
 GPS week: 1247   Day: 5   MJD: 52978                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2585      0    -0.06     0.12     4.11     0.00
 cod |   288     0  26276    789    -0.15    -0.36     0.07    15.13
 emr |   288     0  19719      0   923.43    12.82     0.04    26.66
 esa |   288     0  19639   1819     3.11    -3.04     0.11     5.94
 gfz |   288     0  20010    343     0.13     0.26     0.05    18.63
 iga |    96     0   2585     25    -0.08     0.12     0.12     0.00
 igu |    96     0   2489     38     0.06    -1.53     3.18     0.00
 jpl |   288     0  15006    201     4.11    -2.38     0.06    18.29
 ngs |    96     0   2585      0    -0.07     0.12     3.95     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  31209   2140   275.51    11.41     0.07    15.34

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 |   714   -62   -76     X    -5   -11 -6080    10   434     -   192 |
    2 |  6187  -206   104    31    85   -27 15786   -56  5349     -   -60 |
    3 |  2040  -105    65    96   -94    77  9232    83  1629     -    25 |
    4 |  -255   127  -178    12    66    12 -1111    90  -510     -    40 |
    5 | -5939   -12     4   -56    50    68  1424    13 -5279     -   -43 |
    6 |  1668   -47   -78   -25   240   -28  9870   -49  2291     -   -71 |
    7 |  1581    -5  -132    61   320   169 -1302  -190  1263     -   -54 |
    8 | -5502    25  -143   135   200    60 -5368   -93 -5419     -   -18 |
    9 | -5258    79    49  -150    81   -48 -8912  -146 -4898     -  -113 |
   10 | -3814   147  -114    43    70    78   276  -102 -3300     -    12 |
   11 |  5710    28   -74   -45   167    -4  1717   -79  5515     -   -33 |
   13 |  5444   134  -217     X   137   173 -1262   142  4999     -     X |
   14 |  4555   -12   152     X  -276   -28  2974   152  4423     -   -20 |
   15 | -8757  -109   152   -17   -16    -2 -3572   -86 -8907     -   -81 |
   16 |  6514  -203   135    10     2  -142 -1882   132  6256     -  -117 |
   17 |  -466     9  -135   -44   274    11 -4781    63  -675     -  -129 |
   18 |  3431    17    76    17   -70    38    39   -14  3480     -   -63 |
   20 |  4476   112   -95    99   -53   120  -446   262  4558     -   -59 |
   21 |  2774   -85   170   219  -184    38 -1126   116  2506     -  -140 |
   23 |-12557   -39    71    25  -124   -32     -   263-10926     -  -103 |
   24 | -2946   115  -111    40   -75    58  2759    32 -3104     -   135 |
   25 |  -902  -108   135   -45   -35  -137  7813    70 -1067     -  -111 |
   26 |  -615   124  -123   277    28  -199 -2455    99  -605     -  -106 |
   27 |  2569    -1  -217   172   261  -151 -3947    20  2390     -   -10 |
   28 |  3130    49   -41     9   -28    64  3039     X  3575     -    54 |
   29 | -2310     X   -50   350   -43  -107 -2876    73 -2388     -   -22 |
   30 | -1558    13    55     9    64   -30 -3832    19 -1681     -  -201 |
 -----+-------------------------------------------------------------------+
 ALBH |     -    53  -111     -     -     -     -    96     -     -    30 |
 AMC2 |     -   -93    23     -     -     -     -  -121     -     -   194 |
 AOML |     -   -72     -     -     -     -     -  -101     -     -   192 |
 AREQ |     -   -58    36     1    23     -     -   -40     -     -     9 |
 ARTU |     -     2     -     -   -14     -     -    12     -     -     - |
 AUCK |     -    33     -     X     X     -     -     -     -     -   -32 |
 BAHR |     -     -   114    15   -94     -     -     -     -     -   -91 |
 BILI |     -    61     -     -   -49     -     -     -     -     -     - |
 BOGT |     -  -232     -   225     -     -     -     -     -     -    51 |
 BOR1 |     -     -    68     -     -     -     -     -     -     -  -118 |
 BREW |     -     -   -67     -     -     -     -     -     -     -   116 |
 BRMU |     -     -     -     -    20     -     -     -     -     -   -24 |
 BRUS |     -     -    21     -     -     -     -    13     -     -   -53 |
 CAS1 |     -    19     -    23    25     -     -     -     -     -   -59 |
 CEDU |     -   -81     -    80     -     -     -     -     -     -    49 |
 CHAT |     -    12     -    31     -     -     -     -     -     -   -52 |
 CHUR |     -    77    78     -     -     -     -    -5     -     -  -205 |
 COCO |     -    67     -  -214   152     -     -     -     -     -  -171 |
