
 GPS week: 1293   Day: 4   MJD: 53299                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT  JUMPS
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+---------------------------------------------------------------------
 brd |    96     0   2688      0     0.05    -0.10     3.01     0.00      0
 cod |   288     0  24298     95    -1.33     1.78     0.05    15.10      0
 emr |   288     0  22830    586  1880.69    41.45     0.04    17.13      0
 esa |   288     0  17733   1427  1881.19    41.59     0.08     8.05      0
 gfz |   288     0  20530    924    -0.14    -0.21     0.04    21.10      0
 iga |    96     0   2688     40    -0.01     0.00     0.22     0.00      0
 igu |    96     0   2592      0     0.01    -0.08     3.35     0.00      0
 jpl |   288     0  19816      0    -6.20     2.05     0.03    25.26      0
 ngs |    96     0   2688      6     0.01    -0.14     2.52     0.00      0
 sio |    96    96      0      0     0.00     0.00     0.00     0.00      0
 usn |   288     0  33010   2934  1880.71    41.44     0.05    13.35      0

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  4241    76   -77     6   133   -28 19388   -91   997     -   -27 |
    3 |  1387    15   -97   212    38 -1069  -773     7   471     -   -92 |
    4 | -1244   -68   -36  -123    78  -291 -5707    68 -2158     -   -54 |
    5 | -1756    -9   -36   140   -11  1915  2159   -10 -1321     -     8 |
    6 | -2395   -30   -17   474   -25 -2157 -6827   -59 -1884     -   -49 |
    7 | -3801   -99   -31  -154    96  -793 -6267    77 -3805     -   -51 |
    8 | -9369   -83   -81   -16    98 -1906 -3484    58 -7571     -   -58 |
    9 |  8108     1   -46    84    64  1677 11518   -18  4184     -   -58 |
   10 |   682    76   -46   264   -81   618  4834   -13   957     -   -33 |
   11 |  2303   -53  -113   -18   -22  1831 -3816   122  2641     -    21 |
   13 |  2026    42  -172   320   -44 -2396 -4549    30  2374     -    -8 |
   14 |  2136   104   -99   -19     8  1579   697    61  2667     -  -106 |
   15 | -1614    45    89   -48    92   218  1140  -126 -1085     -   -44 |
   16 |  2663   -10  -188  -104    59 -1964  -331   118  2787     -     0 |
   17 | -5503    10    72   116    31   158   789   -52 -4895     -  -124 |
   18 |  3160    41   -28   -78   -12  1388  -482    40  3213     -   -21 |
   19 |  5123  -146   -50   171  -158   423 -2127   193  5720     -     X |
   20 |  4065   -70  -102     4    54 -1425 -1087   124  4407     -  -111 |
   21 |  1959    81  -145  -115     2   384  -198    62  2369     -    45 |
   22 |  1421    80   -33   -85   -60  1336  -612    31   502     -    39 |
   23 | -1700    43     X   -42   -11 -1452 -3877    81 -1374     -  -158 |
   24 | -8485   -31   -67   104    64   308 11568    19 -6226     -   -79 |
   25 | -4516    38    31     -    69   294     -  -111 -3424     -    22 |
   26 |  2064    -2    15   -60    13  1554 -3072    26  1468     -   -49 |
   27 |  2318   -97   -51     8    87 -2261 -4363    44  1536     -   -51 |
   28 |  2872   -92  -108  -498   220  -645   753    78  3170     -   -23 |
   29 | -3738   104     -     X     3  1483 -1925   -17 -3184     -   -89 |
   30 | -2405   -91   -51   191   108   998 -3349   -45 -2442     -   -32 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    49   -71     -     -     -     -   -12     -     -    59 |
 ALGO |     -     -   109  -440     -     -     -    35     -     -    59 |
 ALRT |     -   -80     -     -    57     -     -     -     -     -     - |
 AMC2 |     -   -16   137     -     -     -     -  -185     -     -   193 |
 AREQ |     -   -28    13     X  -132     -     -   115     -     -     4 |
