
 GPS week: 1264   Day: 1   MJD: 53093                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2483      7     0.09    -0.22     2.93     0.00
 cod |   288     0  23242    699     0.30    -0.39     0.05    17.82
 emr |   288     0  24627    377  2565.79    23.45     0.03    24.07
 gfz |   287     0  19502    310     0.24    -0.33     0.04    18.84
 iga |    96     0   2579      8   866.16 -2684.29     0.08     0.00
 igu |    96     0   2579      7    32.68  -101.37     3.67     0.00
 jpl |   288     0  16313    298     1.67    -2.48     0.04    20.33
 ngs |    96     0   2579      7    32.76  -101.50     2.92     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  32233    702   658.40    10.76     0.04    18.93

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -2679   -58   -91   121    43  4587   -50 -2725     -    73 |
    3 |  2660     8   -37    56   119  3386    43  2484     -   -42 |
    4 |  1945   -77   -40   104   -31   460    50  1453     -    -4 |
    5 | -2178    63  -106    37    43 -7364    51 -2256     -     7 |
    6 | -4131   171    38  -153   175 -8432   146 -4147     -  -139 |
    7 | -1351    77    -7   -23  -125 -2539    27 -1527     -   -57 |
    8 |  1830    -8   -62    -2   -90 17379    -9   638     -    93 |
    9 | -1398   -36  -150   201  -111  5657    55  -958     -     X |
   10 |   990   -99   -11    79  -136 -3839   123   163     -   -41 |
   11 |     -    73   -87   -19   -97  1814    20  4020     -    49 |
   13 |  3689   153   -87  -106   -55  -791   -43  3774     -    95 |
   14 |  1094   234    32  -254   152  -978   204   828     -  -105 |
   15 | -2176  -104    66    64    43 -4376   203 -2191     -  -174 |
   16 |  3976    79  -170   124    33  1117   157  4049     -   -72 |
   17 | -2797    -7     7    59    37  2339   164 -2626     -  -140 |
   18 |  3506   117    89  -224    95  1019   214  3356     -  -110 |
   20 |  6852    -9   -72   -64    52  2121   264  6693     -     0 |
   21 |  5727    52   -32   -95   -45  4317   186  5755     -   -33 |
   22 | -2126   192    60  -155    13 -1906    99 -2278     -  -155 |
   24 |  2773     0   -61   126   101 -3970    16  2394     -   -58 |
   25 | -4090    77  -192   241    18 -8470   121 -3971     -  -149 |
   26 | -3808   -41    -2   206  -141  1151    20 -3497     -  -175 |
   27 | -1060   -21  -101    80   -40  2756    91 -1101     -    14 |
   28 |  5744    29  -125    41  -217  6979    50  5095     -    70 |
   29 |  -500     0   -65    74  -156  1714    34  -667     -   -10 |
   30 | -4529   122   -47   -99   118 -3497    93 -4605     -     0 |
   31 | -8602    22   -27    22   171-10623    43 -8767     -   -28 |
 -----+-------------------------------------------------------------+
 ALBH |     -    54   -40     -     -     -   -15     -     -    17 |
 ALGO |     -     -     6     -     -     -    73     -     -   -86 |
 AMC2 |     -  -119    65     -     -     -   -75     -     -   109 |
 AOML |     -     -     -     -     -     -    45     -     -   -48 |
 ARTU |     -     -     -    -1     -     -     1     -     -     - |
 ASC1 |     -   280     -  -159     -     -     -     -     -  -106 |
 ASPA |     -     -     -   312     -     -  -214     -     -   -86 |
 AUCK |     -    12     -     -     -     -     -     -     -   -11 |
 BAHR |     -   -42    36   -39     -     -     -     -     -    33 |
 BAN2 |     -     -  -150     -     -     -     -     -     -   191 |
 BILI |     -    47     -    -3     -     -   -39     -     -     - |
 BOR1 |     -   -79    26     -     -     -     -     -     -    32 |
