
 GPS week: 1143   Day: 0   MJD: 52245                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2673      0    -0.15     0.12     4.37     0.00
 cod |   288     0  24938     37    -1.25     1.33     0.09    23.56
 emr |    96     0   3889    409  1300.61    17.32     0.18     7.41
 esa |   288     0  17318    445  1289.29    17.35     0.11    17.18
 gfz |   288     0  14777    441    -0.49     0.48     0.09    21.59
 igu |    96     0   2289     94  5510.76 -5489.57     3.16     0.00
 jpl |    96     8   2012    502     0.80    -1.46     0.19     6.35
 ngs |    96     0   2673      0    -0.15     0.09     4.21     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23211    113   690.12     2.19     0.09    23.90

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  2505   109    47    55    27 10898  -115  1779     -  -169 |
    2 |  2407   109     X    94   174  9637  -611  1934     -  -290 |
    3 | -2158    76    57   154     X -9230     X -2742     -  -196 |
    4 | -2317    45  -114    -2   115  1344   -23 -2101     -  -133 |
    5 |   346   156  -222   230  -156 -3526     X   873     -  -155 |
    6 |  2283   -29    44   234   -16     X   201  1666     -  -130 |
    7 |  7616     2     X    62   182 -6907  -571  6429     -  -181 |
    8 | -3723   126     X   180   -22   207  -430 -3675     -  -205 |
    9 | -5285   118  -197    69     5 -1228     3 -4730     -  -150 |
   10 | -2145    59   -85    98   -17 -2292    56 -2241     -  -109 |
   11 |  6186   -39   191    52    20 -1381  -150  5711     -   -27 |
   13 |  3654    86   211   -84  -156   982   -32  3892     -    97 |
   14 |  1721    59    71    13   -91 -1423   221  1757     -    -5 |
   15 |-10281   -40   -57     -    90     -   285 -9220     -   -56 |
   17 |  3269    38   -85    26    94     -   225  2964     -  -148 |
   18 |  4930  -129   -31   -41    41 -1429   182  4961     -   110 |
   20 |  4844    55   -64   243  -152   932   131  5183     -   -92 |
   21 | -7351    38  -165     X    24     -    82 -7150     -   -48 |
   22 | -7379    83  -259   154    83-10276   104 -6436     -  -249 |
   23 |  4805    10  -273   326     0     -   505  4429     -  -253 |
   24 | -1367    -5    79   135   -76  1935     X -1487     -   -31 |
   25 | -1638   160   -41    34    53   883     X -1351     -  -226 |
   26 | -2730    67  -336   -52   147   342    -3 -2667     -  -125 |
   27 |  4735    24    -9   -52   165  3252  -269  5637     -  -134 |
   28 |  5150    69   276   -81   -96   547     X  4996     -    51 |
   29 | -1665    47  -244   -16   105 -2375   244 -1680     -  -125 |
   30 |    44   158  -241    97   -85 -3651     X  -337     -  -123 |
   31 | -6566   -49   201   -56   220 12181  -129 -6590     -  -120 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -65     -   -30     -     -     -     -     -    86 |
 ALGO |     -   -56    95     X   -26     -     -     -     -    46 |
 AMC2 |     -   -53     -     -     -     -     -     -     -    52 |
 AOML |     -  -171     -     -     -     -     -     -     -   169 |
 ARTU |     -   186     -   -62  -153     -     -     -     -     - |
 BAHR |     -    32   126   -28   -90     -     -     -     -    58 |
 BILI |     -    91     -     -  -100     -     -     -     -     - |
 BOR1 |     -   -21     -   -42     -     -     -     -     -    51 |
 BRMU |     -    43     -  -320    24     -     -     -     -   166 |
 BRUS |     -    11     -     -     -     -     -     -     -   -11 |
 CAS1 |     -  -216     -    90    27     -     -     -     -   124 |
 CRO1 |     -   -79     -   -85     -     -     -     -     -   140 |
 DAV1 |     -   -98     -     -    29     -     -     -     -    70 |
 DRAO |     -    33    18     -     -     -     -     -     -   -34 |
 EISL |     -   -38     -    52     -     -     -     -     -     - |
