
 GPS week: 1256   Day: 0   MJD: 53036                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2771      0     0.00    -0.02     3.65     0.00
 cod |   288     0  26816     22     0.07     0.20     0.04    25.37
 esa |     0     0      0      0    -0.55     0.00     0.00     0.00
 gfz |   288     0  19320      2     0.20    -0.22     0.04    24.34
 iga |    96     0   2771     14     0.01    -0.02     0.11     0.00
 igu |    96     0   2771      0     0.03    -0.06     3.01     0.00
 jpl |   288     0  15305     26    -1.31    -1.38     0.04    31.48
 ngs |    96     0   2771      0     0.01    -0.02     3.43     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  26173    412   -81.84    11.44     0.06    18.81

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -3983     3     -   -18    59  -843    14 -2852     -     7 |
    2 | -2617   -32     -  -114   170  1587    70 -2440     -   132 |
    3 |  4550   -93     -  -103    15  5309    28  4370     -   234 |
    4 |  1007    21     -   175  -185  1101    22   796     -  -274 |
    5 |   244    84     -    10    68 -5460    41   264     -  -161 |
    6 | -1714    47     -    56   -72  8285   -77  -753     -   -71 |
    7 |  1624   104     -    91    98 -1225    97  1045     -  -340 |
    8 | -6643   152     -   -93    69 -1714    90 -6003     -  -164 |
    9 | -1247   164     -     1  -165 -6433     4  -759     -  -220 |
   10 |   367    76     -    40    55  7034    42  -189     -  -189 |
   11 |  7399   -77     -   -69   -72  4275    40  6837     -   159 |
   13 |  3934   143     -  -173   -40  3156   135  4034     -   -83 |
   14 |  4657    -3     -    61   136  2329   -41  4304     -   -43 |
   15 |   137   -63     -  -108   239  2715    60  -121     -   174 |
   16 |  3983  -135     -   110   -76   770     6  3740     -    35 |
   17 |   302    17     -   134    74 -1561    43   174     -  -232 |
   18 |  5335   -49     -   126     0  1827   -39  5017     -   -64 |
   20 |  6082    -2     -   -43    36  1966    85  5474     -   -13 |
   21 |   292    11     -  -159   166   768    75    52     -   129 |
   22 | -9005   -35     -    14  -108 -3783    63 -7489     -   -25 |
   23 | -7047  -108     -   124     8 -8074   -68 -6363     -    45 |
   24 | -2076    44     -   143   -44 -3379   -36 -1539     -  -216 |
   25 | -4639   -99     -    86  -115   -14   -29 -4801     -    46 |
   26 |   223   199     -  -105   -16   397    78  -133     -  -201 |
   27 |  2687   105     -   -31   -84 -6711   109  2076     -  -193 |
   28 |  9822    93     -    -9   -36 -4058   105  8884     -  -201 |
   29 | -2586    38     -   160  -216  3295     5 -2534     -  -265 |
   30 | -5518    28     -   167   -71 -1369   -52 -5336     -  -211 |
   31 | -5884  -166     -    57   104  -684   -66 -6097     -   205 |
 -----+-------------------------------------------------------------+
 ALBH |     -    70     -     -     -     -    27     -     -  -140 |
 ALGO |     -   -47     -     -     -     -    91     -     -   -89 |
 AMC2 |     -   -29     -     -     -     -   -31     -     -    92 |
 ARTU |     -    25     -   -10     -     -   -13     -     -     - |
 ASC1 |     -   101     -   -58     -     -     -     -     -   -61 |
 BILI |     -    42     -   -44     -     -     -     -     -     - |
 BOGT |     -   132     -  -160     -     -     -     -     -    31 |
 BRUS |     -     -     -     -     -     -     1     -     -    -2 |
 CAS1 |     -    77     -   -85     -     -    18     -     -   -24 |
 CEDU |     -    46     -     -     -     -     -     -     -   -61 |
 CHUR |     -   142     -     -     -     -     -     -     -  -191 |
 COCO |     -    73     -    64     -     -   -34     -     -  -124 |
 CORD |     -    -5     -    20     -     -   -12     -     -     - |
 CRO1 |     -   -84     -  -116     -     -   -50     -     -   417 |
 DAKA |     -    88     -   -92     -     -     -     -     -     - |
 DAV1 |     -    79     -   -71     -     -     4     -     -   -22 |
 DRAO |     -    67     -     -     -     -     -     -     -   -91 |
 DWH1 |     -     -     -     -     -     -   -12     -     -    20 |
 FAIR |     -   -88     -  -135     -     -   188     -     -   -23 |
 GLPS |     -   -33     -    34     -     -     -     -     -     - |
