
 GPS week: 1139   Day: 6   MJD: 52223                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2667      0    -0.12     0.22     4.87     0.00
 cod |   288     0  25239    311    -4.65   -14.91     0.05    32.20
 emr |    96     0   4006    403   990.56    15.80     0.12    10.36
 esa |   288     0  17490   1380   982.03    15.69     0.09    17.17
 gfz |   288     0  14263      1    -0.30     0.91     0.09    15.97
 igu |    96     0   2301      0    -0.01    -0.01     4.01     0.00
 jpl |    96     1   2057      0   -42.04   167.52     0.11     0.00
 ngs |    96     0   2667      0    -0.11     0.21     4.57     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  24488    296   668.64     4.53     0.07    24.30

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |-13354   159     X    43    19-10482   236-12131     -  -254 |
    2 | -7699    15  -184    66  -140-12237     - -6295     -    52 |
    3 |  5448    39  -143   102   153  4564   149  4635     -  -203 |
    4 | -3552   -46   139   166   155   441  -215 -3348     -  -177 |
    5 | -4467   -94   -25   270   -56 -2812  -105 -4296     -   -26 |
    6 |  8840  -173  -112   343   166 19831  -235  8266     -  -107 |
    7 |  3309   -28   -17   302   -73     -     -  3058     -  -126 |
    8 |  6633    83  -180   116  -170 -4448     -  5757     -   -54 |
    9 | -7425   -27   -13   112   -95 -7168   -84 -6813     -    20 |
   10 | -3395   -31    23  -266    35 -7422  -293 -3636     -   253 |
   11 |  4820    72   230   206   -82  4912   151  5023     -  -219 |
   13 |  6217   116    92   138  -137   721  -146  6174     -  -175 |
   14 |  4719   104    55    41  -108  1905   138  4355     -  -103 |
   15 |  4825     0    73     -   -51 12465   -48  3931     -    23 |
   17 |   775    90    76  -230   235     -   -19   608     -  -121 |
   18 |  3615   -65   245   -22     6  2619    22  3456     -    63 |
   20 |  6404    49   -74    11   -35  1747   324  6016     -   -40 |
   21 | -2568   243  -141  -182   151     -    81 -1539     -  -263 |
   22 |  2145   110  -426   -59   -28 -5370   443  1739     -   -26 |
   23 | -5921     -     X     X   121     -  -117 -4758     -   -80 |
   24 |  3678   -16     X     9    27  4811  -170  2733     -    -3 |
   25 | -6527   169  -315   132    74 -9732    76 -5495     -  -321 |
   26 | -4209    24   -42   -93   164  1298     - -4002     -   -68 |
   27 | -5170    65  -252    41    56 -6570    60 -4852     -  -116 |
   28 |  9127    10   111    74  -173  9549   -82  8779     -    32 |
   29 |   156   147  -151   111    99  3728     -    79     -  -316 |
   30 |  2058    58     X   303    16  1631  -199  1400     -  -302 |
   31 | -9679   130    13  -155   157 -4212     - -9860     -  -167 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -169     -     X     -     -     -     -     -   224 |
 ALGO |     -   -21   176     X   -40     -     -     -     -   -22 |
 AMC2 |     -    -6     -     -     -     -     -     -     -     8 |
 ANKR |     -    62     -  -117     -     -     -     -     -     - |
 AOML |     -    47     -     -     -     -     -     -     -   -62 |
 AUCK |     -    46     -     X     -     -     -     -     -   -60 |
 BAHR |     -   -49  -113    53   -62     -     -     -     -    84 |
 BOR1 |     -     5     -     -     -     -     -     -     -    -6 |
 BRMU |     -   160     -  -266   -16     -     -     -     -   -17 |
 BRUS |     -   -41     -     -     -     -     -     -     -    55 |
 CAS1 |     -  -192     -   123   -58     -     -     -     -   206 |
 CRO1 |     -   -84     -     -     -     -     -     -     -   112 |
 DAV1 |     -   -94     -     -  -125     -     -     -     -   209 |
 DRAO |     -   -22   137     -     -     -     -     -     -    10 |
 EISL |     -   -31     -    57     -     -     -     -     -     - |
 FAIR |     -     -    94    16     -     -     -     -     -   -26 |
 FORT |     -    49     -   -92     -     -     -     -     -     - |
 GALA |     -   -34     -    58   104     -     -     -     -   -67 |
