
 GPS week: 1144   Day: 1   MJD: 52253                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2681      7    -0.13     0.25     4.40     0.00
 cod |   288     0  21721     21    -1.76     3.74     0.08    17.22
 emr |     0     0      0      0    -1.75     0.00     0.00     0.00
 esa |   288     0  17232   1849  1429.92    12.78     0.14     9.57
 gfz |   288     0  14618      7     0.01     0.50     0.07    23.05
 igu |    96     0   2489      6    -0.14     0.35     4.43     0.00
 jpl |   281     0  10643    268    -0.10     0.12     0.05    34.64
 ngs |    96     0   2681      7    -0.13     0.24     4.23     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0   8021      1   649.94     6.82     0.09    15.51

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -3330   -52     -   104   -64    68    47 -3795     -    55 |
    2 |  2134   -24     -   -18   156 15895     X  1240     -  -194 |
    3 |  5722  -105     -   -78    49 -2403    33  5978     -    54 |
    4 |  -785    28     -   174    45 -4134  -143  -808     -   -46 |
    5 |  1907    97     -   160  -132  6467    37  1958     -   -49 |
    6 | -4016    -8     -   -40    13 -5948   -43 -3476     -    53 |
    7 |   459    90     -   -44    89-15986  -107    85     -   -98 |
    8 | -7416    63     -  -151    23 -3113    89 -6733     -  -110 |
    9 |    18   -22     -   226    20  1233   -49  1607     -   -91 |
   10 |  -448    18     -   130    -5  1766   -72 -1001     -   -17 |
   11 |  2487   -86     -  -369    92   253     4  2839     -   182 |
   13 |  6294    58     -     3    23  3171  -181  6070     -    86 |
   14 |  2907    55     -   -96  -157  2243     7  2754     -   211 |
   15 | -2512  -141     -     -    77 16156   -22 -2839     -    67 |
   17 | -3952   -79     -   126    24     -   -21 -3675     -    -4 |
   18 |  7089  -186     -   303   -43  2478   -98  7042     -   194 |
   20 |  6321     6     -  -136  -123   910   136  5952     -   109 |
   21 | -1911    18     -   -25   -22 -1355   -22 -2197     -    53 |
   22 | -9829  -112     -     X  -116-15691   324 -8820     -   -64 |
   23 |   155    35     -     X    44     -    27   -87     -  -134 |
   24 | -3414    53     -    97   -90  1599   -70 -3377     -    87 |
   25 |  1490   -72     -   357   -20  3954    17  1319     -   -92 |
   26 | -1078   -89     -   154   163 -2819  -115 -1290     -  -121 |
   27 |  6658    76     -  -151   163  6542    11  5032     -  -246 |
   28 |  2584    16     -  -158  -120 -2294    10  2842     -   245 |
   29 |  1554    -9     -     X    -1   598     9  1339     -     2 |
   30 |  -688    82     -     6   -35-15984    32  -893     -   -78 |
   31 | -8788   -75     -  -357   153  5002    94 -7383     -   -59 |
 -----+-------------------------------------------------------------+
 ALBH |     -     1     -     X     -     -    -1     -     -     - |
 ALGO |     -    24     -     X   -82     -    45     -     -     - |
 AMC2 |     -   157     -     -     -     -   -78     -     -     - |
 AUCK |     -   -39     -     -     -     -    19     -     -     - |
 BAHR |     -    30     -   147   -62     -   -15     -     -     - |
 BILI |     -    87     -     -   -65     -     -     -     -     - |
 BRMU |     -   139     -  -423    72     -     -     -     -     - |
 CAS1 |     -  -130     -   100    39     -    11     -     -     - |
 CEDU |     -    85     -  -154     -     -     -     -     -     - |
 CRO1 |     -   -15     -   -80     -     -    31     -     -     X |
 DARW |     -    68     -     -     -     -   -34     -     -     - |
 DAV1 |     -   -17     -     -    13     -     -     -     -     - |
 GALA |     -    37     -  -533    25     -    98     -     -     - |
 GOLD |     -   171     -     -     -     -   -85     -     -     - |
 GUAM |     -   -53     -   139   -27     -     6     -     -     - |
 HOB2 |     -   130     -  -234     -     -     -     -     -     - |
 HRAO |     -   -89     -     -     -     -    44     -     -     - |
 KARR |     -  -120     -     -    89     -     -     -     -     - |
 KERG |     -   716     -     -     -     -  -356     -     -     - |
 KIRU |     -   -57     -   103     -     -     -     -     -     - |
 KOKB |     -     -     -     -    27     -   -18     -     -     - |
 KSTU |     -   -55     -     -     -     -    27     -     -     - |
 KWJ1 |     -     -     -     -   -60     -    40     -     -     - |
 MAC1 |     -   -46     -   183   -42     -     -     -     -     - |
