
 GPS week: 1199   Day: 2   MJD: 52639                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2575      0    -0.05     0.06     4.95     0.00
 cod |   288     0  25149     30    -0.56     1.06     0.08    24.69
 emr |   288     0  18767      9  1999.87    16.96     0.07    26.12
 gfz |   288     0  15764      0    -0.59     1.51     0.08    23.61
 igu |    96     0   2387      0    -0.14     0.19     5.12     0.00
 ngs |    96     0   2575      0    -0.08     0.11     4.94     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  28319    284  -475.30   -53.86     0.07    25.58

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 | -3600    93   -41    79 -3111 -3428     -  -121 |
    2 | -9113   -36    21   143  2267 -7539     -  -118 |
    3 |   267    18   -96   115  6182  -168     -   -26 |
    4 | -2917   229   -76    52 -1405 -2800     -  -192 |
    5 | -2547   106   -98   117     - -1829     -  -111 |
    6 |  5405   225  -115   -12 18457  3879     -   -89 |
    7 |   798   114   -73    62  1443   885     -   -93 |
    8 |  5979    83  -104    72  8917  4857     -   -41 |
    9 |  2638   119  -119   149  3106  1811     -  -131 |
   10 |  1916   110   -24    49  7678  1626     -  -127 |
   11 |  9287    46    75   -52  2332  9496     -   -76 |
   13 |  4807   193   106  -138   960  4759     -  -172 |
   14 |  1990   -79    96     4  2320  2119     -   -25 |
   15 |  2891    58  -124    59  5564  2282     -    18 |
   17 |  3717   190  -114   -23  5273  2906     -   -46 |
   18 |  3574    87    29   -30  1525  3901     -   -86 |
   20 |  6403   121    12   -20  2089  6370     -  -110 |
   22 |-18357   -30   -96   290-35768-18645     -  -127 |
   23 |  2918   291  -167    48 11036  2915     -  -155 |
   24 | -7411   264  -145   114  2001 -6673     -  -210 |
   25 | -9597   -23    -4    98 -7635 -8625     -   -65 |
   26 |  1941   161  -119    70   130  2043     -   -86 |
   27 |   -21    79  -126   207-20088   231     -  -139 |
   28 | -3259    90     2    -8 -8826 -2073     -   -81 |
   29 |   376   157  -166    98     -    57     -   -73 |
   30 | -1200   110  -101   106  -349 -1586     -  -101 |
   31 |  2954    44  -126    72 -4212  3031     -    20 |
 -----+-------------------------------------------------+
 ALBH |     -    15  -119     -     -     -     -   104 |
 ALGO |     -     -    70     -     -     -     -   -72 |
 AMC2 |     -  -239    74     -     -     -     -   156 |
 AOML |     -  -180     -     -     -     -     -   173 |
 AREQ |     -    24    82   -20     -     -     -   -88 |
 AUCK |     -    88     -     -     -     -     -   -85 |
 BAHR |     -    59    40    79     -     -     -  -171 |
 BILI |     -    29     -   -30     -     -     -     - |
 BOGT |     -  -759     -     -     -     -     -   733 |
 BOR1 |     -   -51   -51     -     -     -     -   102 |
 BREW |     -     -     7     -     -     -     -    -8 |
 BRMU |     -    41     -   -28     -     -     -   -13 |
 BRUS |     -  -166     5     -     -     -     -   156 |
 CAS1 |     -    54     -   -46     -     -     -   -11 |
 CHAT |     -  -189     -     -     -     -     -   182 |
 CHUR |     -     -    54     -     -     -     -   -55 |
 COCO |     -    40     -   -12     -     -     -   -27 |
 CRO1 |     -  -215   264     -     -     -     -   -50 |
 DAEJ |     -    21   -20     -     -     -     -     X |
 DAVR |     -    23     -   -23     -     -     -    -1 |
 DRAO |     -    45    67     -     -     -     -  -111 |
 EISL |     -   -62     -    28     -     -     -    31 |
 FAIR |     -     -    66  -154     -     -     -    75 |
 GODE |     -  -109   -86     -     -     -     -   193 |