 ARTU |     -   182     -    45   -20     -     -  -106     -     -     X |
 ASPA |     -     -     -     -     8     -     -     -     -     -   -13 |
 AUCK |     -     -     -    48     -     -     -     -     -     -   -29 |
 BAHR |     -     -    -4     -    53     -     -    -7     -     -   -66 |
 BOR1 |     -    15    61     -     -     -     -     -     -     -   -95 |
 BREW |     -     -   -55     -     -     -     -     -     -     -    71 |
 BRUS |     -    15    49     -     -     -     -   -23     -     -   -36 |
 CAS1 |     -   -65     -   -73   -34     -     -    61     -     -    55 |
 CEDU |     -  -242     -   263     -     -     -    57     -     -     7 |
 CHAT |     -   -92     -     -    98     -     -     -     -     -   -50 |
 COCO |     -    73     -    27  -108     -     -    66     -     -   -49 |
 CRO1 |     -    51    64   -22   -14     -     -   -55     -     -     X |
 DARW |     -     -    69     -     -     -     -   -46     -     -     X |
 DAV1 |     -    55     -     -    -7     -     -    32     -     -  -111 |
 DGAR |     -   -15     -     -     -     -     -    41     -     -   -60 |
 DRAO |     -    74  -104     -     -     -     -    42     -     -   -31 |
 DWH1 |     -   220     X     -     -     -     -  -177     -     -   111 |
 FAIR |     -     -    10  -136   -41     -     -    71     -     -     - |
 FORT |     -    94     -   123  -121     -     -     -     -     -     - |
 GLPS |     -    23     -    94   -51     -     -     -     -     -    -2 |
 GODE |     -   -51    97   -84     -     -     -     -     -     -   -17 |
 GOLD |     -   -51     -    99     -     -     -   -38     -     -    70 |
 GRAZ |     -     -    32     -     -     -     -     -     -     -   -41 |
 GUAT |     -   126     -     -  -105     -     -     -     -     -    25 |
 HERS |     -     -  -193     -     -     -     -     -     -     -   248 |
 HOB2 |     -  -117   221     -     -     -     -   -18     -     -  -117 |
 HOFN |     -     -     -     -  -107     -     -   -32     -     -   227 |
 HRAO |     -     -     -     -   -85     -     -    13     -     -   110 |
 IENG |     -  -122   108     -     -     -     -     -     -     -     - |
 IISC |     -   145     -  -336    26     -     -     -     -     -     - |
 ISPA |     -     -     -     -   -16     -     -   -31     -     -    84 |
 JPLM |     -     -   -88     -     -     -     -     -     -     -   113 |
 KERG |     -     -   -80   -27   108     -     -     -     -     -   -52 |
 KGN0 |     -     1    11     -     -     -     -     -     -     -   -14 |
 KIRU |     -   -52     -     -     -     -     -    15     -     -    32 |
 KIT3 |     -     -     -   261  -186     -     -     -     -     -   136 |
 KOKB |     -   -30    64     -   -72     -     -     -     -     -    65 |
 KOSG |     -   -64     -     -     -     -     -     -     -     -    72 |
 KOUR |     -     -     -    48   -18     -     -     -     -     -     - |
 KUNM |     -     -     -     -     -     -     -   -37     -     -    71 |
 LAE1 |     -     -     -     -   168     -     -     -     -     -  -265 |
 LPGS |     -   -63   -17     X     X     -     -     -     -     -    89 |
 MAC1 |     -   -19     -    36     X     -     -     -     -     -     X |
 MADR |     -     -     -     -     -     -     -   -83     -     -   158 |
 MALI |     -    42     -   -78     -     -     -     -     -     -     - |
 MAS1 |     -     -   -12  -121     X     -     -    38     -     -    13 |
 MAW1 |     -   160     -     -   -91     -     -     -     -     -   -37 |
 MBAR |     -   -27     -     -   -34     -     -    44     -     -     X |
