
 GPS week: 1143   Day: 6   MJD: 52251                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2660      0     0.03    -0.22     5.16     0.00
 cod |   288     0  24889    290     1.06    -2.18     0.07    20.92
 emr |    96     0   3987    100  1398.90    16.07     0.10    11.01
 esa |   288     0  18429    827  1386.34    15.68     0.11    10.98
 gfz |   288     0  14512    205    -0.07    -0.27     0.09    14.00
 igu |    96     0   2106      0     0.03    -0.31     3.56     0.00
 jpl |   282     0  11418    583     0.89    -1.63     0.06    24.09
 ngs |    96     0   2660      0     0.03    -0.22     4.99     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23460    741   692.50    -0.58     0.07    19.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  3864    50   -14   188     4  3884     5  2340     -  -168 |
    2 |  1152   -77  -138   -87   104  9627   -51   637     -   134 |
    3 |  7057   116   -63     X   -40  5732   205  6768     -  -183 |
    4 | -3927   -55   -32   182   178  -894   -92 -3895     -  -128 |
    5 | -9443    90  -162   152  -165-10985    37 -7528     -   -62 |
    6 |   -20    24  -125   155    80     -   -36   390     -  -129 |
    7 |  5544     8   -41     9   120 10774  -186  4939     -   -10 |
    8 |  -943    80  -152  -117   -54-14830     4  -940     -    47 |
    9 |  -702    -5  -109   100   155  -163    -1  -812     -  -145 |
   10 | -3600    80   -25  -113    73 -3919  -147 -2855     -    -4 |
   11 |  1755    -7   -97   242    21  -805    60  1733     -  -175 |
   13 |  3144   177   117   103   -58 -1287  -156  2995     -  -116 |
   14 |  2024    79   156   177  -228   911   136  1991     -  -155 |
   15 | -4982     5   178     -   -65     -    90 -5227     -   -34 |
   17 | -2203     -   102     X    16     -   -33 -2316     -     X |
   18 |  3946  -235    50   440    31 -1479     8  3994     -   -16 |
   20 |  4280    30   -70    38   -34  -454    75  4018     -   -51 |
   21 |  2153   -16    32    98    92     -   147  2084     -  -181 |
   22 | -3093    88  -172    90  -346  2215   324 -2575     -  -106 |
   23 | -5341    -2   -14    85   123     -    53 -4714     -  -157 |
   24 |  3590    26    27    72   173  -423  -163  2886     -   -79 |
   25 |  4268   116    -3   369   -53 11126    48  3448     -  -323 |
   26 |  1094   -21   -46    88   245 -1773   -19   766     -  -183 |
   27 | -2667    41  -162   -80   211 -4179  -104 -2766     -   -76 |
   28 |  1354    -8    14   -78  -156 -2085   -25  1655     -   177 |
   29 |  1019   145   -57    68   -40  1827   180  1044     -  -294 |
   30 | -2706   143   -72   227   -21 -2294    79 -2616     -  -297 |
   31 | -6930    31  -175    32    66     -   201 -5703     -  -220 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -63     -  -314     -     -    55     -     -   169 |
 ALGO |     -    -1    90     X    -9     -   -14     -     -     8 |
 AMC2 |     -   179     -     -     -     -  -216     -     -    70 |
 AUCK |     -   -39     -     -     -     -    -5     -     -    50 |
 BAHR |     -    16    98     -   -22     -   -17     -     -     - |
 BILI |     -   -14     -     -    21     -     -     -     -     - |
 BOR1 |     -   -29     -     -     -     -     -     -     -    32 |
 BRMU |     -   -10     -  -149   124     -     -     -     -     6 |
 CAS1 |     -  -155     -   137    47     -   -74     -     -   148 |
 CRO1 |     -   -48     -     0     -     -  -103     -     -   179 |
 DARW |     -  -119     -     -     -     -   103     -     -     - |
 DAV1 |     -   -46     -     -   -95     -     -     -     -   122 |
 DRAO |     -    92     5     -     -     -     -     -     -  -102 |
 EISL |     -    55     -  -105     -     -     -     -     -     - |
 FAIR |     -     -    64     -     -     -   -62     -     -    51 |
 FORT |     -   162     -  -308     -     -     -     -     -     - |
