
 GPS week: 1247   Day: 0   MJD: 52973                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2678      0     0.08     0.01     4.07     0.00
 cod |   288     0  23305   1176    -0.22     0.33     0.05    16.75
 emr |   288     0  20083     25   855.18    10.95     0.03    25.15
 gfz |   288     0  17919     22     0.15    -0.28     0.03    24.88
 iga |    96     0   2582      0     0.07     0.00     0.13     0.00
 igu |    96     0   2678      0     0.08    -0.02     2.52     0.00
 jpl |   288     0  14785      2    -0.96    -0.49     0.05    16.06
 ngs |    96     0   2678      0     0.08     0.00     3.99     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  28859    718 -1985.84   -15.61     0.04    17.16

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -4477     X    81    -9  -339  6269   147 -4528     -  -178 |
    2 | -8493     8   -54   157   -68  1290    50 -7425     -  -182 |
    3 | -1800   -60     0   121  -139 -4551    42 -1824     -  -139 |
    4 |   823    12   -90   126  -241   225    63   405     -   -90 |
    5 | -1722    31   -17   -42   301   137    13 -1553     -    49 |
    6 |  7011   -74   -59    52    37  7734   -20  6018     -    91 |
    7 | -2234     6  -151   233   206  2685   -95 -2048     -   -78 |
    8 |    39    50  -151   106    75  7781    69  -276     -   -14 |
    9 | -3542  -128   -28    92     5 -4052   -80 -3140     -    68 |
   10 | -5931   -61   -38    36   302 -9797    31 -5302     -    48 |
   11 |  3898   127     9   -35  -149   394    75  3591     -  -117 |
   13 |  6173   113   -74    62  -383  1152   178  6052     -  -181 |
   14 |  5255    77   240  -258    30  1277     6  5050     -   -71 |
   15 | -3689   -34    46     8   -30 -8917   -64 -3528     -   -19 |
   16 |  4036    39   -39   -64    26  -574   293  4129     -   -39 |
   17 | -6439   -85   -47    30   277 -6137   107 -5587     -    68 |
   18 |  5270   -68   -12    17    98   658   -81  4940     -   101 |
   20 |  5213   226   -91   -60   118  1347     -  4981     -     - |
   21 |  6677   -68    31   -74   160  -842   -47  6088     -   149 |
   23 | -7054   -67    91   -33     -  -360    32 -6401     -   -33 |
   24 | -6759  -100  -145   125   -10  3898    76 -6339     -    90 |
   25 | -4188    33   120   -53   -53  3359    49 -4161     -  -152 |
   26 | -1394     X  -120    71  -205   420    74 -1630     -    36 |
   27 |  1032   -16  -115   223  -165 -4337    43   555     -  -160 |
   28 |  3893   130  -130  -111   197  -212   130  3587     -   163 |
   29 | -5202   -21  -106     0    -9 -3963    97 -4643     -   125 |
   30 |  1912   -86    51   -26     3 -1512   -86  1531     -    91 |
   31 | 11349    93   -14   -10   -68  6851    79 11134     -   -93 |
 -----+-------------------------------------------------------------+
 ALBH |     -    -3   -28     -     -     -    22     -     -    22 |
 ALGO |     -     -     0     -     -     -   121     -     -  -114 |
 AMC2 |     -   -75    47     -     -     -   -54     -     -    54 |
 AOML |     -    95     -     -     -     -   -63     -     -   -29 |
 AREQ |     -   -97    -1   -38     -     -    21     -     -   102 |
 ASC1 |     -   107     -   -30     -     -     -     -     -   -61 |
 AUCK |     -  -374     -   436     -     -     -     -     -  -268 |
 BAHR |     -   -71    34    22     -     -     -     -     -   -12 |
 BOGT |     -    86     -     -     -     -     -     -     -   -84 |
 BOR1 |     -     -    41     -     -     -     -     -     -   -60 |
 BREW |     -     -    -6     -     -     -     -     -     -     8 |
 BRMU |     -     -     -   -58     -     -     -     -     -    84 |
 BRUS |     -     -    27     -     -     -   -55     -     -    12 |
 CHAT |     -   -55     -   -54     -     -     -     -     -   132 |
