
 GPS week: 1233   Day: 0   MJD: 52875                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2688      0     0.04    -0.12     3.50     0.00
 cod |   288     0  23983    387    -0.19    -0.82     0.05    19.36
 emr |   288     0  18313    372   160.52     2.77     0.05    19.42
 esa |   288     0  19506   1213    -1.19    -1.12     0.07    13.56
 gfz |   288     0  18619    655    -0.33    -0.16     0.05    22.53
 igu |    96     0   2688      0     0.04    -0.12     3.28     0.00
 jpl |   288     0  13208      2     1.58    -0.95     0.04    25.13
 ngs |    96     0   2688      0     0.04    -0.12     3.39     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------+
    1 | -3540   -12   -62   168    35   986   -65 -3573     - |
    2 |   722   -40  -112   -34    97  3295    48   659     - |
    3 | -4043    14   -98     X   -12 -5845    76 -3619     - |
    4 | -2133    44    -6   -56   -27  -655    25 -2255     - |
    5 | -2353   -24  -125   149    39 -6915     - -2458     - |
    6 | -2112   -39    16   -57    54 -2046     - -2161     - |
    7 |  -828   -40    12    44    84 -3472   -77  -889     - |
    8 | -2878    39   -54    37    -9 -1493     - -2334     - |
    9 |   141     0   -28    75    -8   367   -12   173     - |
   10 | -6958    35    48   -47    24 -2337   -60 -6086     - |
   11 |  2185    74   -68   102   -54  -171   -11  2364     - |
   13 |  4332    50   -84    48    75   -86   -67  4186     - |
   14 |  3972    75   -57    29   -32   566     -  3899     - |
   15 |  2658    17    57     -    23   117   -78  1623     - |
   16 |  4107    68  -196    -4   113 -1835     -  4417     - |
   17 | -1406     X    40   -73    10  9481     - -1361     - |
   18 |  2897    64   -70   -12    -8   104    18  3118     - |
   20 |  4307   -52  -222    78   -23   253   191  4286     - |
   21 |  -510    40     6    67  -177 -3008    87   183     - |
   23 |  6497    34   -19   -93    43 18225     -  5417     - |
   24 |  6289   -18     X   120    33 10827   -80  5038     - |
   25 | -1303   -39   -87   135    27  4933     - -1227     - |
   26 | -4256   -19   -98    34    80    38     - -4046     - |
   27 | -1907   -25   -31    56    15 -6190     - -1688     - |
   28 |  3947   -68    20   125   -34 -4901     -  3786     - |
   29 |  1267    63   -53  -114    52 -3523     -   930     - |
   30 | -6441    -4  -126    67    72  2155     - -5467     - |
   31 | -2652    -7    18   -36    13 -8869     - -2913     - |
 -----+-------------------------------------------------------+
 ALGO |     -  -111   -28     X     -     -   107     -     - |
 AMC2 |     -   -46   162     -     -     -   -90     -     - |
 AOML |     -   -28     -     -     -     -    22     -     - |
 AREQ |     -   -69   124     -   -10     -   -34     -     - |
 ARTU |     -   -56     -     -     2     -    42     -     - |
 ASC1 |     -   -13     -     -    11     -     -     -     - |
 AUCK |     -    13     -     X     X     -   -10     -     - |
 BAHR |     -    46   -17  -327    58     -   102     -     - |
 BILI |     -   100     -     -   -86     -     -     -     - |
 BOGT |     -   124     -     X     -     -   -96     -     - |
 BRUS |     -    61    52     -     -     -   -87     -     - |
 CAS1 |     -    40     -   141  -119     -     -     -     - |
 CEDU |     -  -163     -   232     -     -     -     -     - |
 CHAT |     -  -126     -   180     -     -     -     -     - |
 CHUR |     -   118  -118     -     -     -     -     -     - |
 COCO |     -    96     -  -137     -     -     -     -     - |
 CRO1 |     -     -    37     -     -     -   -29     -     - |
 DAV1 |     -    72     -     -   -62     -     -     -     - |
 DRAO |     -   -11    11     -     -     -     -     -     - |
 EISL |     -    99     -   -22     -     -   -62     -     - |