 GODE |     -   -40     -     X     -     -     -     -     -    53 |
 GOLD |     -   -82     -     -     -     -     -     -     -   109 |
 GUAM |     -  -116     -   216    11     -     -     -     -    -6 |
 HOB2 |     -   102     -  -199     -     -     -     -     -     6 |
 HRAO |     -   -76     -     -     -     -     -     -     -   101 |
 KARR |     -    18     -     -   -36     -     -     -     -     - |
 KERG |     -     5     -     -     -     -     -     -     -    -7 |
 KIRU |     -    63     -  -119     -     -     -     -     -     - |
 KOSG |     -  -127     -    58     -     -     -     -     -   128 |
 KWJ1 |     -     -     -  -182   196     -     -     -     -     X |
 LPGS |     -     -     -  -172     -     -     -     -     -   122 |
 MATE |     -    -3  -229     -     -     -     -     -     -    36 |
 MAW1 |     -     1     -     -     -     -     -     -     -    -2 |
 MCM4 |     -    83     -  -508   210     -     -     -     -    42 |
 MEDI |     -   -89     -     -     -     -     -     -     -   118 |
 METS |     -   -11     -     -     -     -     -     -     -    14 |
 MKEA |     -  -184   297   -24    -7     -     -     -     -   223 |
 MSKU |     -    33     -     -   -67     -     -     -     -     - |
 NKLG |     -     -     -  -224     -     -     -     -     -   158 |
 NLIB |     -   -33   -14     -     -     -     -     -     -    46 |
 NPLD |     -  -170     -     -     -     -     -     -     -   226 |
 NRC2 |     -   -49   171     -     -     -     -     -     -    41 |
 NTUS |     -  -166     -     -     -     -     -     -     -   220 |
 NYA1 |     -   -70     -     -  -115     -     -     -     -   170 |
 NYAL |     -     -  -198    50     -     -     -     -     -    -7 |
 OHIG |     -    61     -  -175   -83     -     -     -     -    97 |
 ONSA |     -  -104     -    45     -     -     -     -     -   106 |
 PENC |     -   215     -     -     -     -     -     -     -  -285 |
 PERT |     -    80     -   -33     -     -     -     -     -   -82 |
 PIE1 |     -     X   -69  -121     -     -     -     -     -    95 |
 POTS |     -   -12     -    15     -     -     -     -     -     5 |
 REYK |     -   -97     -     -     -     -     -     -     -   128 |
 RIOG |     -   -10     -   124  -139     -     -     -     -    18 |
 SFER |     -  -216     -     -     -     -     -     -     -   286 |
 STJO |     -    10   174     -  -174     -     -     -     -    77 |
 SUTH |     -  -115     -   216     -     -     -     -     -     - |
 THU1 |     -   160     -     -     -     -     -     -     -  -213 |
 TOW2 |     -   -85     -     -   170     -     -     -     -     - |
 TRO1 |     -     8     -     -   -17     -     -     -     -     - |
 TROM |     -     -     -   133     -     -     -     -     -   -94 |
 TSKB |     -   247    11  -454  -188     -     -     -     -   141 |
 USNO |     -    77   244  -288     -     -     -     -     -    66 |
 USUD |     -   -66     -   106     -     -     -     -     -    12 |
 VILL |     -    16     -    26     -     -     -     -     -   -40 |
 WES2 |     -    -7     -     -     -     -     -     -     -    10 |
 WHIT |     -    58     -     -  -117     -     -     -     -     - |
 WSRT |     -   -55     -     -     -     -     -     -     -    73 |
 WTZR |     -   -73     -    14     -     -     -     -     -    87 |
 WUHN |     -   -90     -    93    53     -     -     -     -    19 |
 YAR2 |     -     5     -     X     -     -     -     -     -    -6 |
 YELL |     -   165   330  -273     -     -     -     -     -   -73 |
 YSSK |     -   -58     -     -   116     -     -     -     -     - |
 ZWEN |     -     -     -     -   -68     -     -     -     -    44 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4837    39     X    39    33  5028    63  4028     -    39 |  288   3.70
    2 |  7357    47    91    49    44  3905     -  7271     -    58 |  288   3.34
    3 |  1999    48    61   115    34  3898    68  2400     -   106 |  288   1.91