 GOLD |     -  -146     -     -     -     -   118     -     -     X |
 GUAM |     -   137     -    31     -     -  -275     -     -   236 |
 HERS |     -  -294     -     -     -     -     -     -     -   397 |
 HOB2 |     -    53     -     -     -     -   -67     -     -    41 |
 HRAO |     -     -     -  -128     -     -     2     -     -   162 |
 IISC |     -   -86     -    63     -     -     -     -     -    34 |
 KERG |     -    52     -   -47     -     -     -     -     -    -9 |
 KIRU |     -    19     -     -     -     -     -     -     -   -25 |
 KOKB |     -  -160     -   -74     -     -     -     -     -   331 |
 KSTU |     -    15     -     -     -     -    24     -     -   -61 |
 MAC1 |     -    69     -    54     -     -  -128     -     -    52 |
 MAG0 |     -   -19     -     -     -     -    15     -     -     - |
 MALI |     -  -376     -   392     -     -     -     -     -     - |
 MAS1 |     -    13     -   -11     -     -     -     -     -    -5 |
 MAW1 |     -   131     -   -85     -     -     -     -     -   -78 |
 MCM4 |     -   -12     -    12     -     -     -     -     -     - |
 MDO1 |     -   -58     -     1     -     -     -     -     -    77 |
 METS |     -    34     -     -     -     -     -     -     -   -45 |
 MKEA |     -     -     -   -82     -     -   -86     -     -   251 |
 NKLG |     -     -     -     -     -     -    46     -     -   -77 |
 NLIB |     -     -     -     -     -     -     5     -     -    -9 |
 NPLD |     -   -58     -     -     -     -     -     -     -    78 |
 NRC1 |     -     6     -    -6     -     -     9     -     -   -16 |
 NRIL |     -     4     -   -29     -     -    19     -     -     - |
 NTUS |     -   -31     -     -     -     -   -94     -     -   199 |
 OHI2 |     -    31     -   -99     -     -    52     -     -     - |
 POTS |     -    72     -   -10     -     -     -     -     -   -85 |
 PRDS |     -   -41     -     -     -     -     -     -     -    56 |
 PTBB |     -    11     -     -     -     -     -     -     -   -14 |
 REYK |     -  -144     -     -     -     -   144     -     -   -47 |
 RIOG |     -    49     -   -73     -     -     -     -     -    28 |
 SANT |     -     -     -   -77     -     -     -     -     -    99 |
 SCH2 |     -    22     -     -     -     -     -     -     -   -30 |
 SFER |     -    36     -     -     -     -  -107     -     -   131 |
 STJO |     -   -60     -     -     -     -    68     -     -   -33 |
 SUTH |     -     1     -     -     -     -     -     -     -    -2 |
 THTI |     -     -     -     -     -     -    -4     -     -     7 |
 THU3 |     -  -161     -    53     -     -     -     -     -   147 |
 TIXI |     -     7     -   -29     -     -    17     -     -     - |
 TRO1 |     -   -48     -   108     -     -   -74     -     -    48 |
 UNSA |     -     -     -    79     -     -     -     -     -  -103 |
 URUM |     -    36     -   -38     -     -     -     -     -     - |
 USN1 |     -     -     -     -     -     -  -182     -     -   304 |
 USNO |     -   -64     -     -     -     -    52     -     -    -1 |
 VILL |     -    20     -     -     -     -     -     -     -   -27 |
 WES2 |     -     -     -   -82     -     -     -     -     -   105 |
 WHIT |     -   -44     -     -     -     -     -     -     -    60 |
 WILL |     -    29     -     -     -     -     -     -     -   -40 |
 WSRT |     -   -16     -     -     -     -    51     -     -   -64 |
 WTZR |     -    37     -     -     -     -    -6     -     -   -40 |
 WUHN |     -    86     -   122     -     -  -171     -     -    14 |
 YAKT |     -  -151     -     -     -     -     -     -     -   204 |
 YAR2 |     -  -170     -     -     -     -     -     -     -   229 |
 YELL |     -    -2     -   -55     -     -    50     -     -   -10 |
 YSSK |     -    40     -     -     -     -   -33     -     -     - |
 ZWEN |     -    -5     -    73     -     -     -     -     -   -87 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  8530    27     -    31    92  5723    19  7166     -    68 |  288   4.80
    2 |  4248    40     -    32    98  3871    39  3960     -    50 |  288   3.10
    3 |  2978    34     -    53    80  3865    80  3047     -    50 |  288   1.45
    4 |   913    54     -    31   118   801    44  1047     -    47 |  288   0.70