 GALA |     -     5     -    45     7     -   123     -     -  -191 |
 GODE |     -   -52     -     -     -     -     -     -     -    57 |
 GOLD |     -    30     -     -     -     -  -107     -     -   100 |
 GUAM |     -   -17     -    36     -     -  -139     -     -   169 |
 HOB2 |     -   -14   186  -257     -     -     -     -     -   128 |
 HRAO |     -   -96     -     -     -     -   -37     -     -   156 |
 KARR |     -   -85     -     -   127     -     -     -     -     - |
 KERG |     -    38     -     -     -     -     X     -     -   -42 |
 KIRU |     -   -27     -    51     -     -     -     -     -     - |
 KOKB |     -     -     -     -   -54     -    31     -     -     X |
 KOSG |     -   -76     -     -     -     -     -     -     -    83 |
 KWJ1 |     -     -     -     -  -122     -    36     -     -    37 |
 LPGS |     -   106     -     -     X     -     -     -     -  -117 |
 MAC1 |     -   -21     -   107  -240     -     -     -     -   140 |
 MAS1 |     -     X   130   -68     6     -   -36     -     -    53 |
 MAW1 |     -   114     -     -  -131     -     -     -     -   -29 |
 MCM4 |     -   100     -  -408    67     -     -     -     -    69 |
 MDO1 |     -   191     -  -597     -     -     -     -     -   135 |
 MKEA |     -   -10    81   -42     -     -     -     -     -    20 |
 MSKU |     -   -73     -     -   109     -     -     -     -     - |
 NKLG |     -  -208     -  -108     -     -     -     -     -   291 |
 NLIB |     -   -27     -   -40     -     -     -     -     -    52 |
 NPLD |     -    18     -     -     -     -     -     -     -   -20 |
 NRC2 |     -  -122    14   222     -     -     X     -     -     4 |
 NYA1 |     -    69     -     -   -18     -   -82     -     -    38 |
 NYAL |     -     -    16   120     -     -     -     -     -   -72 |
 ONSA |     -  -128     -    47    51     -     -     -     -    76 |
 PENC |     -   219     -     -     -     -     -     -     -  -242 |
 PERT |     -   -99     -   128     -     -     -     -     -    35 |
 PIE1 |     -   -61  -103  -254     -     -     -     -     -   234 |
 POTS |     -   -39     -    19     -     -     -     -     -    31 |
 REYK |     -   -80     -   154     -     -     -     -     -    -1 |
 RIOG |     -   -70     -     -   -20     -    45     -     -    36 |
 SFER |     -  -230     -  -214     -     -     -     -     -   380 |
 STJO |     -    28   217  -268  -127     -     -     -     -   164 |
 SUTH |     -  -371     -  -212     -     -     -     -     -   466 |
 THTI |     -     -     -  -224     -     -   137     -     -   -36 |
 THU1 |     -   129     -     -     -     -     -     -     -  -142 |
 TIXI |     -    23     -     -     -     -   -20     -     -     - |
 TRO1 |     -   -86     -     -   128     -     -     -     -     - |
 TROM |     -     -     -   159     -     -     -     -     -   -92 |
 TSKB |     -   199    92  -331  -140     -     -     -     -    63 |
 USNO |     -    48   159  -339     -     -    50     -     -    50 |
 USUD |     -   -68     -   185     -     -     -     -     -   -32 |
 VILL |     -   -78     -    19     -     -     -     -     -    75 |
 WHIT |     -   126     -     -  -188     -     -     -     -     - |
 WSRT |     -    71     -   137     -     -  -158     -     -    38 |
 WTZR |     -   -45     -   109     -     -   -55     -     -    53 |
 WUHN |     -   -37     -    62     1     -    42     -     -   -46 |
 YAR2 |     -  -291     -   -12     -     -   174     -     -   119 |
 YELL |     -   132     X  -252     -     -     -     -     -     X |
 YSSK |     -    31     -     -     -     -   -27     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  9074    68    81   125    63  2527    24  8455     -   131 |  288   4.64
    2 |  8157    57    83   192   222  8336    82  7721     -    63 |  288   3.91
    3 |  3468    90   149     X    92  3506    59  3701     -    57 |  281   3.59