 GOLD |     -    27     -     -     -     -     -   -26 |
 GUAT |     -   -49     -  -219     -     -     -   250 |
 HOB2 |     -   -49   148     -     -     -     -  -101 |
 HRAO |     -   -30     -     -     -     -     -    29 |
 IISC |     -   -26     -  -167     -     -     -   181 |
 JPLM |     -     -   -33  -161     -     -     -   182 |
 KARR |     -    -6     -     6     -     -     -     - |
 KERG |     -   -16    34    87     -     -     -   -99 |
 KIRU |     -  -113    24     -     -     -     -    84 |
 KOKB |     -   137   127     -     -     -     -  -260 |
 KOSG |     -  -193     -     -     -     -     -   186 |
 MAC1 |     -   -50     -  -183     -     -     -   218 |
 MALI |     -     -     -    76     -     -     -   -70 |
 MAS1 |     -    73    72   -37     -     -     -  -110 |
 MCM4 |     -   154     -     -     -     -     -  -148 |
 MDO1 |     -  -151   -31     -     -     -     -   178 |
 METS |     -   -96   -20     -     -     -     -   113 |
 MIZU |     -     -   -24     -     -     -     -    25 |
 MKEA |     -    55     -  -165     -     -     -   101 |
 NLIB |     -   128  -146     -     -     -     -    18 |
 NRC2 |     -     -   -27  -123     -     -     -   142 |
 NRIL |     -    17     -   -18     -     -     -     - |
 NTUS |     -   -92     -     -     -     -     -    89 |
 NYA1 |     -   -25     -     -     -     -     -    24 |
 NYAL |     -     -    66     -     -     -     -   -67 |
 OHI2 |     -    27     -   -28     -     -     -     - |
 OS0G |     -     -    62    19     -     -     -   -81 |
 PERT |     -    36   257     -     -     -     -  -291 |
 PIE1 |     -    10   112     -     -     -     -  -122 |
 POTS |     -  -214     -     -     -     -     -   207 |
 RBAY |     -     -     -  -204     -     -     -   189 |
 RIOG |     -  -172     -     -     -     -     -   166 |
 SANT |     -    58     -     -     -     -     -   -56 |
 SCH2 |     -     -   -52     -     -     -     -    53 |
 SELE |     -   -40     -     -     -     -     -    38 |
 SFER |     -  -127     -     -     -     -     -   122 |
 SUTH |     -  -137     -     -     -     -     -   132 |
 THTI |     -     -     -   -72     -     -     -    66 |
 THU3 |     -    28     -   -29     -     -     -     - |
 TIDB |     -     4    45  -117     -     -     -    58 |
 TLSE |     -  -237   -30     -     -     -     -   261 |
 TRO1 |     -     -     -  -175     -     -     -   162 |
 TSKB |     -    16   129     -     -     -     -  -147 |
 UNSA |     -     -     -   -55     -     -     -    51 |
 URUM |     -    93     -     -     -     -     -   -90 |
 USN1 |     -     -    46     -     -     -     -   -47 |
 USNO |     -     -   150     -     -     -     -  -153 |
 USUD |     -  -105    45     -     -     -     -    57 |
 VILL |     -  -147     -     -     -     -     -   142 |
 WILL |     -     -   -39     -     -     -     -    40 |
 WSRT |     -   -26   154     -     -     -     -  -132 |
 WTZR |     -   -59   159     -     -     -     -  -105 |
 YAKT |     -  -190     -     -     -     -     -   183 |
 YAR2 |     -  -146     -     -     -     -     -   141 |
 YELL |     -  -117     -     -     -     -     -   113 |
 YSSK |     -    60     -   -63     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  6616   134    60    51  5102  6392     -   108 |  276   5.42
    2 |  5141    84   158    99  3987  5122     -   110 |  287   2.61
    3 |  9014    58    35   124  6597  8569     -    55 |  288   2.85
    4 |  1583    59   116   163   968  1555     -    59 |  277   0.49
    5 |  7111    57    51    40     -  6769     -    40 |  288   5.08
    6 |  9719   108    66    66  8148 11065     -   161 |  288  10.33
