
 GPS week: 1146   Day: 2   MJD: 52268                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2683      0    -0.03     0.09     4.51     0.00
 cod |   288     0  23409     41    -1.00     2.36     0.09    14.39
 emr |    96     0   3800      1  1646.44    13.27     0.09    14.99
 esa |   288     0  18770   1024  1629.55    13.38     0.11    10.77
 gfz |   288     0  15635      0    -0.08    -0.25     0.07    19.00
 igu |    96     0   2299      0    -0.04     0.09     4.17     0.00
 jpl |   283     0  11362    283     0.54     1.87     0.06    25.62
 ngs |    96     0   2683      0    -0.03     0.09     4.40     0.00
 usn |   288     0   8031    288   658.80    -3.38     0.09    15.23

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn |
 -----+-------------------------------------------------------+
    1 |  -394   -27  -183   -99   121   -91   -36   -34    22 |
    2 | -3225  -190    27  -181   402  2812     - -2711  -202 |
    3 | -4433  -130  -231   -36   132  -848   173 -3873   -93 |
    4 | -5322  -108   -58    55   204 -4856  -207 -5055    -3 |
    5 | -3184   111   -48   390  -350  3716    98 -3150    -9 |
    6 |  1685   -78  -136   330  -104  2978   -21  1868    32 |
    7 |  3931  -191    11   -17   434  1593  -191  3513  -199 |
    8 |  5001    21    46  -101   160 12865   -37  3805  -133 |
    9 |  2630  -152   -54   348    87  3710   -44  2664  -167 |
   10 | -5926    10   -40   115    49 -2217  -196 -5546    18 |
   11 |  3210  -139     9   -23   -65 -1297   -57  3143   273 |
   13 |  2744    30   112  -102   -54  -585  -167  2804   204 |
   14 |  5287    -9     0   -65  -195  -172    72  5075   236 |
   15 |  5629   -96    44     -   -65     -    69  4964   101 |
   17 | -3483   163    -1     X  -127-20965    12 -4056     0 |
   18 |  4376  -230   -41   309   -27  -771   -78  4550   115 |
   20 |  5125   -84   -33   -34   -32  -133    40  5235   123 |
   21 | -3415    78  -133   -61   -83     -    93 -3872    40 |
   22 | -3430   127   -79  -162  -109 -4694   393 -3247  -131 |
   23 |   610     6  -232   553     0     -     5   779  -234 |
   24 | -4103   -49   -46    52    70     -  -125 -3627    40 |
   25 | -2439    44  -102    11  -145 18768    74 -1987   106 |
   26 | -1748    44    12   -20    57 -3228  -105 -1978   -13 |
   27 |  1599    -2   -14  -197   277 11434    -9  1189  -193 |
   28 |  4790    20   133  -134     3  2482   -59  4923    76 |
   29 |   438    59  -171    -7  -117  -757    37   216   118 |
   30 | -3296     1   -97   338  -210-11520    59 -3142     X |
   31 | -2675   -36  -106  -231   170 -8264   212 -2465  -134 |
 -----+-------------------------------------------------------+
 ALBH |     -  -199     -   223     -     -    18     -     - |
 ALGO |     -    79   187     X  -125     -    12     -     - |
 AMC2 |     -   209     -     -     -     -  -118     -     - |
 BAHR |     -    -6    10   -10   -41     -    38     -     - |
 BRMU |     -   185     -  -365    67     -     -     -     - |
 CAS1 |     -  -143     -   125    51     -   -10     -     - |
 CRO1 |     -   -76     -   -21     -     -    53     -     - |
 DARW |     -   339     -     -     -     -  -190     -     - |
 DAV1 |     -    12     -     -    -9     -     -     -     - |
 DRAO |     -   -60    58     -     -     -     -     -     - |
 EISL |     -   101     -  -135     -     -     -     -     - |
 FAIR |     -     -   183     -   -29     -   -18     -     - |
 GALA |     -   -62     -   -97    77     -    16     -     - |
 GODE |     -    55     -   -76     -     -     -     -     - |
 GUAM |     -    67     -    11    16     -   -56     -     - |
 HARB |     -   -44     -     -    33     -     -     -     - |
 HOB2 |     -   -31     -  -102    81     -     -     -     - |
 HRAO |     -   -77     -     -     -     -    44     -     - |
 IISC |     -   108     -  -187    24     -     -     -     - |
 KERG |     -   337     -     -   -43     -  -166     -     - |
 KIRU |     -    -8     -    11     -     -     -     -     - |
 KOSG |     -    -4     -     5     -     -     -     -     - |
 KSTU |     -    63     -     -     -     -   -36     -     - |
 KWJ1 |     -     -     -     -   -70     -    52     -     - |
 MAC1 |     -   -30     -   -50  -106     -   121     -     - |
 MALI |     -   -69     -   126   -19     -     -     -     - |
 MAS1 |     -  -116    87    71    28     -    -2     -     - |
 MATE |     -  -150     -  -162     -     -   160     -     - |