 MCM4 |     -    71  -157     -    76     -     -     -     -     -     - |
 MDO1 |     -    42     7     -  -169     -     -     -     -     -   211 |
 MIZU |     -     -   -11     1     -     -     -     -     -     -    14 |
 MKEA |     -     -     -   165     -     -     -    -3     -     -   -94 |
 MONP |     -    -1     -     -     -     -     -     -     -     -     2 |
 NKLG |     -    13     -     -     -     -     -     -     -     -   -15 |
 NLIB |     -     -   -47     -     -     -     -    46     -     -   -27 |
 NNOR |     -     -   143     X     -     -     -  -140     -     -    83 |
 NPLD |     -  -171   124     -     -     -     -     -     -     -    34 |
 NRC1 |     -     -    24     -   -54     -     -     -     -     -    55 |
 NSSP |     -    -2     -     -     -     -     -   -49     -     -    94 |
 NTUS |     -     -     -  -144    15     -     -     -     -     -    63 |
 NYA1 |     -   137     -     -   -69     -     -     -     -     -   -46 |
 ONSA |     -     -   111  -236     -     -     -     -     -     -     - |
 PDEL |     -   -73     -     -    52     -     -     -     -     -     - |
 PERT |     -     -   -45   -67   156     -     -     -     -     -  -149 |
 PETP |     -     -     -     -   -20     -     -    16     -     -     X |
 PIE1 |     -     -   -88   220     -     -     -     -     -     -     3 |
 POL2 |     -   120     -     -     -     -     -   -76     -     -     8 |
 POTS |     -    -6     -     -   -10     -     -     -     -     -    22 |
 PRDS |     -   -20   -25     -     -     -     -     -     -     -    55 |
 PTBB |     -   -24    98     -     -     -     -     -     -     -   -98 |
 QAQ1 |     -     -    23     -     -     -     -     -     -     -   -29 |
 REYK |     -   -18     -     -     -     -     -     -     -     -    20 |
 SCH2 |     -     -   109     -     -     -     -  -120     -     -    86 |
 SFER |     -   -84    74     -     -     -     -     -     -     -     - |
 SPT0 |     -   -77    41     -     -     -     -     -     -     -    35 |
 STJO |     -    78    36     -   -53     -     -   -27     -     -     X |
 SUTM |     -     -   218     -  -246     -     -    58     -     -     X |
 THTI |     -     -   -98    33   179     -     -     -     -     -  -177 |
 TID1 |     -     -     -     -     -     -     -    -2     -     -     4 |
 TIDB |     -     -   142   -62     -     -     -     -     -     -  -144 |
 TLSE |     -     -    48     -     -     -     -     -     -     -   -62 |
 TRO1 |     -     -     -     -   -26     -     -     -     -     -    41 |
 TSKB |     -   -48    31    -4    19     -     -     -     -     -   -14 |
 TWTF |     -     4   -38     -     -     -     -   -52     -     -   143 |
 USN3 |     -     -     -     -     -     -     -   -33     -     -    63 |
 USNO |     -   -28    21     -     -     -     -     -     -     -     6 |
 USUD |     -     -    15    -5     -     -     -    -8     -     -     X |
 VILL |     -     -     -   -56     -     -     -     -     -     -    34 |
 WILL |     -    18     6     -     -     -     -     -     -     -   -28 |
 WTZR |     -   -64   218  -167     -     -     -     -     -     -  -105 |
 YAKT |     -   103     -     -     -     -     -   -83     -     -    40 |
 YEBE |     -     -    48     -     -     -     -     -     -     -   -61 |
 YELL |     -   -51   -10   173   -86     -     -     -     -     -   107 |
 ZWEN |     -   -30     -  -206    41     -     -     -     -     -    93 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  9057    56    52    96    60   188 11328    27  4434     -   113 |  288   3.31