 BREW |     -     -    33     -     -     -   -52     -     -    18 |
 BRMU |     -     -     -   -19     -     -     -     -     -    19 |
 BRUS |     -    22    31     -     -     -   -63     -     -     8 |
 CAGZ |     -    21     -     -     -     -     -     -     -   -20 |
 CHUR |     -    40   111     -     -     -    83     -     -  -240 |
 CRO1 |     -     -   -79  -169     -     -   -37     -     -   405 |
 DRAO |     -     -   -72     -     -     -   180     -     -  -103 |
 DWH1 |     -     X   169     -     -     -  -161     -     -   -42 |
 FAIR |     -     -    39  -116     -     -    56     -     -     5 |
 FORT |     -     X   -93    49     -     -     -     -     -    69 |
 GLPS |     -     -     -   -14     -     -    13     -     -     - |
 GODE |     -   -53   125     -     -     -    -8     -     -  -100 |
 GOL2 |     -     -    13     -     -     -     -     -     -   -17 |
 GOLD |     -     -     -     -     -     -    -8     -     -     9 |
 GUAM |     -     4     -    57     -     -  -181     -     -   135 |
 GUAT |     -   -30     -   -48     -     -     -     -     -    76 |
 HERS |     -     -  -225     -     -     -     -     -     -   285 |
 HRAO |     -     -     -     -     -     -   -63     -     -    67 |
 IENG |     -  -150   111     -     -     -     -     -     -     - |
 IISC |     -     -     -    32     -     -     -     -     -   -32 |
 JPLM |     -     -    16     -     -     -     -     -     -   -20 |
 KERG |     -    32   -67   150     -     -     -     -     -   -93 |
 KGN0 |     -     5   -27     -     -     -     -     -     -    29 |
 KIT3 |     -  -106     -     4     -     -   174     -     -   -93 |
 KOKB |     -  -132    18   117     -     -   -26     -     -    12 |
 KOSG |     -   -85     -     -     -     -     -     -     -    80 |
 KUNM |     -     -     -     -     -     -    10     -     -   -11 |
 LHAS |     -   -51     -     -     -     -     -     -     -    48 |
 LPGS |     -    -4    17     X     -     -   -38     -     -    24 |
 MALI |     -     -     -     -     -     -    35     -     -   -37 |
 MAS1 |     -     -   -25     -     -     -    65     -     -   -38 |
 MCM4 |     -    65  -416   377     -     -     -     -     -     - |
 MDO1 |     -    17    12   -71     -     -     -     -     -    39 |
 METS |     -     -   207     -     -     -  -390     -     -   156 |
 MIZU |     -     -   -24     -     -     -     -     -     -    31 |
 MKEA |     -   -36     -     -     -     -     -     -     -    34 |
 NKLG |     -     -     -  -115     -     -   189     -     -   -89 |
 NLIB |     -     -    46     -     -     -     -     -     -   -58 |
 NNOR |     -     -    45     -     -     -  -123     -     -    75 |
 NPLD |     -     -    51     -     -     -     -     -     -   -64 |
 NRC1 |     -     -    20   -43     -     -   -31     -     -    46 |
 NRIL |     -   123     -  -100     -     -     1     -     -     - |
 NYA1 |     -     -     -  -575     -     -     -     -     -   572 |
 NYAL |     -     -   100     -     -     -     X     -     -  -127 |
 PDEL |     -     -     -   -62     -     -    57     -     -     - |
 PERT |     -   -17   -26    76     -     -     -     -     -   -27 |
 PETP |     -   -37     -    35     -     -     -     -     -     - |
 PIE1 |     -   -30    18     -     -     -    -2     -     -     8 |
 PIMO |     -   230     -  -218     -     -     -     -     -     X |
 POTS |     -   -56     -   -13     -     -     -     -     -    65 |
 PRDS |     -  -122   -40     -     -     -     -     -     -   166 |
 PTBB |     -   -58    91     -     -     -     -     -     -   -60 |