 FAIR |     -     -    59     -     -     -     -     -     -   -18 |
 FLIN |     -    18     -   -25     -     -     -     -     -     - |
 FORT |     -   138     -  -189     -     -     -     -     -     - |
 GALA |     -   -27     -  -100   -65     -     -     -     -   158 |
 GODE |     -   -67     -     -     -     -     -     -     -    66 |
 GOLD |     -  -101     -     -     -     -     -     -     -   100 |
 GRAZ |     -     3     -    -5     -     -     -     -     -     - |
 GUAM |     -   -67     -    -4    59     -     -     -     -    15 |
 HOB2 |     -   -59   117   -62     -     -     -     -     -    91 |
 KARR |     -  -182     -     -   198     -     -     -     -     - |
 KIRU |     -   119     -  -163     -     -     -     -     -     - |
 KOKB |     -     -     -     -   -65     -     -     -     -    59 |
 KSTU |     -   -51     -     -     -     -     -     -     -    50 |
 KWJ1 |     -    33     -     -   -98     -     -     -     -    45 |
 LPGS |     -    75     -     -     X     -     -     -     -   -74 |
 MAC1 |     -    10     -    -3  -204     -     -     -     -   178 |
 MAS1 |     -    98   211  -189  -160     -     -     -     -   156 |
 MATE |     -   -37   -20     -     -     -     -     -     -    38 |
 MAW1 |     -   -53     -     -     -     -     -     -     -    52 |
 MCM4 |     -   -70     -  -142    30     -     -     -     -   144 |
 MDO1 |     -  -113     -   -89     -     -     -     -     -   176 |
 MEDI |     -   -38     -     -     -     -     -     -     -    37 |
 METS |     -    96     -     -     -     -     -     -     -   -94 |
 MKEA |     -    33     -  -239     -     -     -     -     -   139 |
 NPLD |     -   -19     -     -     -     -     -     -     -    19 |
 NRC2 |     -   120   254  -168     -     -     -     -     -   -24 |
 NTUS |     -    16     -     -   -23     -     -     -     -     5 |
 OHIG |     -   -98     -  -166    32     -     -     -     -   187 |
 ONSA |     -  -119     -    99     -     -     -     -     -    46 |
 PENC |     -   273     -     -     -     -     -     -     -  -269 |
 PERT |     -  -284     -   470     -     -     -     -     -   -66 |
 PIE1 |     -  -149   -19   -61     -     -     -     -     -   193 |
 POTS |     -   -39     -     -     -     -     -     -     -    39 |
 REYK |     -   -17     -    18     -     -     -     -     -     3 |
 RIOG |     -   -78     -     -    38     -     -     -     -    43 |
 SANT |     -   -12     -     -    -3     -     -     -     -    15 |
 SFER |     -  -276     -     -     -     -     -     -     -   272 |
 STJO |     -  -109   246  -267    30     -     -     -     -   232 |
 TRO1 |     -  -122     -     -   133     -     -     -     -     - |
 TROM |     -     -     -     6     -     -     -     -     -    -5 |
 TSKB |     -   156     3   167     -     -     -     -     -  -348 |
 URUM |     -    -6     -     -  -103     -     -     -     -    99 |
 USNO |     -   119     -  -422     -     -     -     -     -   185 |
 USUD |     -   -34     -    66     -     -     -     -     -   -15 |
 VILL |     -   -66    71     0     -     -     -     -     -    58 |
 WHIT |     -   105     -     -  -115     -     -     -     -     - |
 WSRT |     -   -22     -     -     -     -     -     -     -    22 |
 WTZR |     -   -87     -     1     -     -     -     -     -    85 |
 YELL |     -    37    57   -35     -     -     -     -     -   -16 |
 ZWEN |     -     -     -     -  -124     -     -     -     -   112 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4319    68   102   148    44  4637   168  4054     -    36 |  288   3.88
    2 |  2719   264     X    61   152  4259   143  2665     -   194 |  287   2.29
    3 |  4552   227   349   220     X  2665     X  3546     -   350 |  270   1.72