    5 |  3497    21     -    20    95  4546    24  3735     -    29 |  288   3.01
    6 |  5291    29     -    27    52  6415    34  5279     -    25 |  288   3.71
    7 |  2250    61     -    24    50  1206    26  2206     -   116 |  288   0.74
    8 |  3773   100     -   111    67  2191    51  2941     -    52 |  278   2.65
    9 |  4700   124     -    92   182  2170    94  4611     -   135 |  279   2.93
   10 |  4892    32     -    31    88  3621    35  4691     -    43 |  288   2.88
   11 |  1621    61     -    30    83  1975    32  1648     -    58 |  288   0.31
   13 |   582    52     -    78    52  1416    43   627     -    84 |  288   0.38
   14 |  1496    61     -    33   143   595    43  1258     -   100 |  288   0.31
   15 |  4417    44     -    47    62  3060    58  4329     -    67 |  288   2.93
   16 |  1270    40     -    44    85   422    67  1229     -    99 |  288   0.24
   17 |  1036    68     -    46   121   514    62  1124     -    76 |  288   0.60
   18 |   619    36     -    27    92   766    26   566     -    52 |  288   0.40
   20 |  2291    47     -    32    58   771    51  2026     -    97 |  288   0.17
   21 |  1886    42     -    39    43   480    63  1868     -    90 |  288   0.31
   22 |  3989    40     -    41    93  3127    46  3575     -    82 |  288   0.80
   23 |  3833    41     -    59   116  5381    32  3519     -    92 |  288   0.92
   24 |  6929    47     -    36   165  3417    52  6218     -    40 |  288   3.67
   25 |  3145    55     -    39    82  1345    54  3132     -    46 |  277   1.27
   26 |  2736    36     -    60    44  1118    42  2670     -   103 |  288   0.50
   27 |  2282    92     -    90    97  4151   128  2145     -   113 |  277   0.98
   28 |  6273    40     -    69    52  4023    39  6369     -   107 |  288   0.44
   29 |  1010    62     -    49   246  1105    44  1009     -    85 |  288   0.53
   30 |  1207    27     -    16    83  1197    20  1584     -    41 |  288   0.97
   31 |  2269    39     -    47   162  2872    55  2360     -    57 |  288   1.88
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    50     -     -     -     -    16     -     -    53 |  288   7.08
 ALGO |     -    25     -     -     -     -    11     -     -    23 |  288   0.06
 AMC2 |     -    35     -     -     -     -    14     -     -    32 |  288   0.02
 ARTU |     -    28     -    19     -     -    13     -     -     - |  288  12.83
 ASC1 |     -    46     -    66     -     -     -     -     -    54 |  286    >>>
 BILI |     -    13     -    14     -     -     -     -     -     - |  287   6.45
 BOGT |     -    27     -    95     -     -     -     -     -   111 |  226  11.04
 BRUS |     -     -     -     -     -     -    22     -     -    37 |  288   0.03
 CAS1 |     -    38     -    30     -     -    21     -     -    38 |  288   7.64
 CEDU |     -    24     -     -     -     -     -     -     -    32 |  288  16.82
 CHUR |     -    20     -     -     -     -     -     -     -    27 |  288  10.44
 COCO |     -    32     -    27     -     -    23     -     -    56 |  288  10.14
 CORD |     -    40     -    44     -     -    26     -     -     - |  288  12.46
 CRO1 |     -    21     -    95     -     -    71     -     -    25 |  287  12.24
 DAKA |     -    58     -    60     -     -     -     -     -     - |  264  11.73
 DAV1 |     -    43     -    42     -     -    39     -     -    42 |  288  13.91
 DRAO |     -    29     -     -     -     -     -     -     -    40 |  288   0.04
 DWH1 |     -     -     -     -     -     -    11     -     -    19 |  288   0.67
 FAIR |     -    43     -    17     -     -    17     -     -    22 |  288   0.11
 GLPS |     -    34     -    36     -     -     -     -     -     - |  271  23.88
 GOLD |     -    26     -     -     -     -    21     -     -     X |  239  14.57
 GUAM |     -    21     -    50     -     -    35     -     -    36 |  288  11.51
 HERS |     -    27     -     -     -     -     -     -     -    36 |  264  35.90
 HOB2 |     -    48     -     -     -     -    39     -     -    41 |  288   0.07
 HRAO |     -     -     -    34     -     -    37     -     -    42 |  288   0.99
 IISC |     -    17     -    37     -     -     -     -     -    44 |  288  30.76