 QAQ1 |     -   -78    36     -     -     -     -     -     -    17 |
 RESO |     -     6     -     -     -     -    -5     -     -     - |
 REYK |     -   -94     -     -     -     -    50     -     -    35 |
 RIOG |     -   -22   -21    46     -     -     -     -     -     2 |
 SANT |     -   103     -   103     -     -     -     -     -  -198 |
 SCH2 |     -     -    -1     -     -     -     -     -     -     2 |
 SEY1 |     -     -     -  -147     -     -     -     -     -   146 |
 SFER |     -  -117   -19     -     -     -     -     -     -   135 |
 SPT0 |     -  -165    67     -     -     -     -     -     -    70 |
 STJO |     -     -   -53     -     -     -   -59     -     -   131 |
 SUTH |     -   -19     -     -     -     -     -     -     -    18 |
 SUTM |     -     -   131  -243     -     -    69     -     -     - |
 THTI |     -     -    64   165     -     -  -211     -     -   -18 |
 THU3 |     -     8    27   -58     -     -     -     -     -    15 |
 TIDB |     -     9    12   -80     -     -     -     -     -    56 |
 TLSE |     -     -    32     -     -     -     -     -     -   -40 |
 TRO1 |     -  -113     X    -3     -     -     -     -     -   108 |
 TSKB |     -   -99    50    61     -     -     -     -     -   -32 |
 TWTF |     -    -8     -     -     -     -     -     -     -     8 |
 UNSA |     -     -     -    64     -     -   -44     -     -   -16 |
 URUM |     -   -53     -     -     -     -     -     -     -    50 |
 USN1 |     -   188   218     -     -     -  -383     -     -   -42 |
 USNO |     -   -30     -     -     -     -     -     -     -    29 |
 USUD |     -     -   -16     -     -     -     -     -     -    21 |
 WES2 |     -     -    71     -     -     -     -     -     -   -91 |
 WHIT |     -   -30     -     -     -     -     -     -     -    29 |
 WSRT |     -   -52   144     -     -     -   -27     -     -  -105 |
 WTZR |     -   -64   116     -     -     -   -26     -     -   -59 |
 WUHN |     -     -    66    34     -     -     -     -     -  -118 |
 YAKT |     -     -     -     -     -     -    -3     -     -     3 |
 YAR2 |     -   -55    40     -     -     -     -     -     -     - |
 YEBE |     -     -    24     -     -     -   -29     -     -     1 |
 YELL |     -     -    92   -48     -     -     -     -     -   -70 |
 ZAMB |     -   -84     -    79     -     -     -     -     -     - |
 ZWEN |     -     -     -   -41     -     -     -     -     -    41 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5323    46    24    37    53  7056    27  5274     -    36 |  288   5.30
    3 |  5106    50    39    26    64  4190    79  5138     -    45 |  288   2.09
    4 |   781    53    33    47   118   566    45   836     -    38 |  288   0.56
    5 |  1831    54    48    37   101  3281    34  1764     -    67 |  288   1.64
    6 |  2823    59    53    42    43  7997   138  2709     -    43 |  288   2.95
    7 |   922    44    19    25    42  1670    41  1000     -    25 |  288   0.91
    8 |  6332    58    22    40    33 10067    25  6725     -    66 |  288   4.30
    9 |  3195    21    19    21    74  2488    20  3302     -     X |  288   2.07
   10 |  4615   130    35    46    79  2504    43  4667     -    98 |  278   2.75
   11 |     -    27    31    24   135  1474    71  1411     -    70 |  288   0.42
   13 |   779    39    22    41    28   666    40   546     -    30 |  288   0.25
   14 |  1328    61    26    43    31   801    37  1347     -    70 |  288   0.26
   15 |  2679    24    34    24    63  3754    44  2626     -    82 |  288   2.43