 CHUR |     -   126   141     -     -     -   -42     -     -  -290 |
 CORD |     -  -166     -     -     -     -   173     -     -     - |
 CRO1 |     -    15    -3     -     -     -   -78     -     -    64 |
 DAKA |     -    -1     -     0     -     -     -     -     -     - |
 DRAO |     -     2    -1     -     -     -     -     -     -    -1 |
 DWH1 |     -     -    42     -     -     -  -106     -     -    37 |
 FAIR |     -     -    67   -42     -     -    82     -     -  -114 |
 FORT |     -   527     -  -100     -     -   -91     -     -  -233 |
 GLPS |     -    10     -    -7     -     -     -     -     -     - |
 GODE |     -   -62    83     -     -     -     -     -     -   -62 |
 GOLD |     -    84     -     -     -     -   -87     -     -     X |
 GOPE |     -    49     -     -     -     -   -51     -     -     - |
 GUAM |     -   298     -   -62     -     -  -300     -     -    80 |
 GUAT |     -     X     -    27     -     -     -     -     -   -39 |
 HOB2 |     -  -133    89     -     -     -     -     -     -     - |
 HRAO |     -     -     -  -147     -     -   -25     -     -   229 |
 IISC |     -     -     -    -1     -     -     -     -     -     1 |
 JPLM |     -     -   -48     -     -     -     -     -     -    71 |
 KGN0 |     -     -    10     -     -     -     -     -     -   -15 |
 KIRU |     -    34     -     -     -     -   -68     -     -    30 |
 KIT3 |     -     -     -    -1     -     -    51     -     -   -47 |
 KOKB |     -     -   140   -44     -     -  -217     -     -    62 |
 KOUR |     -    96     -    34     -     -  -152     -     -     - |
 LHAS |     -     -     -    -4     -     -     -     -     -     6 |
 MAD2 |     -     -     -     -     -     -    73     -     -   -68 |
 MAS1 |     -     -     -   -65     -     -    91     -     -    10 |
 MCM4 |     -   246     -   -61     -     -     -     -     -  -155 |
 MDO1 |     -     -   -34    -4     -     -    97     -     -   -36 |
 MEDI |     -     -     1     -     -     -    22     -     -   -21 |
 METS |     -   -74    47     -     -     -     -     -     -     3 |
 MIZU |     -     -   -56     -     -     -     -     -     -    82 |
 MKEA |     -     -     -   -49     -     -    76     -     -     X |
 NLIB |     -     -   -10     -     -     -    44     -     -   -28 |
 NNOR |     -     -   -55     -     -     -     -     -     -    81 |
 NOT1 |     -     -    26     -     -     -     -     -     -   -39 |
 NRC1 |     -     0    42    -4     -     -    -6     -     -   -49 |
 NRIL |     -     -     -   -40     -     -    62     -     -     - |
 NSSP |     -   -74     -     -     -     -     -     -     -    72 |
 NYAL |     -     -   -13     -     -     -     -     -     -    20 |
 OHI2 |     -    56     -   -38     -     -     -     -     -     - |
 ONSA |     -    -7    35   -31     -     -     -     -     -     - |
 PERT |     -    15    -4   -23     -     -     -     -     -    25 |
 PETP |     -   -45     -     -     -     -    47     -     -     - |
 PIE1 |     -   142   -68     -     -     -     -     -     -   -39 |
 POTS |     -   -42     -    49     -     -     -     -     -   -30 |
 PRDS |     -   -38    18     -     -     -     -     -     -    10 |
 PTBB |     -    49     -     -     -     -     -     -     -   -48 |
 QAQ1 |     -  -121     -     -     -     -     -     -     -   118 |
 RBAY |     -  -153     -     -     -     -     -     -     -   150 |
 REYK |     -    44     -     -     -     -     -     -     -   -43 |
 RIOG |     -    67     -  -114     -     -     -     -     -   103 |
 SCH2 |     -     -    38     -     -     -   -40     -     -   -18 |
 SFER |     -     -  -181     -     -     -     -     -     -   266 |