 KERG |     -    32     -    25     -     -     -     -     -    20 |  288   1.60
 KIRU |     -    21     -     -     -     -     -     -     -    28 |  288   7.47
 KOKB |     -    58     -    27     -     -     -     -     -    89 |  288   0.06
 KSTU |     -   144     -     -     -     -    47     -     -   118 |  286  10.02
 MAC1 |     -    46     -    24     -     -    33     -     -    44 |  288  16.10
 MAG0 |     -    24     -     -     -     -    20     -     -     - |  287   7.73
 MALI |     -    34     -    35     -     -     -     -     -     - |  285  18.41
 MAS1 |     -    26     -    25     -     -     -     -     -    27 |  286   1.45
 MAW1 |     -    31     -    27     -     -     -     -     -    52 |  288  24.07
 MCM4 |     -    18     -    18     -     -     -     -     -     - |  288  29.63
 MDO1 |     -    46     -    20     -     -     -     -     -    43 |  288  29.56
 METS |     -    17     -     -     -     -     -     -     -    22 |  287   8.93
 MKEA |     -     -     -    20     -     -    19     -     -    28 |  288  17.44
 NKLG |     -     -     -     -     -     -    14     -     -    24 |  287 317.07
 NLIB |     -     -     -     -     -     -     9     -     -    15 |  288   0.03
 NPLD |     -    13     -     -     -     -     -     -     -    18 |  287   0.05
 NRC1 |     -    17     -    14     -     -     9     -     -    20 |  288   0.01
 NRIL |     -    23     -    21     -     -     9     -     -     - |  288  12.33
 NTUS |     -    25     -     -     -     -    15     -     -    40 |  288  12.14
 OHI2 |     -    38     -    25     -     -    42     -     -     - |  288  12.23
 POTS |     -    20     -    27     -     -     -     -     -    28 |  288  20.42
 PRDS |     -    35     -     -     -     -     -     -     -    48 |  288   1.68
 PTBB |     -    39     -     -     -     -     -     -     -    53 |  288   0.29
 REYK |     -    19     -     -     -     -    16     -     -    19 |  288   8.61
 RIOG |     -    28     -    38     -     -     -     -     -    65 |  287  11.68
 SANT |     -     -     -    65     -     -     -     -     -    84 |  205   4.27
 SCH2 |     -    16     -     -     -     -     -     -     -    22 |  287 164.93
 SFER |     -    20     -     -     -     -    22     -     -    19 |  287   0.27
 STJO |     -    21     -     -     -     -    15     -     -    20 |  288   0.06
 SUTH |     -    24     -     -     -     -     -     -     -    32 |  288  10.52
 THTI |     -     -     -     -     -     -    54     -     -    90 |  268   2.52
 THU3 |     -    15     -    19     -     -     -     -     -    31 |  288   8.09
 TIXI |     -    27     -    19     -     -    23     -     -     - |  287   9.32
 TRO1 |     -    26     -    64     -     -    55     -     -    50 |  288  10.11
 UNSA |     -     -     -    48     -     -     -     -     -    62 |  276  14.20
 URUM |     -    20     -    21     -     -     -     -     -     - |  288  34.48
 USN1 |     -     -     -     -     -     -     8     -     -    14 |  288   0.03
 USNO |     -    24     -     -     -     -    13     -     -    19 |  288   0.03
 VILL |     -    15     -     -     -     -     -     -     -    20 |  288   2.37
 WES2 |     -     -     -    10     -     -     -     -     -    13 |  288   0.08
 WHIT |     -    26     -     -     -     -     -     -     -    35 |  288   3.96
 WILL |     -    31     -     -     -     -     -     -     -    41 |  288  11.64
 WSRT |     -    23     -     -     -     -    16     -     -    16 |  288   0.02
 WTZR |     -    20     -     -     -     -    18     -     -    16 |  288   0.04
 WUHN |     -    33     -    24     -     -    28     -     -    22 |  287  15.89
 YAKT |     -    17     -     -     -     -     -     -     -    23 |  286   0.41
 YAR2 |     -    27     -     -     -     -     -     -     -    37 |  288 124.83
 YELL |     -    59     -    19     -     -    18     -     -    35 |  288   0.01
 YSSK |     -    20     -     -     -     -    16     -     -     - |  287   9.46
 ZWEN |     -    23     -    22     -     -     -     -     -    19 |  288  12.74
 -----+-------------------------------------------------------------+--------------
 TOT  |  3653    42     -    44   106  3005    36  3433     -    56 |


 BEST CLOCK FIT: NRC1   288   0.01 (ns) 

