
 GPS week: 1143   Day: 2   MJD: 52247                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2677      0    -0.28    -0.14     4.95     0.00
 cod |   288     0  20929     14    -0.75    -1.52     0.10    19.72
 esa |   288     0  17192    973  1336.03    -9.30     0.11    18.41
 gfz |   288     0  14480      0    -0.54    -0.09     0.11    18.14
 igu |    96     0   2200      0    -0.32    -0.16     3.74     0.00
 jpl |    96    10   2346      0    -0.21    -0.16     0.09    22.76
 ngs |    96     0   2677      0    -0.29    -0.13     4.71     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16527    280   586.96    10.48     0.10    20.97

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 | -9583    46    66  -150-16372   -37 -9214     -    41 |
    2 | -3268    72   -92    37  1812   143 -3278     -   -63 |
    3 |  4236  -140   201    46  4374   -22  4492     -   -67 |
    4 | -4268   112   148    -2-10432  -144 -3977     -  -189 |
    5 |  6540   135   242  -196 11872    48  5625     -  -184 |
    6 | -1818  -113    41   125     -  -144 -1311     -    13 |
    7 |  3942    33    71    45-10217    37  1739     -  -140 |
    8 |  2048   206  -144     6-14956    77  2122     -   -97 |
    9 | -1032    66   262  -107  5437   103 -1208     -  -233 |
   10 | -3988    75    38     0 -8549   -76 -3044     -   -80 |
   11 |  3893  -146   137   -25   153   -18  3756     -    42 |
   13 |  4308    67     2  -125  1098  -247  4604     -   121 |
   14 |  3120   -32    11   -56  2501    72  3338     -    45 |
   15 | -5428   -92     -   193 -2402   -84 -5060     -   -55 |
   17 | -3074    67     X   200     -   -92 -2616     -  -205 |
   18 |  4090  -250   249   112  1282  -131  4220     -   -38 |
   20 |  5058   -79   152   -75   357    45  5127     -    -9 |
   21 | -4779   -14   -38   200     -   -35 -4402     -  -115 |
   22 |  1125   110  -244    31   978   352   810     -   -27 |
   23 |  1165    42   237    57     -   100   591     -  -329 |
   24 | -7772    51     4    60 -2930  -176 -6936     -   -47 |
   25 |  5362    46   -13    63 13299    25  4555     -   -95 |
   26 | -2641    20    61   165 15066   -43 -2368     -  -202 |
   27 |  2364   134  -141   142  5588    36  1987     -  -136 |
   28 |  7452    93     4  -158  6175    71  6282     -    23 |
   29 | -2071  -120     X   164     -     8 -2135     -   -30 |
   30 | -5509    75    86    27 -1807   -19 -5051     -  -163 |
   31 |   666    72  -139    -1 -2652   142  1479     -     - |
 -----+-------------------------------------------------------+
 ALBH |     -  -201   216     -     -     -     -     -     - |
 ALGO |     -    -6     X   -93     -     -     -     -    86 |
 AUCK |     -  -140     -     -     -     -     -     -   131 |
 BILI |     -    84     -   -91     -     -     -     -     - |
 BRMU |     -   -19  -176   167     -     -     -     -    28 |
 CAS1 |     -  -195     -     4     -     -     -     -   180 |
 CRO1 |     -    46   -49     -     -     -     -     -     - |
 DAV1 |     -  -102     -   -35     -     -     -     -   126 |
 DRAO |     -    38     -     -     -     -     -     -   -35 |
 EISL |     -     5    -5     -     -     -     -     -     - |
 FAIR |     -     -  -252     -     -     -     -     -   222 |
 GALA |     -  -100     -   108     -     -     -     -     - |
 GRAZ |     -   -66     -     -     -     -     -     -    62 |
 GUAM |     -   -95    -7   -33     -     -     -     -   124 |
 HOB2 |     -  -181   120     -     -     -     -     -    64 |
 KARR |     -  -209     -   227     -     -     -     -     - |
 KERG |     -    35     -     -     -     -     -     -   -33 |
 KIRU |     -    67   -72     -     -     -     -     -     - |
 KOKB |     -     -   -33   -97     -     -     -     -   110 |
 KOSG |     -   -21    22     -     -     -     -     -     - |
 KWJ1 |     -     -     -  -313     -     -     -     -   271 |
 LPGS |     -   193     -  -209     -     -     -     -     - |
 MAC1 |     -    94    85  -189     -     -     -     -     - |
 MAS1 |     -  -120   -96    93     -     -     -     -   117 |
 MATE |     -   527   186     -     -     -     -     -  -469 |
 MAW1 |     -    74     -   -81     -     -     -     -     - |
