
 GPS week: 1268   Day: 3   MJD: 53123                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2688      0     0.19    -0.41     3.33     0.00
 cod |   288     0  25248    118     0.15    -0.64     0.05    20.48
 emr |   288     0  20238    338  3363.36    29.71     0.04    24.79
 esa |   288     0  18354    740  3362.67    29.67     0.07    14.01
 gfz |   288     0  19705    291     0.41    -0.84     0.05    20.58
 iga |    96     0   2688     73     0.17    -0.41     0.13     0.00
 igu |    96     0   2688      0     0.14    -0.41     2.94     0.00
 jpl |   288     0  15462    204    -2.32     0.79     0.05    20.13
 ngs |    96     0   2688      0     0.19    -0.41     3.27     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------------+
    1 |  2244   -22  -105   143    39     0  3535    18  2135     - |
    3 | -5616   -28  -119   147    71  -238 -4543   -47 -5342     - |
    4 | -1970    90  -101   -38    32   -69   806    81 -1955     - |
    5 |  3155    76   -30  -118     3    63 12352   118  3617     - |
    6 |  2988    22  -110    40    97  -331-14830   -47  2365     - |
    7 |  1902  -102     -   459  -235  -505 -1517    53  1571     - |
    8 | -7593    -7   -51   123   -20   -36 -9764     6 -6532     - |
    9 | -7276    10     0  -110    42  -153  -303    73 -7365     - |
   10 | -3917   -73   -17    37    85     6 -1075   -55 -4145     - |
   11 |  3391    54  -139   265  -111  -117   119    69  3389     - |
   13 |  4490    73  -109    67   -40   -50  2035    79  4426     - |
   14 |  2707   160   -81   -18  -153   117  2141   155  2620     - |
   15 | -5520   -38   -51   -51    74   215  3033    89 -4375     - |
   16 |  4723   -24   -20    93  -113    15  2247   150  4873     - |
   17 | -4217  -115  -133    78   189    89  4003    49 -4150     - |
   18 |  4133    53   -32    20   -56   -13   719    43  4223     - |
   19 |  5772  -340   262  -225   361  1389  1201  -651  5320     - |
   20 |  3799   -39   -43   273  -154   111   876   184  3908     - |
   21 |   356    42   -86    57   -42   169  2313    98   217     - |
   22 |  3480    56   -45   -80    17   101 -2661   113  2626     - |
   24 | -4718     2  -138     3   163   -80  -612    -6 -4030     - |
   25 | -7685    12   -79   -10    61  -124  8138    92 -7332     - |
   26 | -2290     3   -69  -283   271   -77  2150     6 -2165     - |
   27 | -4376  -116   -46   119   110  -184 -1280   -59 -4155     - |
   28 |  9225    84   109    39  -262    69 -1050    64  8197     - |
   29 |  1687   -36   -72   -32   115  -625   258    44  1615     - |
   30 |  -247   184   -29  -216   -37  -165 -1558    54  -462     - |
   31 |  1373    33    10    74   -93   -75 -6732     X   905     - |
 -----+-------------------------------------------------------------+
 ALBH |     -     -    11     -     -     -     -   -14     -     - |
 ALGO |     -     -  -196   500     -     -     -  -106     -     - |
 AMC2 |     -   -94   159     -     -     -     -  -101     -     - |
 ARTU |     -    74     -   -23    35     -     -   -95     -     - |
 ASC1 |     -   159     -     -  -159     -     -     -     -     - |
 AUCK |     -    27     -   -40     -     -     -     -     -     - |
 BAHR |     -     -    32     -  -135     -     -    99     -     - |
 BILI |     -    30     -     -   -56     -     -    27     -     - |
 BOR1 |     -   100   -82     -     -     -     -     -     -     - |
 BRUS |     -    21     3     -     -     -     -   -24     -     - |
 CAS1 |     -    40     -    67   -86     -     -     -     -     - |
