
 GPS week: 1264   Day: 0   MJD: 53092                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2492      0     0.00    -0.01     2.85     0.00
 cod |   288     0  24625    805     0.17    -0.57     0.05    12.82
 emr |   288     0  25102    326  2539.53    24.54     0.03    25.02
 esa |   288     0  18115    795     1.82    -1.93     0.07     8.26
 gfz |   288     0  19938    287     0.22    -0.22     0.03    20.18
 iga |    96     0   2588     36     0.01    -0.06     0.08     0.00
 igu |    96     0   2588      0    -0.01    -0.05     3.46     0.00
 jpl |   288     0  16245    297     1.47    -1.64     0.04    18.84
 ngs |    96     0   2588      0     0.00     0.00     2.77     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  34289    747   645.54    11.44     0.04    14.88

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |-10937   -57  -105   176   173   -72 -5954   -94-10544     -   -46 |
    3 |  4425  -100   -68    76   283    94  2934   -38  4365     -  -200 |
    4 |  -612   156    -1  -127  -117  -123 -1373    80  -632     -    43 |
    5 |  4039   -49   -69  -114    47   135  8597   120  3863     -    86 |
    6 |  4557  -105  -111   -15   339   -81-12948   -15  3477     -  -164 |
    7 | -2053   169    65   -42  -162  -124 -1290   -21 -2229     -     - |
    8 |-10112   116   -18   264  -142     0-11630   121 -9184     -   -98 |
    9 | -2442    78  -132   -33   191   -68  2238    80 -2370     -  -134 |
   10 |  -157     X   -15     X    26   -99  2002   209   374     -  -141 |
   11 |     -    73   -27   127   -36   -51  1713     X  1879     -   -39 |
   13 |  3371   152   -70   -31   -26   -46  2762    32  3366     -    21 |
   14 |  2642    -5   -68   315   -73    44  2532    17  2416     -    51 |
   15 |  -719  -180    55  -161    63   118 11947   125  -655     -    -9 |
   16 |  4635   -50   -96     2   141    44  2039   138  4548     -   -64 |
   17 | -6287   -23   -87  -103   262   149   988     X -5957     -  -133 |
   18 |  1988     2    79   203  -193    96  1808    99  1974     -   -58 |
   20 |  4323    51   -18   234  -179   202  1944   156  4272     -   -12 |
   21 |   128    87   -24    28  -115   238  -326   104   526     -    43 |
   22 |   321   136    -5  -345   -72    18 -4303   183   130     -    47 |
   24 |  1177    93   -48     1   -36  -104   448    59   958     -    10 |
   25 |  2264    76  -168  -165   262  -218  8121     9  2105     -   -54 |
   26 | -3273     3   -15   -57    69   -35 -4980   112 -3766     -  -113 |
   27 | -4185     7  -106   232   122  -193 -3388   128 -4081     -  -207 |
   28 |  6462   256   -27  -173  -177    61 -2765   148  6473     -    61 |
   29 | -3510    69   -74  -275   170     9 -1143   128 -3616     -   -92 |
   30 | -1045   -64  -123   -82   212    25 -3320    25 -1343     -    14 |
   31 |  4978  -134   -15    19   196   -11  3436   -27  3659     -  -116 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    41   -38     -     -     -     -    14     -     -    11 |
 AMC2 |     -  -139    72     -     -     -     -   -95     -     -   120 |
 AOML |     -   -76     -     -     -     -     -     -     -     -    65 |
 ARTU |     -     -     -    59    44     -     -   -73     -     -     - |
 ASC1 |     -    55     -     -  -477     -     -     -     -     -   616 |
 ASPA |     -     -     -     -   254     -     -  -184     -     -  -117 |
 AUCK |     -    49     -   -76     -     -     -     -     -     -     - |
 BAHR |     -     -    -5     -    -9     -     -    56     -     -   -51 |
 BAN2 |     -     -   -38     -     -     -     -     -     -     -    63 |
 BILI |     -     -     -     -     6     -     -    -6     -     -     - |
 BOR1 |     -    72    48     -     -     -     -     -     -     -  -143 |
 BREW |     -     -    56     -     -     -     -  -122     -     -    61 |
 BRMU |     -     -     -     -   -44     -     -     -     -     -    60 |
 BRUS |     -    39     1     -     -     -     -    -3     -     -   -32 |
 CAGZ |     -    -8     -     -     -     -     -     -     -     -     6 |
 CAS1 |     -    15     -   -23     -     -     -     -     -     -     0 |
 CEDU |     -     -     -   681     -     -     -     -     -     -  -378 |
 CHAT |     -   -45     -    70     -     -     -     -     -     -     - |
 CHUR |     -     -   124     -     -     -     -     -     -     -  -209 |
