
 GPS week: 1275   Day: 3   MJD: 53172                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2683      0     0.02    -0.02     2.71     0.00
 cod |   288     0  26191     23     0.16    -0.84     0.06    19.34
 emr |   288     0  14276     68  4701.59    31.50     0.06    17.88
 esa |   288     0  18592   1582  4700.05    31.59     0.08    13.11
 gfz |   288     0  21530      4    -0.16     0.03     0.04    27.45
 iga |    96     0   2590     99    -0.04    -0.07     0.08     0.00
 igu |    96     0   2683     24    -0.15     0.96     2.76     0.00
 jpl |   286     0  15023    406    -3.95     0.75     0.07     0.00
 ngs |    96     0   2590      0     0.03    -0.05     2.52     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  31414    444  4701.57    31.47     0.05    22.22

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |  8821    -8   -67    76   106   -57   508     X  7580     -  -117 |
    3 |   496    32    44    87   -41   -80  1886   123  -105     -   -64 |
    4 |  -726    -1   -67    -3    84   -37 -1471    26 -1252     -   -47 |
    5 | -1513   -23    95  -127    94   149 -2738    81 -1704     -   -98 |
    6 |  -392    99  -200   -36   107  -149-12796     4 -1985     -   -35 |
    7 | -6258   -24  -108   -61   164    36  -812     X -5996     -   -66 |
    8 | -2687   -40   -43   -24    74    28  4448     X -3308     -    -8 |
    9 | -4846   -27   -36   -75   114   -88 -8079     X -4409     -   -44 |
   10 |  7427    84    47  -104   -73   153  8203   117  5929     -    41 |
   11 |  2824   -50    53   225  -124    15  1165     X  2649     -    15 |
   13 |  4277    82   -62  -180    27   -18   567     X  4059     -    53 |
   14 |   879   156    57   -55   -47    99  1651   192   965     -   -94 |
   15 | -7778   -11   -68   156   -12    57 -5853    27 -6663     -   -17 |
   16 |  5883   -18   -33   121    14    54  3567     X  5349     -   -47 |
   17 | -1255    77  -131    83    48   119  7403     X -1275     -   -75 |
   18 |  3137   135   -40  -178    25     7  3921    78  3335     -   -11 |
   19 |  3479   128    95   -72   -52     X  2506     X  3611     -   -81 |
   20 |  2757   132    25   147   -34   143  2558   312  2696     -  -180 |
   21 |  4458   -11   -35    95   -44   165  1330     X  4673     -    33 |
   22 |   608    51    20  -169    14   -58 -4513   134 -1887     -    23 |
   24 | -9626    21    -7     X   -42     - -2097     X     -     -    38 |
   25 | -6709   112  -136    20   180  -176 -7157   150 -7462     -  -222 |
   26 |   248   -11  -129   151    61  -165  1893   -11   -69     -   -47 |
   27 | -3126    -8  -164    85   174   -70   802    39 -3265     -  -126 |
   28 |  7151   -99    91    -6    18    16  3195   123  6322     -    -5 |
   29 |  -577    42   -54     X   -31   -34 -2231     X -1173     -    45 |
   30 | -1194   -88   -10  -194   212  -105    74     X -1303     -   -64 |
   31 | -6095    32   -21    84   -24    -9 -1364     X -5343     -   -32 |
 -----+-------------------------------------------------------------------+
 ALBH |     -     -    23     -     -     -     -    49     -     -   -18 |
 ALGO |     -     -   -12     X     -     -     -    58     -     -    10 |
 ALRT |     -   -13     -     -     9     -     -     -     -     -     - |
 AMC2 |     -   -95    39     -     -     -     -  -159     -     -    53 |
 ARTU |     -    71     -   -89    -7     -     -     -     -     -     - |
 ASC1 |     -    31     -     -   -22     -     -     -     -     -     X |
 ASPA |     -     -     -     -    53     -     -     -     -     -   -65 |
 AUCK |     -   -19     -    29     -     -     -     -     -     -     3 |