    3 |  4211   154    52   167    69   248  2118    34  4304     -    72 |  288   2.47
    4 |  3117    32    43    95    34    93  3010    37  2478     -    45 |  288   0.62
    5 |  3676    26    34    37    22   179  2946    31  3614     -    49 |  288   1.53
    6 |  1141   149   111    76    69   196  4423    40  1211     -   141 |  288   1.78
    7 |   841   133    99   117    96   397  2231    87   898     -    72 |  288   0.65
    8 |  1710    36    35    61    36    80  2681    35  3745     -    45 |  288   2.43
    9 |  6489    22    77   135    21    95  5780    34  5490     -    77 |  288   3.23
   10 |  2758    55    39    95    40   196  2284    32  2791     -    69 |  288   2.85
   11 |   925    43    47    47    32   189  1260    40   745     -   140 |  288   0.38
   13 |   902    52    65    61    60   140   897    25   845     -    55 |  288   0.51
   14 |   451    68    58    58    45   189   447    34   485     -   104 |  288   0.25
   15 |  4090    49    31    34    26   139  3097    15  3788     -    37 |  288   2.32
   16 |   455    52    48    60    36   156   288    32   602     -    60 |  288   0.36
   17 |   593    58    66    95    22   222  1358    30  1051     -    33 |  288   1.23
   18 |   494    62    49    62    42   117   818    64   506     -    93 |  288   0.35
   19 |  1025    71    78    90    35   335  1100    20   977     -     X |  288   0.27
   20 |   760    95    73    73    30   291   578    32   715     -    54 |  288   0.20
   21 |   577    37    30   118    39   128  1059    27   715     -    33 |  288   0.25
   22 |  1666    57    37    45    45   134  2276    46  1946     -   106 |  288   0.21
   23 |   890    49     X    71    41   316   724    54   966     -    56 |  288   0.30
   24 |  4479    48    26    53    37    96  6430    25  4173     -    74 |  288   2.21
   25 |  4753   129    52     -    31   105     -    19  4075     -   138 |  288   3.35
   26 |  1759    46    59    60    36   158  1481    20  1351     -    86 |  288   0.69
   27 |  2030    23    37    62    18    89  2375    43  1849     -    99 |  288   0.89
   28 |  1107    60    80    49    42   212  1092    23  1300     -    97 |  288   1.14
   29 |  1304    74     -     X    58   554   666    51  1465     -   105 |  288   1.20
   30 |  1291    34    41    47    18   339  3489    39  1053     -    42 |  288   0.75
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    25    19     -     -     -     -    19     -     -    26 |  288   0.07
 ALGO |     -     -    24    61     -     -     -    21     -     -    18 |  288   0.04
 ALRT |     -    29     -     -    21     -     -     -     -     -     - |  288   7.08
 AMC2 |     -    24    13     -     -     -     -    16     -     -    17 |  288   0.03
 AREQ |     -    27    19     X    27     -     -    31     -     -    50 |  288  14.30
 ARTU |     -    28     -    33    26     -     -    28     -     -     X |  288  10.72
 ASPA |     -     -     -     -    45     -     -     -     -     -    70 |  288    >>>
 AUCK |     -     -     -    87     -     -     -     -     -     -    52 |  165  19.26
 BAHR |     -     -    37     -    20     -     -    20     -     -    42 |  288   0.55
 BOR1 |     -    45    50     -     -     -     -     -     -     -    26 |  288   0.68
 BREW |     -     -    16     -     -     -     -     -     -     -    20 |  288   0.03
 BRUS |     -    34    47     -     -     -     -    24     -     -    37 |  288   0.04
 CAS1 |     -    31     -    94    31     -     -    19     -     -    38 |  288   8.81
 CEDU |     -    19     -    87     -     -     -    36     -     -    28 |  288  17.86