 FAIR |     -     -    28   -47   -68     -    62     -     - |
 FORT |     -     -    37   223  -151     -   -10     -     - |
 GODE |     -  -205   215   -14     -     -     -     -     - |
 GOLD |     -  -254     -   243     -     -    32     -     - |
 GUAM |     -    91     -   130  -239     -    34     -     - |
 HERS |     -   -76    75     -     -     -     -     -     - |
 HOB2 |     -    13   167  -257     -     -     -     -     - |
 HOFN |     -     -     -     -    60     -   -54     -     - |
 HRAO |     -   -53     -     -    -7     -    47     -     - |
 IISC |     -    57     -  -127    28     -     -     -     - |
 KERG |     -    54   -49     -    -4     -     -     -     - |
 KIRU |     -    -9    35   -62     -     -    14     -     - |
 KIT3 |     -     -     -   194  -117     -     -     -     - |
 KOKB |     -     -   144     -  -124     -     -     -     - |
 KOUR |     -    90     -  -295   123     -   -20     -     - |
 KSTU |     -    50     -     -    13     -   -50     -     - |
 LPGS |     -     -     -   -86     -     -    46     -     - |
 MAC1 |     -  -105     -   115    21     -     -     -     - |
 MAG0 |     -   -35     -     -     -     -    27     -     - |
 MALI |     -   148     -  -212     X     -     -     -     - |
 MAS1 |     -     -   -18   -34   -35     -    64     -     - |
 MDO1 |     -     -    52     -   -45     -     -     -     - |
 MEDI |     -    30   -30     -     -     -     -     -     - |
 METS |     -   -94    94     -     -     -     -     -     - |
 MKEA |     -     -     -    -2  -103     -    93     -     - |
 MSKU |     -   -52     -     -     -     -    40     -     - |
 NNOR |     -     -   143  -205     -     -     -     -     - |
 NRIL |     -    25     -     -   -15     -    -5     -     - |
 NYA1 |     -    53     -     -   -45     -     -     -     - |
 NYAL |     -     -  -133   191     -     -     -     -     - |
 ONSA |     -  -125   -27   194    14     -     -     -     - |
 PERT |     -    97   -25    15   -58     -   -11     -     - |
 PIE1 |     -     -    72  -103     -     -     -     -     - |
 PIMO |     -     -     -   -70    42     -     -     -     - |
 POTS |     -   -14     -     9     7     -     -     -     - |
 RIOG |     -    71     -    29   -78     -     -     -     - |
 SANT |     -   379     -  -131  -199     -     -     -     - |
 SCH2 |     -   -93    93     -     -     -     -     -     - |
 SELE |     -     -     -   -39     -     -    21     -     - |
 SFER |     -   -37    37     -     -     -     -     -     - |
 STJO |     -   -49    72     -     -     -   -18     -     - |
 THTI |     -     -     -  -142   248     -  -105     -     - |
 THU3 |     -  -101     -     -    87     -     -     -     - |
 TIXI |     -   -31     -     -    53     -   -24     -     - |
 TSKB |     -    34    25   -85     -     -     -     -     - |
 USNO |     -   -73    72     -     -     -     -     -     - |
 USUD |     -   -38   -18    80     -     -     -     -     - |
 VILL |     -   132     -  -189     -     -     -     -     - |
 WES2 |     -     -     5    -7     -     -     -     -     - |
 WILL |     -   -30    30     -     -     -     -     -     - |
 WSRT |     -   -93    92     -     -     -     -     -     - |
 WUHN |     -     -  -117  -146   188     -     -     -     - |
 YAKT |     -   -45    45     -     -     -     -     -     - |
 YELL |     -    -6     -   -74    95     -   -43     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6057   156   133   167    62  2519    30  5929     - |  288   4.15
    2 |  3669    36    30    23    27  2426    24  3920     - |  288   3.37
    3 |  6102    37    27     X    58  4132    35  6356     - |  288   3.62
    4 |  1426    69   120   107    77   573    43  1118     - |  288   0.72
    5 |  1940    36    41    84    29  3611     -  1647     - |  288   0.41