 MAS1 |     -  -111     -   107   -32     -    48     -     -     - |
 MATE |     -  -105     -   189     -     -     X     -     -     - |
 MAW1 |     -    94     -     -   -71     -     -     -     -     - |
 MCM4 |     -   131     -  -415    76     -     -     -     -     - |
 MDO1 |     -   -16     -    29     -     -     -     -     -     - |
 MKEA |     -    13     -   -25     -     -     -     -     -     - |
 MSKU |     -   -25     -     -    19     -     -     -     -     - |
 NLIB |     -    65     -  -117     -     -     -     -     -     - |
 NYA1 |     -    52     -     -   -94     -    37     -     -     - |
 ONSA |     -  -131     -   294   -24     -     -     -     -     - |
 PERT |     -   -89     -   159     -     -     -     -     -     - |
 PIE1 |     -   -35     -    63     -     -     -     -     -     - |
 POTS |     -   -72     -   129     -     -     -     -     -     - |
 RIOG |     -   102     -     -  -148     -    49     -     -     - |
 SANT |     -   -88     -   150    13     -     -     -     -     - |
 SFER |     -   -73     -   131     -     -     -     -     -     - |
 STJO |     -   125     -  -433    56     -     -     -     -     - |
 THTI |     -     -     -  -355     -     -    98     -     -     - |
 TRO1 |     -  -157     -     -   118     -     -     -     -     - |
 TSKB |     -   121     -  -218     -     -     -     -     -     - |
 USUD |     -  -190     -   341     -     -     -     -     -     - |
 VILL |     -   -51     -    92     -     -     -     -     -     - |
 WHIT |     -    18     -     -   -14     -     -     -     -     - |
 WSRT |     -   106     -   245     -     -  -124     -     -     - |
 WTZR |     -   -85     -   176     -     -    -6     -     -     - |
 WUHN |     -     -     -   -76   -24     -    38     -     -     - |
 YAR2 |     -   -53     -  -203     -     -    86     -     -     - |
 YELL |     -   -77     -   139     -     -     -     -     -     - |
 YSSK |     -    18     -     -     -     -    -9     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6973    70     -   177    25  3462    25  7210     -   113 |  288   4.31
    2 |  5164   191     -   166   100  9695     X  4805     -    46 |  288   2.02
    3 |  6935    96     -   291    97  3252    34  6163     -   103 |  288   3.14
    4 |  1764    96     -   146    79  1200    62  1443     -   111 |  288   0.73
    5 |  3467    97     -   112    39  5286    32  3355     -    81 |  288   2.39
    6 | 10127   125     -   102    71  6264    31 10664     -    89 |  279   9.55
    7 |  3632   142     -   166   121  7700    49  3206     -   110 |  281   0.89
    8 |  6255    75     -    80    80  3302   113  6822     -    84 |  288   5.08
    9 |  6076   140     -   127    52  3913    32  3809     -    73 |  288   1.64
   10 |  2264   112     -   207    54  1944    36  2010     -    78 |  288   2.02
   11 |  2701    65     -   183    47  1216    41  2371     -    81 |  288   0.52
   13 |   758    79     -    88    43  1422    74   899     -    67 |  288   0.29
   14 |  1137    71     -   165    47  2146    49  1237     -    63 |  288   0.37
   15 |  4429    81     -     -    37  3653    34  4564     -    69 |  288   2.87
   17 |  2142    89     -   119    28     -    34  2040     -    80 |  288   2.63
   18 |   845    75     -    92    58  1500    42   865     -    58 |  288   0.35
   20 |   671   107     -   225    52  1018    57   817     -    98 |  288   0.27
   21 |  4563    97     -   115    68  3221    78  4712     -    75 |  288   3.19
   22 |  4312   117     -     X    61  9090   118  4310     -    88 |  288   1.05
   23 |  5491   114     -     X   109     -    42  5258     -   119 |  288   5.62
   24 |  2634    66     -   101   110  2801    56  2925     -    70 |  288   2.93
   25 |  2497    74     -   347    53  2530    90  2659     -   117 |  288   2.20
   26 |   708    96     -    65    63  1362    29   867     -    82 |  288   0.62
   27 |  5515    90     -    67    65  2348    31  3942     -   123 |  288   2.54
   28 |  2768    52     -    68    49  1554    30  2166     -    80 |  288   0.51
   29 |  1100   193     -     X    96   965    98  1139     -   122 |  285   1.07
   30 |  1734    54     -    80    62  8893    20  1641     -    74 |  288  59.01
   31 |  7383   130     -   223   123  4938    49  6965     -    91 |  280   3.72
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    56     -     X     -     -    28     -     -     - |  282   0.11