    4 |  1778    39   155    47   170   456   104  1445     -    82 |  288   0.87
    5 |  5684    50   174    51    72  2970    97  5802     -    43 |  288   3.09
    6 |  9470    55   111    56    36  7870    59  9237     -    56 |  288   9.77
    7 |  3215    64   162    91    79     -     -  3085     -    44 |  288   1.52
    8 |  8485    69    96    68   119  7214     -  7591     -   117 |  288   5.37
    9 |  3501    51    88    95    90  4624    93  3047     -    52 |  288   2.32
   10 |  1787   115    77   122   108  2745   150  1776     -   157 |  282   1.82
   11 |  2258    74   148    84    63  2055   119  2123     -    81 |  288   0.42
   13 |  1032    40   209    70    62   426    65  1066     -    56 |  288   0.24
   14 |  1557    56   177    46    97   682    55  1657     -   139 |  288   0.25
   15 |  4194    44   161     -    76  7706    82  4946     -    31 |  288   2.69
   17 |   787    61    86   128   154     -    66   784     -    41 |  288   2.34
   18 |  1496   114    89   249   131   595   209  1507     -    53 |  288   0.35
   20 |  1801    81   199   126    90   625   135  1836     -    31 |  288   0.29
   21 |  7828   120   177    90    61     -   130  7555     -   144 |  278   4.17
   22 |  2244    70    50   117    39  3771    58  2246     -    79 |  288   1.41
   23 |  8255     -     X     X   223     -   279  6766     -   147 |  249   5.91
   24 |  3999    57     X   150   119  2551    57  4313     -   116 |  288   2.07
   25 |  5823    33    86    85    42  4979    73  5192     -    58 |  288   2.22
   26 |  1378    52   189    58    68  1313     -  1149     -    61 |  288   0.86
   27 |  8667    37   172    84   144  4112    94  6963     -    98 |  288   2.40
   28 |  2038    52    63    70    96  3769    69  2103     -    42 |  288   0.48
   29 |  2000    43    96    45    19  2997     -  1831     -    66 |  288   1.32
   30 |  3761   114     X    92   122   958    79  3776     -   169 |  288   1.47
   31 |  7610    70    77    56   112  5453     -  7496     -    86 |  288   5.52
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    16     -     X     -     -     -     -     -    21 |  286   0.18
 ALGO |     -    20    36     X    41     -     -     -     -    32 |   96   0.03
 AMC2 |     -    11     -     -     -     -     -     -     -    14 |  286   0.05
 ANKR |     -    28     -    52     -     -     -     -     -     - |  209  14.28
 AOML |     -    29     -     -     -     -     -     -     -    39 |  286  21.52
 AUCK |     -    55     -     X     -     -     -     -     -    73 |  264  18.67
 BAHR |     -    63    53    76    86     -     -     -     -   174 |  288   0.49
 BOR1 |     -    19     -     -     -     -     -     -     -    25 |  286   1.65
 BRMU |     -    28     -    77    62     -     -     -     -    29 |  286  36.09
 BRUS |     -    64     -     -     -     -     -     -     -    85 |  286   0.08
 CAS1 |     -    66     -    29    57     -     -     -     -    50 |  288   8.54
 CRO1 |     -    20     -     -     -     -     -     -     -    26 |  286   0.13
 DAV1 |     -    23     -     -    24     -     -     -     -    21 |  288  18.47
 DRAO |     -    14    66     -     -     -     -     -     -    13 |  288   0.08
 EISL |     -    77     -   144     -     -     -     -     -     - |  214  44.45
 FAIR |     -     -   136   132     -     -     -     -     -    84 |  248   0.20
 FORT |     -    16     -    30     -     -     -     -     -     - |  119   0.14
 GALA |     -    56     -    81    59     -     -     -     -    62 |  287  31.62
 GODE |     -    46     -     X     -     -     -     -     -    61 |  229  13.12
 GOLD |     -    19     -     -     -     -     -     -     -    25 |  286  25.25
 GUAM |     -    38     -    71    72     -     -     -     -    31 |  288  34.99
 HOB2 |     -    38     -    44     -     -     -     -     -    57 |  288   0.07
 HRAO |     -    18     -     -     -     -     -     -     -    24 |  285  37.28
 KARR |     -    25     -     -    50     -     -     -     -     - |  288  20.41