   16 |   681    74    27    29    46   331    59   545     -    38 |  288   0.35
   17 |  2247    34    36    29    48  1065    35  2355     -    59 |  288   0.83
   18 |   578    58    32    37    51   474    33   560     -    34 |  288   0.34
   20 |   836    90    41    64    46   895    53   684     -    43 |  288   0.21
   21 |  1537    54    62   122   151  2093    66  1400     -   117 |  288   0.32
   22 |  1331    70    32    54    71  1590    38  1310     -    77 |  288   0.42
   24 |  2253    32    46    22    63  1750    40  2403     -    81 |  288   2.57
   25 |  6659    39    58    25    82  5536    36  6680     -    89 |  288   2.87
   26 |  2291    49    43    33    49   705    65  2077     -    34 |  261    >>>
   27 |  1732    59    41    20    26  1473    21  1738     -    20 |  288   1.08
   28 |  1549    71    45    34    77  4092    38  1417     -    35 |  288   0.39
   29 |   849    44    35    42    57   741    41   831     -    56 |  288   0.88
   30 |  1699    56    36    36    88  2444    67  1727     -    66 |  288   0.58
   31 |  1745    77    26    28   233  4406    39  1669     -    72 |  288   0.81
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    19    19     -     -     -    27     -     -    33 |  288   0.09
 ALGO |     -     -     7     -     -     -    12     -     -    12 |  288   0.02
 AMC2 |     -    25    30     -     -     -    26     -     -    14 |  288   0.04
 AOML |     -     -     -     -     -     -    12     -     -    13 |  288  40.25
 ARTU |     -     -     -    37     -     -    34     -     -     - |  286  10.97
 ASC1 |     -    26     -    20     -     -     -     -     -    23 |  287    >>>
 ASPA |     -     -     -    44     -     -    34     -     -    41 |  288    >>>
 AUCK |     -    27     -     -     -     -     -     -     -    26 |  264  12.97
 BAHR |     -    24    20    15     -     -     -     -     -    17 |  288   0.27
 BAN2 |     -     -    27     -     -     -     -     -     -    35 |  288  18.35
 BILI |     -    20     -    11     -     -    23     -     -     - |  286  21.05
 BOR1 |     -    32    35     -     -     -     -     -     -    40 |  288  39.75
 BREW |     -     -    55     -     -     -    49     -     -   131 |  288   0.07
 BRMU |     -     -     -    22     -     -     -     -     -    22 |  275    >>>
 BRUS |     -    48    20     -     -     -    29     -     -    14 |  288   0.04
 CAGZ |     -    24     -     -     -     -     -     -     -    22 |  288   0.55
 CHUR |     -    77    23     -     -     -    20     -     -    55 |  288   9.68
 CRO1 |     -     -    20   116     -     -   100     -     -    37 |  285  20.86
 DRAO |     -     -    12     -     -     -    16     -     -    21 |  288   0.11
 DWH1 |     -     X    39     -     -     -    41     -     -    24 |  288   0.75
 FAIR |     -     -    11    12     -     -    26     -     -    37 |  288   0.02
 FORT |     -     X    22    36     -     -     -     -     -    18 |  288   0.17
 GLPS |     -     -     -    33     -     -    30     -     -     - |  285  29.70
 GODE |     -    41    53     -     -     -    24     -     -    17 |  288   0.27
 GOL2 |     -     -   119     -     -     -     -     -     -   151 |  286 279.72
 GOLD |     -     -     -     -     -     -    17     -     -    19 |  288  14.39
 GUAM |     -    39     -    41     -     -    41     -     -    43 |  288  15.35
 GUAT |     -    29     -    41     -     -     -     -     -    39 |  288    >>>
 HERS |     -     -    27     -     -     -     -     -     -    34 |  241  20.83
 HRAO |     -     -     -     -     -     -    62     -     -    66 |  184   0.69