 CORD |     -     -     -     -    92     -     -   -94     -     -     - |
 CRO1 |     -     3   133     -   -89     -     -  -106     -     -     X |
 DAV1 |     -    -1     -     -     1     -     -     -     -     -     X |
 DRAO |     -  -160   -73     -     -     -     -     -     -     -   286 |
 FAIR |     -     -     2    64   -51     -     -    57     -     -   -37 |
 FORT |     -   170  -124    17   111     -     -   -77     -     -    25 |
 GLPS |     -    67     -     -   -55     -     -     -     -     -     - |
 GODE |     -     -   142  -324     -     -     -     -     -     -  -128 |
 GOLD |     -    62     -    18     -     -     -   -57     -     -     X |
 GUAM |     -   107     -  -225   -76     -     -  -181     -     -   289 |
 HERS |     -  -192   -92     -     -     -     -     -     -     -   333 |
 HOB2 |     -   -57    30   110     -     -     -     -     -     -   -36 |
 HRAO |     -   -52     -     -   -73     -     -    17     -     -   159 |
 IISC |     -    31     -   108   -47     -     -     -     -     -   -15 |
 JPLM |     -     -  -248     -     -     -     -    70     -     -   347 |
 KERG |     -   -22    42   -69    74     -     -     -     -     -  -116 |
 KGN0 |     -     -   -29     -     -     -     -     -     -     -    51 |
 KIRU |     -   -14     -    83     -     -     -   -32     -     -    19 |
 KIT3 |     -     -     -    26    96     -     -   -50     -     -   -66 |
 KOKB |     -  -179    67     -   -70     -     -     -     -     -   142 |
 KOSG |     -   -31     -     -     -     -     -     -     -     -    30 |
 KOUR |     -   113     -   186    19     -     -  -100     -     -   -79 |
 LAE1 |     -    15     -     -     -     -     -     -     -     -   -15 |
 LPGS |     -    50     -  -457     -     -     -     -     -     -   119 |
 MAC1 |     -   -23     -    27   -12     -     -     -     -     -    30 |
 MAD2 |     -     -     -     -     -     -     -   108     -     -  -128 |
 MAS1 |     -    12     -    83   -30     -     -    25     -     -   -37 |
 MAW1 |     -   169     -     -   -80     -     -     -     -     -   -72 |
 MCM4 |     -    69     -     -   -56     -     -     -     -     -     - |
 MDO1 |     -     -  -141   183   -77     -     -    79     -     -   192 |
 MEDI |     -    52     2     -     -     -     -    39     -     -  -102 |
 METS |     -   -72    10     -     -     -     -     -     -     -    54 |
 MIZU |     -     -   -61     -     -     -     -     -     -     -   105 |
 MKEA |     -   -84     -   -87  -135     -     -    75     -     -   184 |
 MONP |     -    21     -     -     -     -     -   -18     -     -     - |
 NKLG |     -     -     -     -    12     -     -     -     -     -   -14 |
 NLIB |     -     -   -72  -108     -     -     -   103     -     -    43 |
 NNOR |     -     -    36    15     -     -     -     -     -     -   -76 |
 NOT1 |     -     -    26     -     -     -     -     -     -     -   -45 |
 NRIL |     -     -     -     -    29     -     -   -29     -     -     - |
 NSSP |     -   -21     -     -     -     -     -     -     -     -    20 |
 NTUS |     -  -124     -     -     -     -     -     -     -     -   123 |
 NYA1 |     -     X     -     -   105     -     -     -     -     -  -127 |
 NYAL |     -     -    10   232     -     -     -     -     -     -  -107 |
 OHI2 |     -    50     -     -   -41     -     -     -     -     -     - |
 ONSA |     -   -87    -9   299   -12     -     -     -     -     -     - |
 PERT |     -   -39   134     3   -23     -     -   -32     -     -  -130 |
 PETP |     -   -39     -     -     -     -     -    32     -     -     - |
 PIE1 |     -     -   -43   -14     -     -     -     -     -     -    80 |
 PIMO |     -     -     -    91   -29     -     -     -     -     -     X |
 POTS |     -    13     -    60    31     -     -     -     -     -   -73 |
 PRDS |     -  -121   -34     -     -     -     -     -     -     -   179 |
 RBAY |     -  -666     -     -     -     -     -     -     -     -   657 |
 RIOG |     -   -34     -     -   -21     -     -     -     -     -    59 |
 SANT |     -   941     -  -514  -955     -     -   468     -     -    12 |
 SCH2 |     -   -11   -23     -     -     -     -   -20     -     -    75 |
 SELE |     -     -     -   119     -     -     -     -     -     -   -46 |