 CEDU |     -  -118     -   206     -     -     -   -23     -     - |
 CHAT |     -   -83     -     -    82     -     -     -     -     - |
 CHUR |     -   -15    13     -     -     -     -     -     -     - |
 COCO |     -     -     -   -71   113     -     -   -67     -     - |
 CRO1 |     -     -    52   -21   -33     -     -   -16     -     - |
 DAKA |     -    19     -     -   -19     -     -     -     -     - |
 DAV1 |     -    82     -     -   -82     -     -     -     -     - |
 DRAO |     -   -81   -60     -     -     -     -   156     -     - |
 DWH1 |     -   128    20     -     -     -     -  -155     -     - |
 FAIR |     -    12    85  -170    -7     -     -     8     -     - |
 FORT |     -   281  -172     -   -44     -     -     -     -     - |
 GODE |     -   -91    67    15     -     -     -     -     -     - |
 GOLD |     -    45     -  -192     -     -     -    88     -     - |
 GUAM |     -     -     -     X    82     -     -   -84     -     - |
 GUAT |     -    57     -     -   -57     -     -     -     -     - |
 HOB2 |     -    36    44  -290     -     -     -   112     -     - |
 HRAO |     -   -27     -     -     -     -     -    28     -     - |
 IENG |     -  -119    98     -     -     -     -     -     -     - |
 IISC |     -     -     -   -60    41     -     -     -     -     - |
 KERG |     -    21   -85   303    -4     -     -     -     -     - |
 KGN0 |     -   -51    42     -     -     -     -     -     -     - |
 KIRU |     -   -17     -   -30     -     -     -    38     -     - |
 KIT3 |     -     -     -   -12     8     -     -     -     -     - |
 KOKB |     -     -   -42     -    51     -     -     -     -     - |
 KOUR |     -   211     -  -308     -     -     -     -     -     - |
 KSTU |     -     -     -   -74     -     -     -    52     -     - |
 LAE1 |     -     -     -     -  -208     -     -   212     -     - |
 LHAS |     -    28     -   -41     -     -     -     -     -     - |
 LPGS |     -  -200   201   255     X     -     -  -235     -     - |
 MAC1 |     -   -36     -    85   -22     -     -     -     -     - |
 MAS1 |     -     -    -3     6     -     -     -    -1     -     - |
 MATE |     -    21     -     -   -21     -     -     -     -     - |
 MCM4 |     -  -341     -     -   339     -     -     -     -     - |
 MDO1 |     -     -   -43     -    52     -     -     -     -     - |
 METS |     -   -84    69     -     -     -     -     -     -     - |
 MIZU |     -     -   338  -598     -     -     -     -     -     - |
 MKEA |     -    45     -   -50   -32     -     -    21     -     - |
 NKLG |     -     -     -  -193     -     -     -   134     -     - |
 NLIB |     -    14     1     -     -     -     -   -15     -     - |
 NNOR |     -     -    71   -88     -     -     -   -26     -     - |
 NPLD |     -   -84    69     -     -     -     -     -     -     - |
 NRC1 |     -   175     -     -  -103     -     -   -73     -     - |
 NRIL |     -    31     -     -   -46     -     -    17     -     - |
 ONSA |     -   -61   -20   153   -20     -     -     -     -     - |
 PDEL |     -    92     -     -  -115     -     -    25     -     - |
 PERT |     -   -45   -44     X    98     -     -     -     -     - |
 PETP |     -  -120     -     -    44     -     -    77     -     - |
 PIE1 |     -     -   114  -155     -     -     -   -33     -     - |
 POTS |     -     5     -     -    -5     -     -     -     -     - |
 PTBB |     -   -17    14     -     -     -     -     -     -     - |
 RBAY |     -   106     -  -155     -     -     -     -     -     - |