 KERG |     -    28     -     -     -     -     -     -     -    37 |  287   1.83
 KIRU |     -    20     -    37     -     -     -     -     -     - |  288   2.96
 KOSG |     -    20     -    33     -     -     -     -     -    26 |  288  46.36
 KWJ1 |     -     -     -   111   120     -     -     -     -     X |  218 130.31
 LPGS |     -     -     -   178     -     -     -     -     -   126 |  140 185.30
 MATE |     -    25    75     -     -     -     -     -     -    27 |  288   0.08
 MAW1 |     -    44     -     -     -     -     -     -     -    59 |  274  28.49
 MCM4 |     -    75     -   205   219     -     -     -     -    99 |  288    >>>
 MEDI |     -    18     -     -     -     -     -     -     -    24 |  286   1.96
 METS |     -    22     -     -     -     -     -     -     -    30 |  285   0.37
 MKEA |     -    30   108    27    45     -     -     -     -    27 |  288  55.62
 MSKU |     -    23     -     -    47     -     -     -     -     - |  279  43.09
 NKLG |     -     -     -    29     -     -     -     -     -    20 |  287    >>>
 NLIB |     -    15    60     -     -     -     -     -     -    15 |  287   0.05
 NPLD |     -    16     -     -     -     -     -     -     -    22 |  285   0.05
 NRC2 |     -    17    45     -     -     -     -     -     -    24 |  286   0.04
 NTUS |     -    22     -     -     -     -     -     -     -    29 |  286   7.45
 NYA1 |     -    21     -     -    36     -     -     -     -    42 |  287   0.06
 NYAL |     -     -    56    66     -     -     -     -     -    42 |  282   0.05
 OHIG |     -    34     -    75    57     -     -     -     -    80 |  288  17.88
 ONSA |     -    25     -    30     -     -     -     -     -    35 |  288   3.85
 PENC |     -    19     -     -     -     -     -     -     -    25 |  285   7.03
 PERT |     -    35     -    86     -     -     -     -     -    39 |  288  18.78
 PIE1 |     -     X    71    48     -     -     -     -     -    28 |  288 141.31
 POTS |     -    28     -    31     -     -     -     -     -    32 |  288  18.94
 REYK |     -    61     -     -     -     -     -     -     -    81 |  285   8.35
 RIOG |     -    45     -   113   236     -     -     -     -    62 |  276  18.71
 SFER |     -   114     -     -     -     -     -     -     -   151 |  287  57.59
 STJO |     -    29    74     -    53     -     -     -     -    46 |  288  15.34
 SUTH |     -   126     -   237     -     -     -     -     -     - |  175  35.49
 THU1 |     -   129     -     -     -     -     -     -     -   171 |  212  53.00
 TOW2 |     -    21     -     -    43     -     -     -     -     - |  288  14.27
 TRO1 |     -    13     -     -    27     -     -     -     -     - |  288  11.55
 TROM |     -     -     -    36     -     -     -     -     -    25 |  274  11.25
 TSKB |     -    85   217    66    58     -     -     -     -    47 |  288   0.83
 USNO |     -    25    54    49     -     -     -     -     -    31 |  288   0.05
 USUD |     -    27     -    28     -     -     -     -     -    25 |  288   0.39
 VILL |     -    24     -    29     -     -     -     -     -    22 |  288  35.42
 WES2 |     -     9     -     -     -     -     -     -     -    12 |  285   0.04
 WHIT |     -    17     -     -    33     -     -     -     -     - |  288   9.68
 WSRT |     -    20     -     -     -     -     -     -     -    27 |  288   0.05
 WTZR |     -    13     -    26     -     -     -     -     -    20 |  288   0.36
 WUHN |     -    49     -   102    33     -     -     -     -    33 |  287  40.37
 YAR2 |     -    23     -     X     -     -     -     -     -    31 |  246   5.58
 YELL |     -    23    63    19     -     -     -     -     -    24 |  288   0.05
 YSSK |     -    24     -     -    49     -     -     -     -     - |  279  22.93
 ZWEN |     -     -     -     -    32     -     -     -     -    21 |  266  18.96
 -----+-------------------------------------------------------------+--------------
 TOT  |  4869    51   119    90    94  4015   111  4572     -    68 |


 BEST CLOCK FIT: NRC2   286   0.04 (ns) 