 COCO |     -     -     -   -23     -     -     -     -     -     -    13 |
 CORD |     -    36     -   -55     -     -     -     -     -     -     - |
 CRO1 |     -     -    -1  -101    53     -     -    24     -     -   -51 |
 DRAO |     -    10   -85     -     -     -     -   138     -     -   -40 |
 DWH1 |     -   157   103     -     -     -     -  -184     -     -   -77 |
 FAIR |     -     -   -17    28  -108     -     -    58     -     -    87 |
 FORT |     -     X  -124     -    -6     -     -    73     -     -   127 |
 GLPS |     -   -42     -    16    41     -     -   -22     -     -     - |
 GODE |     -   -96    99   138     -     -     -   -96     -     -   -39 |
 GOL2 |     -     -    10     -     -     -     -     -     -     -   -16 |
 GOLD |     -   -15     -    -9     -     -     -     2     -     -    15 |
 GUAM |     -   194     -  -585    83     -     -  -106     -     -   179 |
 GUAT |     -     -     -     -   -23     -     -     -     -     -    32 |
 HERS |     -     -  -187     -     -     -     -     -     -     -   314 |
 HOB2 |     -   112   -20     -     -     -     -     -     -     -   -62 |
 HOFN |     -     -     -     -  -138     -     -   148     -     -     - |
 HRAO |     -   -61     -     -     -     -     -     3     -     -    54 |
 IENG |     -  -131    67     -     -     -     -     -     -     -     - |
 IISC |     -     -     -    69   -28     -     -     -     -     -     X |
 JPLM |     -     -   -56     -     -     -     -    94     -     -   -24 |
 KERG |     -     -    15   597  -106     -     -     -     -     -   -19 |
 KGN0 |     -    -2    -4     -     -     -     -     -     -     -     9 |
 KIRU |     -   -37     -    70     -     -     -     -     -     -    -7 |
 KIT3 |     -     -     -    76   -31     -     -     -     -     -     X |
 KOKB |     -   -32    -5     -   -43     -     -     2     -     -    91 |
 KOSG |     -   -40     -     -     -     -     -     -     -     -    35 |
 KUNM |     -     -     -     -     -     -     -    69     -     -   -87 |
 LHAS |     -    55     -  -164     -     -     -     -     -     -    43 |
 LPGS |     -   120   203   261  -579     -     -    20     -     -   174 |
 MAC1 |     -     -     -   -96     -     -     -     -     -     -    53 |
 MALI |     -   108     -   -58     -     -     -     -     -     -   -59 |
 MAS1 |     -   -11    50  -164     -     -     -     -     -     -    17 |
 MCM4 |     -    50  -111     -    85     -     -     -     -     -     - |
 MDO1 |     -     -    26     -    10     -     -     4     -     -   -62 |
 MEDI |     -     -    31     -     -     -     -     -     -     -   -52 |
 METS |     -  -112    -1     -     -     -     -     -     -     -    98 |
 MIZU |     -     -    12     -     -     -     -     -     -     -   -20 |
 MKEA |     -   -20     -  -235     -     -     -     -     -     -   148 |
 NKLG |     -     -     -  -127  -163     -     -   231     -     -     0 |
 NLIB |     -     -    29     -     -     -     -    53     -     -  -115 |
 NNOR |     -     -    47  -124     -     -     -   -45     -     -    48 |
 NPLD |     -     -    33     -     -     -     -     -     -     -   -55 |
 NRC1 |     -     -     9     -    20     -     -   -78     -     -    56 |
 NRIL |     -     -     -     -   -32     -     -    34     -     -     - |
 NYA1 |     -     X     -     -   -48     -     -     -     -     -    65 |
 ONSA |     -     -   -18    56     -     -     -     -     -     -     - |
 PDEL |     -    38     -     -   -69     -     -    48     -     -     - |
 PERT |     -   108    22  -565   119     -     -     -     -     -    13 |
 PETP |     -   -18     -     -    12     -     -     -     -     -     - |
 PIE1 |     -     -   104  -116     -     -     -   -54     -     -   -42 |
 POTS |     -   -61     -     -    10     -     -     -     -     -    39 |
 PRDS |     -  -131   -22     -     -     -     -     -     -     -   150 |
 PTBB |     -     8    58     -     -     -     -     -     -     -  -104 |
 QAQ1 |     -     -     4     -     -     -     -     -     -     -    -7 |
 RBAY |     -  -185     -     -     -     -     -     -     -     -   159 |
 REYK |     -  -123     -     -     -     -     -     -     -     -   106 |
 RIOG |     -   -30     0   517  -110     -     -     -     -     -  -112 |
 SANT |     -   259     -    80  -158     -     -     -     -     -   -44 |
