
 GPS week: 1144   Day: 5   MJD: 52257                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2683      0    -0.04    -0.07     5.64     0.00
 cod |   288     0  14602     29     1.21     0.34     0.11    20.17
 emr |    96     0   3913      0  1479.77    12.30     0.07    30.90
 gfz |   288     0  13717      0    -0.53    -0.16     0.08    27.31
 igu |    96     0   2395      0    -0.05     0.05     4.62     0.00
 jpl |   284    13   6459    177  -208.70   516.89   774.05     0.00
 ngs |    96     0   2683      1     0.01    -0.12     5.02     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0   7729      7   678.50     7.19     0.10    21.62

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -3752   122  -101    -9  1316****** -3613     -   -54 |
    2 | -8608  -133    19    91-17871****** -7264     -     - |
    3 | -2596     1  -127   130  2947****** -1935     -  -105 |
    4 | -1900  -113   -50    65 -5013****** -2356     -    48 |
    5 | -3715   129    78  -173     -****** -2961     -    60 |
    6 |  8231     9   -73    67 20097******  8153     -   -59 |
    7 |  3451   -20    44   -25  5491******  3181     -    29 |
    8 |  5991    67   -47   -35  8506******  5410     -     4 |
    9 | -4537   -81  -190   117  2229****** -3787     -    19 |
   10 | -2272    38   163   -38   409****** -1623     -   -64 |
   11 |  3699   -18  -111   -45  1152******  3629     -   126 |
   13 |  2572   -25   -66  -136  1010******  2539     -   232 |
   14 |  2591    68    18   -67  4230******  2638     -    12 |
   15 |  2952   -17    52   -45     -******  2214     -    49 |
   17 | -6027   -26    35    50-20289****** -5613     -   -56 |
   18 |   658  -159    14    45   233******  1195     -    85 |
   20 |  3873    34   -19   -24   769******  3937     -     8 |
   21 |  6958    51   -73   -11     -******  4821     -     2 |
   22 | -4974   306   -25  -121 -6354****** -4348     -  -121 |
   23 | -7222    43   120    46 -5502****** -6521     -  -155 |
   24 | -4856   -72    67   -36  -994****** -4739     -    80 |
   25 |  4735   123  -195    73  8748******  3414     -  -114 |
   26 | -5947  -160  -164   212 -3160****** -5418     -   -40 |
   27 | -2424     6    -9    79 -5803****** -2956     -  -101 |
   28 |  4898    96    81  -319  4037******  4967     -   275 |
   29 | -2039    77  -180    45  -586****** -1581     -   -43 |
   30 |  3194   101  -142     7 -9164******  2730     -   -35 |
   31 |  7422    25  -130    99 14330******  6300     -   -87 |
 -----+-------------------------------------------------------+
 ALGO |     -    50    90   -71     -******     -     -     - |
 BAHR |     -    52    64   -62     -******     -     -     - |
 BRMU |     -    13     -   -10     -     -     -     -     - |
 CAS1 |     -  -105     -    78     -******     -     -     - |
 DAV1 |     -   -68     -    51     -     -     -     -     - |
 DRAO |     -    12    -8     -     -     -     -     -     - |
 GUAM |     -    30     -   -22     -******     -     -     - |
 HOB2 |     -  -172   112     -     -     -     -     -     - |
 KARR |     -  -179     -   132     -     -     -     -     - |
 MAC1 |     -   -38     -    28     -     -     -     -     - |
 MAS1 |     -  -194   286    28     -******     -     -     - |
 MATE |     -   -14     9     -     -******     -     -     - |
 MAW1 |     -   123     -   -91     -     -     -     -     - |
 MCM4 |     -     9     -    -7     -     -     -     -     - |
 MKEA |     -  -181   118     -     -     -     -     -     - |
 NRC2 |     -   -88    58     -     -     -     -     -     - |
 NYA1 |     -    67     -   -50     -******     -     -     - |
 ONSA |     -  -176   115     -     -     -     -     -     - |
 PIE1 |     -    82   -54     -     -     -     -     -     - |
 RIOG |     -    32     -   -23     -******     -     -     - |
 SANT |     -    15     -   -11     -     -     -     -     - |
 STJO |     -   -28   159   -39     -     -     -     -     - |
 TIDB |     -     9     -    -6     -******     -     -     - |
 TRO1 |     -  -227     -   167     -     -     -     -     - |
 TSKB |     -    69   -45     -     -     -     -     -     - |
 WHIT |     -   104     -   -77     -     -     -     -     - |
 WUHN |     -   100     -   -74     -******     -     -     - |
 YELL |     -  -154   101     -     -     -     -     -     - |
 ZWEN |     -   -50     -    37     -     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5174   121    65    74  3615794518  4965     -    79 |  288   3.72
