
 GPS week: 1286   Day: 2   MJD: 53248                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2784      0    -0.07     0.08     2.18     0.00
 cod |   288     0  25411      5     0.08    -0.61     0.04    18.22
 emr |   288     0  21376   1084   166.65    29.59     0.08     9.57
 esa |   288     0  19068    989   165.75    29.62     0.07    11.26
 gfz |   288     0  19413     58    -0.05    -0.10     0.04    25.98
 iga |    96     0   2784      4    -0.10     0.10     0.11     0.00
 igu |    96     0   2688      0    -0.10     0.09     2.62     0.00
 jpl |   288     0  17946      0    -5.44     0.54     0.04    21.01
 ngs |    96     0   2784      0    -0.06     0.08     2.13     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  29877   7654    -5.49     0.44     0.06    13.97

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -3538    79  -219     5   -35   -69 -1370    64 -3033     -    -9 |
    3 | -3424    16  -148  -114    93   -68 -1707    84 -3907     -  -127 |
    4 | -3465   -67   -43  -189   144  -122  1128    13 -3116     -   -18 |
    5 | -3108   -77   -44   327   -66   141 -6569   -32 -2848     -    33 |
    6 |  -311  -106  -138   256   138  -257 -9415  -127  -553     -   -48 |
    7 | -2301    -7  -133    46    66   152  1450    25 -2011     -   -96 |
    8 |   996    61   -51  -194    15   113  5915    51   856     -     8 |
    9 | -6551     8   -36   181   -59  -166 -3541   -63 -6647     -    72 |
   10 |    -4     0   -19   323  -177    30  2199    56   345     -    -2 |
   11 |  4148    -6     X  -135   -14  -210   291   154  3940     -   -89 |
   13 |  2827    63   -88    46   -55    42   742    76  2941     -   -72 |
   14 |  6428   127   -50   -81   -87   -82  1377    93  6279     -   -44 |
   15 | -4032    41   -76   -69   -27   187 -2889    16 -3476     -    80 |
   16 |  5813    42     X    -1   -89   -77  1438   135  5301     -   -98 |
   17 | -3446   -65   -84   465   -52    22  9612   -52 -3219     -   -59 |
   18 |  4641    -7   121  -147    43   -86  2017     1  4412     -   -20 |
   19 |  4165   141  -206   -46   100  1500  3185    97  4626     -  -337 |
   20 |  6788    -4  -104    93   -80   -90   783   153  6100     -   -85 |
   21 |  5167    60     X  -359    86   126  2417   -15  5619     -    73 |
   22 | -3512    -8    18  -192   126  -216   -55   -39 -3214     -   -14 |
   23 |   384    55  -187  -183   140  -188   787    53   -58     -  -165 |
   24 |  3794   -97   -95   150   128  -222  8177  -109  2003     -    -1 |
   25 | -3200    24  -101  -212   130  -236 -6705    14 -3397     -   -55 |
   26 | -3583   -52    12   124     2   -69  -943   -36 -3325     -    11 |
   27 | -3738    -5  -182  -109   172   -66  1113   -10 -3344     -   -87 |
   28 |  2621    16    45  -358   -19   189-10694   198  3102     -   -28 |
   29 |   312   -65    -4   158   -99  -113     -    23  -100     -   111 |
   30 |   566   -13     -   170     5  -143  2812   -10   645     -  -120 |
   31 | -4434    -5     -  -127    62     6 -1554    55 -3919     -   -90 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -   124     -     -     -     -   -56     -     -     X |
 ALGO |     -     -  -315   595     -     -     -  -175     -     -     - |
 AMC2 |     -   -50     -     -     -     -     -   -53     -     -   144 |
 AREQ |     -   -50    82   365   -52     -     -  -131     -     -     8 |
 ARTU |     -    78     -    18   -32     -     -   -39     -     -     X |
 ASPA |     -     -     -     -    26     -     -     -     -     -   -48 |
 AUCK |     -     -     -   -72     -     -     -     -     -     -    58 |
 BAHR |     -    -3   -59     -    40     -     -    -6     -     -   -22 |
 BOGT |     -    93     -     X   -12     -     -     -     -     -   -96 |
 BOR1 |     -    27   -52     -     -     -     -     -     -     -     X |
 BRUS |     -    -3     4     -     -     -     -     1     -     -     X |
