
 GPS week: 1146   Day: 5   MJD: 52271                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2675      0    -0.38     0.53     4.70     0.00
 cod |   288     0  20438    289     4.55    -5.60     0.09    19.08
 emr |    96     0   2517     11  1691.24    11.16     0.15     9.58
 esa |   288     2  13555   1861     1.03    -0.55     0.39     0.00
 gfz |   288     0  14655     47     0.09    -0.33     0.07    25.16
 igu |    96     0   2195      9    -0.64     1.02     2.80     0.00
 jpl |   282     0  10267     40     5.74    -7.10     0.07    26.96
 ngs |    96     0   2675      0    -0.38     0.53     4.48     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16012    392   654.49    -0.19     0.09    19.21

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  4804    14  -122  -256    52 12107    58  3975     -  -101 |
    2 | -4835     1   -60  -449   209     -     - -3893     -  -264 |
    3 | -2636  -148  -489  -286   274  4494     6 -2772     -  -146 |
    4 | -3898    16    29  -247    82  5028   -98 -3742     -   -61 |
    5 | -3778   113   117  -164   -52     -    12 -3400     -   -71 |
    6 |  -980    52    29   -35    62     -   -90  -736     -   -79 |
    7 |  5988    43    -2  -316   159  4689   -63  4033     -  -205 |
    8 | -6145    72   132  -424     8  -225   132 -6269     -  -189 |
    9 | -6857   -20   257  -104   -28 -1985    50 -6004     -   -13 |
   10 |   521   121   246  -194   -46 -6416   -28   695     -   -81 |
   11 |  2533  -160  -227  -347    77  -415    97  2698     -    28 |
   13 |  1794     5   -18  -312   -24 -3185   -35  1506     -    50 |
   14 |  1686   -10   184  -148  -130  1439    22  1691     -   130 |
   15 | -7248  -128    73     -    88 -8431     0 -5472     -     X |
   17 |  1769   -47   187  -117   137 -1145   -65  1703     -  -118 |
   18 |  2926  -154   224    83    30  1954   -82  2945     -   134 |
   20 |  4527   -73    34  -221    42  -600   175  4695     -  -100 |
   21 | -7788    69   -57 -2929    29 -1563   -89 -6971     -   -35 |
   22 |  -822   107  -192  -138    -6 -6635   239 -1220     -  -224 |
   23 |  7286    65   160    -8   -84     -    27  6413     -     - |
   24 |  6787   -51   175  -255    83     -   -97  5613     -   -22 |
   25 | -7219     2   -34  -234    96 -5633    47 -6250     -  -156 |
   26 |  -521    24  -113   -53   167  -672  -151  -684     -  -131 |
   27 |  7568    -3     4  -379   136 12648   127  6937     -  -264 |
   28 |  8082   124   -58  -198  -222  9119   213  7589     -    42 |
   29 |  1033     1  -190  -908   101  2170   -27   668     -   -84 |
   30 |  3664   193    15  -185  -125  2136   117  3489     -  -105 |
   31 | -8097    35  -346  -432   128-20253   174 -7131     -  -262 |
 -----+-------------------------------------------------------------+
 ALBH |     -     7     -   315     -     -    -5     -     -     - |
 ALGO |     -    15     -     X  -211     -     -     -     -   261 |
 AMC2 |     -   176     -     -     -     -  -125     -     -     - |
 ARTU |     -    36     -     -   -92     -    62     -     -     - |
 AUCK |     -    68     -     -     -     -  -137     -     -   124 |
 BAHR |     -   -76     -     -     -     -    11     -     -    61 |
 BILI |     -  -193     -     -   146     -     -     -     -     - |
 BRMU |     -     8     -  -326   -89     -     -     -     -   108 |
 BRUS |     -    35     -     -     -     -   -25     -     -     - |
 CAS1 |     -   -23     -   -52    76     -  -180     -     -   168 |
 CRO1 |     -  -207     -     -     -     -   146     -     -     - |
 DARW |     -   217     -     -     -     -  -154     -     -     - |
 DAV1 |     -    83     -     -   -71     -     -     -     -    10 |
 DRAO |     -    37     -     -     -     -     -     -     -   -37 |
 GALA |     -   -77     -     -    12     -    80     -     -   -48 |
 GUAM |     -   -76     -     -   208     -  -335     -     -   258 |
 HARB |     -   180     -     -  -137     -     -     -     -     - |
 HOB2 |     -   -29     -  -149     -     -     -     -     -    29 |
 HRAO |     -   -72     -     -     -     -    51     -     -     - |
 KARR |     -  -142     -     -   108     -     -     -     -     - |