    7 |  1557    74    54    40   697  1408     -    57 |  288   0.58
    8 |  4780    61    45    86  4604  4927     -    83 |  288   2.56
    9 |  5780   118    58    65  2130  5221     -    94 |  288   1.89
   10 |  3250    65    58    61  2882  2822     -    48 |  288   2.16
   11 |  1934    80    49    35  1075  1857     -    94 |  288   0.31
   13 |  1504    89    55    43   655  1359     -    41 |  288   0.21
   14 |  1725    73   104   114  1090  1662     -    51 |  288   0.29
   15 |  2128    62    87    96  3926  2595     -   204 |  287   1.37
   17 |  3495   131    39   161  2450  3354     -   127 |  288   1.32
   18 |  1363    71    61   113   757  1132     -    67 |  288   0.33
   20 |  1451    66    29    41  1105  1299     -    31 |  288   0.21
   22 | 11304    64    59   175 15598 11085     -    71 |  288   4.21
   23 |  7861    59   182   189  7772  7914     -    57 |  288   5.84
   24 |  4464    61    29    65  2174  4535     -    36 |  282   2.89
   25 |  3997    50    32    35  2730  4049     -    45 |  288   1.54
   26 |  1629   234    88   144  1193  1566     -   102 |  277   0.93
   27 |  2556    63    52    28  9530  2278     -    72 |  288   1.28
   28 |  4287    84    74    92  4517  3751     -    67 |  288   1.11
   29 |  1708   157    84    77     -  2071     -   126 |  277   0.98
   30 |  3182    46    40    47   735  2968     -    43 |  288   0.79
   31 |  1950   113    44   147  4097  2291     -    42 |  288   2.13
 -----+-------------------------------------------------+--------------
 ALBH |     -    60    50     -     -     -     -    51 |  288   0.12
 ALGO |     -     -    15     -     -     -     -    15 |  288   0.05
 AMC2 |     -    57    86     -     -     -     -    48 |  288   0.09
 AOML |     -    40     -     -     -     -     -    38 |  286  60.84
 AREQ |     -    26    38    26     -     -     -    27 |  288  17.32
 AUCK |     -    77     -     -     -     -     -    75 |  288  30.86
 BAHR |     -    33    44    50     -     -     -    35 |  288   0.71
 BILI |     -    24     -    25     -     -     -     - |  287   9.77
 BOGT |     -    45     -     -     -     -     -    43 |  162  20.04
 BOR1 |     -    46    18     -     -     -     -    37 |  288   0.56
 BREW |     -     -    49     -     -     -     -    50 |  276   0.08
 BRMU |     -    26     -    15     -     -     -    24 |  288  21.00
 BRUS |     -    80    60     -     -     -     -    74 |  288   0.06
 CAS1 |     -    83     -    51     -     -     -    59 |  288   8.42
 CHAT |     -    28     -     -     -     -     -    27 |  285  14.55
 CHUR |     -     -    57     -     -     -     -    58 |  283   0.60
 COCO |     -   121     -    34     -     -     -   110 |  288   9.98
 CRO1 |     -    77   182     -     -     -     -   120 |  288  21.76
 DAEJ |     -    78    73     -     -     -     -     X |  284   3.17
 DAVR |     -    77     -    17     -     -     -    67 |  288  19.79
 DRAO |     -    27    16     -     -     -     -    21 |  288   0.06
 EISL |     -    56     -    29     -     -     -    53 |  276  33.00
 FAIR |     -     -    27    48     -     -     -    43 |  281   0.07
 GODE |     -    82   132     -     -     -     -    87 |  288   0.12
 GOLD |     -    47     -     -     -     -     -    45 |  235  17.01
 GUAT |     -    22     -    27     -     -     -    37 |  288    >>>
 HOB2 |     -   122   104     -     -     -     -   159 |  288   0.11
 HRAO |     -    25     -     -     -     -     -    24 |  288   3.84
 IISC |     -    21     -    21     -     -     -    25 |  288  29.65
 JPLM |     -     -   128    98     -     -     -    67 |  288  36.56