 CHAT |     -    65     -     -    32     -     -     -     -     -    46 |  287   8.84
 COCO |     -    21     -    58    26     -     -    20     -     -    51 |  288   9.13
 CRO1 |     -    28    30    91    29     -     -    31     -     -     X |  288  18.64
 DARW |     -     -    30     -     -     -     -    20     -     -     X |  288  14.72
 DAV1 |     -    23     -     -    28     -     -    25     -     -    41 |  288  11.89
 DGAR |     -    31     -     -     -     -     -    15     -     -    25 |  288  21.09
 DRAO |     -    20    22     -     -     -     -    19     -     -    21 |  288   0.08
 DWH1 |     -    27     X     -     -     -     -    12     -     -    25 |  288   0.68
 FAIR |     -     -    27    29    20     -     -    14     -     -     - |  288   0.23
 FORT |     -    54     -    83    25     -     -     -     -     -     - |  280   0.21
 GLPS |     -    27     -    52    19     -     -     -     -     -    20 |  288  20.70
 GODE |     -    48    14    85     -     -     -     -     -     -    21 |  288   0.05
 GOLD |     -    36     -    97     -     -     -    40     -     -    25 |  288  13.68
 GRAZ |     -     -    30     -     -     -     -     -     -     -    39 |  282    >>>
 GUAT |     -    36     -     -    33     -     -     -     -     -    21 |  288    >>>
 HERS |     -     -    20     -     -     -     -     -     -     -    26 |  241  12.21
 HOB2 |     -    28    33     -     -     -     -    25     -     -    44 |  288   0.05
 HOFN |     -     -     -     -    25     -     -    26     -     -    26 |  287    >>>
 HRAO |     -     -     -     -    39     -     -    34     -     -   117 |  288   0.51
 IENG |     -    35    30     -     -     -     -     -     -     -     - |  288   0.50
 IISC |     -    28     -    68    35     -     -     -     -     -     - |  288  24.47
 ISPA |     -     -     -     -    41     -     -    39     -     -    51 |  288  14.90
 JPLM |     -     -    15     -     -     -     -     -     -     -    20 |  288  13.12
 KERG |     -     -    23   136    26     -     -     -     -     -    51 |  288   3.59
 KGN0 |     -    30    38     -     -     -     -     -     -     -    30 |  287   0.41
 KIRU |     -    16     -     -     -     -     -    16     -     -    36 |  280 172.07
 KIT3 |     -     -     -    28    18     -     -     -     -     -    25 |  288  16.44
 KOKB |     -    35    38     -    36     -     -     -     -     -    22 |  288   0.09
 KOSG |     -    21     -     -     -     -     -     -     -     -    24 |  288 157.31
 KOUR |     -     -     -    59    22     -     -     -     -     -     - |  154   1.87
 KUNM |     -     -     -     -     -     -     -    21     -     -    41 |  288  21.10
 LAE1 |     -     -     -     -    26     -     -     -     -     -    42 |  287  18.47
 LPGS |     -    47    40     X     X     -     -     -     -     -    46 |  288  31.87
 MAC1 |     -    40     -    74     X     -     -     -     -     -     X |  285  17.97
 MADR |     -     -     -     -     -     -     -    18     -     -    35 |  288  18.48
 MALI |     -    43     -    81     -     -     -     -     -     -     - |  285  17.39
 MAS1 |     -     -    40    88     X     -     -    41     -     -    26 |  288  22.91
 MAW1 |     -    23     -     -    21     -     -     -     -     -    29 |  288  28.41
 MBAR |     -    27     -     -    23     -     -    16     -     -     X |  288  18.59
 MCM4 |     -    32    21     -    18     -     -     -     -     -     - |  288  22.19
 MDO1 |     -    22    31     -    18     -     -     -     -     -    20 |  288  46.99