    2 |  4673   124    78   113  7463660335  4300     -     - |  288   1.43
    3 |  2907   236    71   210  2075743739  2911     -    82 |  288   1.54
    4 |  4071   100    81   173  2216781134  3777     -   182 |  288   0.80
    5 | 12715    71    73    75     -794498 11487     -    81 |  288   4.87
    6 | 16178   272    80   141 11521739598 13526     -    75 |  277   9.05
    7 |  5179   195    53    55  3353865850  4337     -   179 |  282   2.49
    8 |  9122    57    60    90  5307713337  7316     -    97 |  288   5.97
    9 |  3493   170    50   104  3937822879  3372     -    73 |  288   1.39
   10 |  3208   136    66    48  2584822877  3548     -   105 |  288   2.75
   11 |  1246    69   111    49   902713341  1138     -    85 |  288   0.37
   13 |  1365   101   122    76  1036734050  1292     -   170 |  288   0.29
   14 |  1194    85    36    37  2228781125  1078     -    68 |  288   0.25
   15 |  5837   103    43    40     -758288  5413     -   102 |  288   3.08
   17 |  2180    58    35    38 11569821664  1995     -    64 |  288   2.94
   18 |  1524    72    82    67  1051794507  1541     -    47 |  288   0.35
   20 |  1114   172    87    55   519822889  1180     -   106 |  288   0.34
   21 |  7034    94    96    63     -758290  6112     -    61 |  288   2.52
   22 |  1974   124    72    31  4005734023  2169     -    80 |  288   0.88
   23 |  7568   133    73   120  2189734027  7664     -    51 |  288   6.45
   24 |  2187   109    69    59  2970781128  2077     -    74 |  288   2.28
   25 |  6291    73    47    64  2900794523  6570     -    71 |  288   1.73
   26 |  2131    59    99    50  1404886824  1936     -    73 |  288   0.51
   27 |  4306   106   135    59  3460660342  3450     -    80 |  288   2.91
   28 |  1815   104    76    49  2820857194  1693     -   126 |  288   0.40
   29 |  2074   112    56    69   584821676  2248     -    75 |  288   0.88
   30 |  2296   143    65   161  5793781135  2291     -    97 |  288   1.48
   31 |  6383   196   132    98  5823834961  4978     -    64 |  285   3.42
 -----+-------------------------------------------------------+--------------
 ALGO |     -    45    40    28     -780361     -     -     - |  288   0.02
 BAHR |     -    27    42    32     -766954     -     -     - |  288   0.37
 BRMU |     -    41     -    30     -     -     -     -     - |  288  31.12
 CAS1 |     -    39     -    29     -788702     -     -     - |  288   8.64
 DAV1 |     -    50     -    37     -     -     -     -     - |  286  17.70
 DRAO |     -    28    19     -     -     -     -     -     - |   96   0.09
 GUAM |     -    48     -    35     -788704     -     -     - |  288  34.51
 HOB2 |     -    26    17     -     -     -     -     -     - |   96   0.06
 KARR |     -    39     -    29     -     -     -     -     - |  288  21.35
 MAC1 |     -    86     -    62     -     -     -     -     - |  288  19.09
 MAS1 |     -   186   107   125     -757217     -     -     - |  286   2.34
 MATE |     -    25    16     -     -351886     -     -     - |   96   0.13
 MAW1 |     -    48     -    35     -     -     -     -     - |  284  18.41
 MCM4 |     -    47     -    35     -     -     -     -     - |  287  10.77
 MKEA |     -    58    38     -     -     -     -     -     - |   94  49.50
 NRC2 |     -    72    46     -     -     -     -     -     - |   96   0.04
 NYA1 |     -    23     -    17     -777921     -     -     - |  288   0.08
 ONSA |     -    83    54     -     -     -     -     -     - |   96   0.14
 PIE1 |     -    31    20     -     -     -     -     -     - |   96   0.07
 RIOG |     -    50     -    37     -788705     -     -     - |  288  16.88
 SANT |     -    82     -    60     -     -     -     -     - |  241  19.95
 STJO |     -    38    47    32     -     -     -     -     - |  288   7.49
 TIDB |     -    74     -    55     -788704     -     -     - |  288   0.10
 TRO1 |     -    24     -    18     -     -     -     -     - |  288  11.47
 TSKB |     -    58    38     -     -     -     -     -     - |   91   2.01
 WHIT |     -    48     -    36     -     -     -     -     - |  288  83.91
 WUHN |     -    56     -    41     -783251     -     -     - |  286  38.07
 YELL |     -   117    76     -     -     -     -     -     - |   96   0.07
 ZWEN |     -    26     -    20     -     -     -     -     - |  288  24.93
 -----+-------------------------------------------------------+--------------
 TOT  |  5644   106    71    76  4618774047  5022     -    97 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