 RIOG |     -   -46    -9   167   -58     -     -     -     -     - |
 SANT |     -  -168     -   361   -79     -     -     -     -     - |
 SCH2 |     -   -35   120     -     -     -     -  -112     -     - |
 SPT0 |     -   -60    49     -     -     -     -     -     -     - |
 STJO |     -     -     5     -     -     -     -    -6     -     - |
 SUTM |     -     -   103     -    18     -     -  -145     -     - |
 THTI |     -     -   -47   122   117     -     -   -97     -     - |
 THU3 |     -    65   122     -  -211     -     -     -     -     - |
 TIDB |     -    -1   -59   106     -     -     -     -     -     - |
 TRO1 |     -  -123     X     -   122     -     -     -     -     - |
 TSKB |     -  -100    74     -    10     -     -     -     -     - |
 TWTF |     -   -39    32     -     -     -     -     -     -     - |
 USN1 |     -   215   215     -     -     -     -  -471     -     - |
 USUD |     -     -    -9  -189     -     -     -   143     -     - |
 VILL |     -   302     -  -441     -     -     -     -     -     - |
 WTZR |     -    43     -   -63     -     -     -     -     -     - |
 YAKT |     -   -58     -     -     -     -     -    59     -     - |
 YELL |     -   -69    46   130   -75     -     -     -     -     - |
 YSSK |     -   -42     -     -     -     -     -    43     -     - |
 ZAMB |     -   -15     -     -    68     -     -   -55     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4219    53    22    35    28    48  3406    51  4195     - |  288   4.13
    3 |  2622   144   111   143   112   315  1786    59  2717     - |  288   1.49
    4 |  1232    45    51    35    39    57   778    22  1282     - |  288   0.80
    5 |  6093    56    40    55    32    80  7360    28  5777     - |  288   1.71
    6 |  2121   184   150   203   121   216  8232    95  1956     - |  288   1.05
    7 |  1443   178     -   136   173   253   838   109  1514     - |  288   0.81
    8 |  7052    24    23    25    28    72  3022    52  7522     - |  288   3.63
    9 |  3873    40    33    48    25    46  1835    32  3831     - |  288   1.81
   10 |  2710    68    33    49    55    50  1978    44  2696     - |  288   1.29
   11 |   749    47    98    44    58    61   320   103   714     - |  288   0.29
   13 |   753    38    57    38    41    71  1200    61   692     - |  288   0.23
   14 |   826    61    40    67    33    55  1130    27   793     - |  288   0.32
   15 |  9117    40    35    31    30    60  4028    22  8689     - |  288   4.30
   16 |   587    65    53   138    50    49  1020    73   495     - |  288   0.28
   17 |  1565    48    28    49    36    55  1343    35  1396     - |  288   0.80
   18 |   545    43    40    40    37    86   452    26   542     - |  288   0.36
   19 |  2592    67    53   114   107   250  1358   135  2304     - |  288   0.62
   20 |   690    52    40    35    22    79   644    30   627     - |  288   0.41
   21 |  1315    62    48    39    31    57   751    34  1251     - |  288   0.30
   22 |  3672    53    29    54    28    81  2182    38  3602     - |  288   0.32
   24 |  2602    32    36    44    50    87  1853    30  2051     - |  288   1.90
   25 |  4413    36    51    59    30    75  5844    20  4351     - |  288   1.43
   26 |  1109    38    26    36    22    94   740    25  1110     - |  288   0.81
   27 |   796    32    22    38    23    51   817    84   692     - |  288   0.42
   28 |  4768    38    56    34    53   150  2432    39  4695     - |  288   0.73
   29 |   964    50    32    73    28   422   546    28   997     - |  288   0.68