 IENG |     -    37    27     -     -     -     -     -     -     - |  288   0.56
 IISC |     -     -     -    61     -     -     -     -     -    61 |  286  32.01
 JPLM |     -     -    21     -     -     -     -     -     -    26 |  288    >>>
 KERG |     -    43    24    31     -     -     -     -     -    33 |  288   1.18
 KGN0 |     -    26    18     -     -     -     -     -     -    26 |  287   0.34
 KIT3 |     -    43     -    23     -     -    33     -     -    20 |  288  21.29
 KOKB |     -    36    25    46     -     -    39     -     -    46 |  288   0.05
 KOSG |     -    15     -     -     -     -     -     -     -    14 |  288  53.95
 KUNM |     -     -     -     -     -     -    39     -     -    42 |  288  54.40
 LHAS |     -    22     -     -     -     -     -     -     -    21 |  283  11.84
 LPGS |     -    52    35     X     -     -    29     -     -    31 |  288  31.29
 MALI |     -     -     -     -     -     -    67     -     -    72 |  210  32.41
 MAS1 |     -     -    16     -     -     -    14     -     -    27 |  288   1.62
 MCM4 |     -    33    41    31     -     -     -     -     -     - |  286  65.13
 MDO1 |     -    35    11    21     -     -     -     -     -    26 |  288  25.30
 METS |     -     -    19     -     -     -    30     -     -    22 |  287  11.25
 MIZU |     -     -    20     -     -     -     -     -     -    26 |  288   0.32
 MKEA |     -    14     -     -     -     -     -     -     -    14 |  288  30.68
 NKLG |     -     -     -    27     -     -    30     -     -    35 |  287    >>>
 NLIB |     -     -    26     -     -     -     -     -     -    34 |  288 212.45
 NNOR |     -     -    41     -     -     -    47     -     -    27 |  288  18.92
 NPLD |     -     -    15     -     -     -     -     -     -    19 |  287   0.04
 NRC1 |     -     -    42    26     -     -    50     -     -    22 |  287  11.39
 NRIL |     -    46     -    26     -     -    25     -     -     - |  287  30.14
 NYA1 |     -     -     -    26     -     -     -     -     -    26 |  209   0.01
 NYAL |     -     -    14     -     -     -     X     -     -    18 |  288   0.22
 PDEL |     -     -     -    22     -     -    20     -     -     - |  287  52.28
 PERT |     -    36    17    27     -     -     -     -     -    34 |  288   1.41
 PETP |     -    34     -    32     -     -     -     -     -     - |  286   8.14
 PIE1 |     -    42    35     -     -     -    23     -     -    15 |  288   0.07
 PIMO |     -   101     -    96     -     -     -     -     -     X |  216  16.86
 POTS |     -    31     -    18     -     -     -     -     -    15 |  288  22.04
 PRDS |     -    21    15     -     -     -     -     -     -    27 |  288   1.94
 PTBB |     -    24    30     -     -     -     -     -     -    36 |  288   0.33
 QAQ1 |     -    21    15     -     -     -     -     -     -    22 |  288  10.82
 RESO |     -    17     -     -     -     -    15     -     -     - |  288   9.86
 REYK |     -     9     -     -     -     -    13     -     -    14 |  288   8.15
 RIOG |     -    62    24    50     -     -     -     -     -    36 |  288  16.58
 SANT |     -    71     -    41     -     -     -     -     -    34 |  288   4.90
 SCH2 |     -     -    12     -     -     -     -     -     -    16 |  288  68.52
 SEY1 |     -     -     -    24     -     -     -     -     -    24 |  287  28.64
 SFER |     -    36    26     -     -     -     -     -     -    27 |  287   0.59
 SPT0 |     -    24    21     -     -     -     -     -     -    11 |  288   0.03
 STJO |     -     -    10     -     -     -    12     -     -    11 |  288   0.06
