
 GPS week: 1141   Day: 1   MJD: 52232                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2574      0    -0.06     0.22     4.90     0.00
 cod |   288     0  14473      0     0.90    -0.74     0.05    39.99
 emr |    96     0   3621     15  1120.86    10.19     0.09    22.00
 esa |   288     1  11067    295  -149.83   -28.56     0.22     0.00
 gfz |   288     0  13699      0     0.08    -0.11     0.06    38.02
 igu |    96     0   2480      0     0.01    -0.05     3.61     0.00
 ngs |    96     0   2574      0    -0.06     0.22     4.88     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio |
 -----+-------------------------------------------------+
    1 |  -950    27   -71  -102   -15  6721  -499     - |
    2 |  4209    99   -19   170  -100 18877  2681     - |
    3 |  2214  -289  -141   253   332 -2549  1648     - |
    4 | -6424    25   -20   388   -22 -2687 -6055     - |
    5 |  -381   144   -18   228  -148 -4432   181     - |
    6 | -5241   -89   -50    33   105-14523 -4067     - |
    7 | -1898    97  -125    11   -78   368 -1615     - |
    8 | -6164   110     6    46  -117   -20 -5641     - |
    9 |   513    94  -137    96   -73 -7107    69     - |
   10 | -5001   144   -17   165  -148 -2835 -5237     - |
   11 |  4361  -184   148  -143   164  -497  4606     - |
   13 |  6540    85   149     7  -118 -1921  6345     - |
   14 |  5852   -64    94  -138    49  -699  5347     - |
   15 | -1784   -81   -21     -    89  6475 -1512     - |
   17 |  -942   -66  -149  -216    98 -1404  -547     - |
   18 |  5614  -181    80   112   177  -665  5659     - |
   20 |  6376   -38    13  -203    38   -96  6254     - |
   22 |  7445   -85  -309   -33   149  5130  6002     - |
   23 |  -109    70  -228   -12   -35     -  -221     - |
   24 | -6735    68    25   192   -76  6346 -6156     - |
   25 |  -504     7  -238  -224    39 -4588   -57     - |
   26 | -2699    24  -107   115    -5   938 -2430     - |
   27 | -3586   108    35   -35  -120 -1960 -3101     - |
   28 |  4529   105   259   242  -160  5038  4269     - |
   29 | -2790   -33   -32   -41    40 -3568 -2811     - |
   30 | -1715    51  -133   261   -28 -5786 -1552     - |
   31 |  -966  -173   -29   366   187  5476 -1856     - |
 -----+-------------------------------------------------+
 ALGO |     -     0   153  -275   -30     -     -     - |
 ARTU |     -    55     -     -   -58     -     -     - |
 BAHR |     -   -20    99     5     2     -     -     - |
 BRMU |     -    42     -  -112   -44     -     -     - |
 CAS1 |     -   -54     -    32    56     -     -     - |
 DAV1 |     -     7     -     -    -8     -     -     - |
 DRAO |     -     2    -3     -     -     -     -     - |
 GALA |     -   -67     -   -19    71     -     -     - |
 GUAM |     -   -53     -  -264    55     -     -     - |
 KARR |     -  -104     -     -   109     -     -     - |
 MAC1 |     -   139     -  -104  -147     -     -     - |
 MATE |     -   -41    74     -     -     -     -     - |
 MCM4 |     -    39     -   127   -41     -     -     - |
 MKEA |     -   -47    86    24     -     -     -     - |
 MSKU |     -   -14     -     -    14     -     -     - |
 NLIB |     -    10   -19     -     -     -     -     - |
 NRC2 |     -   -80   145     -     -     -     -     - |
 NYA1 |     -    82     -     -   -86     -     -     - |
 OHIG |     -    68     -  -137   -72     -     -     - |
 RIOG |     -   -40     -     X    43     -     -     - |
 SANT |     -   -20     -  -220    21     -     -     - |
 STJO |     -    31   353     -  -100     -     -     - |
 TRO1 |     -   -50     -     -    53     -     -     - |
 TSKB |     -    22   -40  -637     -     -     -     - |
 USNO |     -   -56   102  -494     -     -     -     - |
 WHIT |     -    61     -     -   -65     -     -     - |
 WUHN |     -    27     -   -92   -28     -     -     - |
 YELL |     -   -27    50   100     -     -     -     - |
 YSSK |     -   -52     -     -    55     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  9560    50   145   160    52  6012  9426     - |  288   3.92