 MCM4 |     -     -  -171    27     -     -     -     -   128 |
 MDO1 |     -    25   -27     -     -     -     -     -     - |
 NLIB |     -   131  -141     -     -     -     -     -     X |
 NRC2 |     -    83   -89     -     -     -     -     -     - |
 NTUS |     -  -203     -     -     -     -     -     -   191 |
 NYA1 |     -    23     -   -25     -     -     -     -     - |
 NYAL |     -     -    95     -     -     -     -     -   -84 |
 ONSA |     -   -74    37     -     -     -     -     -    38 |
 PERT |     -   -94  -105     -     -     -     -     -   181 |
 PIE1 |     -   -56    82     -     -     -     -     -   -19 |
 POTS |     -    50     -   -54     -     -     -     -     - |
 REYK |     -   -71    76     -     -     -     -     -     - |
 SANT |     -   135  -226   -75     -     -     -     -   136 |
 SFER |     -   -48    51     -     -     -     -     -     - |
 STJO |     -   110  -171    40     -     -     -     -     - |
 THTI |     -     -  -126     -     -     -     -     -   110 |
 TIDB |     -    40     -   -43     -     -     -     -     - |
 TSKB |     -   202  -335     -     -     -     -     -   119 |
 URUM |     -   -21     -   -97     -     -     -     -   103 |
 USNO |     -   192  -439     -     -     -     -     -   204 |
 USUD |     -   -76    82     -     -     -     -     -     - |
 VILL |     -   -25    27     -     -     -     -     -     - |
 WHIT |     -    56     -   -61     -     -     -     -     - |
 WSRT |     -    28   -23     -     -     -     -     -    -6 |
 WTZR |     -  -110    29     -     -     -     -     -    78 |
 WUHN |     -   -18   120   -15     -     -     -     -   -81 |
 YAR2 |     -  -145   155     -     -     -     -     -     - |
 YELL |     -    18     X     -     -     -     -     -   -17 |
 ZWEN |     -     -     -  -245     -     -     -     -   212 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  3999    71   112   142  5082    40  3424     -    49 |  288   3.86
    2 |  4657    92    79   189  2901    59  4548     -   113 |  288   3.01
    3 |  4839   153   233   356  4590    65  4520     -   145 |  281   2.86
    4 |   809   162    89   144  4561    55   941     -    93 |  288   0.75
    5 |  6243    69    75    41  9702    77  5573     -    69 |  288   3.35
    6 | 10065   205    88   165     -   110 10344     -    84 |  281   9.05
    7 | 12900   202   127   159  3740   104 11919     -   164 |  282   0.83
    8 |  6568   110    49    62  5244    53  6681     -    88 |  288   6.55
    9 |  4075   113    80    70  1915    87  4018     -    57 |  288   1.91
   10 |  5845    88   174   105  4338    62  5576     -    38 |  288   2.98
   11 |  1754    94    92    48   476   102  1598     -    38 |  288   0.36
   13 |  1346    75    41    40   755    94  1212     -    66 |  288   0.24
   14 |   568    62   124    58  1266    52   468     -    73 |  288   0.27
   15 |  3293    89     -    95  2523   146  3003     -    70 |  286   2.90
   17 |  1707   310     X   136     -    98  1560     -   200 |  288   3.56
   18 |   700   145   104    74   540    57   702     -    62 |  288   0.41
   20 |   751    95    52    65   540   113   825     -    37 |  288   0.19
   21 |  2469    97   162    80     -   123  2438     -   183 |  288   1.45
   22 |  3027    87   260    62  2221    90  2414     -   168 |  288   0.44
   23 |  9348    85    82    92     -    62  8912     -    88 |  288   6.38
   24 |  3339   160   168    48  3644    96  3461     -    44 |  288   1.67
   25 |  2963    63    46    85  3804    74  3652     -    39 |  288   1.21
   26 |   864    68   102    82  4859    51   977     -    79 |  288   0.67
   27 |  3846    70   127    48  2642    33  3253     -    87 |  288   2.58
   28 |  4840    92   103    53  1677    49  4331     -    60 |  288   1.36
   29 |  1341   120     X   133     -    76  1085     -    59 |  288   0.63
   30 |  3383   106   110    66   960   221  3036     -    68 |  288   2.00
   31 |  6516   242   131   250  3738    89  5921     -     - |  281   4.01
 -----+-------------------------------------------------------+--------------
 ALBH |     -   198   212     -     -     -     -     -     - |  285   0.12
 ALGO |     -    29     X    35     -     -     -     -    34 |  288   0.04