 KERG |     -   145     -     -  -275     -    93     -     -    93 |
 KOKB |     -     -     -     -    24     -   -75     -     -    56 |
 KWJ1 |     -     -     -     -   104     -   -81     -     -   -21 |
 LPGS |     -     X     -     -  -683     -   637     -     -     - |
 MAC1 |     -    25     -  -168  -115     -    92     -     -     - |
 MATE |     -    88     -   -71     -     -  -121     -     -    77 |
 MSKU |     -   -58     -     -    44     -     -     -     -     - |
 NKLG |     -     -     -   -82    60     -     -     -     -   -79 |
 NLIB |     -    12     -  -375     -     -     -     -     -   -12 |
 NTUS |     -   -38     -     -     -     -     -     -     -    37 |
 NYA1 |     -   129     -     -  -124     -    25     -     -     - |
 ONSA |     -   -51     -  -262     -     -     -     -     -    50 |
 PIE1 |     -   -44     -  -315     -     -     -     -     -    44 |
 SANT |     -   -34     -  -552   -91     -     -     -     -   180 |
 SFER |     -  -200     -  -367     -     -     -     -     -   199 |
 STJO |     -    84     -    45   -64     -     -     -     -     - |
 TRO1 |     -  -109     -     -    83     -     -     -     -     - |
 TSKB |     -   -14     -  -358     -     -     -     -     -    13 |
 URUM |     -   -40     -     -     -     -     -     -     -    39 |
 USNO |     -   -46     -  -312     -     -     8     -     -    34 |
 WHIT |     -    87     -     -   -66     -     -     -     -     - |
 WSRT |     -    80     -   -28     -     -  -124     -     -    92 |
 WTZR |     -   -63     -    24     -     -   -82     -     -   175 |
 WUHN |     -   -41     -  -281  -166     -    95     -     -   129 |
 YAR2 |     -   120     -  -241     -     -  -170     -     -   111 |
 YELL |     -   -49     -  -371     -     -     -     -     -    48 |
 YSSK |     -   -35     -     -     -     -    25     -     -     - |
 ZWEN |     -   -92     -     -   -50     -     -     -     -   156 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6116   130   156   697    74  3127    54  5424     -    86 |  277   3.96
    2 |  7289   157   150   174   110     -     -  7352     -    48 |  288   1.67
    3 |  4107    55   150   268    86  1335    67  3886     -    35 |  288   1.24
    4 |  1042   152    73   161    88  3112   130  1328     -   237 |  288   1.08
    5 |  4413    77   103   245    47     -    35  4789     -    80 |  288   3.76
    6 |  8065    59    91   423    85     -    55  6779     -   131 |  288   7.35
    7 |  6748   135   135   165    85  2616   116  5725     -    84 |  288   2.45
    8 |  3870    66   133    80    34  1051    67  3906     -    39 |  288   3.44
    9 |  5093    84    99   278    22  5094    27  5665     -    55 |  288   2.61
   10 |  4462   100    47   256    59  3129    57  4450     -    56 |  288   3.38
   11 |  1414   280   136   141   119   932    54  1111     -   108 |  288   0.37
   13 |  2509    98   189   263    47  1664    44  2347     -    52 |  288   0.28
   14 |  1801   170   160   249    97   434    78  1524     -    68 |  288   0.29
   15 |  7514   128   111     -    82  2909   216  6482     -     X |  287   1.95
   17 |  1398    73   153   181    45   720    41  1433     -    46 |  288   2.85
   18 |  1278   130   256   422    55   510    47  1327     -    47 |  288   0.35
   20 |   978    73   309   167    36   616    64   799     -    43 |  288   0.24
   21 |  5148   124   158  1780   169  2606   138  4928     -   201 |  288   1.91
   22 |  1150    58   106   139    97  2006    44  1266     -   124 |  288   1.20
   23 |  5309    82   184   535    60     -    34  5907     -     - |  288   5.11
   24 |  7074   109    73   238    51     -    75  6675     -    51 |  288   3.39
   25 |  3883    61   216    86    27  1730    41  3568     -    75 |  288   1.53
   26 |  1257   163   133   307    39   566    56  1326     -    94 |  277   0.45
   27 |  3907    68    64   159    47  5655    68  3372     -    58 |  288   2.78
   28 |  1373    88   130   109   115  2740    61  1557     -    95 |  288   0.23
   29 |  1453   216   135   753    82  1158   106  1163     -   117 |  278   0.57
   30 |  1127    78    87   237    33  1313    35  1157     -    43 |  288   1.37