 CHAT |     -   -62     -   -15    60     -     -     -     -     -   -18 |
 CHUR |     -    -8    14     -     -     -     -     -     -     -     X |
 CRO1 |     -     -   273  -521  -562     -     -   486     -     -   279 |
 DGAR |     -    20     -     -   -43     -     -    36     -     -     X |
 DRAO |     -     3   -85     -     -     -     -    88     -     -   -78 |
 DWH1 |     -   322   220     -     -     -     -  -379     -     -     X |
 FAIR |     -     -   124     X   -60     -     -    16     -     -     - |
 GLPS |     -    41     -    75   -61     -     -     -     -     -     - |
 GODE |     -    68   -51   -20     -     -     -     -     -     -   -37 |
 GOL2 |     -     -   246     -     -     -     -   -38     -     -  -126 |
 GOLD |     -   128     -  -228     -     -     -    21     -     -   -14 |
 GUAM |     -     2     -  -116    43     -     -   -62     -     -   105 |
 GUAT |     -   -38     -     -    26     -     -     -     -     -     0 |
 HARB |     -     1     -    -1     -     -     -     -     -     -     X |
 HERS |     -     2    -3     -     -     -     -     -     -     -     X |
 HLFX |     -     -   295     -     -     -     -  -134     -     -     X |
 HOFN |     -     -     -     -   -46     -     -    57     -     -     - |
 HRAO |     -     -     -     -   -63     -     -    25     -     -    79 |
 IENG |     -   -11    22     -     -     -     -     -     -     -     - |
 IISC |     -   -35     -   -93    64     -     -     -     -     -     - |
 IRKT |     -     -  -126   107     -     -     -     -     -     -     - |
 JPLM |     -     -   142     -  -117     -     -    89     -     -   -14 |
 KERG |     -    10   -60  -175    72     -     -     -     -     -    35 |
 KGN0 |     -    42   -81     -     -     -     -     -     -     -     X |
 KIRU |     -    43     -     -     -     -     -   -38     -     -     X |
 KOKB |     -    21   126     -  -107     -     -     -     -     -    85 |
 KOUR |     -   192     -  -320     4     -     -     -     -     -     - |
 LAE1 |     -   101     -   -18   -31     -     -     -     -     -   -59 |
 LHAS |     -    75     -     -     -     -     -   -65     -     -     X |
 LPGS |     -   -87   128   -18     -     -     -     -     -     -    39 |
 MALI |     -    24     -   -65     -     -     -     -     -     -    21 |
 MAS1 |     -     -     -  -375    12     -     -   147     -     -    60 |
 MBAR |     -  -136     -     -    11     -     -    44     -     -    91 |
 MDO1 |     -     -    63     -   -75     -     -     -     -     -    97 |
 METS |     -   -35    66     -     -     -     -     -     -     -     X |
 MIZU |     -     -     -   529     -     -     -  -283     -     -     X |
 MKEA |     -    48     -   -30     -     -     -   -67     -     -    63 |
 NKLG |     -     -     -  -218     -     -     -     -     -     -   176 |
 NLIB |     -     -    77     -     -     -     -     0     -     -   -54 |
 NNOR |     -     -   150    96     -     -     -   -82     -     -   -57 |
 NPLD |     -   -18    35     -     -     -     -     -     -     -     X |
 NRC1 |     -     -    15     -   -69     -     -     -     -     -   119 |
 NTUS |     -  -129     -   -64     -     -     -     -     -     -   220 |
 NYA1 |     -  -293     -     -   205     -     -     -     -     -     X |
 NYAL |     -     -   -26     -     -     -     -     -     -     -    18 |
 ONSA |     -   -46   -59   123     -     -     -     -     -     -     - |
 PERT |     -   -77   -74  -226   174     -     -     -     -     -    10 |
 PETP |     -  -109     -     -    73     -     -     5     -     -     X |
 PIE1 |     -     -   147   228     -     -     -     -     -     -  -260 |
 POL2 |     -    84     -     -     -     -     -   -73     -     -     X |
 POTS |     -   -44     -     -   -38     -     -     -     -     -   127 |
