     0   286    0.01   | 1.92e-12  5.83e-13  1.94e-13 |
 KOUR |   281     0     0   278    0.01   | 1.52e-12  3.53e-13  2.81e-13 |
 PERT |   288     0     0   288    0.01   | 1.96e-12  5.08e-13  1.47e-13 |
 PRDS |   288     0     0   143    0.00   | 1.48e-12  4.97e-13  1.04e-13 |
 DAEJ |   287     0     0   141    0.00   | 1.36e-12  3.48e-13  8.68e-14 |
 VILL |   288     0     0   143    0.00   | 1.11e-12  6.09e-13  2.42e-13 |
 WHIT |   288     0     0   288    0.00   | 5.23e-13  2.11e-13  6.08e-14 |
 GPST |   288     0     0     0    0.00   | 1.97e-14  5.13e-15  1.10e-15 |
 ARTU |   174     0     0     0    0.00   |        -         -         - |
 LAE1 |   213     0     0     0    0.00   |        -         -         - |
 HARB |   286     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   284     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   251     0     0     0    0.00   |        -         -         - |
 AUCK |   255     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     6     0    0.00   | 6.70e-13  6.93e-14  4.98e-14 |
 G24  |   288     0     0     0    0.00   | 1.44e-12  4.36e-13  3.87e-13 |
 G22  |   288     0     6     0    0.00   | 8.60e-13  8.52e-14  2.28e-14 |
 G21  |   288     0     6     0    0.00   | 1.09e-12  1.21e-13  2.56e-14 |
 G20  |   288     0     6     0    0.00   | 6.31e-13  7.52e-14  3.32e-14 |
 G19  |   288     0     5     0    0.00   | 7.42e-13  7.37e-14  2.16e-14 |
 G18  |   288     1     6     0    0.00   | 1.52e-12  1.44e-13  3.70e-14 |
 G15  |   288     0     0     0    0.00   | 1.60e-12  5.61e-13  4.46e-13 |
 G14  |   288     0     6     0    0.00   | 6.47e-13  6.46e-14  2.30e-14 |
 G11  |   288     0     6     0    0.00   | 8.76e-13  8.04e-14  4.67e-14 |
 G10  |   288     0     0     0    0.00   | 1.23e-12  5.01e-13  1.61e-13 |
 G09  |   288     0     0     0    0.00   | 1.30e-12  5.30e-13  2.67e-13 |
 G03  |   288     0     0     0    0.00   | 1.31e-12  4.51e-13  3.67e-13 |
 G01  |   288     0     0     0    0.00   | 1.44e-12  6.51e-13  2.70e-13 |
 YAR2 |   287     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 TOW2 |   288     0     0     0    0.00   |        -         -         - |
 TIDB |   288     0     6     0    0.00   | 1.81e-13  2.78e-14  7.25e-15 |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.91e-13  2.23e-13  8.43e-13 |
 SUTM |   288     0     0     0    0.00   |        -         -         - |
 STJO |   287     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     2     0    0.00   | 7.93e-13  1.18e-12  1.22e-12 |
 SANT |   285     0     2     0    0.00   | 1.77e-12  1.01e-12  1.03e-12 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 REYK |   266     0     0     0    0.00   |        -         -         - |
 RABT |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   212     0     0     0    0.00   |        -         -         - |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   282     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   | 6.90e-13  2.27e-13  7.30e-13 |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MALI |   283     0     0     0    0.00   |        -         -         - |
 MADR |   284     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   | 7.82e-13  7.65e-13  1.43e-12 |
 JPLM |   281     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   212     1     0     0    0.00   |        -         -         - |
 HOLM |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     1     0    0.00   | 2.32e-13  8.66e-13  7.25e-13 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 BOGT |   274     1     0     0    0.00   |        -         -         - |
 BAHR |   288     0     6     0    0.00   | 6.61e-13  1.07e-13  3.45e-14 |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.69e-17  2.03e-16  1.22e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      BRUS      BRUS |
------------------------------------------+------------------------------+