   30 |  1531    48    37    70    49    71  1307    36  1374     - |  288   0.73
   31 |  2804   130   117   111    56    97  3799     X  2941     - |  288   1.10
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -    10     -     -     -     -    12     -     - |  288   0.05
 ALGO |     -     -    13    27     -     -     -    27     -     - |  288   0.04
 AMC2 |     -    43    35     -     -     -     -    21     -     - |  288   0.04
 ARTU |     -    46     -    35    29     -     -    49     -     - |  263  12.74
 ASC1 |     -    22     -     -    22     -     -     -     -     - |  288    >>>
 AUCK |     -   105     -   154     -     -     -     -     -     - |  143  11.98
 BAHR |     -     -    22     -    40     -     -    39     -     - |  288   0.41
 BILI |     -    24     -     -    13     -     -    17     -     - |  287   7.54
 BOR1 |     -    21    18     -     -     -     -     -     -     - |  288   0.38
 BRUS |     -    32    21     -     -     -     -    23     -     - |  288   0.04
 CAS1 |     -    26     -   100    56     -     -     -     -     - |  288   7.66
 CEDU |     -    78     -    68     -     -     -    42     -     - |  288  12.30
 CHAT |     -    27     -     -    27     -     -     -     -     - |  287  12.41
 CHUR |     -    27    22     -     -     -     -     -     -     - |  288   5.83
 COCO |     -     -     -    55    54     -     -    41     -     - |  288  10.65
 CRO1 |     -     -    16    64    25     -     -    39     -     - |  288  17.15
 DAKA |     -    23     -     -    23     -     -     -     -     - |  263  19.44
 DAV1 |     -    17     -     -    17     -     -     -     -     - |  284  13.90
 DRAO |     -    43    26     -     -     -     -    19     -     - |  288   0.05
 DWH1 |     -   120    38     -     -     -     -   165     -     - |  288   0.40
 FAIR |     -    63    22    22    31     -     -    29     -     - |  288   0.13
 FORT |     -    42    32     -    55     -     -     -     -     - |  288   0.15
 GODE |     -    34    26    24     -     -     -     -     -     - |  288   0.42
 GOLD |     -    42     -    92     -     -     -    99     -     - |  288  17.97
 GUAM |     -     -     -     X   163     -     -   167     -     - |  258  11.71
 GUAT |     -    15     -     -    15     -     -     -     -     - |  287    >>>
 HOB2 |     -    35    47    43     -     -     -    43     -     - |  288   0.05
 HRAO |     -    49     -     -     -     -     -    50     -     - |  288   0.83
 IENG |     -    27    22     -     -     -     -     -     -     - |  288   0.58
 IISC |     -     -     -   107    73     -     -     -     -     - |  286  23.46
 KERG |     -    68    34    51    40     -     -     -     -     - |  288   1.64
 KGN0 |     -    26    21     -     -     -     -     -     -     - |  287   0.32
 KIRU |     -    29     -    26     -     -     -    33     -     - |  288  12.17
 KIT3 |     -     -     -    36    25     -     -     -     -     - |  288  23.69
 KOKB |     -     -    17     -    21     -     -     -     -     - |  288   0.11
 KOUR |     -    22     -    32     -     -     -     -     -     - |  288   1.45
 KSTU |     -     -     -    95     -     -     -    66     -     - |  286   8.74
 LAE1 |     -     -     -     -    38     -     -    39     -     - |  287  12.51
 LHAS |     -    15     -    21     -     -     -     -     -     - |  274  36.99
 LPGS |     -    53    62   101     X     -     -    57     -     - |  288  35.51
 MAC1 |     -    71     -    99    25     -     -     -     -     - |  288  13.42
 MAS1 |     -     -    29    27     -     -     -    42     -     - |  288   2.44