 PTBB |     -    45   -86     -     -     -     -     -     -     -     X |
 RESO |     -   -52     -     -    36     -     -     -     -     -     - |
 RIOG |     -   -79   332     -   -55     -     -     -     -     -   -22 |
 SCH2 |     -     -    64     -     -     -     -   -29     -     -     X |
 SFER |     -   -64   121     -     -     -     -     -     -     -     - |
 SPT0 |     -   -30    57     -     -     -     -     -     -     -     X |
 STJO |     -     -    20     -   -29     -     -    27     -     -     X |
 SUTH |     -  -128     -   226     -     -     -     -     -     -   -16 |
 THTI |     -     -   159   260  -176     -     -     -     -     -     9 |
 TIDB |     -    44   -95   156   -59     -     -     -     -     -    -9 |
 TIXI |     -    22     -     -    39     -     -   -68     -     -     X |
 TRO1 |     -    29     -     -   -59     -     -     -     -     -    72 |
 TSKB |     -   -72   -75    68    37     -     -     -     -     -    22 |
 TWTF |     -   100    73     -     -     -     -  -120     -     -     X |
 URUM |     -   -62     -     -     -     -     -     -     -     -    80 |
 USNO |     -   -35    -2     -     -     -     -     -     -     -    48 |
 USUD |     -     -  -170   145     -     -     -     -     -     -     0 |
 VILL |     -     0     -     X     -     -     -     -     -     -     0 |
 WHIT |     -   -18     -     -     -     -     -     -     -     -    23 |
 WILL |     -   -90   172     -     -     -     -     -     -     -     X |
 WTZR |     -   -21    51   -80     -     -     -     -     -     -    56 |
 WUHN |     -     -  -177     -   140     -     -     -     -     -  -139 |
 YAKT |     -    68     -     -     -     -     -   -59     -     -     X |
 YELL |     -    -5    43    14   -68     -     -     -     -     -    93 |
 ZWEN |     -     -     -  -126     2     -     -     -     -     -    98 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  3281    62   157    35    24    81  2311    42  3115     -    73 |  288   3.03
    3 |  3202    59    76    48    28    72  1883    49  2702     -    66 |  288   2.10
    4 |  1481    37    35    54    34    53  1167    40  1382     -    51 |  288   0.81
    5 |  3665   100   104   106    62    68  2000    95  3670     -   134 |  288   2.90
    6 |   918    25    66    44    40    98  6435    35   942     -    49 |  288   1.85
    7 |  1261    27    66    81    73    50   884    39  1271     -    30 |  288   0.58
    8 |  1599    59    98    33    22    55  2475    27  1779     -    53 |  288   1.30
    9 |  4618    34    61    34    26    95  3057    49  4363     -   126 |  288   2.55
   10 |  2718   149    71   175    93   230  1978    52  2905     -    64 |  288   2.24
   11 |  1149    71     X    36    57    39   351   107  1018     -    61 |  288   0.31
   13 |   337    35   131   101    49    94   944    38   395     -    43 |  288   0.30
   14 |   693    29   137    39    13    57   851    39   918     -    55 |  288   0.30
   15 |  3468    59   183    49    61    51  2345    33  3280     -    52 |  288   2.19
   16 |   975    45     X    34    24    58  1038    32  1097     -    59 |  288   0.41
   17 |  1696    50    34    54    18    55  5366    38  1731     -    39 |  288   0.57
   18 |   557    62    79   137    37   184   960    45   711     -    44 |  288   0.37
   19 |  1935    63   131    58    48   128  1762    43  1826     -    95 |  288   0.43
   20 |  1397    70    57    57    33   103   618    35  1355     -    93 |  288   0.31
   21 |  1009    46     X    59    70   144   778    40   868     -    48 |  288   0.27
   22 |  1091    73    51    90    35    87   622    68   975     -    60 |  288   0.65
   23 |   790    40   139    85    29    64   641    47   847     -   104 |  288   0.33
   24 |  4536    34    35    26    22    73  4546    33  4562     -    34 |  288   2.23
   25 |  2466    34   169    60    18    76  3049    59  2547     -    48 |  288   1.42