 BAHR |     -   -18    12     -    24     -     -     5     -     -   -23 |
 BILI |     -     0     -     -     0     -     -     -     -     -     - |
 BOGT |     -    86     -   272   -17     -     -     8     -     -  -214 |
 BOR1 |     -   119    36     -     -     -     -     -     -     -  -133 |
 BREW |     -     -    18     -     -     -     -     -     -     -   -15 |
 BRMU |     -     -     -     -     4     -     -     -     -     -    -5 |
 BRUS |     -    43    38     -     -     -     -  -161     -     -   -68 |
 CAGZ |     -   -62     -     -     -     -     -     -     -     -    54 |
 CAS1 |     -    61     -   116   -46     -     -     -     -     -   -64 |
 CEDU |     -   -19     -   112     -     -     -    59     -     -   -50 |
 CHAT |     -     -     -     -    30     -     -     -     -     -   -37 |
 CHUR |     -     -   146     -     -     -     -    68     -     -  -117 |
 COCO |     -    38     -   -36     -     -     -  -113     -     -   -12 |
 CRO1 |     -     -   175    96    67     -     -   141     -     -  -360 |
 DARW |     -    33   -36     -     -     -     -     -     -     -     - |
 DAV1 |     -     5     -     -   -51     -     -   106     -     -    58 |
 DGAR |     -  -209     -     -  -124     -     -  -123     -     -   418 |
 DRAO |     -     -   -21     -     -     -     -   143     -     -    17 |
 DWH1 |     -   210    -1     -     -     -     -  -316     -     -  -182 |
 FAIR |     -     -    31   105   -77     -     -   -41     -     -    17 |
 FORT |     -     -   -98  -302   119     -     -     -     -     -   110 |
 GLPS |     -     0     -     -     0     -     -   -20     -     -     - |
 GODE |     -     -     -   207     -     -     -     -     -     -  -122 |
 GOLD |     -     6     -    -4     -     -     -   -43     -     -    -3 |
 GUAM |     -     -     -    40   -78     -     -   -11     -     -    72 |
 GUAT |     -     -     -     -    97     -     -     -     -     -  -120 |
 HOB2 |     -     7     -     -     -     -     -     -     -     -    -6 |
 HRAO |     -  -115     -     -     -     -     -   -46     -     -   100 |
 IISC |     -   -42     -  -124    83     -     -     -     -     -     6 |
 ISPA |     -   116     -     -     3     -     -   -27     -     -  -105 |
 KERG |     -     -     -  -154   163     -     -     -     -     -  -110 |
 KGN0 |     -    -4     -     -     -     -     -     -     -     -     3 |
 KIRU |     -    -7     -     -     -     -     -    -7     -     -     6 |
 KIT3 |     -     -     -   -10   -47     -     -     -     -     -    64 |
 KOKB |     -   -11     -     -   -95     -     -    40     -     -   127 |
 KOSG |     -   -98     -     -     -     -     -     -     -     -    85 |
 KOUR |     -   166     -  -400   -95     -     -    52     -     -   209 |
 LAE1 |     -     -     -     -    22     -     -     -     -     -   -27 |
 LPGS |     -   -12    32  -212     -     -     -    -8     -     -   109 |
 MAC1 |     -   -68     -    27   -55     -     -     -     -     -   112 |
 MALI |     -    12     -  -188     -     -     -     -     -     -   101 |
 MAS1 |     -     -     -   -67     3     -     -   111     -     -    35 |
 MATE |     -     -     -  -251     -     -     -     -     -     -   148 |
 MAW1 |     -    50     -     -  -154     -     -     -     -     -   147 |
 MBAR |     -    20     -     -   -38     -     -    41     -     -    30 |
 MCM4 |     -   321     -     -  -226     -     -     -     -     -     - |
 MDO1 |     -     7    22     -   -18     -     -     -     -     -     0 |
 METS |     -  -270     -     -     -     -     -     -     -     -   235 |