 SCH2 |     -     -     1     -     -     -     -     -     -     -    -1 |
 SELE |     -     -     -     -     -     -     -   -10     -     -    13 |
 SEY1 |     -   -95     -     -    38     -     -     -     -     -    30 |
 SFER |     -    44    15     -     -     -     -     -     -     -   -77 |
 SPT0 |     -  -154    41     -     -     -     -     -     -     -    63 |
 STJO |     -     -   -76     -     -     -     -   -15     -     -   147 |
 STR1 |     -     -   -29     -     -     -     -     -     -     -    49 |
 SUTH |     -    20     -     -     -     -     -     -     -     -   -18 |
 SUTM |     -     -   144     -  -100     -     -   -84     -     -     - |
 SUWN |     -     -     4     -     -     -     -     -     -     -    -7 |
 THTI |     -     -   154   247   126     -     -  -292     -     -  -116 |
 THU3 |     -   -15     -     -    23     -     -     -     -     -   -18 |
 TID2 |     -     -     -     -     X     -     -   -69     -     -    88 |
 TIDB |     -     -   -22   -18   -24     -     -     -     -     -    79 |
 TLSE |     -     -    50     -     -     -     -     -     -     -   -83 |
 TRO1 |     -  -118     X     -    -5     -     -    -3     -     -   113 |
 TSKB |     -   -40    23     -    28     -     -     -     -     -   -42 |
 UNSA |     -     -     -  -123    88     -     -     -     -     -   -50 |
 URUM |     -   -17     -     -     -     -     -     -     -     -    15 |
 USN1 |     -   130   218     -     -     -     -  -415     -     -    47 |
 USNO |     -   -74    55     -     -     -     -     -     -     -   -29 |
 USUD |     -     -   -56   133     -     -     -     -     -     -    20 |
 VILL |     -    -6     -     X     -     -     -     -     -     -     6 |
 WHIT |     -  -110     -     -     -     -     -     -     -     -    94 |
 WSRT |     -   -96    71     -     -     -     -    43     -     -   -92 |
 WTZR |     -   -53   101   -73     -     -     -   -22     -     -   -56 |
 WUHN |     -     -   -89     -  -214     -     -     -     -     -   440 |
 YAKT |     -     -     -     -     -     -     -   -42     -     -    53 |
 YAR2 |     -     -    27     -     -     -     -     -     -     -   -46 |
 YEBE |     -     -    47     -     -     -     -    20     -     -  -104 |
 YELL |     -  -125    73   192   -23     -     -     -     -     -  -109 |
 YSSK |     -    46     -     -     -     -     -   -31     -     -     - |
 ZAMB |     -   -98     -     -    62     -     -     -     -     -     - |
 ZWEN |     -  -103     -   -26    37     -     -     -     -     -    54 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  4579    52    16    38    16    45  4224    32  4677     -    44 |  288   3.70
    3 |  2549    71    25    86    57    73  1078    37  2606     -    72 |  288   1.21
    4 |   957    35    26    72    46    55   978    47   934     -    51 |  288   0.80
    5 |  4697    42    43    42    27    84  7898    28  4766     -    59 |  288   2.06
    6 |  3073    73    30    54    31    83  8365    57  4199     -    63 |  288   1.74
    7 |   918    37    24    58    45    51   554    24  1033     -     - |  288   0.73
    8 |  5474    98    40    55    21   148  5512    23  4767     -    63 |  288   2.46
    9 |  3347    21    19    30    24   116  2276    24  3257     -    32 |  288   2.65
   10 |  5247     X    42     X    24   142  4040    33  4845     -    68 |  276   2.01
   11 |     -    93    47    45    22    63  1069     X  1235     -    49 |  288   0.35
   13 |   411    70    27    62    37    35  1808    51   461     -    45 |  288   0.53
   14 |   667    62    27    87    54    67  1308    46   569     -    57 |  288   0.24
   15 |  3950    33    21    81    41    65  5435    72  4055     -    41 |  288   3.75
   16 |   623    62    32   146    27    50  1058    52   655     -    92 |  288   0.37
   17 |  1836    45    38    50    28    40  1238     X  1451     -    45 |  288   0.67
   18 |  1122    62    26    99    21   120  1426    44  1002     -    25 |  288   0.43
   20 |   907    68    18    78    20   103  1072    37   754     -    43 |  288   0.23
   21 |  1569    51    46    31    24    51  1129    24  1637     -    42 |  288   0.76
   22 |  1061    61    30    79    44    58  2748    54  1084     -    89 |  288   0.42
   24 |  2169    49    34    54    27    31  2442    63  2219     -    70 |  288   2.11