   31 | 10472   126    83   141    63  7101    48 10345     -    67 |  288   7.93
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    48     -   592     -     -    34     -     -     - |  282   0.05
 ALGO |     -   129     -     X   122     -     -     -     -   283 |  288   0.08
 AMC2 |     -    38     -     -     -     -    27     -     -     - |  281   0.07
 ARTU |     -    31     -     -    27     -    27     -     -     - |  287  31.39
 AUCK |     -   108     -     -     -     -    50     -     -    81 |  264  19.94
 BAHR |     -    40     -     -     -     -    28     -     -    45 |  156    >>>
 BILI |     -    77     -     -    59     -     -     -     -     - |  287  17.54
 BRMU |     -    44     -   231    56     -     -     -     -    43 |  288  28.64
 BRUS |     -    37     -     -     -     -    26     -     -     - |  281   0.07
 CAS1 |     -   112     -   215    33     -    91     -     -    44 |  288   8.73
 CRO1 |     -   177     -     -     -     -   125     -     -     - |  276   0.13
 DARW |     -    39     -     -     -     -    27     -     -     - |  111  21.10
 DAV1 |     -    35     -     -    27     -     -     -     -    46 |  287  22.59
 DRAO |     -    37     -     -     -     -     -     -     -    37 |  288   0.05
 GALA |     -    55     -     -    33     -    57     -     -    46 |  288  44.01
 GUAM |     -    75     -     -    78     -    65     -     -    45 |  288  35.05
 HARB |     -    62     -     -    47     -     -     -     -     - |  287   5.24
 HOB2 |     -    95     -   154     -     -     -     -     -    94 |  288   0.10
 HRAO |     -    55     -     -     -     -    39     -     -     - |  279  31.37
 KARR |     -    55     -     -    41     -     -     -     -     - |  288  18.27
 KERG |     -    71     -     -    39     -    39     -     -    52 |  287   1.75
 KOKB |     -     -     -     -   103     -    43     -     -   165 |  285   0.26
 KWJ1 |     -     -     -     -   103     -   143     -     -   260 |  249    >>>
 LPGS |     -     X     -     -   172     -   160     -     -     - |  215  14.22
 MAC1 |     -   119     -   270    41     -    70     -     -     - |  288  16.29
 MATE |     -    39     -   276     -     -    27     -     -    23 |  288   0.30
 MSKU |     -    57     -     -    43     -     -     -     -     - |  272  34.50
 NKLG |     -     -     -   187    22     -     -     -     -    29 |  199 787.37
 NLIB |     -    55     -   139     -     -     -     -     -    55 |  281   0.05
 NTUS |     -    44     -     -     -     -     -     -     -    44 |  288   6.99
 NYA1 |     -    46     -     -    38     -    20     -     -     - |  288  51.30
 ONSA |     -    20     -    80     -     -     -     -     -    20 |  288   0.59
 PIE1 |     -    63     -   256     -     -     -     -     -    62 |  281   0.06
 SANT |     -    49     -   883    20     -     -     -     -    41 |  282  18.69
 SFER |     -    27     -   213     -     -     -     -     -    27 |  287   1.47
 STJO |     -    55     -   518    42     -     -     -     -     - |  288   2.52
 TRO1 |     -    24     -     -    18     -     -     -     -     - |  288  10.04
 TSKB |     -    36     -   329     -     -     -     -     -    36 |  235   0.84
 URUM |     -    23     -     -     -     -     -     -     -    23 |  288  25.76
 USNO |     -    37     -   489     -     -    46     -     -    38 |  288   0.03
 WHIT |     -    37     -     -    28     -     -     -     -     - |  288  46.05
 WSRT |     -    46     -   242     -     -    28     -     -    26 |  288   0.07
 WTZR |     -    39     -   150     -     -    22     -     -    29 |  288   0.06
 WUHN |     -    98     -   218    60     -    27     -     -    24 |  287  32.59
 YAR2 |     -    57     -   499     -     -    24     -     -    42 |  288   4.33
 YELL |     -    33     -   255     -     -     -     -     -    33 |  287   0.04
 YSSK |     -    45     -     -     -     -    32     -     -     - |  280  23.78
 ZWEN |     -    45     -     -    27     -     -     -     -    49 |  288  20.14
 -----+-------------------------------------------------------------+--------------
 TOT  |  4702    92   148   392    70  2798    69  4484     -    90 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