 MIZU |     -     -    24    68     -     -     -     -     -     -    42 |  288   0.44
 MKEA |     -     -     -    40     -     -     -    16     -     -    35 |  288  27.20
 MONP |     -    17     -     -     -     -     -     -     -     -    19 |  287  13.23
 NKLG |     -    48     -     -     -     -     -     -     -     -    55 |  282    >>>
 NLIB |     -     -    29     -     -     -     -    21     -     -    24 |  288   0.05
 NNOR |     -     -    24     X     -     -     -    27     -     -    56 |  288  12.01
 NPLD |     -    22    27     -     -     -     -     -     -     -    16 |  287   0.06
 NRC1 |     -     -    21     -    26     -     -     -     -     -    22 |  288   0.06
 NSSP |     -    24     -     -     -     -     -    18     -     -    26 |  288  12.01
 NTUS |     -     -     -    67    21     -     -     -     -     -    42 |  288  10.59
 NYA1 |     -    26     -     -    45     -     -     -     -     -    47 |  288   0.10
 ONSA |     -     -    30    64     -     -     -     -     -     -     - |  279   0.09
 PDEL |     -    38     -     -    27     -     -     -     -     -     - |  288  54.66
 PERT |     -     -    24    59    38     -     -     -     -     -    54 |  288   4.06
 PETP |     -     -     -     -    24     -     -    20     -     -     X |  287  12.92
 PIE1 |     -     -    20    61     -     -     -     -     -     -    23 |  259   1.82
 POL2 |     -    22     -     -     -     -     -    18     -     -    21 |  288   9.51
 POTS |     -    42     -     -    40     -     -     -     -     -    53 |  288  20.05
 PRDS |     -    25    24     -     -     -     -     -     -     -    17 |  288   0.96
 PTBB |     -    35    30     -     -     -     -     -     -     -    17 |  288   0.38
 QAQ1 |     -     -    21     -     -     -     -     -     -     -    26 |  288  64.85
 REYK |     -    12     -     -     -     -     -     -     -     -    13 |  288   8.30
 SCH2 |     -     -    24     -     -     -     -    22     -     -    16 |  288  16.62
 SFER |     -    24    21     -     -     -     -     -     -     -     - |  287   0.30
 SPT0 |     -    43    44     -     -     -     -     -     -     -    26 |  288   0.06
 STJO |     -    24    38     -    28     -     -    17     -     -     X |  288   0.05
 SUTM |     -     -    34     -    23     -     -    24     -     -     X |  285   9.04
 THTI |     -     -    52    47    33     -     -     -     -     -    38 |  288   3.66
 TID1 |     -     -     -     -     -     -     -    29     -     -    54 |  288   0.14
 TIDB |     -     -    19    34     -     -     -     -     -     -    16 |  288   0.14
 TLSE |     -     -    28     -     -     -     -     -     -     -    35 |  287   0.60
 TRO1 |     -     -     -     -    15     -     -     -     -     -    24 |  288   9.85
 TSKB |     -    36    48   105    61     -     -     -     -     -    57 |  288   0.86
 TWTF |     -    43    33     -     -     -     -    23     -     -    29 |  288   0.45
 USN3 |     -     -     -     -     -     -     -    12     -     -    24 |  288   0.02
 USNO |     -    30    29     -     -     -     -     -     -     -    19 |  235   0.03
 USUD |     -     -    37    70     -     -     -    32     -     -     X |  288  11.80
 VILL |     -     -     -    73     -     -     -     -     -     -    44 |  288 650.30
 WILL |     -    26    30     -     -     -     -     -     -     -    20 |  288 135.74
 WTZR |     -    19    57    47     -     -     -     -     -     -    56 |  282   0.07
 YAKT |     -    56     -     -     -     -     -    43     -     -    24 |  288   1.21