    4 |  3073    76    75    73    70  1289   208  3236     -    47 |  288   0.62
    5 |  5536    79   111    26    85  7545     X  5319     -    40 |  288   4.37
    6 | 10841   164   234   122   151     X   174  9579     -    86 |  280   9.99
    7 |  3832   241     X   171   114  3997   276  3564     -   142 |  282   1.74
    8 |  6588    55     X   148    68  3002   287  6736     -   163 |  288   5.76
    9 |  2479    53    95    93    85  1272   209  2785     -    38 |  288   1.18
   10 |  2420   103   257   183    73  2072   152  2852     -   112 |  288   1.59
   11 |  2512    58   212   132    89   669   247  2464     -    62 |  288   0.47
   13 |   682    56    97    84    80   680   175   755     -   139 |  288   0.22
   14 |  1366    36   271   105    76   433   179  1435     -    49 |  288   0.33
   15 |  3232    70   166     -    54     -   132  3142     -    69 |  288   3.44
   17 |  3576    93   207   144    67     -   104  3572     -    90 |  288   3.27
   18 |   945    85   232   157   235   530   143  1188     -    86 |  288   0.36
   20 |  1499   127   270   125    59   910   259  1418     -    58 |  288   0.17
   21 |  3102   115   218     X   101     -   174  3076     -    67 |  288   2.50
   22 |  3186    82   272    62    53  5515   249  3327     -    48 |  288   1.29
   23 |  7963   136   200   302   208     -   170  7947     -   148 |  288   5.94
   24 |  3698    78   196    80    72  1904     X  3541     -    36 |  288   2.33
   25 |  6808    45   142    50    59  3024     X  6634     -    35 |  288   2.09
   26 |  1197   101   246   195    46  1126   121  1190     -    41 |  288   0.46
   27 |  7669    91   203    87    43  2911   243  7459     -    75 |  288   3.03
   28 |  1670    83   329    54    49  1581     X  1655     -    57 |  288   0.78
   29 |  2241   118   263   217   106  2087   165  2195     -    67 |  288   2.04
   30 |  2547    66   134    46    69   986     X  2556     -    33 |  288   1.05
   31 |  3820    56   344    93    53  5812   186  3920     -    97 |  283   3.28
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    68     -   188     -     -     -     -     -    76 |  288   0.05
 ALGO |     -    28    51     X    36     -     -     -     -    22 |  132   0.05
 AMC2 |     -    19     -     -     -     -     -     -     -    19 |  286   0.02
 AOML |     -    50     -     -     -     -     -     -     -    50 |  286  19.69
 ARTU |     -    14     -    47    34     -     -     -     -     - |  279  23.29
 BAHR |     -    40   134    91    97     -     -     -     -   144 |  288   0.40
 BILI |     -    35     -     -    38     -     -     -     -     - |  287  16.85
 BOR1 |     -    24     -    30     -     -     -     -     -    14 |  288    >>>
 BRMU |     -    30     -    43    43     -     -     -     -    30 |  288  34.76
 BRUS |     -    29     -     -     -     -     -     -     -    29 |  286   0.08
 CAS1 |     -   104     -    69    41     -     -     -     -    44 |  288   9.32
 CRO1 |     -    87     -    75     -     -     -     -     -    77 |  288   0.12
 DAV1 |     -    47     -     -    42     -     -     -     -    23 |  288  17.70
 DRAO |     -    24    88     -     -     -     -     -     -    21 |  288   0.04
 EISL |     -    60     -    82     -     -     -     -     -     - |  192  40.08
 FAIR |     -     -    55     -     -     -     -     -     -    17 |   96   0.08
 FLIN |     -    18     -    25     -     -     -     -     -     - |  288  16.02
 FORT |     -    58     -    79     -     -     -     -     -     - |  157   0.16
 GALA |     -    39     -    31    29     -     -     -     -    66 |  288  33.70
 GODE |     -    49     -     -     -     -     -     -     -    48 |  286   0.21
 GOLD |     -    29     -     -     -     -     -     -     -    29 |  286  24.99