   26 |  1128    35    76    74    34    35  1100    66   850     -    83 |  288   1.04
   27 |  1402    48    89    32    29    59  1263    26  1400     -    82 |  288   1.06
   28 |  1766    69   128    62    31   187  6288    24  1681     -    65 |  288   0.80
   29 |  2699    37    68    56    31   289     -    64  2668     -    51 |  288   1.06
   30 |  1396    67     -    49    32    78  1565    58  1484     -    58 |  288   0.45
   31 |   757    42     -    97    44    64   947    34   775     -    34 |  288   0.60
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    46     -     -     -     -    21     -     -     X |  288   0.05
 ALGO |     -     -    16    21     -     -     -    13     -     -     - |  288   0.04
 AMC2 |     -    16     -     -     -     -     -    15     -     -    23 |  288   0.02
 AREQ |     -    42    56    46    18     -     -    22     -     -    22 |  288  18.12
 ARTU |     -    33     -    89    22     -     -    49     -     -     X |  277  11.41
 ASPA |     -     -     -     -    17     -     -     -     -     -    32 |  288    >>>
 AUCK |     -     -     -   172     -     -     -     -     -     -   138 |  220  11.33
 BAHR |     -    23    21     -    12     -     -    35     -     -    23 |  288   1.76
 BOGT |     -    43     -     X    21     -     -     -     -     -    48 |  282  20.86
 BOR1 |     -    14    26     -     -     -     -     -     -     -     X |  288   0.39
 BRUS |     -    23    24     -     -     -     -    26     -     -     X |  288   0.02
 CHAT |     -    21     -    27    35     -     -     -     -     -    50 |  287  10.98
 CHUR |     -    72   137     -     -     -     -     -     -     -     X |  284  24.32
 CRO1 |     -     -    47    60    56     -     -    70     -     -    64 |  277  19.82
 DGAR |     -    22     -     -    27     -     -    36     -     -     X |  288  21.88
 DRAO |     -    18    32     -     -     -     -    14     -     -    15 |  288   0.46
 DWH1 |     -    18    47     -     -     -     -    22     -     -     X |  288   0.53
 FAIR |     -     -    68     X    33     -     -    49     -     -     - |  281   0.25
 GLPS |     -    23     -    27    16     -     -     -     -     -     - |  288  17.83
 GODE |     -    39    21    39     -     -     -     -     -     -    38 |  288   0.04
 GOL2 |     -     -    88     -     -     -     -    55     -     -    69 |  282  31.56
 GOLD |     -    25     -    65     -     -     -    65     -     -    37 |  284  12.62
 GUAM |     -    33     -    82    38     -     -    36     -     -    38 |  282  13.36
 GUAT |     -    46     -     -    23     -     -     -     -     -    31 |  288    >>>
 HARB |     -    56     -    90     -     -     -     -     -     -     X |  256  46.31
 HERS |     -    13    25     -     -     -     -     -     -     -     X |  232  43.02
 HLFX |     -     -    52     -     -     -     -    24     -     -     X |  288   8.83
 HOFN |     -     -     -     -    19     -     -    23     -     -     - |  269    >>>
 HRAO |     -     -     -     -    36     -     -    29     -     -    41 |  288   0.78
 IENG |     -    13    24     -     -     -     -     -     -     -     - |  288   0.94
 IISC |     -    40     -    54    18     -     -     -     -     -     - |  288  18.95
 IRKT |     -     -    68    57     -     -     -     -     -     -     - |  288   0.32
 JPLM |     -     -    37     -    17     -     -    30     -     -    76 |  288   6.02
 KERG |     -    31    46    43    49     -     -     -     -     -    87 |  288   2.80
 KGN0 |     -    16    30     -     -     -     -     -     -     -     X |  287   0.40
 KIRU |     -    22     -     -     -     -     -    19     -     -     X |  288   7.49
 KOKB |     -    65   123     -    37     -     -     -     -     -    62 |  288   0.07
 KOUR |     -    58     -    42    36     -     -     -     -     -     - |  288   1.41