 MIZU |     -     -     -   -49     -     -     -  -110     -     -    29 |
 MKEA |     -   -66     -   -98     -     -     -     -     -     -   116 |
 NNOR |     -     -     -   -15     -     -     -  -149     -     -     9 |
 NPLD |     -    19     -     -     -     -     -     -     -     -   -16 |
 NRC1 |     -     -     4     -  -109     -     -  -236     -     -   131 |
 NRIL |     -    12     -     -    -8     -     -    53     -     -     - |
 NSSP |     -   -74     -     -     -     -     -    -1     -     -    64 |
 NTUS |     -  -152     -    51     -     -     -     -     -     -   102 |
 NYA1 |     -   107     -     -  -165     -     -     -     -     -   111 |
 OHI2 |     -    99     -    77  -107     -     -    23     -     -     - |
 PDEL |     -    19     -     -   -13     -     -    -3     -     -     - |
 PERT |     -     -     -     X    77     -     -     -     -     -   -95 |
 PIE1 |     -     -     -    53     -     -     -    -1     -     -   -31 |
 POTS |     -   -96     -     -   -16     -     -     -     -     -   103 |
 PTBB |     -   -27     -     -     -     -     -     -     -     -    24 |
 RIOG |     -    45   135     -  -162     -     -     -     -     -    53 |
 SANT |     -  -218     -     X    29     -     -     -     -     -   153 |
 SFER |     -   -98     -     -     -     -     -     -     -     -    85 |
 STJO |     -     -   -49     -     -     -     -  -132     -     -    39 |
 SUTM |     -     -   285     -  -185     -     -   -50     -     -     - |
 THTI |     -     -     -   -34   121     -     -  -133     -     -  -129 |
 THU3 |     -    -5     -     -     -     -     -     -     -     -     5 |
 TIDB |     -   -29     -   123     -     -     -     -     -     -   -47 |
 TRO1 |     -  -111     -     -   -27     -     -     -     -     -   130 |
 TSKB |     -   -50     -   334  -106     -     -     -     -     -   -22 |
 TWTF |     -   -41     -     -     -     -     -   -67     -     -    36 |
 URUM |     -    -3     -     -     -     -     -     -     -     -     3 |
 USN1 |     -   -44     -     -     -     -     -  -262     -     -    39 |
 USNO |     -   -87   114     -     -     -     -     -     -     -   -16 |
 USUD |     -     -     -   113     -     -     -     -     -     -   -66 |
 WHIT |     -   -34     -     -     -     -     -     -     -     -    30 |
 WILL |     -     8     -     -     -     -     -     -     -     -    -7 |
 WTZR |     -   -42     -   -41     -     -     -     -     -     -    61 |
 WUHN |     -     -     -     -    95     -     -     -     -     -  -118 |
 YAKT |     -   -93     -     -     -     -     -     -     -     -    81 |
 YELL |     -   -46    -1   270  -107     -     -     -     -     -    14 |
 YKRO |     -  -232     -     -   164     -     -     -     -     -     - |
 ZWEN |     -     -     -    38    25     -     -     -     -     -   -53 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  4159   114    61   156    74    66  3196     X  5205     -    67 |  288   4.97
    3 |  2567    77    40    41    20    60  3192    79  2367     -    69 |  288   1.40
    4 |   628   139   116   166    73   146   618   132  1131     -    62 |  288   0.84
    5 |  2041    52    26    30    33    45  2070    71  2163     -    21 |  288   1.94
    6 |  5708    54    43    57    26    47  7481    70  5252     -    31 |  288   1.87
    7 |  2023    52    52    29    55    48   499     X  1978     -   131 |  288   0.59
    8 |  2417    46    38    35    21    37  3654     X  2311     -    33 |  288   2.00
    9 |  4019    45    35    72    34    46  6062     X  3968     -    47 |  288   2.18