 SUTH |     -    36     -     -     -     -     -     -     -    34 |  288  19.81
 SUTM |     -     -    21    26     -     -    23     -     -     - |  288   2.55
 THTI |     -     -    20    31     -     -    41     -     -    47 |  288   4.05
 THU3 |     -    25    10    14     -     -     -     -     -    16 |  288   9.45
 TIDB |     -    36    21    35     -     -     -     -     -    45 |  288   0.10
 TLSE |     -     -    18     -     -     -     -     -     -    22 |  287   0.82
 TRO1 |     -    21     X    29     -     -     -     -     -    28 |  275   9.95
 TSKB |     -    42    15    27     -     -     -     -     -    41 |  288   0.84
 TWTF |     -    29     -     -     -     -     -     -     -    28 |  282   0.54
 UNSA |     -     -     -    31     -     -    32     -     -    25 |  276  18.38
 URUM |     -    32     -     -     -     -     -     -     -    30 |  285  21.50
 USN1 |     -    41    25     -     -     -    43     -     -    23 |  288   0.08
 USNO |     -    19     -     -     -     -     -     -     -    18 |  210   0.03
 USUD |     -     -    21     -     -     -     -     -     -    27 |  288  15.30
 WES2 |     -     -    11     -     -     -     -     -     -    14 |  288   0.04
 WHIT |     -    34     -     -     -     -     -     -     -    32 |  288   3.29
 WSRT |     -    18    26     -     -     -    29     -     -    15 |  288   0.03
 WTZR |     -    28    28     -     -     -    26     -     -    23 |  288   0.06
 WUHN |     -     -    46    31     -     -     -     -     -    51 |  287  22.60
 YAKT |     -     -     -     -     -     -    42     -     -    45 |  288   0.52
 YAR2 |     -    30    22     -     -     -     -     -     -     - |  276   5.23
 YEBE |     -     -    22     -     -     -    26     -     -    23 |  288   0.08
 YELL |     -     -   111   140     -     -     -     -     -    21 |  288   0.07
 ZAMB |     -    22     -    20     -     -     -     -     -     - |  279  13.15
 ZWEN |     -     -     -    14     -     -     -     -     -    14 |  287  15.83
 -----+-------------------------------------------------------------+--------------
 TOT  |  2931    45    35    43    84  3668    40  2916     -    44 |


 BEST CLOCK FIT: FAIR   288   0.02 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 BRUS |   288     0     0   288    9.95   | 4.08e-14  4.45e-15  2.69e-15 |
 NPLD |   287     0     0   286    9.88   | 4.24e-14  6.46e-15  2.27e-15 |
 NRC1 |   287     0     0   286    9.78   | 1.01e-13  8.65e-15  2.30e-15 |
 AMC2 |   288     0     0   288    8.94   | 3.69e-14  4.73e-15  2.90e-15 |
 BREW |   288     0     0   288    8.50   | 6.47e-14  9.25e-15  4.20e-15 |
 NLIB |   288     1     0   287    5.93   | 4.16e-14  7.92e-15  4.16e-15 |
 GOL2 |   286     2     0   283    5.53   | 3.94e-14  7.36e-15  2.81e-15 |
 STJO |   288     0     0   288    4.77   | 3.63e-14  4.41e-15  4.04e-15 |
 USNO |   210     0     0   210    4.68   | 3.21e-14  5.11e-15         - |
 USN1 |   288     0     0   288    4.64   | 7.04e-14  1.05e-14  2.91e-15 |
 WSRT |   288     0     0   288    3.16   | 2.90e-14  7.06e-15  2.73e-15 |
 PIE1 |   288     0     0   288    3.07   | 3.20e-14  5.82e-15  7.02e-15 |
 WTZR |   288     0     0   288    2.83   | 4.38e-14  1.78e-14  8.14e-15 |
 SPT0 |   288     0     0   288    2.66   | 4.27e-14  5.22e-15  2.83e-15 |
 FAIR |   288     0     0   288    2.50   | 5.86e-14  7.16e-15  1.80e-15 |
 WES2 |   288     0     0   143    2.06   | 4.56e-14  8.31e-15  3.31e-15 |
 KOKB |   288     0     0   288    1.98   | 6.28e-14  1.40e-14  5.07e-15 |