 ALGO |     -    37     -     X    32     -    18     -     -     - |  288   0.03
 AMC2 |     -    41     -     -     -     -    19     -     -     - |  282   0.04
 AUCK |     -    75     -     -     -     -    37     -     -     - |  264  16.68
 BAHR |     -    32     -    74    37     -    44     -     -     - |  288   0.53
 BILI |     -    52     -     -    39     -     -     -     -     - |  287  15.11
 BRMU |     -    31     -    86    26     -     -     -     -     - |  288  39.92
 CAS1 |     -    87     -    58    34     -    36     -     -     - |  288   8.32
 CEDU |     -    25     -    45     -     -     -     -     -     - |  288  12.80
 CRO1 |     -    59     -   146     -     -    26     -     -     X |  288   0.11
 DARW |     -    58     -     -     -     -    29     -     -     - |  272  26.51
 DAV1 |     -    41     -     -    30     -     -     -     -     - |  288  20.56
 GALA |     -    75     -    81    45     -    44     -     -     - |  288  35.61
 GOLD |     -    44     -     -     -     -    22     -     -     - |  278  24.66
 GUAM |     -    71     -   110   117     -    47     -     -     - |  288  31.30
 HOB2 |     -    46     -    83     -     -     -     -     -     - |  288   0.09
 HRAO |     -   151     -     -     -     -    75     -     -     - |  278  26.49
 KARR |     -    66     -     -    49     -     -     -     -     - |  287  19.90
 KERG |     -    90     -     -     -     -    45     -     -     - |  221   1.55
 KIRU |     -    85     -   153     -     -     -     -     -     - |  288   4.59
 KOKB |     -     -     -     -   155     -   103     -     -     - |  142   1.24
 KSTU |     -    50     -     -     -     -    25     -     -     - |  280  23.82
 KWJ1 |     -     -     -     -   177     -   118     -     -     - |  195  96.53
 MAC1 |     -    80     -   175   119     -     -     -     -     - |  288  18.80
 MAS1 |     -    43     -   160    38     -    28     -     -     - |  288   2.22
 MATE |     -    11     -    19     -     -     X     -     -     - |  142   0.10
 MAW1 |     -    36     -     -    27     -     -     -     -     - |  285  20.64
 MCM4 |     -    45     -    89    64     -     -     -     -     - |  288  34.26
 MDO1 |     -    98     -   177     -     -     -     -     -     - |  288  23.63
 MKEA |     -    74     -   132     -     -     -     -     -     - |  287  44.58
 MSKU |     -   117     -     -    87     -     -     -     -     - |  232  37.67
 NLIB |     -   100     -   179     -     -     -     -     -     - |  288   0.04
 NYA1 |     -    59     -     -    21     -    30     -     -     - |  288   0.07
 ONSA |     -    63     -    66    33     -     -     -     -     - |  288   0.14
 PERT |     -    20     -    36     -     -     -     -     -     - |  288  19.97
 PIE1 |     -   133     -   239     -     -     -     -     -     - |  288   0.22
 POTS |     -    46     -    83     -     -     -     -     -     - |  288  14.34
 RIOG |     -    44     -     -    36     -    34     -     -     - |  288  18.14
 SANT |     -    84     -   119    56     -     -     -     -     - |  287  16.86
 SFER |     -   103     -   185     -     -     -     -     -     - |  287  24.68
 STJO |     -    57     -   156    33     -     -     -     -     - |  288  11.40
 THTI |     -     -     -    68     -     -    19     -     -     - |  278   1.69
 TRO1 |     -    34     -     -    25     -     -     -     -     - |  286   9.39
 TSKB |     -    45     -    80     -     -     -     -     -     - |  256   2.00
 USUD |     -    52     -    93     -     -     -     -     -     - |  288   0.16
 VILL |     -    67     -   120     -     -     -     -     -     - |  288  29.96
 WHIT |     -    28     -     -    21     -     -     -     -     - |  288  28.56
 WSRT |     -    64     -    48     -     -    31     -     -     - |  288   0.05
 WTZR |     -    61     -    65     -     -    23     -     -     - |  288   0.03
 WUHN |     -     -     -    75    73     -    34     -     -     - |  287  37.12
 YAR2 |     -    29     -    60     -     -    17     -     -     - |  287   4.09
 YELL |     -   124     -   223     -     -     -     -     -     - |  268   0.06
 YSSK |     -    58     -     -     -     -    29     -     -     - |  279  20.74
 -----+-------------------------------------------------------------+--------------
 TOT  |  4405    84     -   139    69  4430    48  4230     -    90 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