    6 |  5464    40    39    48    25  2043     -  5599     - |  288   4.82
    7 |  1311    43    90    28    37  2716    34  1232     - |  288   0.64
    8 |  4530    76    45   105    23  1769     -  4428     - |  288   1.73
    9 |  2868    67    38    53    31  2394    26  2690     - |  288   2.48
   10 |  2114    85   116    36    26  2097    36  2245     - |  288   1.96
   11 |  1058    64    48   114    50   898    70   893     - |  288   0.52
   13 |   772    83    57   109    94   650    41   710     - |  288   0.32
   14 |  1142    44    60    47    50   756     -   863     - |  288   0.17
   15 |  4755    52    46     -    21  3651    26  4871     - |  288   2.81
   16 |  1566    37    46    23    25   752     -  1564     - |  288   0.24
   17 |  2038     X    46    59    60  6219     -  1921     - |  288   0.91
   18 |   861    63    36    67    25   479    44   901     - |  288   0.38
   20 |  1291    81   107    92    24   555    63  1157     - |  288   0.24
   21 |  2675    80    90    77    36  2037    28  2681     - |  288   0.36
   23 |  9288    58    45    62    30  7907     -  7941     - |  288   7.75
   24 |  4464    50     X    68    40  6272    26  4459     - |  288   2.00
   25 |  1761    63    48    56    40  3022     -  1956     - |  288   2.12
   26 |  1268    53    35    80    36   609     -  1138     - |  288   0.41
   27 |  1591    69    24    55    28  3616     -  1592     - |  288   1.21
   28 |  1766    64    51   116    59  2830     -  1612     - |  288   0.60
   29 |  1715    50    43   111    39  1924     -  1882     - |  288   0.61
   30 |  3591    35    40    93    45  1709     -  3218     - |  288   0.43
   31 |  3775    74    31   163    63  6187     -  4043     - |  288   1.46
 -----+-------------------------------------------------------+--------------
 ALGO |     -    41    39     X     -     -    11     -     - |  288   0.05
 AMC2 |     -    22    28     -     -     -    32     -     - |  288   0.05
 AOML |     -    36     -     -     -     -    28     -     - |  283  26.56
 AREQ |     -    47    33     -    18     -    12     -     - |  288  19.01
 ARTU |     -    29     -     -    29     -    25     -     - |  288  12.12
 ASC1 |     -    20     -     -    17     -     -     -     - |  287    >>>
 AUCK |     -    68     -     X     X     -    53     -     - |  264  12.33
 BAHR |     -    73    34    62    40     -    68     -     - |  288   0.45
 BILI |     -    49     -     -    42     -     -     -     - |  286   9.60
 BOGT |     -    32     -     X     -     -    25     -     - |  287  20.22
 BRUS |     -    29    14     -     -     -    18     -     - |  288   0.03
 CAS1 |     -    54     -    28    50     -     -     -     - |  288   8.69
 CEDU |     -    36     -    51     -     -     -     -     - |  288  17.14
 CHAT |     -    17     -    24     -     -     -     -     - |  286  11.05
 CHUR |     -    82    82     -     -     -     -     -     - |  231  14.77
 COCO |     -    23     -    33     -     -     -     -     - |  288  10.64
 CRO1 |     -     -    23     -     -     -    18     -     - |  288  23.34
 DAV1 |     -    34     -     -    29     -     -     -     - |  276  22.07
 DRAO |     -    66    66     -     -     -     -     -     - |  286   0.07
 EISL |     -    25     -    48     -     -    27     -     - |  288  25.00
 FAIR |     -     -   123    93    83     -   117     -     - |  286   0.11
 FORT |     -     -    26    38    38     -    35     -     - |  288   0.09
 GODE |     -    20    25    44     -     -     -     -     - |  288   0.12
 GOLD |     -    51     -   107     -     -    64     -     - |  288  13.61
 GUAM |     -    27     -    60    38     -    28     -     - |  288  15.84
 HERS |     -    31    31     -     -     -     -     -     - |  241  11.69