    2 |  7190    33    43    88    37  7640  6865     - |  288   3.47
    3 |  3741    87    78   324    96  1602  3282     - |  275   1.65
    4 |  1907    46   100   191    50  2139  1899     - |  288   0.88
    5 |  6697    49    66    86    54  5889  6107     - |  288   3.57
    6 | 10237    88    77   231    81  5820 10105     - |  281   9.27
    7 |  3074    70   104   139    79  1869  2934     - |  277   1.04
    8 |  5205    29    74    93    36  3094  6275     - |  288   5.02
    9 |  5666    26    49    60    24  5726  6079     - |  288   2.59
   10 |  2671    62    93   545    65  1736  2666     - |  276   1.48
   11 |  2504    41    54   187    39   829  2336     - |  288   0.67
   13 |  1453    41    95   149    47  1166  1477     - |  288   0.25
   14 |  2268    43   147    52    59   597  2547     - |  288   0.28
   15 |  6602    50    87     -    56  2054  5887     - |  288   2.22
   17 |  1791    49   121    98    64  1680  1668     - |  288   2.67
   18 |   920    76   134   176    82  1194  1035     - |  280   0.39
   20 |   701    61    57   150    56   928   850     - |  280   0.28
   22 |  4531    98   134   220    86  2337  4331     - |  288   0.69
   23 |  5216   102   146   690   108     -  5187     - |  278   5.57
   24 |  4246    58    65    86    64  6046  5035     - |  288   2.37
   25 |  5186    68   138   161    92  1705  4269     - |  288   1.48
   26 |  2055    59    67   108    55   789  2051     - |  288   0.59
   27 |  4455    33   123   123    47  2963  4175     - |  288   2.19
   28 |  2324    70    52   134    69  3785  2108     - |  288   0.64
   29 |  1291    39    72    82    43  1419  1388     - |  288   1.06
   30 |  1745    32    54    46    31  1979  1628     - |  288   0.69
   31 |  9086    96    37   352    99  6079  9768     - |  276   4.16
 -----+-------------------------------------------------+--------------
 ALGO |     -    24    50    41    27     -     -     - |  288   0.03
 ARTU |     -    48     -     -    50     -     -     - |  287  21.59
 BAHR |     -    38    58    98    34     -     -     - |  288   0.38
 BRMU |     -    22     -    45    23     -     -     - |  288  36.13
 CAS1 |     -    59     -    61    62     -     -     - |  288   7.44
 DAV1 |     -   100     -     -   105     -     -     - |  288  19.26
 DRAO |     -    46    83     -     -     -     -     - |   96   0.10
 GALA |     -    16     -    44    17     -     -     - |  288  35.05
 GUAM |     -    37     -   124    39     -     -     - |  288  31.73
 KARR |     -    36     -     -    38     -     -     - |  287  25.26
 MAC1 |     -    65     -    76    69     -     -     - |  288  15.69
 MATE |     -    32    57     -     -     -     -     - |   96   0.15
 MCM4 |     -    69     -   173    72     -     -     - |  275    >>>
 MKEA |     -    55   100   163     -     -     -     - |   96  51.72
 MSKU |     -    38     -     -    40     -     -     - |  282  42.84
 NLIB |     -    19    35     -     -     -     -     - |   92 162.10
 NRC2 |     -    20    36     -     -     -     -     - |   96   0.07
 NYA1 |     -    21     -     -    22     -     -     - |  288   0.06
 OHIG |     -    40     -   223    42     -     -     - |  287  12.10
 RIOG |     -    32     -     X    34     -     -     - |  287  17.07
 SANT |     -    33     -   560    35     -     -     - |  283  20.36
 STJO |     -    19    84     -    27     -     -     - |  288  20.59
 TRO1 |     -    19     -     -    19     -     -     - |  288  11.32
 TSKB |     -    36    66   196     -     -     -     - |   93   2.05
 USNO |     -    12    21    69     -     -     -     - |   96   0.04
 WHIT |     -    31     -     -    33     -     -     - |  288  10.02
 WUHN |     -    22     -    55    23     -     -     - |  287  32.69
 YELL |     -    36    66   247     -     -     -     - |   96   0.04
 YSSK |     -    22     -     -    23     -     -     - |  287  25.84
 -----+-------------------------------------------------+--------------
 TOT  |  4905    53    87   216    57  3611  4878     - |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