   10 |  2205    35    78    62    25    65  3531    81  2832     -    35 |  288   1.87
   11 |   859    41    50   106    38    82   974     X   836     -    36 |  288   0.50
   13 |   487    86    44    47    26    70   753     X   447     -    83 |  288   0.19
   14 |   524    61    71    64    49    65  1160    78   795     -    51 |  288   0.18
   15 |  4136   150    78   129    53   135  2273   124  5217     -    75 |  288   2.88
   16 |   831    29    43    48    27    60  1863     X   648     -    35 |  288   0.19
   17 |   841   139   102   107    33   107  3801     X   886     -   106 |  288   0.70
   18 |  1160    48    48    41    24    70  1685   108   906     -    35 |  288   0.42
   19 |   842    49    90    71    38     X   820     X   989     -    55 |  288   0.43
   20 |   492    59    82    27    59    58  1731    78   530     -    90 |  288   0.18
   21 |  1341    68    45    82    59    68  1048     X  1077     -    64 |  288   0.35
   22 |  6078    58    50    81    30    54  2960   100  3801     -    68 |  288   0.53
   24 |  4836   109   180     X    98     -  3281     X     -     -    67 |  278   2.43
   25 |  3134    28    30    52    33    24  3806    99  2651     -    41 |  288   1.42
   26 |   984   133   161   226    65   144  1216   145   919     -   126 |  288   0.42
   27 |   576    52    48    58    52    59   978    53   557     -    43 |  288   0.70
   28 |  1124    39    67    43    43    54   930    30  1252     -    89 |  288   0.53
   29 |  1411   190    73     X    82   102  2099     X  1634     -    57 |  282   1.04
   30 |  1049    25    52    68    50    40   997     X   835     -    78 |  288   0.84
   31 |  4076    53    65    95    43    50  2793     X  3640     -    53 |  288   2.51
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -     -    44     -     -     -     -    38     -     -    35 |  288   0.18
 ALGO |     -     -    13     X     -     -     -    30     -     -    10 |  288   0.02
 ALRT |     -    61     -     -    43     -     -     -     -     -     - |  288   7.63
 AMC2 |     -    40    37     -     -     -     -    75     -     -    39 |  287   0.08
 ARTU |     -    48     -    47    51     -     -     -     -     -     - |  288  13.28
 ASC1 |     -    67     -     -    47     -     -     -     -     -     X |  287    >>>
 ASPA |     -     -     -     -    18     -     -     -     -     -    22 |  286    >>>
 AUCK |     -    34     -   106     -     -     -     -     -     -    38 |  264  16.84
 BAHR |     -    57    20     -    24     -     -    72     -     -    44 |  288   1.38
 BILI |     -    61     -     -    43     -     -     -     -     -     - |  286  11.13
 BOGT |     -    29     -   101    21     -     -    39     -     -    33 |  288  10.86
 BOR1 |     -    54    44     -     -     -     -     -     -     -    28 |  288   0.49
 BREW |     -     -    45     -     -     -     -     -     -     -    36 |  288   0.03
 BRMU |     -     -     -     -    38     -     -     -     -     -    47 |  276    >>>
 BRUS |     -    39    26     -     -     -     -    67     -     -    21 |  288   0.04
 CAGZ |     -    40     -     -     -     -     -     -     -     -    35 |  288   0.60
 CAS1 |     -    30     -    98    19     -     -     -     -     -    30 |  288   8.34
 CEDU |     -    55     -    48     -     -     -    28     -     -    26 |  288  13.51
 CHAT |     -     -     -     -    23     -     -     -     -     -    29 |  239  11.77
 CHUR |     -     -    20     -     -     -     -    40     -     -    16 |  288  30.74
 COCO |     -    38     -    36     -     -     -    30     -     -    35 |  288   9.32