 LAE1 |     -    28     -    71    23     -     -     -     -     -    65 |  287  12.59
 LHAS |     -    30     -     -     -     -     -    26     -     -     X |  288  12.01
 LPGS |     -    43    36    43     -     -     -     -     -     -    41 |  288  47.94
 MALI |     -    34     -    72     -     -     -     -     -     -    20 |  288  25.16
 MAS1 |     -     -     -    25    20     -     -    26     -     -    26 |  288   1.79
 MBAR |     -    46     -     -    54     -     -    20     -     -   118 |  288  25.60
 MDO1 |     -     -    25     -    12     -     -     -     -     -    18 |  287   6.38
 METS |     -    15    28     -     -     -     -     -     -     -     X |  287  10.14
 MIZU |     -     -     -    51     -     -     -    27     -     -     X |  218  33.27
 MKEA |     -    47     -    34     -     -     -    39     -     -    28 |  288  22.07
 NKLG |     -     -     -    30     -     -     -     -     -     -    24 |  287    >>>
 NLIB |     -     -    64     -     -     -     -    22     -     -    17 |  288   0.04
 NNOR |     -     -    53    70     -     -     -    62     -     -    88 |  288  12.62
 NPLD |     -    14    26     -     -     -     -     -     -     -     X |  287   0.03
 NRC1 |     -     -    22     -    17     -     -     -     -     -    23 |  288   0.04
 NTUS |     -    44     -    49     -     -     -     -     -     -    29 |  288   9.12
 NYA1 |     -    22     -     -    15     -     -     -     -     -     X |  288   0.09
 NYAL |     -     -    29     -     -     -     -     -     -     -    20 |  288   0.09
 ONSA |     -    51   172    66     -     -     -     -     -     -     - |  288   0.05
 PERT |     -    28    40    52    25     -     -     -     -     -    21 |  288   2.33
 PETP |     -    19     -     -    14     -     -    18     -     -     X |  287   9.43
 PIE1 |     -     -    64    53     -     -     -     -     -     -    40 |  284   1.62
 POL2 |     -    23     -     -     -     -     -    20     -     -     X |  288  10.76
 POTS |     -    22     -     -    17     -     -     -     -     -    24 |  288  38.63
 PTBB |     -    12    23     -     -     -     -     -     -     -     X |  288   0.26
 RESO |     -    22     -     -    15     -     -     -     -     -     - |  288   5.77
 RIOG |     -    36    41     -    29     -     -     -     -     -    66 |  288  14.02
 SCH2 |     -     -    39     -     -     -     -    18     -     -     X |  262   4.27
 SFER |     -    53   102     -     -     -     -     -     -     -     - |  231 769.01
 SPT0 |     -    20    39     -     -     -     -     -     -     -     X |  286   0.04
 STJO |     -     -    27     -    18     -     -    19     -     -     X |  288   0.05
 SUTH |     -    41     -    44     -     -     -     -     -     -    41 |  288  12.34
 THTI |     -     -    98    73    26     -     -     -     -     -    62 |  288   3.86
 TIDB |     -    37    75    22    29     -     -     -     -     -    54 |  288   0.13
 TIXI |     -    24     -     -    16     -     -    21     -     -     X |  287   6.62
 TRO1 |     -   109     -     -    47     -     -     -     -     -    81 |  288   7.76
 TSKB |     -    30    40    55    28     -     -     -     -     -    30 |  288   1.42
 TWTF |     -    14    36     -     -     -     -    19     -     -     X |  288   0.44
 URUM |     -    16     -     -     -     -     -     -     -     -    21 |  288  18.84
 USNO |     -    14    21     -     -     -     -     -     -     -    20 |  288   0.04
 USUD |     -     -    51    71     -     -     -     -     -     -    37 |  288   9.01
 VILL |     -    17     -     X     -     -     -     -     -     -    22 |  288  11.11
 WHIT |     -    27     -     -     -     -     -     -     -     -    35 |  288   0.73
 WILL |     -    29    56     -     -     -     -     -     -     -     X |  288 159.82
