
 GPS week: 1140   Day: 5   MJD: 52229                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2678      0    -0.01    -0.07     5.50     0.00
 cod |   288     0  18593     56     1.16    -1.43     0.11    14.92
 emr |    96     0   3699    116  1084.58    11.05     0.10    18.06
 esa |   288     1  15811   1133   136.55   -35.06     0.16    10.45
 gfz |   288     0  14736      0     0.52    -0.90     0.07    24.63
 igu |    96     0   2300      0    -0.05    -0.04     3.89     0.00
 jpl |    96    10   2311      0    -0.14     0.08     0.06    31.93
 ngs |    96     0   2678      0    -0.01    -0.07     5.29     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------+
    1 | -8378   -51  -112   133   -29 -8508    82 -7949     - |
    2 |  2737   116  -329   -36    -8     -    89  1324     - |
    3 | -1194  -293   -93   189   126  3640   -26 -1237     - |
    4 | -1820   -48  -130    85    67 -3118  -113 -1765     - |
    5 | -6021    72   -52   102  -109 -8812    94 -4287     - |
    6 | -5765   -92    43   172    32     -  -162 -4796     - |
    7 | -2800   124     3   -27   -77  8896    34 -2800     - |
    8 | -2040    -9  -165    71     1  8485    40 -1219     - |
    9 |  4610    27   -57   100   -38  4944   -18  4274     - |
   10 | -4686    80   -72     X   -40  1698    24 -3794     - |
   11 |   678  -123    70   170   -30   830    39  1274     - |
   13 |  2779    -5     X    92     7   338  -116  2928     - |
   14 |  6570   -30   117   -44    19  -835   -30  6371     - |
   15 |   470   -18    18     -    -4  9777    29   128     - |
   17 |  8848    34   -30     X    -6  7413   -20  8175     - |
   18 |  5552  -142   147    66    60  1504   -96  5591     - |
   20 |  5555    25    52   -36   -44   257    78  5185     - |
   21 |  2621    52   -65    34   -26     -    -8  2467     - |
   22 | -6148    37  -321   -76   -44 -4725   359 -5849     - |
   23 | 10684   110   -63     X   -42     -   -31  8942     - |
   24 | -3172    30    32   -32     5   218   -47 -3067     - |
   25 |  4677   132  -157    22   -39   706   -32  4002     - |
   26 | -2662    72     3  -149    43 -2045   -64 -2854     - |
   27 | -6212  -104  -198   177    46-16288   -25 -6077     - |
   28 |   654   126    38   -45   -74  2583    23   620     - |
   29 | -1486    27   -75     X     4 -3643    -6 -1586     - |
   30 | -6231    27   -88    83    19-11122  -134 -5763     - |
   31 |  2498  -262  -205   113   143  7874    38  2019     - |
 -----+-------------------------------------------------------+
 ALBH |     -   127     -  -181     -     -     -     -     - |
 ALGO |     -   -52   153   -84    30     -     -     -     - |
 ANKR |     -    54     -   -78     -     -     -     -     - |
 AUCK |     -   -44     -    63     -     -     -     -     - |
 BAHR |     -    56     -    16   -41     -     -     -     - |
 BRMU |     -   -14     -   -75    40     -     -     -     - |
 CAS1 |     -  -116     -   175    -3     -     -     -     - |
 DAV1 |     -    10     -     -    -6     -     -     -     - |
 DRAO |     -   -32    26     -     -     -     -     -     - |
 FAIR |     -     -   218  -377     -     -     -     -     - |
 GALA |     -   -44     -  -252   133     -     -     -     - |
 GODE |     -   -16     -    23     -     -     -     -     - |
 GUAM |     -   -96     -   156    -8     -     -     -     - |
 HOB2 |     -   103     -  -148     -     -     -     -     - |
 KARR |     -  -122     -     -    74     -     -     -     - |
 KIRU |     -    13     -   -18     -     -     -     -     - |
 KOSG |     -   -31     -    44     -     -     -     -     - |
 KWJ1 |     -     -     -    93   -39     -     -     -     - |
 MAC1 |     -   263     -   134  -216     -     -     -     - |
 MALI |     -    -1     -  -322   137     -     -     -     - |