 GRAZ |     -   126     -   172     -     -     -     -     -     - |  279  13.99
 GUAM |     -    43     -    88    64     -     -     -     -    56 |  288  33.73
 HOB2 |     -   101    92    68     -     -     -     -     -    49 |  288   0.12
 KARR |     -    47     -     -    51     -     -     -     -     - |  288  18.72
 KIRU |     -    22     -    31     -     -     -     -     -     - |  288   2.01
 KOKB |     -     -     -     -   259     -     -     -     -   234 |  272   0.28
 KSTU |     -   128     -     -     -     -     -     -     -   126 |  270  16.97
 KWJ1 |     -   174     -     -   167     -     -     -     -   241 |  249 139.64
 LPGS |     -   221     -     -     X     -     -     -     -   218 |  171  17.23
 MAC1 |     -    95     -    90    63     -     -     -     -    43 |  288  20.21
 MAS1 |     -    82   140    82   144     -     -     -     -    52 |  287   1.89
 MATE |     -    18   103     -     -     -     -     -     -    18 |  288   0.17
 MAW1 |     -    54     -     -     -     -     -     -     -    53 |  286  22.07
 MCM4 |     -   171     -   146   129     -     -     -     -   115 |  287    >>>
 MDO1 |     -    29     -    40     -     -     -     -     -    14 |  288  25.63
 MEDI |     -    20     -     -     -     -     -     -     -    20 |  286   0.41
 METS |     -    17     -     -     -     -     -     -     -    17 |  285   0.38
 MKEA |     -    30     -    44     -     -     -     -     -    26 |  288  45.80
 NPLD |     -    29     -     -     -     -     -     -     -    28 |  285   0.05
 NRC2 |     -    23    56    36     -     -     -     -     -    20 |  288   0.05
 NTUS |     -   146     -     -    61     -     -     -     -    93 |  288   6.98
 OHIG |     -    44     -    90    64     -     -     -     -    21 |  288  17.43
 ONSA |     -    28     -    43     -     -     -     -     -    19 |  276   0.31
 PENC |     -    30     -     -     -     -     -     -     -    30 |  285   5.96
 PERT |     -   122     -    75     -     -     -     -     -    73 |  287  20.63
 PIE1 |     -    43    86    75     -     -     -     -     -    20 |  288   0.02
 POTS |     -    61     -     -     -     -     -     -     -    60 |  275  14.59
 REYK |     -    23     -    53     -     -     -     -     -    22 |  288   9.62
 RIOG |     -    33     -     -    56     -     -     -     -    48 |  288  17.16
 SANT |     -    86     -     -    37     -     -     -     -    96 |  284  17.59
 SFER |     -    39     -     -     -     -     -     -     -    38 |  285   1.58
 STJO |     -   102    73   232    45     -     -     -     -    51 |  288  21.95
 TRO1 |     -    14     -     -    15     -     -     -     -     - |  288  10.44
 TROM |     -     -     -    41     -     -     -     -     -    29 |  286  12.02
 TSKB |     -    56    92   104     -     -     -     -     -    44 |  287   1.05
 URUM |     -    42     -     -    22     -     -     -     -    52 |  287  30.56
 USNO |     -    27     -    36     -     -     -     -     -    17 |  288   0.06
 USUD |     -    33     -    79     -     -     -     -     -    45 |  288   0.44
 VILL |     -    21    95    35     -     -     -     -     -    22 |  288  29.28
 WHIT |     -    23     -     -    25     -     -     -     -     - |  288  23.61
 WSRT |     -    25     -     -     -     -     -     -     -    25 |  288   0.05
 WTZR |     -    39     -    33     -     -     -     -     -    43 |  288   0.04
 YELL |     -    65    79    23     -     -     -     -     -    50 |  288   0.05
 ZWEN |     -     -     -     -    15     -     -     -     -    13 |  277  17.97
 -----+-------------------------------------------------------------+--------------
 TOT  |  4368    86   183   112    93  3163   192  4209     -    86 |


 BEST CLOCK FIT: AMC2   286   0.02 (ns) 