 SFER |     -   -13    95     -     -     -     -     -     -     -  -194 |
 STJO |     -  -106    15     -     -     -     -     5     -     -    73 |
 STR1 |     -     -    37     -     -     -     -     -     -     -   -64 |
 SUTH |     -   -86     -   -55     -     -     -     -     -     -   105 |
 THTI |     -     -     -  -187    99     -     -     -     -     -   -51 |
 THU3 |     -    41     -     -   -33     -     -     -     -     -     X |
 TIXI |     -    26     -     -   -92     -     -    73     -     -     - |
 TLSE |     -     -    71     -     -     -     -     -     -     -  -123 |
 TRO1 |     -   -71     -     -    58     -     -     -     -     -     X |
 TROM |     -     -     -    61     -     -     -     -     -     -   -24 |
 TWTF |     -    -7    16     -     -     -     -     -     -     -   -21 |
 USN1 |     -     -   247     -     -     -     -  -478     -     -   140 |
 USUD |     -     0   -29    58     -     -     -    35     -     -   -14 |
 VILL |     -    35     -    97     -     -     -     -     -     -   -72 |
 WES2 |     -     -   -17     -     -     -     -     -     -     -    30 |
 WHIT |     -   411     -     -     -     -     -     -     -     -  -406 |
 WSRT |     -   -68   111     -     -     -     -     -     -     -  -126 |
 WTZR |     -   -51    91   -21     -     -     -     -     -     -  -100 |
 WUHN |     -   302     -  -115  -177     -     -    85     -     -  -141 |
 YAKT |     -  -233     -     -     -     -     -    51     -     -   159 |
 YELL |     -     X     -   188   109     -     -  -125     -     -   -55 |
 YSSK |     -    65     -     -     -     -     -   -54     -     -     - |
 ZAMB |     -     -     -     -   191     -     -  -195     -     -     - |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  5896   214    40     X    38   144  5480   155  5907     -   139 |  277   3.93
    2 |  6448    49    27    96    23   133  8376    61  5931     -    79 |  288   2.68
    3 |  2187    32    36   183    38    70  3748    44  2071     -    89 |  288   2.09
    4 |  2008    49    45    94    57    77  1366    93  2030     -    50 |  288   0.73
    5 |  4889    27    26   106    12    73  2237    52  4997     -    30 |  288   1.97
    6 | 13516    59    43   156    60    76  5576    58 12706     -    52 |  288  10.02
    7 |  1294    56    50   122    21    53  1385    57  1207     -    25 |  288   0.84
    8 |  2755    57    38   152    58    62  3797    43  3436     -   138 |  288   2.45
    9 |  2931    31    23   129    18   112  3431    36  2770     -    34 |  288   1.84
   10 |  3919    45    43   174    48    80  3565    29  3152     -    64 |  288   1.62
   11 |   763    65    74   121    18   114  1760    33   715     -    82 |  288   0.36
   13 |  1652    59    30     X    32   248   590    39  1639     -     X |  288   0.29
   14 |   569    73    41     X    48   153  2044   108   612     -    82 |  288   0.27
   15 |  8608    43    47    65    51    85  5417    49  8513     -    97 |  288   2.89
   16 |  1340    40    31   145    52    88   867    98  1277     -   111 |  288   0.21
   17 |  1055    53    48    48    24    65  2274    43  1121     -    87 |  288   0.71
   18 |  1274    49    26    99    26    90   567    35  1150     -    45 |  288   0.37
   20 |   611    68    37   127    18    81   958    36   685     -    46 |  288   0.20
   21 |  1300    88    32   105    30    96   720    68  1310     -    32 |  288   0.34
   23 |  4184    86    47   183    44   295     -    84  4347     -   117 |  288   0.76
   24 |  3373    61    45    57    24    81  3094    46  3225     -    33 |  288   2.94
   25 |  1827    57    44    63    61    87  4297    69  1825     -    94 |  288   1.49
   26 |  1417   205    33   159   196   142   851    53  1384     -    40 |  288   0.55
   27 |   822    59    28   226    44   109  2818    48   974     -   135 |  288   1.46
   28 |  3678    71    25   194    27   219  2779     X  3308     -    40 |  288   0.45
   29 |   869     X    98   186   173   125  1145   107   771     -    83 |  278   0.69
   30 |  1243    43    28   158    18    52  2620    80  1201     -    35 |  288   0.57
 -----+-------------------------------------------------------------------+--------------
 ALBH |     -    39    21     -     -     -     -    18     -     -    33 |  278  10.01