 WTZR |     -    14    26    28     -     -     -     -     -     -    31 |  288   0.04
 WUHN |     -     -    33     -    17     -     -     -     -     -    29 |  287  11.65
 YAKT |     -    20     -     -     -     -     -    17     -     -     X |  288   0.55
 YELL |     -    44    74   104    40     -     -     -     -     -    35 |  285 133.72
 ZWEN |     -     -     -    64    19     -     -     -     -     -    31 |  288  13.72
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2184    45    76    67    35   110  2621    42  2133     -    57 |


 BEST CLOCK FIT: AMC2   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 AMC2 |   288     0     0   288   11.10   | 3.19e-14  7.24e-15  1.89e-15 |
 ALGO |   288     0     0   288   10.58   | 3.51e-14  8.74e-15  3.63e-15 |
 ALBH |   288     1     0   287    9.92   | 4.12e-14  8.47e-15  4.15e-15 |
 NPLD |   287     0     0   286    9.02   | 4.61e-14  9.02e-15  3.61e-15 |
 YELL |   285     0     0   283    8.86   | 3.73e-14  8.33e-15  5.30e-15 |
 USNO |   288     0     0   287    7.39   | 3.42e-14  1.11e-14  4.70e-15 |
 BRUS |   288     0     0   288    6.93   | 4.31e-14  7.09e-15  1.77e-15 |
 ONSA |   288     0     0   288    5.89   | 4.64e-14  1.14e-14  4.27e-15 |
 SPT0 |   286     0     0   139    4.26   | 4.10e-14  8.38e-15  2.14e-15 |
 WTZR |   288     0     0   288    4.08   | 4.28e-14  1.43e-14  2.77e-15 |
 GODE |   288     0     0   288    3.90   | 4.83e-14  1.20e-14  2.73e-15 |
 NRC1 |   288     0     0   288    2.96   | 4.43e-14  1.25e-14  4.21e-15 |
 NLIB |   288     0     0   288    2.60   | 3.83e-14  8.20e-15  2.49e-15 |
 STJO |   288     0     0   288    2.34   | 4.10e-14  1.39e-14  4.71e-15 |
 KOKB |   288     1     0   287    1.90   | 5.60e-14  1.58e-14  5.36e-15 |
 NYA1 |   288     0     0   288    1.88   | 2.55e-14  9.00e-15  6.78e-15 |
 NYAL |   288     0     0   143    1.17   | 3.97e-14  1.03e-14  7.45e-15 |
 TIDB |   288     0     1   167    1.11   | 2.00e-13  1.87e-14  6.93e-15 |
 FAIR |   281     0     0   278    0.93   | 5.59e-14  1.22e-14  9.57e-15 |
 GOL2 |   282     1     0   135    0.68   | 9.03e-14  1.28e-14  5.67e-15 |
 PIE1 |   284     1     0   280    0.59   | 9.32e-14  2.66e-14  5.90e-15 |
 G23  |   288     1     0   230    0.21   | 4.81e-13  6.22e-14  3.06e-14 |
 PTBB |   288     1     0   287    0.20   | 3.13e-13  6.53e-14  1.72e-14 |
 DRAO |   288     1     0   287    0.13   | 8.53e-14  3.52e-14  3.47e-14 |
 KGN0 |   287     0     0   286    0.11   | 3.77e-13  1.08e-13  5.14e-14 |
 G07  |   288     1     0   287    0.10   | 3.01e-13  8.37e-14  7.55e-14 |
 TWTF |   288     1     0   287    0.10   | 4.02e-13  1.23e-13  4.08e-14 |
 G30  |   288     1     0   287    0.09   | 3.22e-13  1.12e-13  2.57e-14 |
 G16  |   288     1     0   287    0.09   | 4.87e-13  7.97e-14  4.76e-14 |
 G17  |   288     1     0   287    0.08   | 3.70e-13  1.11e-13  6.45e-14 |
 YAKT |   288     1     0   287    0.08   | 4.64e-13  1.12e-13  4.26e-14 |
 BOR1 |   288     1     0   287    0.07   | 4.35e-13  1.59e-13  2.20e-14 |
 G27  |   288     1     0   287    0.07   | 3.34e-13  9.78e-14  1.03e-13 |
 G29  |   288     1     0   287    0.07   | 4.27e-13  1.26e-13  7.22e-14 |
 DWH1 |   288     1     0   287    0.06   | 5.06e-13  1.41e-13  2.62e-14 |
 IRKT |   288     0     0   143    0.06   | 5.46e-14  1.43e-14  2.29e-14 |
 G31  |   288     1     0   287    0.05   | 2.89e-13  1.33e-13  7.50e-14 |
 G20  |   288     1     1   136    0.05   | 6.62e-13  8.02e-14  3.05e-14 |
 G26  |   288     1     0   287    0.05   | 3.57e-13  1.03e-13  7.63e-14 |
 G04  |   288     1     0   287    0.04   | 4.60e-13  1.32e-13  9.82e-14 |
 SFER |   231     1     0   122    0.04   | 3.57e-13  8.41e-14         - |
 MIZU |   218     0     0    81    0.03   | 3.67e-13  1.01e-13         - |
 G06  |   288     1     0   287    0.03   | 5.58e-13  1.62e-13  1.36e-13 |
 IENG |   288     0     0   143    0.02   | 5.89e-13  1.73e-13  5.84e-14 |