 MATE |     -   -20    16     -     -     -     -     -     - |
 MCM4 |     -   116     -   -14   -61     -     -     -     - |
 MKEA |     -  -163   195   153   -14     -     -     -     - |
 MSKU |     -   -50     -     -    30     -     -     -     - |
 NKLG |     -   -56     -    80     -     -     -     -     - |
 NLIB |     -   -30    25     -     -     -     -     -     - |
 NRC2 |     -  -158   130     -     -     -     -     -     - |
 NTUS |     -  -173     -     -   105     -     -     -     - |
 NYA1 |     -    49     -     -   -29     -     -     -     - |
 OHIG |     -    73     -  -143    16     -     -     -     - |
 ONSA |     -     4     -    -6     -     -     -     -     - |
 PIE1 |     -   140   272  -425     -     -     -     -     - |
 PIMO |     -  -544     -   777     -     -     -     -     - |
 POTS |     -    60     -   -86     -     -     -     -     - |
 RIOG |     -     -     -    71   -30     -     -     -     - |
 SANT |     -     -     -   -40    17     -     -     -     - |
 SELE |     -    63     -   -90     -     -     -     -     - |
 STJO |     -     3   245     -   -62     -     -     -     - |
 TRO1 |     -   -92     -     -    56     -     -     -     - |
 TSKB |     -   282   132  -519     -     -     -     -     - |
 URUM |     -   102     -     -   -62     -     -     -     - |
 USNO |     -   121   329  -374     -     -     -     -     - |
 USUD |     -   -17     -    24     -     -     -     -     - |
 VILL |     -    38     -   -54     -     -     -     -     - |
 WHIT |     -    30     -     -   -18     -     -     -     - |
 WTZR |     -   -45     -    64     -     -     -     -     - |
 YSSK |     -    41     -     -   -25     -     -     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  5018   110   163   249    91  5230    68  5011     - |  288   3.52
    2 |  9723   270   164   330   125     -    92  8848     - |  286   4.07
    3 |  3007    80    66   106    42  1720    35  2932     - |  288   1.48
    4 |  2626   100   105   272   113  2118    79  2214     - |  288   0.66
    5 |  8858   156    77   121    54  4346    37  8740     - |  288   4.08
    6 | 13209    76    75   103    48     -    36 12853     - |  288  10.75
    7 |  2937    86    37    68    37  2584    45  3000     - |  288   2.63
    8 |  6136    96   112    70    54  7505    55  6845     - |  288   5.48
    9 |  5582   215    58   216    42  6717    39  5692     - |  288   2.46
   10 |  6380    69    60     X    37  2635    58  5431     - |  274   2.06
   11 |  2437   116    75   138    50   932    65  2365     - |  288   0.38
   13 |  1020    94     X   113    80   418    48  1023     - |  288   0.37
   14 |  2648    63    74   123    49   722    31  2841     - |  288   0.36
   15 |  9120    92   154     -    85  2585    39  8242     - |  287   3.23
   17 |  5532    64   143     X    43  3445    58  5247     - |  288   3.15
   18 |   730    71   136   251   131   534    40   788     - |  288   0.41
   20 |  1308   123    90   174    89   482    67  1316     - |  287   0.29
   21 |  3391   147   143   185    56     -    67  3382     - |  280   3.02
   22 |  1713   287   100   263    91  2055    85  1714     - |  285   1.29
   23 |  7894   182   137     X   115     -    35  8166     - |  276   6.54
   24 |  3088    77    66    72    55  3065    54  2694     - |  288   2.87
   25 |  6114    68    60   196    71  1937    59  6078     - |  288   1.69
   26 |   718    78    81   115    32   880    50   756     - |  288   0.51
   27 |  4076    95   133   118    67  7734   100  3753     - |  288   2.38
   28 |  1153   122    51   103    67   951    46   895     - |  288   0.77
   29 |  1990   237    98     X   121  1871    69  1905     - |  284   0.81
   30 |  1532    79    88   209    50  6535    50  1480     - |  288   1.26
   31 |  8440    51    73   127    83  7193    98  7534     - |  288   3.57