   25 |  3693    40    30    44    20    58  5488    24  3758     -    45 |  288   1.58
   26 |  3611    33    31    66    24    41  2599    59  3543     -    27 |  288   0.84
   27 |   649    76    43    70    18    75  1814    28   734     -    61 |  288   0.80
   28 |  2309    87    39    88    36    81  3544    40  2253     -    90 |  288   0.65
   29 |  1767    29    26    81    25    76  1483    32  1737     -    37 |  288   0.89
   30 |  1950    54    44    34    38    54  2541    20  1649     -    44 |  288   0.69
   31 |  3948    58    44   110    71   121  2329    31  3572     -    55 |  288   2.03
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    39    14     -     -     -     -    23     -     -    42 |  288   0.08
 AMC2 |     -    40    33     -     -     -     -    40     -     -    35 |  288   0.03
 AOML |     -    23     -     -     -     -     -     -     -     -    20 |  282  23.51
 ARTU |     -     -     -    35    18     -     -    26     -     -     - |  288   9.96
 ASC1 |     -    48     -     -    23     -     -     -     -     -    42 |  196    >>>
 ASPA |     -     -     -     -    33     -     -    46     -     -    53 |  288    >>>
 AUCK |     -    66     -   102     -     -     -     -     -     -     - |  105  18.08
 BAHR |     -     -    21     -    12     -     -    44     -     -    19 |  288   0.40
 BAN2 |     -     -    30     -     -     -     -     -     -     -    51 |  288  19.32
 BILI |     -     -     -     -    13     -     -    14     -     -     - |  287   6.93
 BOR1 |     -    25    15     -     -     -     -     -     -     -    23 |  265   0.55
 BREW |     -     -    19     -     -     -     -    29     -     -    34 |  288   0.03
 BRMU |     -     -     -     -    14     -     -     -     -     -    19 |  288    >>>
 BRUS |     -    23    13     -     -     -     -    21     -     -    32 |  288   0.03
 CAGZ |     -    23     -     -     -     -     -     -     -     -    20 |  288   0.58
 CAS1 |     -    40     -    53     -     -     -     -     -     -    44 |  288   8.52
 CEDU |     -     -     -    45     -     -     -     -     -     -    25 |  269  13.15
 CHAT |     -    32     -    49     -     -     -     -     -     -     - |  263  12.17
 CHUR |     -     -    12     -     -     -     -     -     -     -    20 |  278   5.03
 COCO |     -     -     -    55     -     -     -     -     -     -    31 |  288  10.98
 CORD |     -    35     -    54     -     -     -     -     -     -     - |  286  22.27
 CRO1 |     -     -    16    92    41     -     -    21     -     -    29 |  288  21.97
 DRAO |     -    47    13     -     -     -     -    20     -     -    25 |  288   0.10
 DWH1 |     -    34    20     -     -     -     -    23     -     -    35 |  288   0.32
 FAIR |     -     -    13    31    30     -     -    15     -     -    22 |  288   0.03
 FORT |     -     X    32     -    41     -     -    30     -     -    31 |  288   0.11
 GLPS |     -    28     -    47    22     -     -    18     -     -     - |  288  29.35
 GODE |     -    34    48    30     -     -     -    30     -     -    30 |  288   0.25
 GOL2 |     -     -    38     -     -     -     -     -     -     -    65 |  200  86.36
 GOLD |     -    90     -    23     -     -     -    25     -     -    59 |  288  15.88
 GUAM |     -    18     -    72    24     -     -    34     -     -    43 |  288  18.33
 GUAT |     -     -     -     -    18     -     -     -     -     -    24 |  288    >>>
 HERS |     -     -    30     -     -     -     -     -     -     -    50 |  208  14.51
 HOB2 |     -    32    14     -     -     -     -     -     -     -    29 |  288  28.91
 HOFN |     -     -     -     -    26     -     -    28     -     -     - |  288    >>>
 HRAO |     -    77     -     -     -     -     -    73     -     -   135 |  283   0.58
 IENG |     -    28    14     -     -     -     -     -     -     -     - |  288   0.80
 IISC |     -     -     -    42    17     -     -     -     -     -     X |  288  34.20
 JPLM |     -     -    26     -     -     -     -    24     -     -    42 |  288  10.23
 KERG |     -     -    20    64    30     -     -     -     -     -    18 |  288   1.03
 KGN0 |     -    34    20     -     -     -     -     -     -     -    17 |  287   0.35
 KIRU |     -    35     -    42     -     -     -     -     -     -    13 |  288   8.88