 SPT0 |     -     -     4     -     -     -     -     -     -    -6 |
 STJO |     -   -95    38     -     -     -    96     -     -   -54 |
 SUTH |     -  -186     -     -     -     -     -     -     -   182 |
 THU3 |     -    83     -   -56     -     -     -     -     -     X |
 TIXI |     -     X     -    -1     -     -     2     -     -     - |
 TRO1 |     -  -212     -    84     -     -     -     -     -    86 |
 TSKB |     -   -93    21     3     -     -     -     -     -    56 |
 TWTF |     -  -126    -4     -     -     -     -     -     -   129 |
 URUM |     -   -18     -     -     -     -     -     -     -    17 |
 USN1 |     -     -   204     -     -     -  -410     -     -    84 |
 USNO |     -     -    32     -     -     -     -     -     -   -48 |
 USUD |     -     7   -16     -     -     -   -21     -     -    36 |
 VILL |     -    38     -     -     -     -     -     -     -   -37 |
 WES2 |     -     -    27     -     -     -     -     -     -   -40 |
 WHIT |     -    42     -     -     -     -     -     -     -   -41 |
 WTZR |     -   -31    79     -     -     -     -     -     -   -86 |
 WUHN |     -     -     -     -     -     -    53     -     -   -49 |
 YAKT |     -  -151     -     -     -     -    54     -     -    92 |
 YELL |     -  -104     -  -112     -     -    75     -     -   194 |
 YSSK |     -    35     -     -     -     -   -37     -     -     - |
 ZAMB |     -   202     -  -137     -     -     5     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   iga   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  7418     X    40    45   254  3698    54  7497     -    35 |  276   5.58
    2 |  5615    33    43    22    47  3218   152  4440     -    36 |  288   1.72
    3 |  5077    57    29    28    65  1996    35  4382     -    27 |  288   2.19
    4 |  1531    55    35    48   112   756    39  1705     -    52 |  288   0.90
    5 |  4160    32    28    19   127  2972    48  4145     -    39 |  288   1.01
    6 | 10590    62    33    23    67  3819    21 11463     -    21 |  288  11.68
    7 |  2734    68    33    41    85  1962    64  2275     -    37 |  288   0.71
    8 |  5810    37    26    31    94  5394    28  5515     -    22 |  288   4.82
    9 |  1989    38    34    12    78  1764    49  1844     -    49 |  288   1.90
   10 |  2585    72    43    35    54  3584    66  2186     -    76 |  288   1.63
   11 |  1157    88    53    29    53   541    39  1215     -    32 |  288   0.45
   13 |   667    63    62    37   147   937   127   711     -    41 |  288   0.29
   14 |   790    72    34    33   240   978    42   831     -    37 |  288   0.33
   15 |  5189    46    24    33    41  4772    25  4930     -    47 |  288   3.45
   16 |   916    31    43    21    37   377    33   845     -    35 |  288   0.29
   17 |  5449    69    16    24    65  2318    49  5535     -    94 |  288   0.82
   18 |   925    42    32    36    66   685    40  1079     -    60 |  288   0.29
   20 |   555    57    36    37   145   806     -   739     -     - |  288   0.19
   21 |  2504    62    60    70    33   680    58  2467     -    62 |  288   0.41
   23 |  3980    41    23    43     -   435    56  3494     -    29 |  288   1.60
   24 |  3733    47    19    18    49  1657    30  3406     -    39 |  288   2.91
   25 |  2753    42    41    20    25  2143    45  2453     -    34 |  288   2.01
   26 |   598     X    79    48   193   850    73   583     -    83 |  276   0.51
   27 |  1762    47    16    24    42  3447    24  1736     -    33 |  288   1.11
   28 |   805    44    47    28   336   535    52  1001     -    27 |  288   0.40
   29 |  2228   136    56    59   175  1762    79  1803     -   121 |  281   0.79
   30 |  1055    35    36    21   126   310    88  1034     -    31 |  288   0.41