 KARR |     -    35     -    37     -     -     -     - |  287  21.59
 KERG |     -   138    38    51     -     -     -    86 |  287   1.69
 KIRU |     -    81    34     -     -     -     -    59 |  287 294.73
 KOKB |     -    72    29     -     -     -     -    84 |  288   0.07
 KOSG |     -    31     -     -     -     -     -    30 |  285  11.33
 MAC1 |     -    60     -    45     -     -     -    33 |  288  16.22
 MALI |     -     -     -    27     -     -     -    25 |  288  32.59
 MAS1 |     -    34    35    18     -     -     -    27 |  287   2.04
 MCM4 |     -   210     -     -     -     -     -   203 |  287    >>>
 MDO1 |     -    36    41     -     -     -     -    71 |  276    >>>
 METS |     -    49    44     -     -     -     -    47 |  287   4.93
 MIZU |     -     -    55     -     -     -     -    56 |  275   0.53
 MKEA |     -    86     -    36     -     -     -    63 |  288  31.47
 NLIB |     -    74   121     -     -     -     -    70 |  282 255.25
 NRC2 |     -     -    28    72     -     -     -    41 |  288   0.03
 NRIL |     -    57     -    59     -     -     -     - |  288  14.50
 NTUS |     -    69     -     -     -     -     -    67 |  288   9.99
 NYA1 |     -    52     -     -     -     -     -    50 |  286   0.05
 NYAL |     -     -    59     -     -     -     -    60 |  279   0.08
 OHI2 |     -    57     -    60     -     -     -     - |  288   7.67
 OS0G |     -     -    43    32     -     -     -    33 |  288   0.38
 PERT |     -    54   130     -     -     -     -   103 |  287  21.93
 PIE1 |     -    74   102     -     -     -     -    47 |  288   0.07
 POTS |     -    67     -     -     -     -     -    64 |  286  15.09
 RBAY |     -     -     -   238     -     -     -   220 |   86    >>>
 RIOG |     -   105     -     -     -     -     -   101 |  155  14.06
 SANT |     -    59     -     -     -     -     -    57 |  288   9.23
 SCH2 |     -     -    35     -     -     -     -    36 |  282  26.74
 SELE |     -    60     -     -     -     -     -    58 |  282    >>>
 SFER |     -    82     -     -     -     -     -    79 |  285   0.37
 SUTH |     -    63     -     -     -     -     -    61 |  287  19.99
 THTI |     -     -     -    23     -     -     -    22 |  287   1.76
 THU3 |     -    23     -    24     -     -     -     - |  288   7.64
 TIDB |     -    48    23    40     -     -     -    42 |  288   0.12
 TLSE |     -    60    73     -     -     -     -    98 |  288   0.26
 TRO1 |     -     -     -    34     -     -     -    31 |  286  12.69
 TSKB |     -    59    27     -     -     -     -    68 |  288   1.01
 UNSA |     -     -     -   126     -     -     -   116 |  275  36.91
 URUM |     -    29     -     -     -     -     -    28 |  288  27.63
 USN1 |     -     -   125     -     -     -     -   128 |  281   0.12
 USNO |     -     -    15     -     -     -     -    16 |  288   0.05
 USUD |     -    40    59     -     -     -     -    35 |  287  19.62
 VILL |     -    49     -     -     -     -     -    47 |  286   4.31
 WILL |     -     -    63     -     -     -     -    64 |  276   2.54
 WSRT |     -    56    39     -     -     -     -    58 |  288   0.04
 WTZR |     -    36    59     -     -     -     -    52 |  288   0.08
 YAKT |     -    58     -     -     -     -     -    56 |  288   0.44
 YAR2 |     -   111     -     -     -     -     -   107 |  288   4.43
 YELL |     -    53     -     -     -     -     -    52 |  285   0.04
 YSSK |     -    34     -    36     -     -     -     - |  287  10.92
 -----+-------------------------------------------------+--------------
 TOT  |  4954    77    73    80  5117  4941     -    74 |


 BEST CLOCK FIT: NRC2   288   0.03 (ns) 