 KIT3 |     -     -     -   157    64     -     -     -     -     -     X |  272  24.54
 KOKB |     -    40    19     -    37     -     -    35     -     -    28 |  288   0.07
 KOSG |     -    28     -     -     -     -     -     -     -     -    24 |  288  46.60
 KUNM |     -     -     -     -     -     -     -    30     -     -    38 |  288  19.19
 LHAS |     -    17     -    19     -     -     -     -     -     -    15 |  288  11.67
 LPGS |     -    52    28   106    22     -     -    67     -     -    28 |  288  31.75
 MAC1 |     -     -     -    63     -     -     -     -     -     -    35 |  288  12.27
 MALI |     -    36     -    71     -     -     -     -     -     -    41 |  288  30.93
 MAS1 |     -    34    13    32     -     -     -     -     -     -    20 |  288   1.73
 MCM4 |     -    39    39     -    26     -     -     -     -     -     - |  288  59.09
 MDO1 |     -     -    13     -    18     -     -    21     -     -    21 |  288  10.85
 MEDI |     -     -    18     -     -     -     -     -     -     -    31 |  288    >>>
 METS |     -    32    20     -     -     -     -     -     -     -    32 |  287   8.90
 MIZU |     -     -    11     -     -     -     -     -     -     -    19 |  288   0.31
 MKEA |     -    17     -    46     -     -     -     -     -     -    29 |  288  38.31
 NKLG |     -     -     -    59    21     -     -    37     -     -    54 |  287 330.87
 NLIB |     -     -    55     -     -     -     -    49     -     -    51 |  288 256.68
 NNOR |     -     -    35    79     -     -     -    36     -     -    18 |  288  20.95
 NPLD |     -     -    19     -     -     -     -     -     -     -    33 |  287   0.03
 NRC1 |     -     -    10     -    14     -     -    20     -     -    18 |  288   0.01
 NRIL |     -     -     -     -    17     -     -    18     -     -     - |  288   9.77
 NYA1 |     -     X     -     -    26     -     -     -     -     -    35 |  288   0.09
 ONSA |     -     -    12    35     -     -     -     -     -     -     - |  288   0.03
 PDEL |     -    22     -     -    21     -     -    19     -     -     - |  288  57.06
 PERT |     -    40    25    75    16     -     -     -     -     -    25 |  288   2.20
 PETP |     -    24     -     -    15     -     -     -     -     -     - |  287   7.66
 PIE1 |     -     -    33    62     -     -     -    25     -     -    21 |  288   0.03
 POTS |     -    26     -     -    16     -     -     -     -     -    23 |  288  21.11
 PRDS |     -    42    10     -     -     -     -     -     -     -    44 |  288   1.63
 PTBB |     -    30    21     -     -     -     -     -     -     -    50 |  288   0.22
 QAQ1 |     -     -    10     -     -     -     -     -     -     -    17 |  284   7.59
 RBAY |     -   118     -     -     -     -     -     -     -     -   102 |  115  39.10
 REYK |     -    27     -     -     -     -     -     -     -     -    24 |  288   6.72
 RIOG |     -    41    26    73    22     -     -     -     -     -    27 |  285  17.59
 SANT |     -    80     -    62    51     -     -     -     -     -    54 |  288   5.73
 SCH2 |     -     -    12     -     -     -     -     -     -     -    20 |  288 127.76
 SELE |     -     -     -     -     -     -     -    28     -     -    35 |  288  47.49
 SEY1 |     -    44     -     -    23     -     -     -     -     -    27 |  288  30.20
 SFER |     -    61    32     -     -     -     -     -     -     -    29 |  286 172.84
 SPT0 |     -    31    17     -     -     -     -     -     -     -    31 |  288   0.02
 STJO |     -     -     8     -     -     -     -    18     -     -    25 |  288   0.04
 STR1 |     -     -    18     -     -     -     -     -     -     -    30 |  288   1.15
 SUTH |     -    50     -     -     -     -     -     -     -     -    43 |  288  19.79
 SUTM |     -     -    27     -    34     -     -    61     -     -     - |  288   1.53
 SUWN |     -     -    14     -     -     -     -     -     -     -    23 |  288   1.57
 THTI |     -     -    46    83    47     -     -    55     -     -    41 |  288   2.84
 THU3 |     -    22     -     -    13     -     -     -     -     -    18 |  288   9.28
 TID2 |     -     -     -     -     X     -     -    43     -     -    54 |  287   0.04
 TIDB |     -     -    20    37    34     -     -     -     -     -    39 |  288   0.09
 TLSE |     -     -    17     -     -     -     -     -     -     -    29 |  287   0.58