   31 |  7584    61    52    46    89  4746    49  7535     -    51 |  288   1.22
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    47    13     -     -     -    16     -     -    50 |  288  10.97
 ALGO |     -     -    14     -     -     -    12     -     -    18 |  288   0.07
 AMC2 |     -    37    15     -     -     -    23     -     -    19 |  288   0.04
 AOML |     -    19     -     -     -     -    18     -     -    19 |  288  25.39
 AREQ |     -    32    43    29     -     -    42     -     -    32 |  287  20.96
 ASC1 |     -    25     -    13     -     -     -     -     -    29 |  288    >>>
 AUCK |     -    28     -    15     -     -     -     -     -    19 |  264  10.57
 BAHR |     -    47    54    57     -     -     -     -     -   151 |  288   0.39
 BOGT |     -    38     -     -     -     -     -     -     -    37 |  197  34.11
 BOR1 |     -     -    17     -     -     -     -     -     -    25 |  288   0.68
 BREW |     -     -    18     -     -     -     -     -     -    27 |  288   0.06
 BRMU |     -     -     -    36     -     -     -     -     -    52 |  288    >>>
 BRUS |     -     -    23     -     -     -    39     -     -    26 |  288   0.04
 CHAT |     -    45     -    29     -     -     -     -     -    31 |  287  17.93
 CHUR |     -    28    26     -     -     -    26     -     -    27 |  288   6.26
 CORD |     -    31     -     -     -     -    32     -     -     - |  214  15.65
 CRO1 |     -    26    14     -     -     -    26     -     -    44 |  288  23.47
 DAKA |     -    51     -    34     -     -     -     -     -     - |  245 127.21
 DRAO |     -    34    17     -     -     -     -     -     -    20 |  288   0.10
 DWH1 |     -     -    14     -     -     -    19     -     -    12 |  288   0.61
 FAIR |     -     -    17    18     -     -    16     -     -    14 |  288   0.05
 FORT |     -    61     -    37     -     -    33     -     -    49 |  288   0.10
 GLPS |     -    20     -    13     -     -     -     -     -     - |  262  30.66
 GODE |     -    31    37     -     -     -     -     -     -    30 |  288   0.16
 GOLD |     -    30     -     -     -     -    31     -     -     X |  113  12.84
 GOPE |     -    26     -     -     -     -    27     -     -     - |  288  17.84
 GUAM |     -    15     -    24     -     -    27     -     -    25 |  288  23.70
 GUAT |     -     X     -    13     -     -     -     -     -    19 |  288    >>>
 HOB2 |     -    25    17     -     -     -     -     -     -     - |  288   0.06
 HRAO |     -     -     -    17     -     -    66     -     -    51 |  284   0.59
 IISC |     -     -     -    26     -     -     -     -     -    37 |  288  26.95
 JPLM |     -     -    17     -     -     -     -     -     -    25 |  288  13.96
 KGN0 |     -     -    14     -     -     -     -     -     -    20 |  287   0.36
 KIRU |     -    40     -     -     -     -    31     -     -    42 |  285  10.59
 KIT3 |     -     -     -    13     -     -    15     -     -    15 |  288  13.89
 KOKB |     -     -    15    25     -     -    44     -     -    33 |  288   0.06
 KOUR |     -    43     -    34     -     -    53     -     -     - |  263   2.97
 LHAS |     -     -     -    17     -     -     -     -     -    24 |  288  10.89
 MAD2 |     -     -     -     -     -     -    84     -     -    79 |  287 419.52
 MAS1 |     -     -     -    27     -     -    50     -     -    27 |  288   2.42
 MCM4 |     -    55     -    54     -     -     -     -     -   127 |  286  18.30
 MDO1 |     -     -   100    72     -     -   127     -     -    66 |  288 914.50
 MEDI |     -     -    25     -     -     -    29     -     -    19 |  288   0.29
 METS |     -    17    19     -     -     -     -     -     -    26 |  287  15.47
 MIZU |     -     -    16     -     -     -     -     -     -    23 |  288   0.45