 MAW1 |     -    19     -     -   -83     -    52     -     - |
 MDO1 |     -    63     -   -84     -     -     -     -     - |
 MKEA |     -   -27   273     -   -92     -    31     -     - |
 MSKU |     -    25     -     -   -19     -     -     -     - |
 NKLG |     -   -58     -    78     -     -     -     -     - |
 NRC2 |     -  -126   118   113     -     -     -     -     - |
 NYA1 |     -   151     -     -  -114     -     -     -     - |
 NYAL |     -     -   -39    54     -     -     -     -     - |
 ONSA |     -   -19    96     -   -11     -     -     -     - |
 PERT |     -   156     -  -208     -     -     -     -     - |
 PIE1 |     -   115     -  -153     -     -     -     -     - |
 REYK |     -  -102     -   136     -     -     -     -     - |
 SANT |     -  -121     -     X   -51     -   109     -     - |
 SELE |     -   259     -  -346     -     -     -     -     - |
 SFER |     -   -32     -    42     -     -     -     -     - |
 STJO |     -    -8   159   -46   -16     -     -     -     - |
 SUTH |     -     0     -     0     -     -     -     -     - |
 THTI |     -     -     -    54     -     -   -23     -     - |
 TIDB |     -    46     -     -   -34     -     -     -     - |
 TOW2 |     -    39     -     -     -     -   -22     -     - |
 TRO1 |     -   -41     -     -   -36     -    50     -     - |
 TSKB |     -   -28   242   -83     -     -     -     -     - |
 URUM |     -   -16     -     -    12     -     -     -     - |
 USNO |     -   140     -  -187     -     -     X     -     - |
 USUD |     -   -19     -    46     -     -    -9     -     - |
 VILL |     -     1     -    -1     -     -     -     -     - |
 WES2 |     -     6     -    -9     -     -     -     -     - |
 WSRT |     -     3     -    -3     -     -     -     -     - |
 WTZR |     -    27     -    50     -     -   -37     -     - |
 WUHN |     -    12     -   -62   -14     -    31     -     - |
 YAR2 |     -   -25     -   248     -     -   -93     -     - |
 YELL |     -   -87    84     -     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  3983   179   121   322    76  2597    75  3925    75 |  281   3.35
    2 |  3536   162    43   167    41  2234     -  3390    65 |  288   2.30
    3 |  2261    86    81    70   136  1428    87  2064   126 |  288   1.40
    4 |  1601    70    31    45    85  2538    45  1613    94 |  288   0.85
    5 |  2156    60    66   114    82  2392    38  2241    32 |  288   1.87
    6 | 10158   128   130   240    61  2877    69 10219    37 |  288   9.19
    7 |  3804    71    39    51    81  2874    55  3084    75 |  288   2.02
    8 |  7826    73    34   104   140  7937    37  7843   170 |  288   5.30
    9 |  5056   121    86    71    95  5591    45  5213   112 |  288   1.95
   10 |  3150    91    72   116   130  2938    44  3082    82 |  288   3.21
   11 |  1798    78   129    89    56   586    73  1627    38 |  288   0.32
   13 |   754    78    74   125    91   563    58   741   121 |  288   0.17
   14 |  1088    58   104    43    59  1262    36  1124    54 |  288   0.31
   15 |  6323   104    79     -    87     -    93  5034    67 |  288   2.19
   17 |  2564   195   279     X    87 10779   137  3091   130 |  288   3.63
   18 |   982    66    86   100   109   713    68   961    45 |  288   0.25
   20 |  1073   132    95    60    52   747    62  1025    56 |  288   0.23
   21 |  9269   148    47    63   102     -    59  9446    53 |  288   5.09
   22 |  1141    92   140   137   102  3247    69   971   119 |  288   1.64
   23 |  8208    94   127   207    67     -    82  8260    50 |  288   6.87
   24 |  2934    82    73    59    80     -    40  3244    41 |  288   2.25
   25 |  2562    53   110   213   130  5213    58  2083    36 |  288   1.69
   26 |  2455   194   128   189   100  1681   111  2247    80 |  282   0.91
   27 |  7373   145    27    58    43  6884    32  6393    93 |  288   4.43
   28 |  1324    56    58    79    38  1858    70  1459    47 |  288   0.70
   29 |  1701   145    48   101    51  1091    48  1383   122 |  282   1.23
   30 |  2205    67    77    52    52  6360    46  2083     X |  288   1.95
   31 |  5215    65    36    86    84  4778    59  5152   107 |  288   4.68
 -----+-------------------------------------------------------+--------------
 ALBH |     -    44     -   125     -     -    42     -     - |  288   0.08
 ALGO |     -    33    34     X    25     -    26     -     - |  288   0.03
 AMC2 |     -    47     -     -     -     -    25     -     - |  283   0.04