 MATE |     -    14     -     -    14     -     -     -     -     - |  286   0.10
 MCM4 |     -    18     -     -    18     -     -     -     -     - |  286  33.25
 MDO1 |     -     -    18     -    22     -     -     -     -     - |  287  19.88
 METS |     -    12    10     -     -     -     -     -     -     - |  287  10.54
 MIZU |     -     -    81   143     -     -     -     -     -     - |  193   0.34
 MKEA |     -    48     -    56    69     -     -    35     -     - |  288  31.60
 NKLG |     -     -     -    30     -     -     -    21     -     - |  286 749.98
 NLIB |     -    38    19     -     -     -     -    33     -     - |  288   0.05
 NNOR |     -     -    57    73     -     -     -    33     -     - |  288  10.93
 NPLD |     -    32    27     -     -     -     -     -     -     - |  285   0.04
 NRC1 |     -    51     -     -    28     -     -    32     -     - |  288   0.01
 NRIL |     -    34     -     -    12     -     -    25     -     - |  288   9.98
 ONSA |     -    27    45    37    33     -     -     -     -     - |  288   0.04
 PDEL |     -    20     -     -    14     -     -    20     -     - |  288  54.10
 PERT |     -    41    36     X    22     -     -     -     -     - |  288   3.69
 PETP |     -    27     -     -    21     -     -    25     -     - |  287   9.71
 PIE1 |     -     -    11    28     -     -     -    23     -     - |  288   0.10
 POTS |     -    19     -     -    19     -     -     -     -     - |  287  23.31
 PTBB |     -    20    16     -     -     -     -     -     -     - |  288   0.23
 RBAY |     -    79     -   115     -     -     -     -     -     - |  288  66.34
 RIOG |     -    50    39    87    35     -     -     -     -     - |  288   9.99
 SANT |     -    42     -    84    28     -     -     -     -     - |  288   4.10
 SCH2 |     -    28    17     -     -     -     -    30     -     - |  288 126.95
 SPT0 |     -    31    26     -     -     -     -     -     -     - |  256   0.04
 STJO |     -     -    20     -     -     -     -    25     -     - |  288   0.06
 SUTM |     -     -    31     -    34     -     -    41     -     - |  288   2.08
 THTI |     -     -    34    61    42     -     -    44     -     - |  288   4.73
 THU3 |     -    19    15     -    14     -     -     -     -     - |  288   7.39
 TIDB |     -    26    41    67     -     -     -     -     -     - |  288   0.05
 TRO1 |     -    42     X     -    42     -     -     -     -     - |  286   9.10
 TSKB |     -    46    17     -    37     -     -     -     -     - |  288   1.24
 TWTF |     -    24    20     -     -     -     -     -     -     - |  256   0.40
 USN1 |     -    28    42     -     -     -     -    56     -     - |  285   0.04
 USUD |     -     -    18    36     -     -     -    21     -     - |  288   9.97
 VILL |     -    22     -    32     -     -     -     -     -     - |  288   9.39
 WTZR |     -    23     -    34     -     -     -     -     -     - |  288   0.09
 YAKT |     -    30     -     -     -     -     -    31     -     - |  288   0.31
 YELL |     -    58    23    18    33     -     -     -     -     - |  288   0.07
 YSSK |     -    23     -     -     -     -     -    23     -     - |  287   8.23
 ZAMB |     -    39     -     -    40     -     -    36     -     - |  288  10.59
 -----+-------------------------------------------------------------+--------------
 TOT  |  3333    54    43    72    50   132  2944    54  3272     - |


 BEST CLOCK FIT: NRC1   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ONSA |   288     0     0   288   11.85   | 3.24e-14  7.91e-15  3.89e-15 |