 MKEA |     -     -     -    18     -     -    28     -     -     X |  288  29.12
 NLIB |     -     -    10     -     -     -    24     -     -    26 |  288 120.50
 NNOR |     -     -    22     -     -     -     -     -     -    32 |  288  18.21
 NOT1 |     -     -    14     -     -     -     -     -     -    20 |  288    >>>
 NRC1 |     -    23    22    33     -     -    14     -     -    16 |  288   0.04
 NRIL |     -     -     -    20     -     -    31     -     -     - |  268  10.85
 NSSP |     -    24     -     -     -     -     -     -     -    23 |  287  11.62
 NYAL |     -     -    26     -     -     -     -     -     -    39 |  282   0.23
 OHI2 |     -    37     -    25     -     -     -     -     -     - |  288  10.14
 ONSA |     -    22    16    21     -     -     -     -     -     - |  276   0.04
 PERT |     -    33    20    21     -     -     -     -     -    34 |  288  12.88
 PETP |     -    13     -     -     -     -    13     -     -     - |  287  15.43
 PIE1 |     -    22    18     -     -     -     -     -     -    14 |  288   0.07
 POTS |     -    25     -    20     -     -     -     -     -    20 |  288  18.54
 PRDS |     -    29    18     -     -     -     -     -     -    33 |  288   1.46
 PTBB |     -    40     -     -     -     -     -     -     -    39 |  288   0.45
 QAQ1 |     -    49     -     -     -     -     -     -     -    47 |  283  12.70
 RBAY |     -    60     -     -     -     -     -     -     -    58 |  201  44.75
 REYK |     -    43     -     -     -     -     -     -     -    42 |  257  13.93
 RIOG |     -    25     -    17     -     -     -     -     -    26 |  284  15.22
 SCH2 |     -     -    22     -     -     -    23     -     -    17 |  286  69.64
 SFER |     -     -    16     -     -     -     -     -     -    24 |  287   0.41
 SPT0 |     -     -    15     -     -     -     -     -     -    23 |  276   0.05
 STJO |     -    34    11     -     -     -    20     -     -    21 |  288   0.06
 SUTH |     -    38     -     -     -     -     -     -     -    37 |  284  23.26
 THU3 |     -    27     -    18     -     -     -     -     -     X |  287   9.09
 TIXI |     -     X     -    33     -     -    51     -     -     - |  287   8.52
 TRO1 |     -    58     -    45     -     -     -     -     -    68 |  288  10.12
 TSKB |     -    29    19    34     -     -     -     -     -    20 |  288   1.44
 TWTF |     -    24    30     -     -     -     -     -     -    27 |  288   0.44
 URUM |     -    46     -     -     -     -     -     -     -    45 |  287  67.99
 USN1 |     -     -    15     -     -     -    47     -     -    33 |  288   0.05
 USNO |     -     -    15     -     -     -     -     -     -    22 |  288   0.04
 USUD |     -    34    14     -     -     -    17     -     -    28 |  288  13.43
 VILL |     -    38     -     -     -     -     -     -     -    37 |  288   3.40
 WES2 |     -     -    15     -     -     -     -     -     -    22 |  288   0.05
 WHIT |     -    21     -     -     -     -     -     -     -    21 |  288   2.37
 WTZR |     -    29    18     -     -     -     -     -     -    25 |  288   0.06
 WUHN |     -     -     -     -     -     -    17     -     -    16 |  287  20.04
 YAKT |     -   105     -     -     -     -    16     -     -    93 |  284    >>>
 YELL |     -    45     -    20     -     -    17     -     -    16 |  288   0.03
 YSSK |     -    14     -     -     -     -    14     -     -     - |  287  13.26
 ZAMB |     -    28     -    30     -     -    64     -     -     - |  288  19.60
 -----+-------------------------------------------------------------+--------------
 TOT  |  4065    45    33    33   129  2515    47  3992     -    44 |


 BEST CLOCK FIT: YELL   288   0.03 (ns) 