 AUCK |     -    82     -     -     -     -     -     -    77 |  264  23.24
 BILI |     -    41     -    44     -     -     -     -     - |  286  16.92
 BRMU |     -    25    57    40     -     -     -     -    61 |  288  31.32
 CAS1 |     -    48     -    81     -     -     -     -    63 |  285   9.38
 CRO1 |     -   124   132     -     -     -     -     -     - |  195    >>>
 DAV1 |     -   161     -    93     -     -     -     -    80 |  288  19.01
 DRAO |     -    31     -     -     -     -     -     -    29 |  288   0.11
 EISL |     -    64    69     -     -     -     -     -     - |  128  19.94
 FAIR |     -     -   133     -     -     -     -     -   116 |  223   0.12
 GALA |     -    25     -    28     -     -     -     -     - |  275  32.52
 GRAZ |     -    80     -     -     -     -     -     -    75 |  287    >>>
 GUAM |     -    66    74    55     -     -     -     -    32 |  288  33.28
 HOB2 |     -    87    39     -     -     -     -     -    69 |  288   0.08
 KARR |     -    32     -    35     -     -     -     -     - |  288  19.79
 KERG |     -    73     -     -     -     -     -     -    69 |  286   1.36
 KIRU |     -    46    49     -     -     -     -     -     - |  277   2.03
 KOKB |     -     -   186   223     -     -     -     -   318 |  288   0.32
 KOSG |     -    57    62     -     -     -     -     -     - |  276  55.05
 KWJ1 |     -     -     -   217     -     -     -     -   187 |  172  75.70
 LPGS |     -    70     -    76     -     -     -     -     - |  102  22.00
 MAC1 |     -   157    69   133     -     -     -     -     - |  288  17.72
 MAS1 |     -    39    68    46     -     -     -     -    21 |  288   2.61
 MATE |     -   239   141     -     -     -     -     -   230 |  206   0.20
 MAW1 |     -    48     -    52     -     -     -     -     - |  288  27.11
 MCM4 |     -     -    82    82     -     -     -     -    31 |  288  92.91
 MDO1 |     -    65    70     -     -     -     -     -     - |  276   5.29
 NLIB |     -    34    36     -     -     -     -     -     X |  279   0.04
 NRC2 |     -    33    36     -     -     -     -     -     - |  276   0.06
 NTUS |     -    52     -     -     -     -     -     -    49 |  288   6.58
 NYA1 |     -    30     -    32     -     -     -     -     - |  288   0.07
 NYAL |     -     -   143     -     -     -     -     -   126 |  276   0.10
 ONSA |     -    64    53     -     -     -     -     -    59 |  288   0.40
 PERT |     -    22    32     -     -     -     -     -    38 |  288  18.84
 PIE1 |     -    26    72     -     -     -     -     -    46 |  288   0.06
 POTS |     -    70     -    76     -     -     -     -     - |  255  17.10
 REYK |     -    63    68     -     -     -     -     -     - |  277   9.12
 SANT |     -    43    93    43     -     -     -     -    95 |  288  17.73
 SFER |     -    56    60     -     -     -     -     -     - |  275  81.93
 STJO |     -   118   227    96     -     -     -     -     - |  288  22.28
 THTI |     -     -    38     -     -     -     -     -    33 |  274   4.37
 TIDB |     -    72     -    78     -     -     -     -     - |  288   0.11
 TSKB |     -    61    76     -     -     -     -     -    51 |  265   0.79
 URUM |     -    22     -    25     -     -     -     -    24 |  288  46.36
 USNO |     -    45    37     -     -     -     -     -    31 |  288   0.08
 USUD |     -    53    56     -     -     -     -     -     - |  278   0.42
 VILL |     -    52    56     -     -     -     -     -     - |  276  37.46
 WHIT |     -    57     -    62     -     -     -     -     - |  288  25.96
 WSRT |     -    76    61     -     -     -     -     -    66 |  288   0.04
 WTZR |     -    72    51     -     -     -     -     -    69 |  288   0.09
 WUHN |     -    45    59    31     -     -     -     -    14 |  287  36.42
 YAR2 |     -    43    46     -     -     -     -     -     - |  219 189.90
 YELL |     -    21     X     -     -     -     -     -    20 |  288   0.06
 ZWEN |     -     -     -    33     -     -     -     -    28 |  238  27.13
 -----+-------------------------------------------------------+--------------
 TOT  |  4947   100   108   108  3736    91  4712     -    95 |


 BEST CLOCK FIT: NLIB   279   0.04 (ns) 