 BAHR |     -    40    48    60    51     -    48     -     - |  288   0.32
 BRMU |     -    22     -    50    26     -     -     -     - |  288  30.14
 CAS1 |     -    88     -    52    29     -    47     -     - |  288   8.11
 CRO1 |     -    44     -    41     -     -    21     -     - |  288   0.09
 DARW |     -   195     -     -     -     -   110     -     - |  248  22.02
 DAV1 |     -    43     -     -    32     -     -     -     - |  288  17.18
 DRAO |     -    63    61     -     -     -     -     -     - |   96   0.10
 EISL |     -   102     -   136     -     -     -     -     - |  241  26.94
 FAIR |     -     -    92     -    96     -    64     -     - |  235   0.27
 GALA |     -   159     -    74    49     -    69     -     - |  288  38.80
 GODE |     -   152     -   203     -     -     -     -     - |  193  99.35
 GUAM |     -    50     -    50    46     -    51     -     - |  288  31.22
 HARB |     -    38     -     -    29     -     -     -     - |  287   1.56
 HOB2 |     -    60     -    59    52     -     -     -     - |  288   0.18
 HRAO |     -    72     -     -     -     -    39     -     - |  282  23.19
 IISC |     -    34     -    44    25     -     -     -     - |  288  41.32
 KERG |     -    31     -     -    28     -    29     -     - |  287   2.00
 KIRU |     -    28     -    38     -     -     -     -     - |  288   1.60
 KOSG |     -    34     -    46     -     -     -     -     - |  288  34.37
 KSTU |     -    75     -     -     -     -    42     -     - |  266  17.44
 KWJ1 |     -     -     -     -   179     -   133     -     - |  220  91.00
 MAC1 |     -    38     -    85    41     -    44     -     - |  288  16.48
 MALI |     -    31     -   119    54     -     -     -     - |  288  15.27
 MAS1 |     -    54    50   104    65     -    57     -     - |  288   2.36
 MATE |     -    27     -    42     -     -    16     -     - |  288   0.23
 MAW1 |     -    83     -     -    26     -    43     -     - |  288  18.12
 MDO1 |     -    61     -    82     -     -     -     -     - |  283   5.50
 MKEA |     -    45    46     -    77     -    59     -     - |  284  50.65
 MSKU |     -    39     -     -    29     -     -     -     - |  288  36.16
 NKLG |     -    39     -    52     -     -     -     -     - |  287    >>>
 NRC2 |     -    28    48    35     -     -     -     -     - |  288   0.04
 NYA1 |     -    57     -     -    43     -     -     -     - |  288   0.11
 NYAL |     -     -    19    27     -     -     -     -     - |   96   0.12
 ONSA |     -    37    44     -    26     -     -     -     - |  288   0.31
 PERT |     -    46     -    62     -     -     -     -     - |  288  16.34
 PIE1 |     -    80     -   106     -     -     -     -     - |  281   0.05
 REYK |     -    57     -    76     -     -     -     -     - |  288   7.91
 SANT |     -    37     -     X    40     -    38     -     - |  288  15.31
 SELE |     -    35     -    46     -     -     -     -     - |  267  32.10
 SFER |     -   222     -   296     -     -     -     -     - |  287  25.77
 STJO |     -    57    62   213    58     -     -     -     - |  288   1.39
 SUTH |     -   127     -   170     -     -     -     -     - |  286  20.69
 THTI |     -     -     -    84     -     -    35     -     - |  274   2.60
 TIDB |     -   117     -     -    89     -     -     -     - |  280    >>>
 TOW2 |     -    34     -     -     -     -    19     -     - |  278   9.69
 TRO1 |     -    22     -     -    38     -    25     -     - |  288  10.14
 TSKB |     -    41    88    59     -     -     -     -     - |  229   1.10
 URUM |     -    20     -     -    15     -     -     -     - |  288  35.97
 USNO |     -    18     -    25     -     -     X     -     - |  288   0.06
 USUD |     -    59     -    43     -     -    24     -     - |  288   0.20
 VILL |     -    21     -    28     -     -     -     -     - |  288  30.00
 WES2 |     -   150     -   200     -     -     -     -     - |  287   0.08
 WSRT |     -    15     -    20     -     -     -     -     - |  288   0.03
 WTZR |     -    56     -    63     -     -    14     -     - |  288   0.06
 WUHN |     -    26     -    26    21     -    17     -     - |  287  29.10
 YAR2 |     -    47     -   127     -     -    38     -     - |  287   6.44
 YELL |     -    67    64     -     -     -     -     -     - |   96   0.09
 -----+-------------------------------------------------------+--------------
 TOT  |  4513    88    89   114    73  4169    56  4397    87 |


 BEST CLOCK FIT: WSRT   288   0.03 (ns) 