 TRO1 |     -    23     X     -    33     -     -    34     -     -    28 |  283   9.37
 TSKB |     -    32    20     -    21     -     -     -     -     -    25 |  288   1.68
 UNSA |     -     -     -    42    51     -     -     -     -     -    54 |  288  18.62
 URUM |     -    18     -     -     -     -     -     -     -     -    16 |  288  21.50
 USN1 |     -    57    36     -     -     -     -    54     -     -    29 |  288   0.05
 USNO |     -    31    10     -     -     -     -     -     -     -    23 |  288   0.03
 USUD |     -     -    15    24     -     -     -     -     -     -    22 |  288  12.40
 VILL |     -    15     -     X     -     -     -     -     -     -    13 |  287   2.09
 WHIT |     -    37     -     -     -     -     -     -     -     -    32 |  288   1.40
 WSRT |     -    22    16     -     -     -     -    19     -     -    20 |  288   0.03
 WTZR |     -    25    21    56     -     -     -    22     -     -    19 |  288   0.04
 WUHN |     -     -    26     -    24     -     -     -     -     -    38 |  287  26.21
 YAKT |     -     -     -     -     -     -     -    50     -     -    64 |  288   0.75
 YAR2 |     -     -    22     -     -     -     -     -     -     -    37 |  288   5.25
 YEBE |     -     -    12     -     -     -     -    16     -     -    22 |  288   0.08
 YELL |     -    27    54    40    57     -     -     -     -     -    28 |  287   0.13
 YSSK |     -    25     -     -     -     -     -    17     -     -     - |  287   9.52
 ZAMB |     -    48     -     -    30     -     -     -     -     -     - |  283  15.92
 ZWEN |     -    32     -    40    12     -     -     -     -     -    10 |  287  15.41
 -----+-------------------------------------------------------------------+--------------
 TOT  |  2853    47    28    65    32    79  3464    36  2769     -    42 |


 BEST CLOCK FIT: NRC1   288   0.01 (ns) 

---------------------------------------------------------------------------
---------------------------------------------------------------------------
 
 
RESULTS OF TIME SCALE COMBINATION:
 
      |  STABILITY RESULTS FROM IGS CLOCK ENSEMBLE
      |              NFRQ  NEPO     MEAN  |  ALLAN DEVIATION AT TAU =    |
      | NREPO NBEPO  BRKS  USED    WGT(%) |     300s     3600s    21600s |
------+-----------------------------------+------------------------------+
 ONSA |   288     0     0   288    9.97   | 3.99e-14  7.29e-15  1.91e-15 |
 BRUS |   288     0     0   288    9.97   | 3.68e-14  4.93e-15  1.90e-15 |
 AMC2 |   288     0     0   288    9.62   | 3.97e-14  5.71e-15  2.06e-15 |
 NRC1 |   288     0     0   288    8.37   | 2.72e-14  5.91e-15  1.48e-15 |
 NLIB |   288     1     0   287    7.02   | 4.44e-14  1.19e-14  2.71e-15 |
 USNO |   288     0     0   288    6.98   | 3.73e-14  6.42e-15  1.52e-15 |
 BREW |   288     0     0   288    6.43   | 4.05e-14  6.30e-15  1.81e-15 |
 TID2 |   287     0     0   286    5.35   | 5.37e-14  1.23e-14  2.38e-15 |
 STJO |   288     0     0   288    5.16   | 3.34e-14  7.83e-15  3.18e-15 |
 NPLD |   287     0     0   142    4.90   | 3.68e-14  5.04e-15  1.78e-15 |
 USN1 |   288     0     0   288    4.52   | 8.54e-14  1.64e-14  2.96e-15 |
 WTZR |   288     0     0   288    3.06   | 3.53e-14  7.23e-15  2.28e-15 |
 PIE1 |   288     0     0   288    3.04   | 3.69e-14  4.70e-15  2.10e-15 |
 SPT0 |   288     0     0   288    2.77   | 4.38e-14  6.88e-15  1.46e-15 |
 NYA1 |   288     0     0   287    2.35   | 3.17e-14  6.64e-15  5.94e-15 |
 KOKB |   288     0     0   288    1.77   | 6.07e-14  1.60e-14  6.80e-15 |
 FAIR |   288     0     0   288    1.66   | 5.89e-14  8.74e-15  1.84e-15 |
 WSRT |   288     0     0   143    1.64   | 2.87e-14  5.16e-15  2.24e-15 |
 DRAO |   288     0     0   288    1.41   | 6.57e-14  1.94e-14  1.07e-14 |
 TIDB |   288     0     0   177    0.97   | 1.79e-13  1.79e-14  5.99e-15 |
 FORT |   288     0     0   288    0.58   | 8.29e-14  2.23e-14  8.76e-15 |
 GODE |   288     0     0   288    0.28   | 3.84e-14  1.13e-14  1.73e-14 |
 PTBB |   288     0     0   288    0.20   | 3.29e-13  7.05e-14  1.71e-14 |
 G30  |   288     0     0   288    0.19   | 2.96e-13  9.60e-14  4.13e-14 |
 KGN0 |   287     0     0   286    0.15   | 3.19e-13  9.31e-14  2.59e-14 |
 MIZU |   288     0     0   288    0.14   | 3.33e-13  8.89e-14  2.14e-14 |
 ALBH |   288     0     0   288    0.14   | 3.97e-14  8.27e-15  5.83e-15 |