 YEBE |     -     -    51     -     -     -     -     -     -     -    66 |  284 310.37
 YELL |     -    93    56    55    55     -     -     -     -     -    85 |  288   0.03
 ZWEN |     -    24     -    32    29     -     -     -     -     -    53 |  288  18.85
 -----+-------------------------------------------------------------------+--------------
 TOT  |  3014    50    43    76    37   225  3355    31  2517     -    54 |


 BEST CLOCK FIT: USN3   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 NLIB |   288     0     0   288    9.96   | 3.50e-14  7.07e-15  2.25e-15 |
 SPT0 |   288     1     0   287    9.81   | 5.28e-14  2.11e-14  4.84e-15 |
 NPLD |   287     0     0   286    9.63   | 5.06e-14  1.54e-14  2.35e-15 |
 AMC2 |   288     0     0   288    9.46   | 3.87e-14  8.67e-15  2.08e-15 |
 BREW |   288     0     0   288    9.10   | 4.31e-14  9.21e-15  2.34e-15 |
 ALBH |   288     0     0   288    4.68   | 3.95e-14  8.46e-15  2.63e-15 |
 YELL |   288     0     0   288    4.61   | 2.86e-14  1.03e-14  2.94e-15 |
 TID1 |   288     0     0   288    4.43   | 4.63e-14  7.32e-15  6.16e-15 |
 BRUS |   288     0     0   143    4.28   | 5.36e-14  1.67e-14  2.51e-15 |
 PIE1 |   259     0     0   252    4.20   | 6.83e-14  2.21e-14         - |
 NYA1 |   288     0     0   288    3.35   | 2.98e-14  8.65e-15  6.68e-15 |
 ONSA |   279     0     0   276    3.30   | 5.07e-14  2.37e-14  7.69e-15 |
 ALGO |   288     0     0   288    2.82   | 3.00e-14  5.92e-15  3.63e-15 |
 HOB2 |   288     0     0   288    2.68   | 4.51e-14  1.22e-14  2.90e-15 |
 KOKB |   288     0     0   288    2.38   | 5.20e-14  1.58e-14  9.15e-15 |
 WTZR |   282     0     0   255    2.29   | 4.42e-14  2.43e-14  5.68e-15 |
 STJO |   288     0     0   288    2.27   | 3.32e-14  7.71e-15  2.02e-15 |
 NRC1 |   288     1     0   287    2.10   | 3.24e-14  5.99e-15  5.14e-15 |
 FORT |   280     0     0   277    1.94   | 8.20e-14  2.91e-14  1.23e-14 |
 YEBE |   284     1     0   281    1.75   | 8.33e-14  1.85e-14  9.68e-15 |
 USN3 |   288     0     0   143    1.72   | 6.96e-14  9.08e-15  2.13e-15 |
 DRAO |   288     0     0   288    0.69   | 6.89e-14  1.77e-14  7.75e-15 |
 GODE |   288     0     0   288    0.43   | 3.44e-14  7.49e-15  6.24e-15 |
 TIDB |   288     0     3    77    0.39   | 1.92e-13  1.71e-14  6.89e-15 |
 USNO |   235     0     0   234    0.29   | 4.20e-14  7.41e-15         - |
 FAIR |   288     1     0   287    0.20   | 1.90e-13  5.15e-14  1.58e-14 |
 MIZU |   288     1     0   287    0.11   | 3.52e-13  9.61e-14  3.80e-14 |
 G16  |   288     1     0   287    0.11   | 4.33e-13  6.27e-14  4.40e-14 |
 SFER |   287     0     0   286    0.09   | 4.16e-13  1.41e-13  2.14e-14 |
 PTBB |   288     1     2   129    0.08   | 4.00e-13  9.96e-14  2.72e-14 |
 TWTF |   288     1     0   287    0.08   | 4.21e-13  1.18e-13  2.90e-14 |
 G27  |   288     1     0   287    0.08   | 3.66e-13  7.22e-14  8.18e-14 |
 TLSE |   287     0     0   286    0.08   | 4.14e-13  1.10e-13  4.60e-14 |
 KGN0 |   287     0     0   286    0.07   | 3.73e-13  9.82e-14  3.12e-14 |
 BOR1 |   288     1     0   287    0.06   | 4.43e-13  1.28e-13  7.32e-14 |
 HRAO |   288     1     0   287    0.06   | 1.27e-13  3.29e-14  6.38e-14 |
 G07  |   288     1     0   287    0.05   | 2.89e-13  1.06e-13  8.32e-14 |
 G26  |   288     1     0   287    0.05   | 3.41e-13  1.01e-13  8.63e-14 |
 DWH1 |   288     1     0   287    0.04   | 5.04e-13  1.69e-13  8.03e-14 |
 G30  |   288     1     0   287    0.04   | 3.61e-13  1.19e-13  9.00e-14 |
 G04  |   288     1     0   287    0.04   | 4.55e-13  1.45e-13  7.71e-14 |
 G29  |   288     1     0   287    0.04   | 4.23e-13  1.27e-13  1.19e-13 |