 ALGO |   288     0     0   143    1.69   | 3.91e-14  7.86e-15  2.82e-15 |
 TIDB |   288     0     0   288    1.64   | 1.89e-13  2.49e-14  5.65e-15 |
 DRAO |   288     0     0   288    1.31   | 6.99e-14  1.65e-14  8.25e-15 |
 FORT |   288     0     0   288    0.94   | 6.73e-14  2.77e-14  2.09e-14 |
 NYA1 |   209     0     0   209    0.80   | 3.00e-14  6.06e-15         - |
 NYAL |   288     1     0   142    0.41   | 3.85e-14  6.77e-15  1.31e-15 |
 GODE |   288     0     0   288    0.32   | 3.81e-14  2.20e-14  1.67e-14 |
 PTBB |   288     0     0   288    0.20   | 3.40e-13  6.79e-14  3.38e-14 |
 ALBH |   288     0     0   288    0.19   | 3.60e-14  9.61e-15  7.05e-15 |
 BAHR |   288     0     0   288    0.14   | 3.14e-13  8.83e-14  2.08e-14 |
 KGN0 |   287     0     0   286    0.14   | 3.32e-13  1.03e-13  2.26e-14 |
 MIZU |   288     0     0   288    0.13   | 3.03e-13  7.39e-14  2.95e-14 |
 G16  |   288     0     0   288    0.12   | 4.77e-13  6.64e-14  3.87e-14 |
 SFER |   287     0     0   286    0.10   | 4.07e-13  9.99e-14  4.20e-14 |
 G04  |   288     0     0   288    0.10   | 4.81e-13  1.37e-13  5.88e-14 |
 G29  |   288     0     0   288    0.09   | 3.88e-13  1.12e-13  8.17e-14 |
 YAKT |   288     0     0   288    0.08   | 4.39e-13  1.54e-13  3.98e-14 |
 G22  |   288     0     1   121    0.07   | 6.21e-13  6.57e-14  3.33e-14 |
 TLSE |   287     0     0   286    0.07   | 4.36e-13  1.32e-13  5.71e-14 |
 G17  |   288     0     0   288    0.07   | 4.01e-13  1.10e-13  9.54e-14 |
 G30  |   288     0     0   288    0.06   | 3.22e-13  1.00e-13  6.59e-14 |
 IENG |   288     0     0   288    0.06   | 5.20e-13  1.32e-13  5.66e-14 |
 G20  |   288     0     2    66    0.06   | 5.25e-13  6.78e-14  1.53e-14 |
 HRAO |   184     0     0   178    0.06   | 1.12e-13  2.87e-14         - |
 G27  |   288     0     0   288    0.05   | 3.24e-13  1.02e-13  8.91e-14 |
 TWTF |   282     0     0   136    0.05   | 4.07e-13  1.07e-13  5.07e-14 |
 BOR1 |   288     1     0   286    0.05   | 4.48e-13  1.20e-13  7.05e-14 |
 DWH1 |   288     0     2   196    0.04   | 5.40e-13  1.84e-13  9.43e-14 |
 G07  |   288     0     0   288    0.03   | 3.16e-13  9.71e-14  1.20e-13 |
 G31  |   288     0     0   288    0.03   | 2.02e-13  1.30e-13  1.06e-13 |
 TSKB |   288     0     0   288    0.02   | 1.00e-12  3.26e-13  6.91e-14 |
 G06  |   288     0     0   288    0.01   | 5.87e-13  2.25e-13  2.25e-13 |
 G05  |   288     0     0   288    0.01   | 1.37e-12  4.31e-13  1.59e-13 |
 G24  |   288     0     0   288    0.01   | 1.31e-12  3.41e-13  3.38e-13 |
 KERG |   288     0     0   288    0.01   | 1.64e-12  2.91e-13  9.01e-14 |
 G15  |   288     0     0   288    0.01   | 1.46e-12  5.39e-13  1.57e-13 |
 G25  |   288     0     0   288    0.00   | 1.51e-12  4.49e-13  1.84e-13 |
 PRDS |   288     0     0   288    0.00   | 1.43e-12  4.17e-13  2.21e-13 |
 WHIT |   288     0     1   145    0.00   | 4.99e-13  2.47e-13  2.31e-13 |
 THTI |   288     0     0   288    0.00   | 3.77e-13  2.01e-13  3.00e-13 |
 SUTM |   288     0     1   134    0.00   | 7.30e-13  1.73e-13  2.69e-13 |
 GPST |   288     0     0     0    0.00   | 2.40e-14  4.06e-15  1.50e-15 |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 PETP |   286     0     0     0    0.00   |        -         -         - |
 NKLG |   287     1     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HERS |   241     0     0     0    0.00   |        -         -         - |
 BILI |   286     1     0     0    0.00   |        -         -         - |
 AUCK |   264     0     0     0    0.00   |        -         -         - |