 BAHR |   288     0     0   288    0.14   | 3.01e-13  8.24e-14  4.80e-14 |
 G16  |   288     0     0   288    0.09   | 4.91e-13  8.13e-14  3.80e-14 |
 TLSE |   287     0     0   286    0.08   | 4.21e-13  1.05e-13  4.75e-14 |
 HRAO |   283     0     0   282    0.08   | 1.24e-13  2.54e-14  5.36e-14 |
 YAKT |   288     0     0   288    0.08   | 4.59e-13  1.29e-13  5.73e-14 |
 GOL2 |   200     1     0    41    0.08   | 4.03e-14  6.04e-15         - |
 G28  |   288     0     3   111    0.08   | 6.98e-13  7.70e-14  5.33e-14 |
 G04  |   288     0     0   288    0.07   | 4.45e-13  1.56e-13  7.21e-14 |
 G17  |   288     0     0   288    0.07   | 3.99e-13  1.10e-13  7.94e-14 |
 G07  |   288     0     0   288    0.07   | 3.36e-13  9.06e-14  9.79e-14 |
 G27  |   288     0     0   288    0.07   | 3.57e-13  8.95e-14  9.58e-14 |
 SFER |   286     0     0   284    0.07   | 4.09e-13  1.20e-13  3.12e-14 |
 DWH1 |   288     0     0   288    0.06   | 5.20e-13  1.53e-13  2.53e-14 |
 IENG |   288     0     0   288    0.06   | 5.26e-13  1.38e-13  9.78e-14 |
 BOR1 |   265     0     0   265    0.04   | 4.53e-13  1.46e-13  4.38e-14 |
 G29  |   288     0     0   288    0.04   | 4.02e-13  1.14e-13  1.07e-13 |
 G26  |   288     0     0   288    0.04   | 3.71e-13  1.13e-13  1.15e-13 |
 STR1 |   288     0     0   288    0.02   | 6.22e-13  1.69e-13  7.59e-14 |
 G06  |   288     0     0   288    0.02   | 4.78e-13  1.72e-13  1.30e-13 |
 TSKB |   288     0     0   288    0.02   | 9.30e-13  3.03e-13  1.09e-13 |
 G10  |   276     0     0   274    0.01   | 1.23e-12  4.34e-13  2.08e-13 |
 G03  |   288     0     0   288    0.01   | 1.37e-12  4.06e-13  1.20e-13 |
 G25  |   288     0     0   288    0.01   | 1.51e-12  4.21e-13  1.51e-13 |
 G31  |   288     0     0   288    0.01   | 2.18e-13  1.75e-13  1.69e-13 |
 G05  |   288     0     0   288    0.01   | 1.30e-12  4.46e-13  2.54e-13 |
 KERG |   288     0     0   288    0.01   | 1.52e-12  4.57e-13  7.33e-14 |
 G09  |   288     0     0   288    0.01   | 1.31e-12  4.34e-13  2.43e-13 |
 PRDS |   288     0     0   288    0.00   | 1.43e-12  4.61e-13  1.68e-13 |
 SUWN |   288     0     0   143    0.00   | 9.68e-13  3.23e-13  1.28e-13 |
 SUTM |   288     0     0   288    0.00   | 7.29e-13  2.20e-13  1.08e-13 |
 WHIT |   288     0     0   288    0.00   | 4.89e-13  2.27e-13  1.32e-13 |
 MAS1 |   288     0     0   288    0.00   | 1.88e-12  4.87e-13  1.08e-13 |
 THTI |   288     0     0   288    0.00   | 4.07e-13  1.80e-13  2.57e-13 |
 GPST |   288     0     0     0    0.00   | 2.07e-14  3.73e-15  1.75e-15 |
 AUCK |   105     0     0     0    0.00   |        -         -         - |
 RIOG |   285     1     0     0    0.00   |        -         -         - |
 RBAY |   115     0     0     0    0.00   |        -         -         - |
 YSSK |   287     0     0     0    0.00   |        -         -         - |
 WUHN |   287     0     0     0    0.00   |        -         -         - |
 PETP |   287     0     0     0    0.00   |        -         -         - |
 NKLG |   287     0     0     0    0.00   |        -         -         - |
 METS |   287     0     0     0    0.00   |        -         -         - |
 HERS |   208     0     0     0    0.00   |        -         -         - |
 CHAT |   263     0     0     0    0.00   |        -         -         - |
 BILI |   287     0     0     0    0.00   |        -         -         - |
 G24  |   288     0     0     0    0.00   | 1.33e-12  4.35e-13  2.65e-13 |
 G22  |   288     0     3     0    0.00   | 5.83e-13  6.50e-14  2.79e-14 |
 G21  |   288     1     6     0    0.00   | 9.01e-13  1.24e-13  6.71e-14 |
 G20  |   288     0     6     0    0.00   | 5.87e-13  7.75e-14  1.63e-14 |
 G18  |   288     0     6     0    0.00   | 1.30e-12  1.12e-13  4.34e-14 |
 G15  |   288     0     0     0    0.00   | 1.60e-12  6.00e-13  4.34e-13 |
 G14  |   288     0     6     0    0.00   | 5.84e-13  6.96e-14  1.53e-14 |
 G13  |   288     0     6     0    0.00   | 6.68e-13  6.64e-14  3.19e-14 |
 G11  |   288     0     6     0    0.00   | 8.64e-13  9.81e-14  3.93e-14 |
 G08  |   288     0     0     0    0.00   | 4.41e-13  4.15e-13  3.18e-13 |
 G01  |   288     0     0     0    0.00   | 1.65e-12  5.47e-13  4.22e-13 |
 ZWEN |   287     0     0     0    0.00   |        -         -         - |
 ZAMB |   283     0     0     0    0.00   |        -         -         - |
 YELL |   287     1     0     0    0.00   | 4.32e-14  5.76e-15  1.15e-15 |