 BRUS |   288     0     0   288   11.85   | 3.59e-14  1.08e-14  1.73e-15 |
 AMC2 |   288     0     0   288   11.56   | 3.49e-14  5.46e-15  3.39e-15 |
 NPLD |   285     0     0   283    8.58   | 3.91e-14  9.05e-15  3.46e-15 |
 PIE1 |   288     0     0   288    7.22   | 3.90e-14  7.40e-15  5.19e-15 |
 MATE |   286     0     0   285    6.36   | 3.24e-14  9.28e-15  9.63e-15 |
 SPT0 |   256     0     0   255    5.83   | 3.55e-14  6.77e-15         - |
 ALBH |   288     0     0   288    5.78   | 4.58e-14  9.08e-15  4.74e-15 |
 USN1 |   285     0     0   284    5.51   | 6.68e-14  1.10e-14  3.83e-15 |
 ALGO |   288     0     0   288    4.17   | 3.46e-14  6.93e-15  5.39e-15 |
 YELL |   288     0     0   288    3.19   | 2.62e-14  4.83e-15  5.86e-15 |
 NRC1 |   288     1     0   287    3.12   | 2.86e-14  6.85e-15  2.76e-15 |
 WTZR |   288     0     0   288    2.48   | 3.98e-14  2.85e-14  7.52e-15 |
 STJO |   288     0     0   288    2.36   | 5.23e-14  1.08e-14  4.62e-15 |
 HOB2 |   288     0     0   288    1.75   | 4.59e-14  1.01e-14  5.69e-15 |
 KOKB |   288     0     0   288    1.69   | 6.27e-14  1.14e-14  8.48e-15 |
 FAIR |   288     0     0   288    1.37   | 4.52e-14  1.29e-14  1.45e-14 |
 DRAO |   288     0     0   288    1.25   | 6.18e-14  1.58e-14  4.96e-15 |
 TIDB |   288     0     2   150    0.77   | 1.74e-13  1.94e-14  3.72e-15 |
 NLIB |   288     0     0   143    0.67   | 4.14e-14  9.41e-15  4.51e-15 |
 GODE |   288     0     0   288    0.56   | 3.49e-14  1.23e-14  2.83e-14 |
 FORT |   288     0     0   288    0.27   | 7.56e-14  3.26e-14  1.36e-14 |
 PTBB |   288     0     0   288    0.20   | 3.33e-13  6.02e-14  2.15e-14 |
 G16  |   288     0     0   288    0.16   | 4.69e-13  5.59e-14  3.01e-14 |
 G27  |   288     0     0   288    0.16   | 3.25e-13  9.60e-14  1.95e-14 |
 BAHR |   288     0     0   288    0.13   | 3.11e-13  7.19e-14  3.28e-14 |
 KGN0 |   287     0     0   286    0.12   | 3.04e-13  7.30e-14  2.24e-14 |
 G19  |   288     0     0   288    0.10   | 6.64e-13  8.85e-14  4.47e-14 |
 G22  |   288     0     5    65    0.08   | 5.92e-13  6.48e-14  2.06e-14 |
 TWTF |   256     0     0   256    0.08   | 3.82e-13  1.11e-13         - |
 G30  |   288     0     0   288    0.07   | 3.69e-13  1.11e-13  7.28e-14 |
 G07  |   288     0     0   287    0.07   | 4.11e-13  1.25e-13  5.98e-14 |
 G26  |   288     0     0   288    0.06   | 3.40e-13  9.14e-14  6.59e-14 |
 BOR1 |   288     0     0   288    0.06   | 4.53e-13  1.38e-13  4.30e-14 |
 DWH1 |   288     0     0   288    0.06   | 5.11e-13  1.29e-13  4.19e-14 |
 G29  |   288     0     0   288    0.05   | 3.83e-13  8.68e-14  8.32e-14 |
 YAKT |   288     0     0   288    0.05   | 4.12e-13  1.18e-13  3.24e-14 |
 IENG |   288     0     0   288    0.05   | 5.43e-13  1.83e-13  6.00e-14 |
 G17  |   288     0     0   288    0.04   | 4.30e-13  1.16e-13  1.03e-13 |
 G06  |   288     0     0   288    0.04   | 4.78e-13  1.72e-13  7.79e-14 |
 G14  |   288     0     3    56    0.04   | 5.94e-13  7.06e-14  3.31e-14 |
 G04  |   288     0     0   288    0.03   | 4.63e-13  1.43e-13  1.01e-13 |
 HRAO |   288     0     0   288    0.03   | 1.20e-13  3.30e-14  8.74e-14 |
 G31  |   288     0     0   288    0.02   | 2.20e-13  1.57e-13  1.02e-13 |
 MIZU |   193     0     0    42    0.02   | 3.35e-13  1.06e-13         - |
 G20  |   288     0     3    26    0.02   | 5.31e-13  6.80e-14  3.84e-14 |
 G10  |   288     0     0   288    0.01   | 1.17e-12  3.13e-13  1.24e-13 |
 TSKB |   288     0     0   288    0.01   | 1.00e-12  3.32e-13  1.19e-13 |