 AMC2 |     -    36    21     -     -     -     -    28     -     -    29 |  288   0.04
 AOML |     -    35     -     -     -     -     -    18     -     -    36 |  288  27.83
 AREQ |     -    36    27    83    19     -     -    47     -     -    67 |  288  23.74
 ARTU |     -    24     -     -    21     -     -    16     -     -     - |  272  14.82
 AUCK |     -    22     -     X     X     -     -     -     -     -    21 |  264  15.91
 BAHR |     -     -    24    62    32     -     -     -     -     -    38 |  288   0.38
 BILI |     -   111     -     -    90     -     -     -     -     -     - |  280   7.58
 BOGT |     -    72     -   112     -     -     -     -     -     -    57 |  286  28.15
 BOR1 |     -     -     9     -     -     -     -     -     -     -    15 |  288   0.36
 BREW |     -     -    28     -     -     -     -     -     -     -    49 |  274    >>>
 BRMU |     -     -     -     -    14     -     -     -     -     -    17 |  288    >>>
 BRUS |     -     -    11     -     -     -     -    12     -     -    18 |  288   0.02
 CAS1 |     -    43     -    87    26     -     -     -     -     -    48 |  277   9.63
 CEDU |     -    55     -    78     -     -     -     -     -     -    37 |  277  15.59
 CHAT |     -    31     -    81     -     -     -     -     -     -    13 |  285  12.98
 CHUR |     -   158    41     -     -     -     -   139     -     -    48 |  286   4.19
 COCO |     -    47     -    74    39     -     -     -     -     -    29 |  288  12.58
 CORD |     -     -     -     -    30     -     -    31     -     -     - |  288  14.33
 CRO1 |     -    35    18     -    40     -     -    22     -     -     X |  288  18.90
 DAV1 |     -    18     -     -    15     -     -     -     -     -     X |  276  14.33
 DRAO |     -    24    14     -     -     -     -     -     -     -    18 |  288   0.14
 FAIR |     -     -    34   116    85     -     -    47     -     -    47 |  278   0.14
 FORT |     -   131    45   106    34     -     -    34     -     -    57 |  288   0.07
 GLPS |     -    32     -     -    26     -     -     -     -     -     - |  263  28.95
 GODE |     -     -    16    81     -     -     -     -     -     -    28 |  288   0.03
 GOLD |     -    16     -    83     -     -     -    25     -     -     X |  288  13.85
 GUAM |     -    31     -    76    50     -     -    61     -     -   121 |  288  21.72
 HERS |     -    38    36     -     -     -     -     -     -     -    43 |  264  10.99
 HOB2 |     -    50    49   105     -     -     -     -     -     -    76 |  288   0.05
 HRAO |     -    50     -     -    60     -     -    66     -     -   190 |  288   1.38
 IISC |     -    53     -    66    28     -     -     -     -     -    44 |  288  24.88
 JPLM |     -     -    94     -     -     -     -    64     -     -    93 |  287    >>>
 KERG |     -   119    46    58    28     -     -     -     -     -    35 |  287   2.91
 KGN0 |     -     -    33     -     -     -     -     -     -     -    58 |  287   0.34
 KIRU |     -    50     -    72     -     -     -    21     -     -    29 |  288   8.84
 KIT3 |     -     -     -    58    22     -     -    18     -     -    19 |  288  13.50
 KOKB |     -    49    34     -    26     -     -     -     -     -    21 |  288   0.03
 KOSG |     -    22     -     -     -     -     -     -     -     -    21 |  288  37.20
 KOUR |     -    47     -    84    33     -     -    40     -     -    46 |  288   2.16
 LAE1 |     -    84     -     -     -     -     -     -     -     -    83 |  287  19.90
 LPGS |     -    38     -   146     -     -     -     -     -     -    37 |  284  25.01
 MAC1 |     -    94     -    94    49     -     -     -     -     -   143 |  277  18.96
 MAD2 |     -     -     -     -     -     -     -    37     -     -    44 |  288   0.04
 MAS1 |     -    41     -    75    18     -     -    24     -     -    19 |  288   1.19
 MAW1 |     -    64     -     -    51     -     -     -     -     -   124 |  288  32.80
 MCM4 |     -    27     -     -    22     -     -     -     -     -     - |  288  50.68
 MDO1 |     -     -    56    34    92     -     -    32     -     -    54 |  288 820.81
 MEDI |     -    43    19     -     -     -     -    23     -     -    14 |  288   0.43
 METS |     -    25    12     -     -     -     -     -     -     -    20 |  287  15.29
 MIZU |     -     -    48     -     -     -     -     -     -     -    83 |  288    >>>