 YEBE |   288     0     6     0    0.00   | 2.84e-13  2.90e-14  6.66e-15 |
 YAR2 |   288     0     0     0    0.00   | 1.06e-12  1.20e-12  4.71e-13 |
 VILL |   287     0     0     0    0.00   | 1.13e-12  5.65e-13  1.49e-13 |
 USUD |   288     0     0     0    0.00   |        -         -         - |
 URUM |   288     0     0     0    0.00   |        -         -         - |
 UNSA |   288     0     0     0    0.00   |        -         -         - |
 TRO1 |   283     0     0     0    0.00   |        -         -         - |
 THU3 |   288     0     0     0    0.00   |        -         -         - |
 SUTH |   288     0     0     0    0.00   |        -         -         - |
 SEY1 |   288     0     0     0    0.00   |        -         -         - |
 SELE |   288     0     0     0    0.00   |        -         -         - |
 SCH2 |   288     0     0     0    0.00   |        -         -         - |
 SANT |   288     0     2     0    0.00   | 2.02e-12  8.25e-13  4.91e-13 |
 REYK |   288     0     0     0    0.00   |        -         -         - |
 QAQ1 |   284     0     0     0    0.00   |        -         -         - |
 POTS |   288     0     0     0    0.00   |        -         -         - |
 PERT |   288     0     0     0    0.00   | 1.70e-12  4.29e-13  2.13e-13 |
 PDEL |   288     0     0     0    0.00   |        -         -         - |
 NRIL |   288     0     0     0    0.00   |        -         -         - |
 NNOR |   288     1     0     0    0.00   |        -         -         - |
 MKEA |   288     0     0     0    0.00   |        -         -         - |
 MEDI |   288     0     0     0    0.00   |        -         -         - |
 MDO1 |   288     0     1     0    0.00   | 7.15e-13  1.04e-12  7.42e-13 |
 MCM4 |   288     0     0     0    0.00   |        -         -         - |
 MALI |   288     0     0     0    0.00   |        -         -         - |
 MAC1 |   288     0     0     0    0.00   |        -         -         - |
 LPGS |   288     0     0     0    0.00   |        -         -         - |
 LHAS |   288     0     0     0    0.00   |        -         -         - |
 KUNM |   288     0     0     0    0.00   |        -         -         - |
 KOSG |   288     0     2     0    0.00   | 7.36e-13  9.70e-13  2.61e-12 |
 KIT3 |   272     0     0     0    0.00   |        -         -         - |
 KIRU |   288     0     0     0    0.00   |        -         -         - |
 JPLM |   288     0     0     0    0.00   | 5.70e-13  4.08e-13  1.11e-12 |
 IISC |   288     0     0     0    0.00   |        -         -         - |
 HOFN |   288     0     0     0    0.00   |        -         -         - |
 HOB2 |   288     0     0     0    0.00   |        -         -         - |
 GUAT |   288     0     0     0    0.00   |        -         -         - |
 GUAM |   288     0     0     0    0.00   |        -         -         - |
 GOLD |   288     0     0     0    0.00   |        -         -         - |
 GLPS |   288     0     0     0    0.00   |        -         -         - |
 CRO1 |   288     0     0     0    0.00   |        -         -         - |
 CORD |   286     0     0     0    0.00   |        -         -         - |
 COCO |   288     0     0     0    0.00   |        -         -         - |
 CHUR |   278     0     0     0    0.00   |        -         -         - |
 CEDU |   269     0     0     0    0.00   |        -         -         - |
 CAS1 |   288     0     0     0    0.00   |        -         -         - |
 CAGZ |   288     0     6     0    0.00   | 1.98e-12  1.71e-13  4.83e-14 |
 BRMU |   288     0     0     0    0.00   |        -         -         - |
 BAN2 |   288     0     0     0    0.00   |        -         -         - |
 ASPA |   288     0     0     0    0.00   |        -         -         - |
 ASC1 |   196     0     0     0    0.00   |        -         -         - |
 ARTU |   288     0     0     0    0.00   |        -         -         - |
 AOML |   282     0     0     0    0.00   |        -         -         - |
------+-----------------------------------+------------------------------+
STEERS APPLIED TO TIME SCALE:             | 2.65e-17  3.18e-16  1.91e-15 |
------------------------------------------+------------------------------+
MOST STABLE CLOCKS:                       |     NRC1      PIE1      YELL |
------------------------------------------+------------------------------+