 G25  |   288     0     1   219    0.01   | 1.37e-12  3.78e-13  1.51e-13 |
 G24  |   288     0     0   288    0.01   | 1.29e-12  4.37e-13  2.01e-13 |
 KOUR |   288     0     0   288    0.01   | 1.50e-12  3.90e-13  1.66e-13 |
 KERG |   288     0     0   288    0.01   | 1.53e-12  4.00e-13  1.39e-13 |
 G09  |   288     0     2   145    0.01   | 1.36e-12  4.46e-13  1.75e-13 |
 G05  |   288     0     0   288    0.01   | 1.23e-12  3.73e-13  2.17e-13 |
 MAS1 |   288     0     0   288    0.01   | 1.64e-12  4.52e-13  1.91e-13 |
 G03  |   288     0     0   288    0.00   | 1.41e-12  4.18e-13  1.03e-13 |
 SUTM |   288     0     0   288    0.00   | 6.35e-13  1.83e-13  1.61e-13 |
 THTI |   288     0     0   288    0.00   | 4.29e-13  2.03e-13  3.27e-13 |
 GPST |   288     0     0     0    0.00   | 1.92e-14  4.31e-15  2.16e-15 |
 GUAM |   258     0     0     0    0.00   |        -         -         - |
 AUCK |   143     0     0     0    0.00   |        -         -         - |
 NKLG |   286     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 MDO1 |   287     0     1     0    0.00   | 6.64e-13  7.68e-13  1.55e-12 |
 LAE1 |   287     0     0     0    0.00   |        -         -         - |
 IISC |   286     0     0     0    0.00   |        -         -         - |
 DAKA |   263     0     0     0    0.00   |        -         -         - |
 CHAT |   287     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     1     6     0    0.00   | 5.94e-13  7.60e-14  4.72e-14 |
 G21  |   288     2     6     0    0.00   | 9.75e-13  1.09e-13  2.01e-14 |
 G18  |   288     0     6     0    0.00   | 1.62e-12  1.42e-13  3.37e-14 |
 G15  |   288     0     0     0    0.00   | 1.48e-12  6.54e-13  5.47e-13 |
 G13  |   288     0     5     0    0.00   | 5.25e-13  5.30e-14  1.52e-14 |
 G11  |   288     1     6     0    0.00   | 6.10e-13  7.49e-14  3.22e-14 |
 G08  |   288     0     0     0    0.00   | 4.42e-13  3.10e-13  4.62e-13 |
 G01  |   288     0     0     0    0.00   | 1.41e-12  5.91e-13  4.91e-13 |
 ZAMB |   288     0     0     0    0.00   |        -         -         - |
 VILL |   288     0     0     0    0.00   |        -         -         - |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   286     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     0     0    0.00   | 1.88e-12  6.83e-13  5.38e-13 |
 RIOG |   288     0     0     0    0.00   |        -         -         - |
 RBAY |   288     2     0     0    0.00   |        -         -         - |
 POTS |   287     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.73e-12  5.01e-13  3.42e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   286     0     1     0    0.00   | 6.24e-13  4.99e-13  1.89e-12 |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   274     0     0     0    0.00   |        -         -         - |
 KSTU |   286     0     0     0    0.00   |        -         -         - |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   287     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 DAV1 |   284     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     1     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   288     0     0     0    0.00   |        -         -         - |
 CEDU |   288     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 ASC1 |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   263     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.72e-17  3.27e-16  1.96e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     YELL      YELL      BRUS |
------------------------------------------+------------------------------+