 MKEA |     -    31     -    79    31     -     -    26     -     -    40 |  288  30.06
 MONP |     -    25     -     -     -     -     -    21     -     -     - |  287  14.75
 NKLG |     -     -     -     -    16     -     -     -     -     -    19 |  287    >>>
 NLIB |     -     -    72   168     -     -     -   108     -     -   192 |  287   0.17
 NNOR |     -     -    93    97     -     -     -     -     -     -   197 |  288  16.87
 NOT1 |     -     -     7     -     -     -     -     -     -     -    13 |  288    >>>
 NRIL |     -     -     -     -    59     -     -    60     -     -     - |  263   9.35
 NSSP |     -    34     -     -     -     -     -     -     -     -    33 |  288  13.74
 NTUS |     -    21     -     -     -     -     -     -     -     -    20 |  287  10.80
 NYA1 |     -     X     -     -    38     -     -     -     -     -    47 |  185   0.09
 NYAL |     -     -    18    65     -     -     -     -     -     -    33 |  288   0.13
 OHI2 |     -    26     -     -    21     -     -     -     -     -     - |  288   9.48
 ONSA |     -    51    27    68    40     -     -     -     -     -     - |  288   0.06
 PERT |     -    90    40    85    29     -     -    95     -     -    29 |  288  11.50
 PETP |     -    31     -     -     -     -     -    26     -     -     - |  287  12.97
 PIE1 |     -     -    22   101     -     -     -     -     -     -    30 |  288   0.05
 PIMO |     -     -     -   153    49     -     -     -     -     -     X |  261  21.31
 POTS |     -    48     -    64    39     -     -     -     -     -    26 |  288  17.77
 PRDS |     -    38    48     -     -     -     -     -     -     -   103 |  282   2.15
 RBAY |     -    84     -     -     -     -     -     -     -     -    83 |  105  31.24
 RIOG |     -   121     -     -    87     -     -     -     -     -    77 |  252  16.31
 SANT |     -    37     -   176    19     -     -    45     -     -    72 |  288   8.14
 SCH2 |     -   169    55     -     -     -     -    84     -     -    42 |  287  55.83
 SELE |     -     -     -    69     -     -     -     -     -     -    27 |  288  29.86
 SFER |     -    58    37     -     -     -     -     -     -     -    32 |  283 199.91
 STJO |     -    32    14     -     -     -     -    17     -     -    25 |  288   0.03
 STR1 |     -     -    31     -     -     -     -     -     -     -    54 |  288  13.47
 SUTH |     -    41     -    61     -     -     -     -     -     -    33 |  288  18.89
 THTI |     -     -     -    73    37     -     -     -     -     -    40 |  287   1.60
 THU3 |     -    35     -     -    29     -     -     -     -     -     X |  288   6.63
 TIXI |     -   108     -     -    72     -     -    34     -     -     - |  283   7.22
 TLSE |     -     -     8     -     -     -     -     -     -     -    14 |  287   0.36
 TRO1 |     -    52     -     -    42     -     -     -     -     -     X |  259   9.92
 TROM |     -     -     -   100     -     -     -     -     -     -    39 |  196  10.81
 TWTF |     -    45    42     -     -     -     -     -     -     -    43 |  288   0.48
 USN1 |     -     -    40     -     -     -     -    46     -     -    27 |  288   0.04
 USUD |     -    32    45    71     -     -     -    36     -     -    62 |  288  14.19
 VILL |     -    34     -    67     -     -     -     -     -     -    26 |  288   3.93
 WES2 |     -     -    16     -     -     -     -     -     -     -    27 |  288   0.04
 WHIT |     -    36     -     -     -     -     -     -     -     -    36 |  140   1.89
 WSRT |     -    40    20     -     -     -     -     -     -     -    14 |  288   0.03
 WTZR |     -    49    23    37     -     -     -     -     -     -    19 |  288   0.08
 WUHN |     -    33     -    50    32     -     -    35     -     -    26 |  287  18.73
 YAKT |     -    57     -     -     -     -     -    39     -     -    24 |  288   1.75
 YELL |     -     X     -   197   174     -     -    91     -     -   126 |  284   0.25
 YSSK |     -    29     -     -     -     -     -    24     -     -     - |  287  12.85
 ZAMB |     -     -     -     -    26     -     -    26     -     -     - |  286    >>>
 -----+-------------------------------------------------------------------+--------------
 TOT  |  4105    66    40   112    54   124  3180    55  3953     -    67 |


 BEST CLOCK FIT: BRUS   288   0.02 (ns) 