    4 |  1549    61    63    75   105   779    31  1611     -    50 |  288   1.04
    5 |  4812    45    41    90    63  5608    30  5623     -    92 |  288   2.66
    6 | 12192   126   234   130   113     -   104 12128     -   132 |  280   9.76
    7 |  2300   147   101   101    75  5105    61  2311     -   172 |  281   2.91
    8 |  5833    50   152    72   120  7451    33  5665     -    53 |  288   5.15
    9 |  2754    81    49    82    76  1501    38  2910     -    64 |  288   1.50
   10 |  8460    80   108    52    59  3888   151  8242     -    60 |  288   3.99
   11 |   857    81   129    95    67   965    31   801     -   101 |  288   0.38
   13 |  1173    54   143    95    50  1266    65  1228     -    89 |  288   0.19
   14 |  1103    75    74    71   106   472    41  1041     -    93 |  288   0.24
   15 |  3551    88   149     -    65     -    48  3629     -    26 |  288   3.20
   17 |  2001     -   218     X   240     -   131  2362     -     X |  186   3.29
   18 |  1319    95    80   144   111  1023    38  1344     -    79 |  288   0.41
   20 |  2103   182   128   190    44   824    76  2069     -    45 |  288   0.18
   21 |  5479   100   133   237   106     -   101  5620     -    79 |  288   2.83
   22 |  7038    35    35    82   153  1899    52  6125     -    64 |  288   1.00
   23 |  6523    64   105   168    80     -    33  6386     -    59 |  288   5.55
   24 |  5711    69    40   132    66  1800    56  5500     -    46 |  288   2.01
   25 |  6373    70    28   134    70  6060   100  6234     -    80 |  288   2.73
   26 |  1090    52    87   158   112   879    31  1119     -    68 |  288   0.57
   27 |  2797    66   181    67    52  2767    37  2740     -    64 |  288   3.09
   28 |  1606    56   126   191   156  2040    29  1426     -    82 |  288   0.33
   29 |  1745    51   131    66    97  1008    51  1781     -   105 |  288   1.07
   30 |  2243   117    93    61    71  1045    40  1977     -    59 |  288   0.82
   31 |  7724   103   100   115   118     -    47  6383     -    41 |  281   5.11
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    45     -   132     -     -    38     -     -    53 |  288   0.05
 ALGO |     -    41    42     X    31     -    16     -     -    20 |  288   0.03
 AMC2 |     -    33     -     -     -     -    19     -     -    31 |  288   0.03
 AUCK |     -    58     -     -     -     -    47     -     -    92 |  264  14.58
 BAHR |     -    31   127     -   104     -    91     -     -     - |  275    >>>
 BILI |     -    31     -     -    47     -     -     -     -     - |  287  16.92
 BOR1 |     -    33     -     -     -     -     -     -     -    37 |  286   0.54
 BRMU |     -    29     -   101    86     -     -     -     -    31 |  288  37.88
 CAS1 |     -    43     -    65    26     -    28     -     -    34 |  288   9.23
 CRO1 |     -    55     -    89     -     -    46     -     -    55 |  288   0.10
 DARW |     -   138     -     -     -     -   120     -     -     - |  271  25.42
 DAV1 |     -    25     -     -    26     -     -     -     -    34 |  288  18.47
 DRAO |     -    58    42     -     -     -     -     -     -    57 |  288   0.07
 EISL |     -    40     -    76     -     -     -     -     -     - |  192  31.83
 FAIR |     -     -    99     -     -     -    93     -     -   123 |  223   0.08
 FORT |     -    51     -    97     -     -     -     -     -     - |   92   0.14
 GALA |     -    29     -   178    87     -    42     -     -    73 |  288  33.17
 GODE |     -    34     -     -     -     -     -     -     -    38 |  225   0.05
 GOLD |     -    42     -     -     -     -    13     -     -    46 |  288  28.99
 GUAM |     -   102     -   107     -     -    33     -     -    92 |  288  28.75
 HOB2 |     -    44    38    60     -     -     -     -     -    63 |  288   0.08
 HRAO |     -    41     -     -     -     -    21     -     -    41 |  288  25.17
 KARR |     -     9     -     -    13     -     -     -     -     - |  288  16.50