 HRAO |   288     1     0   287    0.02   | 1.27e-13  4.18e-14  8.81e-14 |
 BAHR |   288     1     0   287    0.02   | 5.38e-13  1.78e-13  1.53e-13 |
 TSKB |   288     1     0   287    0.01   | 9.71e-13  2.84e-13  1.43e-13 |
 G25  |   288     1     0   287    0.01   | 1.47e-12  4.25e-13  1.27e-13 |
 KERG |   288     1     0   287    0.01   | 1.20e-12  3.63e-13  1.86e-13 |
 WHIT |   288     1     0   287    0.01   | 4.85e-13  2.04e-13  5.54e-14 |
 G03  |   288     1     0   287    0.01   | 1.33e-12  4.16e-13  2.60e-13 |
 G15  |   288     1     0   287    0.01   | 1.52e-12  5.07e-13  2.36e-13 |
 KOUR |   288     1     0   287    0.01   | 1.43e-12  4.06e-13  1.31e-13 |
 PERT |   288     1     0   287    0.00   | 1.75e-12  5.46e-13  2.65e-13 |
 G08  |   288     1     4    12    0.00   | 1.25e-12  3.43e-13  9.91e-14 |
 JPLM |   288     1     0   287    0.00   | 5.51e-13  2.08e-13  3.82e-13 |
 GPST |   288     0     0     0    0.00   | 2.48e-14  5.16e-15  1.81e-15 |
 AUCK |   220     0     0     0    0.00   |        -         -         - |
 SCH2 |   262     0     0     0    0.00   | 6.16e-13  2.71e-13  4.12e-13 |
 HERS |   232     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 TIXI |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MDO1 |   287     0     0     0    0.00   | 7.15e-13  9.74e-13  5.94e-13 |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 HARB |   256     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     5     0    0.00   | 7.02e-13  7.89e-14  5.41e-14 |
 G24  |   288     1     0     0    0.00   | 1.41e-12  4.12e-13  2.49e-13 |
 G22  |   288     0     1     0    0.00   |        -         -         - |
 G21  |   288     1     6     0    0.00   | 8.93e-13  1.11e-13  2.06e-14 |
 G19  |   288     1     5     0    0.00   | 7.74e-13  7.50e-14  4.90e-14 |
 G18  |   288     2     6     0    0.00   | 1.21e-12  1.42e-13  2.40e-14 |
 G14  |   288     1     5     0    0.00   | 6.75e-13  6.78e-14  3.46e-14 |
 G13  |   288     2     6     0    0.00   | 6.60e-13  1.10e-13  4.46e-14 |
 G11  |   288     1     6     0    0.00   | 7.50e-13  6.94e-14  3.67e-14 |
 G10  |   288     1     0     0    0.00   | 1.27e-12  4.30e-13  2.24e-13 |
 G09  |   288     1     0     0    0.00   | 1.25e-12  4.38e-13  2.85e-13 |
 G05  |   288     1     0     0    0.00   | 1.40e-12  5.00e-13  2.70e-13 |
 G01  |   288     1     0     0    0.00   | 1.49e-12  5.87e-13  3.67e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 WILL |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     1     1     0    0.00   | 1.10e-12  1.43e-12  8.99e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     1     0     0    0.00   | 4.04e-13  2.16e-13  3.15e-13 |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 POL2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     1     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     1     0     0    0.00   | 1.97e-12  5.23e-13  1.97e-13 |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     2     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   269     0     0     0    0.00   |        -         -         - |
 HLFX |   288     0     0     0    0.00   | 2.21e-13  4.09e-13  9.37e-13 |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   282     0     0     0    0.00   |        -         -         - |
 GOLD |   284     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   277     0     0     0    0.00   |        -         -         - |
 CHUR |   284     1     1     0    0.00   | 1.12e-12  5.96e-13  1.59e-12 |
 BOGT |   282     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   277     0     0     0    0.00   |        -         -         - |
 AREQ |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 1.54e-17  1.85e-16  1.11e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NYA1      BRUS      BRUS |
------------------------------------------+------------------------------+