 CRO1 |     -     -    27    65    32     -     -   102     -     -    39 |  275  20.15
 DARW |     -    27    29     -     -     -     -     -     -     -     - |  288   3.10
 DAV1 |     -    52     -     -    36     -     -    40     -     -    85 |  288  15.62
 DGAR |     -    65     -     -    77     -     -   114     -     -   167 |  288  15.16
 DRAO |     -     -    23     -     -     -     -    24     -     -    19 |  288   0.11
 DWH1 |     -    24    59     -     -     -     -    40     -     -    38 |  288   0.66
 FAIR |     -     -    42    46    55     -     -    61     -     -    84 |  284   0.09
 FORT |     -     -    99   116    31     -     -     -     -     -    41 |  288   0.10
 GLPS |     -    19     -     -    13     -     -    42     -     -     - |  288   8.71
 GODE |     -     -     -    24     -     -     -     -     -     -    14 |  288   0.07
 GOLD |     -    56     -    68     -     -     -    81     -     -    25 |  288  13.96
 GUAM |     -     -     -    74    32     -     -    48     -     -    48 |  284  11.93
 GUAT |     -     -     -     -    25     -     -     -     -     -    31 |  185    >>>
 HOB2 |     -    29     -     -     -     -     -     -     -     -    25 |  288   0.07
 HRAO |     -    31     -     -     -     -     -    64     -     -    27 |  288   0.98
 IISC |     -    36     -    58    43     -     -     -     -     -    44 |  288  16.84
 ISPA |     -    33     -     -    18     -     -    44     -     -    29 |  288  14.18
 KERG |     -     -     -    79    44     -     -     -     -     -    32 |  288   1.55
 KGN0 |     -    29     -     -     -     -     -     -     -     -    25 |  287   0.37
 KIRU |     -    35     -     -     -     -     -    70     -     -    31 |  288   9.78
 KIT3 |     -     -     -    88    36     -     -     -     -     -    30 |  288  58.56
 KOKB |     -    65     -     -    48     -     -    65     -     -    22 |  288   0.04
 KOSG |     -    41     -     -     -     -     -     -     -     -    36 |  288  25.35
 KOUR |     -    43     -    47    31     -     -    47     -     -    25 |  288   1.79
 LAE1 |     -     -     -     -    29     -     -     -     -     -    36 |  287  12.99
 LPGS |     -    55    54   103     -     -     -    53     -     -    25 |  288 138.71
 MAC1 |     -    61     -    89    26     -     -     -     -     -    20 |  288  14.03
 MALI |     -    81     -    75     -     -     -     -     -     -    99 |  282    >>>
 MAS1 |     -     -     -    27    21     -     -    41     -     -    35 |  288   2.06
 MATE |     -     -     -    59     -     -     -     -     -     -    35 |  288   0.11
 MAW1 |     -    23     -     -    37     -     -     -     -     -    40 |  288  21.64
 MBAR |     -   100     -     -    90     -     -    55     -     -   192 |  288  25.03
 MCM4 |     -    23     -     -    16     -     -     -     -     -     - |  276  58.89
 MDO1 |     -    38    31     -    21     -     -     -     -     -    22 |  288  12.11
 METS |     -    43     -     -     -     -     -     -     -     -    38 |  138  12.17
 MIZU |     -     -     -   132     -     -     -    76     -     -    78 |  229   0.78
 MKEA |     -    31     -    80     -     -     -     -     -     -    39 |  288  25.90
 NNOR |     -     -     -    73     -     -     -    37     -     -    43 |  288  12.41
 NPLD |     -    35     -     -     -     -     -     -     -     -    30 |  287   0.06
 NRC1 |     -     -    13     -    13     -     -    27     -     -    17 |  288   0.04
 NRIL |     -    37     -     -    26     -     -    60     -     -     - |  288  10.21
 NSSP |     -    31     -     -     -     -     -    79     -     -    27 |  288  10.83