 ASC1 |   287     0     0     0    0.00   |        -         -         - |
 G28  |   288     0     5     0    0.00   | 6.67e-13  6.73e-14  4.23e-14 |
 G26  |   261     0     0     0    0.00   |        -         -         - |
 G21  |   288     0     6     0    0.00   | 1.04e-12  1.19e-13  2.80e-14 |
 G18  |   288     0     6     0    0.00   | 1.19e-12  1.17e-13  2.87e-14 |
 G14  |   288     0     6     0    0.00   | 6.62e-13  6.58e-14  1.85e-14 |
 G13  |   288     0     6     0    0.00   | 5.65e-13  5.86e-14  2.23e-14 |
 G11  |   288     0     6     0    0.00   | 7.06e-13  7.24e-14  4.40e-14 |
 G10  |   278     0     0     0    0.00   | 1.30e-12  5.36e-13  2.80e-13 |
 G09  |   288     0     0     0    0.00   | 1.30e-12  4.24e-13  2.21e-13 |
 G08  |   288     0     0     0    0.00   | 3.98e-13  6.87e-13  4.62e-13 |
 G03  |   288     0     0     0    0.00   | 1.28e-12  4.08e-13  2.29e-13 |
 G01  |   288     0     0     0    0.00   | 1.46e-12  5.31e-13  3.76e-13 |
 ZWEN |   287     0     0     0    0.00   |        -         -         - |
 ZAMB |   279     0     0     0    0.00   |        -         -         - |
 YELL |   288     1     0     0    0.00   | 5.41e-14  1.11e-14  4.89e-15 |
 YEBE |   288     0     6     0    0.00   | 2.82e-13  3.22e-14  6.63e-15 |
 YAR2 |   276     0     0     0    0.00   | 8.99e-13  1.24e-12  4.03e-13 |
 USUD |   288     2     0     0    0.00   |        -         -         - |
 URUM |   285     0     0     0    0.00   |        -         -         - |
 UNSA |   276     0     0     0    0.00   |        -         -         - |
 TRO1 |   275     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   287     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     1     0    0.00   | 1.96e-12  9.46e-13  3.98e-13 |
 RIOG |   288     1     0     0    0.00   |        -         -         - |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 RESO |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   288     1     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PIMO |   216     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.81e-12  5.28e-13  1.12e-13 |
 PDEL |   287     0     0     0    0.00   |        -         -         - |
 NRIL |   287     1     0     0    0.00   |        -         -         - |
 NNOR |   288     0     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     0     0    0.00   |        -         -         - |
 MCM4 |   286     0     0     0    0.00   |        -         -         - |
 MAS1 |   288     0     0     0    0.00   | 1.93e-12  4.57e-13  1.89e-13 |
 MALI |   210     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   283     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     1     0    0.00   | 7.93e-13  7.76e-13  3.08e-12 |
 KIT3 |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     1     0     0    0.00   | 5.73e-13  2.94e-13  8.01e-13 |
 IISC |   286     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   285     0     0     0    0.00   |        -         -         - |
 CRO1 |   285     1     0     0    0.00   |        -         -         - |
 CHUR |   288     0     2     0    0.00   | 1.23e-12  1.34e-12  7.73e-13 |
 CAGZ |   288     0     6     0    0.00   | 1.85e-12  1.96e-13  4.33e-14 |
 BRMU |   275     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ARTU |   286     0     0     0    0.00   |        -         -         - |
 AOML |   288     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.57e-17  3.08e-16  1.85e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     WSRT      STJO      NYAL |
------------------------------------------+------------------------------+