 HOB2 |     -    17    38    57     -     -     -     -     - |  288   0.09
 HOFN |     -     -     -     -    46     -    41     -     - |  288    >>>
 HRAO |     -    69     -     -    43     -    43     -     - |  288  21.29
 IISC |     -    37     -   115    63     -     -     -     - |  282  24.84
 KERG |     -    48    31     -    26     -     -     -     - |  287   1.30
 KIRU |     -    48    22    47     -     -    17     -     - |  288  12.98
 KIT3 |     -     -     -    21    13     -     -     -     - |  264  20.89
 KOKB |     -     -    93     -    80     -     -     -     - |  287   0.08
 KOUR |     -    28     -    35    25     -    24     -     - |  288   2.29
 KSTU |     -    87     -     -    36     -    53     -     - |  288  11.45
 LPGS |     -     -     -    37     -     -    20     -     - |  288  23.08
 MAC1 |     -    44     -    33    35     -     -     -     - |  288  14.89
 MAG0 |     -    15     -     -     -     -    12     -     - |  287   9.45
 MALI |     -    45     -    64     X     -     -     -     - |  285   9.62
 MAS1 |     -     -    31    63    20     -    28     -     - |  288   1.56
 MDO1 |     -     -    36     -    31     -     -     -     - |  288 273.80
 MEDI |     -    20    20     -     -     -     -     -     - |  288   0.35
 METS |     -    29    29     -     -     -     -     -     - |  287  12.13
 MKEA |     -     -     -    83    97     -    59     -     - |  288  28.52
 MSKU |     -    57     -     -     -     -    44     -     - |  288  23.49
 NNOR |     -     -    20    28     -     -     -     -     - |  288   0.43
 NRIL |     -    95     -     -    88     -    55     -     - |  288   9.67
 NYA1 |     -    37     -     -    32     -     -     -     - |  288   0.10
 NYAL |     -     -    12    17     -     -     -     -     - |  288   0.10
 ONSA |     -    49    36    26    48     -     -     -     - |  288   0.04
 PERT |     -    43    40    36    23     -    58     -     - |  288   9.24
 PIE1 |     -     -    52    74     -     -     -     -     - |  288  54.83
 PIMO |     -     -     -    69    42     -     -     -     - |  288  25.59
 POTS |     -    58     -    32    33     -     -     -     - |  288  11.30
 RIOG |     -    39     -    51    16     -     -     -     - |  286  12.42
 SANT |     -    51     -    94    32     -     -     -     - |  283   6.69
 SCH2 |     -    18    18     -     -     -     -     -     - |  288  17.72
 SELE |     -     -     -    57     -     -    31     -     - |  287  33.71
 SFER |     -    20    20     -     -     -     -     -     - |  285   0.60
 STJO |     -    49    48     -     -     -    23     -     - |  288   0.04
 THTI |     -     -     -    38    48     -    41     -     - |  287   1.60
 THU3 |     -    48     -     -    41     -     -     -     - |  288   7.54
 TIXI |     -    29     -     -    20     -    14     -     - |  287   8.74
 TSKB |     -    30    24    53     -     -     -     -     - |  288   1.22
 USNO |     -    46    46     -     -     -     -     -     - |  288   0.03
 USUD |     -    41    30    40     -     -     -     -     - |  288  11.63
 VILL |     -    19     -    28     -     -     -     -     - |  288   2.78
 WES2 |     -     -    19    27     -     -     -     -     - |  288   0.10
 WILL |     -    32    31     -     -     -     -     -     - |  288  41.91
 WSRT |     -    18    18     -     -     -     -     -     - |  288   0.03
 WUHN |     -     -    57    34    57     -     -     -     - |  287  18.45
 YAKT |     -    38    38     -     -     -     -     -     - |  288   8.96
 YELL |     -    64     -    75    49     -    70     -     - |  288   4.62
 -----+-------------------------------------------------------+--------------
 TOT  |  3499    53    53    70    45  3277    42  3386     - |


 BEST CLOCK FIT: BRUS   288   0.03 (ns) 