 NTUS |     -    22     -    43     -     -     -     -     -     -    29 |  288   9.51
 NYA1 |     -    27     -     -    33     -     -     -     -     -    23 |  288   0.10
 OHI2 |     -    58     -   121    27     -     -    34     -     -     - |  288   7.32
 PDEL |     -    15     -     -    11     -     -    54     -     -     - |  288  50.28
 PERT |     -     -     -     X    35     -     -     -     -     -    43 |  288   2.11
 PIE1 |     -     -     -    38     -     -     -    37     -     -    23 |  288   0.05
 POTS |     -    39     -     -    20     -     -     -     -     -    30 |  288  22.86
 PTBB |     -    85     -     -     -     -     -     -     -     -    74 |  288   0.24
 RIOG |     -    42    23     -    22     -     -     -     -     -    54 |  288   8.65
 SANT |     -   189     -     X   137     -     -     -     -     -    46 |  287  10.90
 SFER |     -    41     -     -     -     -     -     -     -     -    35 |  284   0.75
 STJO |     -     -    24     -     -     -     -    41     -     -    20 |  288   0.08
 SUTM |     -     -    48     -    31     -     -    51     -     -     - |  276    >>>
 THTI |     -     -     -    46    27     -     -    52     -     -    20 |  288   7.01
 THU3 |     -    15     -     -     -     -     -     -     -     -    13 |  288   9.79
 TIDB |     -    32     -    46     -     -     -     -     -     -    17 |  288   0.07
 TRO1 |     -    65     -     -    49     -     -     -     -     -    24 |  288   8.53
 TSKB |     -    43     -    87    44     -     -     -     -     -    32 |  288   1.36
 TWTF |     -    57     -     -     -     -     -    36     -     -    49 |  288   0.34
 URUM |     -    40     -     -     -     -     -     -     -     -    35 |  288  15.61
 USN1 |     -    22     -     -     -     -     -    39     -     -    19 |  287   0.05
 USNO |     -    16    13     -     -     -     -     -     -     -    15 |  288   0.04
 USUD |     -     -     -    78     -     -     -     -     -     -    46 |  288  12.81
 WHIT |     -    15     -     -     -     -     -     -     -     -    13 |  288   2.29
 WILL |     -    16     -     -     -     -     -     -     -     -    14 |  259 537.99
 WTZR |     -    44     -    43     -     -     -     -     -     -    49 |  288   0.07
 WUHN |     -     -     -     -    26     -     -     -     -     -    32 |  287  11.38
 YAKT |     -    26     -     -     -     -     -     -     -     -    23 |  288   0.77
 YELL |     -    84    70    65    61     -     -     -     -     -    90 |  288   0.04
 YKRO |     -    40     -     -    28     -     -     -     -     -     - |  283  47.67
 ZWEN |     -     -     -    76    31     -     -     -     -     -    41 |  288  18.68
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2710    63    61    81    44    76  2761    67  2521     -    53 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BREW |   288     0     0   288   11.33   | 3.41e-14  5.27e-15  1.78e-15 |
 BRUS |   288     0     0   288   10.70   | 4.38e-14  7.70e-15  3.33e-15 |
 YELL |   288     0     0   288    8.79   | 3.68e-14  9.23e-15  2.76e-15 |
 ALGO |   288     0     0   288    8.03   | 3.00e-14  7.90e-15  2.21e-15 |
 USNO |   288     0     0   288    7.96   | 4.29e-14  7.58e-15  2.85e-15 |
 NPLD |   287     0     0   286    7.51   | 4.92e-14  9.95e-15  4.70e-15 |
 AMC2 |   287     2     0   284    4.99   | 7.30e-14  1.46e-14  3.56e-15 |
 PIE1 |   288     0     0   288    4.82   | 5.52e-14  1.17e-14  3.49e-15 |
 USN1 |   287     0     0   286    4.59   | 8.04e-14  1.36e-14  3.17e-15 |
 NRC1 |   288     0     0   288    3.95   | 3.42e-14  8.72e-15  2.56e-15 |