 KERG |     -    70     -     -     -     -     X     -     -    77 |  287   1.70
 KIRU |     -    21     -    40     -     -     -     -     -     - |  288   4.74
 KOKB |     -     -     -     -   143     -    83     -     -     X |  226   1.60
 KOSG |     -    30     -     -     -     -     -     -     -    33 |  286  20.61
 KWJ1 |     -     -     -     -   159     -   114     -     -    91 |  231 125.69
 LPGS |     -   178     -     -     X     -     -     -     -   196 |  192  19.46
 MAC1 |     -    72     -    78    41     -     -     -     -   102 |  288  16.87
 MAS1 |     -     X    28    88    83     -    27     -     -    30 |  288   2.35
 MAW1 |     -    49     -     -    51     -     -     -     -    30 |  270  27.20
 MCM4 |     -    46     -   276    89     -     -     -     -   191 |  288  26.95
 MDO1 |     -    27     -   116     -     -     -     -     -    64 |  287  26.55
 MKEA |     -    53    22    51     -     -     -     -     -    78 |  288  46.98
 MSKU |     -    40     -     -    60     -     -     -     -     - |  285  34.47
 NKLG |     -    48     -    55     -     -     -     -     -    50 |  287    >>>
 NLIB |     -    33     -    52     -     -     -     -     -    16 |  272   0.05
 NPLD |     -    23     -     -     -     -     -     -     -    25 |  285   0.05
 NRC2 |     -    29    57    46     -     -     X     -     -    36 |  286   0.04
 NYA1 |     -    73     -     -    41     -    65     -     -    35 |  288   0.10
 NYAL |     -     -    88   154     -     -     -     -     -    74 |  286   0.15
 ONSA |     -    40     -    42    58     -     -     -     -    48 |  288   0.23
 PENC |     -    37     -     -     -     -     -     -     -    41 |  285   9.64
 PERT |     -    46     -    75     -     -     -     -     -    37 |  288  19.90
 PIE1 |     -    51    33   102     -     -     -     -     -    27 |  288   0.17
 POTS |     -    43     -    36     -     -     -     -     -    35 |  288  14.71
 REYK |     -    59     -    49     -     -     -     -     -    49 |  288   9.04
 RIOG |     -    69     -     -    63     -    57     -     -    76 |  276  18.17
 SFER |     -    53     -    54     -     -     -     -     -    38 |  287   1.26
 STJO |     -    43    36   138    33     -     -     -     -    50 |  288  17.68
 SUTH |     -   107     -    83     -     -     -     -     -    94 |  247  47.82
 THTI |     -     -     -    57     -     -    64     -     -    93 |  287   4.48
 THU1 |     -    46     -     -     -     -     -     -     -    50 |  252  26.28
 TIXI |     -    52     -     -     -     -    46     -     -     - |  282  12.27
 TRO1 |     -    36     -     -    54     -     -     -     -     - |  288  10.27
 TROM |     -     -     -    31     -     -     -     -     -    18 |  286  11.18
 TSKB |     -    19    34    72    61     -     -     -     -    50 |  288   0.82
 USNO |     -    39    77    83     -     -    31     -     -    32 |  288   0.03
 USUD |     -    64     -    68     -     -     -     -     -    55 |  288   0.31
 VILL |     -    33     -    33     -     -     -     -     -    24 |  288  28.45
 WHIT |     -    20     -     -    30     -     -     -     -     - |  288  15.33
 WSRT |     -    28     -    26     -     -    17     -     -    36 |  288   0.05
 WTZR |     -    52     -    37     -     -    30     -     -    32 |  288   0.05
 WUHN |     -    51     -    70    44     -    23     -     -    34 |  287  32.03
 YAR2 |     -    40     -    73     -     -    22     -     -    45 |  288   4.16
 YELL |     -    27     X    52     -     -     -     -     -     X |  287   0.06
 YSSK |     -    22     -     -     -     -    19     -     -     - |  280  20.84
 -----+-------------------------------------------------------------+--------------
 TOT  |  5164    65   104   107    91  3559    57  4993     -    71 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