 G17  |   288     1     0   287    0.03   | 3.83e-13  1.25e-13  1.12e-13 |
 IENG |   288     0     0   143    0.02   | 5.49e-13  1.52e-13  4.27e-14 |
 G06  |   288     1     0   287    0.02   | 4.51e-13  1.48e-13  1.52e-13 |
 YAKT |   288     1     0   287    0.01   | 4.36e-13  1.34e-13  1.41e-13 |
 TSKB |   288     1     0   287    0.01   | 9.81e-13  2.78e-13  7.92e-14 |
 BAHR |   288     1     3    77    0.01   | 7.26e-13  1.20e-13  3.99e-14 |
 KERG |   288     1     0   287    0.01   | 1.17e-12  4.69e-13  2.70e-13 |
 G08  |   288     1     0   287    0.01   | 1.33e-12  3.66e-13  1.65e-13 |
 PRDS |   288     1     0   287    0.01   | 1.50e-12  3.72e-13  7.28e-14 |
 G09  |   288     1     0   287    0.01   | 1.40e-12  4.43e-13  2.12e-13 |
 G24  |   288     1     0   287    0.00   | 1.28e-12  3.88e-13  2.12e-13 |
 G05  |   288     1     2    96    0.00   | 1.40e-12  4.12e-13  1.18e-13 |
 MAS1 |   288     2     0   286    0.00   | 1.87e-12  4.98e-13  1.56e-13 |
 KOUR |   154     0     0    51    0.00   | 1.59e-12  4.01e-13         - |
 G25  |   288     0     3    17    0.00   | 1.45e-12  3.34e-13  2.38e-13 |
 GPST |   288     0     0     0    0.00   | 2.33e-14  4.55e-15  1.91e-15 |
 SUTM |   285     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   282     1     0     0    0.00   |        -         -         - |
 MONP |   287     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HOFN |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 AUCK |   165     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     6     0    0.00   | 6.46e-13  6.88e-14  7.43e-14 |
 G23  |   288     1     6     0    0.00   | 6.11e-13  6.59e-14  1.87e-14 |
 G22  |   288     1     5     0    0.00   | 6.60e-13  6.89e-14  1.77e-14 |
 G21  |   288     2     6     0    0.00   | 8.57e-13  1.14e-13  3.99e-14 |
 G20  |   288     1     5     0    0.00   | 6.46e-13  7.68e-14  1.99e-14 |
 G19  |   288     1     5     0    0.00   | 6.61e-13  7.26e-14  2.09e-14 |
 G18  |   288     1     6     0    0.00   | 1.37e-12  1.25e-13  2.46e-14 |
 G15  |   288     1     0     0    0.00   | 1.54e-12  5.52e-13  2.72e-13 |
 G14  |   288     1     6     0    0.00   | 6.63e-13  6.08e-14  2.26e-14 |
 G13  |   288     1     5     0    0.00   | 7.92e-13  1.93e-13  3.89e-14 |
 G11  |   288     1     6     0    0.00   | 8.66e-13  8.20e-14  4.19e-14 |
 G10  |   288     1     0     0    0.00   | 1.23e-12  4.22e-13  3.67e-13 |
 G03  |   288     1     0     0    0.00   | 1.32e-12  4.69e-13  2.69e-13 |
 G01  |   288     1     0     0    0.00   | 1.54e-12  6.80e-13  3.64e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     3     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 4.09e-13  1.66e-13  3.51e-13 |
 SCH2 |   288     0     0     0    0.00   | 6.50e-13  3.46e-13  1.21e-12 |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     2     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     1     0     0    0.00   | 1.95e-12  5.58e-13  3.52e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MALI |   285     0     0     0    0.00   |        -         -         - |
 MADR |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   285     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   280     1     0     0    0.00   |        -         -         - |
 JPLM |   288     1     0     0    0.00   | 5.43e-13  3.92e-13  1.38e-12 |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GRAZ |   282     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.17e-17  2.60e-16  1.56e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     YELL      ALGO      STJO |
------------------------------------------+------------------------------+