 WTZR |   288     0     0   288    3.39   | 5.03e-14  3.41e-14  5.91e-15 |
 NYA1 |   288     1     0   287    3.09   | 3.26e-14  1.35e-14  5.25e-15 |
 FAIR |   284     0     0   283    3.08   | 5.70e-14  1.55e-14  4.21e-15 |
 GODE |   288     0     0   288    2.85   | 5.51e-14  1.00e-14  4.45e-15 |
 KOKB |   288     0     0   288    2.54   | 4.76e-14  1.10e-14  4.56e-15 |
 STJO |   288     0     0   288    2.51   | 4.29e-14  1.37e-14  5.63e-15 |
 TIDB |   288     0     0   288    2.03   | 1.57e-13  1.40e-14  5.57e-15 |
 DRAO |   288     0     0   288    1.58   | 6.92e-14  1.71e-14  7.14e-15 |
 MATE |   288     0     0   288    1.51   | 5.74e-14  1.59e-14  8.74e-15 |
 HOB2 |   288     0     0   143    1.48   | 4.77e-14  9.26e-15  6.75e-15 |
 FORT |   288     0     0   288    0.96   | 8.38e-14  2.66e-14  9.87e-15 |
 ALBH |   288     0     0   288    0.42   | 5.27e-14  1.46e-14  1.84e-14 |
 PTBB |   288     0     0   288    0.25   | 3.10e-13  6.42e-14  1.49e-14 |
 G26  |   288     0     0   288    0.20   | 3.63e-13  1.22e-13  3.03e-14 |
 G30  |   288     0     0   288    0.17   | 3.25e-13  1.08e-13  5.08e-14 |
 G16  |   288     0     5    63    0.17   | 4.41e-13  4.89e-14  2.10e-14 |
 TWTF |   288     0     0   288    0.11   | 3.87e-13  9.58e-14  2.22e-14 |
 G13  |   288     0     5    52    0.11   | 5.51e-13  6.17e-14  1.41e-14 |
 G17  |   288     0     0   288    0.10   | 3.94e-13  1.08e-13  7.38e-14 |
 KGN0 |   287     0     0   286    0.10   | 3.29e-13  9.31e-14  2.89e-14 |
 G07  |   288     0     0   288    0.09   | 2.92e-13  8.72e-14  7.40e-14 |
 MIZU |   229     0     0   227    0.08   | 3.94e-13  8.79e-14         - |
 SFER |   284     0     0   280    0.08   | 4.35e-13  1.10e-13  6.13e-14 |
 G27  |   288     0     0   288    0.08   | 3.39e-13  8.93e-14  5.82e-14 |
 G29  |   282     0     0   281    0.08   | 3.85e-13  1.01e-13  8.93e-14 |
 BOR1 |   288     0     0   288    0.08   | 4.75e-13  1.23e-13  4.86e-14 |
 DWH1 |   288     0     0   288    0.06   | 5.04e-13  1.91e-13  4.36e-14 |
 G04  |   288     0     0   288    0.03   | 5.22e-13  1.47e-13  9.87e-14 |
 G06  |   288     0     0   288    0.02   | 5.87e-13  1.91e-13  1.50e-13 |
 G31  |   288     0     0   288    0.02   | 2.30e-13  1.70e-13  1.94e-13 |
 HRAO |   288     0     0   288    0.02   | 1.38e-13  3.38e-14  9.64e-14 |
 BAHR |   288     0     0   288    0.01   | 3.54e-13  9.64e-14  1.02e-13 |
 TSKB |   288     0     0   288    0.01   | 9.56e-13  2.64e-13  9.09e-14 |
 G03  |   288     0     0   206    0.01   | 1.29e-12  4.92e-13  1.07e-13 |
 KERG |   288     0     0   288    0.01   | 1.21e-12  4.05e-13  1.54e-13 |
 G05  |   288     0     1   224    0.01   | 1.46e-12  4.46e-13  1.45e-13 |
 KOUR |   288     0     0   288    0.01   | 1.39e-12  3.80e-13  1.37e-13 |
 G24  |   278     0     0   276    0.01   | 1.34e-12  4.90e-13  2.05e-13 |
 G25  |   288     0     0   288    0.01   | 1.46e-12  5.37e-13  9.77e-14 |
 YAKT |   288     0     0   288    0.01   | 4.74e-13  1.10e-13  5.55e-14 |
 MAS1 |   288     0     0   287    0.00   | 1.81e-12  5.46e-13  1.71e-13 |
 SUTM |   276     0     0   275    0.00   | 6.41e-13  2.00e-13  2.63e-13 |
 WHIT |   288     0     0   288    0.00   | 4.95e-13  4.29e-13  1.48e-13 |
 GPST |   288     0     0     0    0.00   | 2.10e-14  6.55e-15  1.50e-15 |
 WILL |   259     1     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 METS |   138     0     0     0    0.00   |        -         -         - |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 CHAT |   239     0     0     0    0.00   |        -         -         - |
 BILI |   286     0     0     0    0.00   |        -         -         - |