 -----+-------------------------------------------------------+--------------
 ALBH |     -   127     -   181     -     -     -     -     - |  157   0.19
 ALGO |     -    86    41   104    38     -     -     -     - |  288   0.04
 ANKR |     -    28     -    39     -     -     -     -     - |  267  16.76
 AUCK |     -   198     -   283     -     -     -     -     - |  224  19.81
 BAHR |     -    56     -    85    21     -     -     -     - |  288   0.48
 BRMU |     -    50     -    98    43     -     -     -     - |  288  48.29
 CAS1 |     -    99     -   124    55     -     -     -     - |  286  39.31
 DAV1 |     -   100     -     -    61     -     -     -     - |  286  18.44
 DRAO |     -    91    75     -     -     -     -     -     - |   96   0.10
 FAIR |     -     -    86   148     -     -     -     -     - |   84   0.10
 GALA |     -    62     -    63    21     -     -     -     - |  288  30.82
 GODE |     -   172     -   246     -     -     -     -     - |  216   0.19
 GUAM |     -    42     -   111    55     -     -     -     - |  288  36.00
 HOB2 |     -    44     -    63     -     -     -     -     - |  267   0.07
 KARR |     -    48     -     -    29     -     -     -     - |  288  21.48
 KIRU |     -    61     -    86     -     -     -     -     - |  267   3.39
 KOSG |     -    29     -    41     -     -     -     -     - |  269  30.15
 KWJ1 |     -     -     -   263   112     -     -     -     - |  195 125.14
 MAC1 |     -    82     -   134    85     -     -     -     - |  288  17.61
 MALI |     -   107     -    91    91     -     -     -     - |  288  25.93
 MATE |     -    49    40     -     -     -     -     -     - |   96   0.16
 MCM4 |     -   114     -   128    84     -     -     -     - |  286  55.83
 MKEA |     -   136   153   161    55     -     -     -     - |  288  49.25
 MSKU |     -   103     -     -    63     -     -     -     - |  282  49.65
 NKLG |     -   257     -   367     -     -     -     -     - |  220    >>>
 NLIB |     -    35    29     -     -     -     -     -     - |   96   0.04
 NRC2 |     -    39    32     -     -     -     -     -     - |   96   0.08
 NTUS |     -    59     -     -    36     -     -     -     - |  288   9.73
 NYA1 |     -    16     -     -    10     -     -     -     - |  288   0.10
 OHIG |     -    75     -   152    28     -     -     -     - |  288  14.35
 ONSA |     -    30     -    42     -     -     -     -     - |  267   3.97
 PIE1 |     -    79   108   128     -     -     -     -     - |  218   0.09
 PIMO |     -    36     -    52     -     -     -     -     - |  142  22.17
 POTS |     -    24     -    35     -     -     -     -     - |  266  16.61
 RIOG |     -     -     -    85    36     -     -     -     - |  268  17.15
 SANT |     -     -     -   116    49     -     -     -     - |  258  23.24
 SELE |     -   113     -   162     -     -     -     -     - |  207  58.64
 STJO |     -    81    77     -    53     -     -     -     - |  288  16.57
 TRO1 |     -    61     -     -    37     -     -     -     - |  288  11.18
 TSKB |     -    94   125    85     -     -     -     -     - |  204   1.74
 URUM |     -    33     -     -    20     -     -     -     - |  288 101.66
 USNO |     -    77    75   109     -     -     -     -     - |  273   0.05
 USUD |     -    71     -   102     -     -     -     -     - |  269   0.39
 VILL |     -    39     -    55     -     -     -     -     - |  268  39.19
 WHIT |     -    76     -     -    46     -     -     -     - |  288   6.00
 WTZR |     -    60     -    86     -     -     -     -     - |  216   0.10
 YSSK |     -    28     -     -    17     -     -     -     - |  279  24.84
 -----+-------------------------------------------------------+--------------
 TOT  |  5497   109    98   156    66  3888    60  5286     - |


 BEST CLOCK FIT: ALGO   288   0.04 (ns) 