 AUCK |   264     2     0     0    0.00   |        -         -         - |
 G28  |   288     1     5     0    0.00   | 6.64e-13  7.39e-14  6.79e-14 |
 G22  |   288     0     6     0    0.00   | 6.90e-13  6.43e-14  3.87e-14 |
 G21  |   288     0     6     0    0.00   | 1.26e-12  1.28e-13  2.76e-14 |
 G20  |   288     0     5     0    0.00   | 6.03e-13  5.88e-14  1.22e-14 |
 G19  |   288     0     5     0    0.00   | 6.80e-13  7.00e-14  3.27e-14 |
 G18  |   288     1     6     0    0.00   | 1.42e-12  1.47e-13  7.37e-14 |
 G15  |   288     0     0     0    0.00   | 1.65e-12  5.66e-13  3.19e-13 |
 G14  |   288     0     5     0    0.00   | 6.15e-13  6.31e-14  1.58e-14 |
 G11  |   288     0     5     0    0.00   | 7.66e-13  7.54e-14  5.49e-14 |
 G10  |   288     0     0     0    0.00   | 1.26e-12  4.47e-13  1.66e-13 |
 G09  |   288     0     0     0    0.00   | 1.26e-12  4.18e-13  1.83e-13 |
 G08  |   288     0     0     0    0.00   | 1.39e-12  4.39e-13  1.49e-13 |
 G01  |   288     0     0     0    0.00   | 1.57e-12  7.44e-13  5.42e-13 |
 ZWEN |   288     0     0     0    0.00   |        -         -         - |
 YKRO |   283     1     0     0    0.00   |        -         -         - |
 USUD |   288     2     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   288     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 THTI |   288     0     0     0    0.00   | 3.52e-13  2.02e-13  5.56e-13 |
 SANT |   287     0     0     0    0.00   | 1.63e-12  7.14e-13  6.55e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.93e-12  6.53e-13  1.23e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 OHI2 |   288     0     0     0    0.00   |        -         -         - |
 NTUS |   288     0     0     0    0.00   |        -         -         - |
 NSSP |   288     1     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   | 9.07e-13  8.79e-13  9.15e-13 |
 MCM4 |   276     0     0     0    0.00   |        -         -         - |
 MBAR |   288     0     0     0    0.00   |        -         -         - |
 MAW1 |   288     0     0     0    0.00   |        -         -         - |
 MALI |   282     1     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     1     0     0    0.00   |        -         -         - |
 KOSG |   288     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     1     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 ISPA |   288     0     0     0    0.00   |        -         -         - |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   185     0     0     0    0.00   |        -         -         - |
 GUAM |   284     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 DGAR |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   288     0     0     0    0.00   |        -         -         - |
 DARW |   288     0     0     0    0.00   | 2.34e-13  4.85e-13  1.95e-13 |
 CRO1 |   275     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   288     2     1     0    0.00   | 1.12e-12  5.97e-13  2.00e-12 |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   288     0     6     0    0.00   | 1.47e-12  1.07e-13  5.86e-14 |
 BRMU |   276     0     0     0    0.00   |        -         -         - |
 BOGT |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   286     0     0     0    0.00   |        -         -         - |
 ASC1 |   287     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 ALRT |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.16e-17  2.59e-16  1.55e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     ALGO      BREW      BREW |
------------------------------------------+------------------------------+
