
 GPS week: 1139   Day: 3   MJD: 52220                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2680      0     0.13    -0.30     5.06     0.00
 cod |   288     0  25202    281    -0.10     1.78     0.11    28.29
 emr |    96     0   3673    111   936.25    15.48     0.18    16.33
 esa |   288     0  18027   1455   928.06    16.05     0.22    12.75
 gfz |   288     0  14675      0     0.54    -1.44     0.13    23.61
 igu |    96     0   2016      0     0.15    -0.33     2.69     0.00
 jpl |     0     0      0      0     0.00     0.00     0.00     0.00
 ngs |    96     0   2680      0     0.13    -0.30     4.83     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  26193    303   646.97     4.88     0.16    19.01

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |-17497   -58   -23   100   134     -     --15326     -  -140 |
    2 |  -442   -29  -120  -170   -53     -     - -1725     -   257 |
    3 | -3029    53   -91   146   165  1698     - -2880     -  -355 |
    4 | -8482   -54   131   284   -74 -1930     - -7254     -   -51 |
    5 |  3098    56  -136   275  -243  2781     -  2419     -    73 |
    6 |  -618    26   -95   306    40  -205     -  -221     -  -266 |
    7 | -2338   -24    46   -27   -18  1545     - -1779     -    62 |
    8 |  3629   -83   159  -269   116 -7464     -  3854     -   115 |
    9 | -1153     0   -77   242  -136 -3539     - -1444     -    28 |
   10 | -5731    10    16  -113   -44     -     - -5068     -   104 |
   11 |  1050   -31   128   133     7 -1632     -  1469     -   -88 |
   13 |  5269    -3   268   127    35  1279     -  5279     -  -201 |
   14 |  5362    14   207   -47   100 -1507     -  5013     -  -172 |
   15 |   -17   134    81     -   -15   950     -  -765     -  -205 |
   17 |  2539   141  -166   125   105     -     -  2093     -  -374 |
   18 |  6122     5   168    71   -20   317     -  6137     -   -78 |
   20 |  3991   -61    40  -113   100  -191     -  4288     -    39 |
   21 | -2707   263    18    47   -92     -     - -2035     -  -323 |
   22 |  1902    75  -370  -123   239 -5531     -  2088     -  -217 |
   23 | 11284   262  -178     X    13     -     -  9492     -  -361 |
   24 |   444   107   -12    41  -158     -     -  -242     -    12 |
   25 |  1941   -26     X    99   -23   862     -  2130     -     X |
   26 | -2950   -72  -106    76    99  1272     - -2886     -   -37 |
   27 | -2104   -50   -26    72    71 14556     - -2131     -   -56 |
   28 |  3422  -213   -15   330    20  -417     -  3224     -    83 |
   29 | -2945    80   -28     X   264   366     - -2984     -  -439 |
   30 | -3808    99  -180   243    74  -846     - -3646     -  -350 |
   31 |  4135   -47   -58     X   260 -2363     -  3205     -  -237 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -127     -  -407     -     -     -     -     -   408 |
 ALGO |     -   -26   145     X   -77     -     -     -     -    93 |
 AMC2 |     -  -107     -     -     -     -     -     -     -   159 |
 ANKR |     -   -34     -    74     -     -     -     -     -     - |
 AOML |     -   -61     -     -     -     -     -     -     -    90 |
 AUCK |     -     -     -   146     -     -     -     -     -   -98 |
 BILI |     -   -36     -     -    43     -     -     -     -     - |
 BOR1 |     -    21     -     -     -     -     -     -     -   -32 |
 BRMU |     -    16     -  -188    65     -     -     -     -    21 |
 BRUS |     -    20     -     -     -     -     -     -     -   -30 |
 CAS1 |     -    -4     -     -   -66     -     -     -     -    89 |
 CRO1 |     -  -133     -     -     -     -     -     -     -   199 |
 DAEJ |     -    72     -     -     -     -     -     -     -  -108 |
 DAV1 |     -    -4     -     -   -66     -     -     -     -    89 |
 DRAO |     -   -26   -33     -     -     -     -     -     -    48 |
 FAIR |     -     -    84  -155     -     -     -     -     -    83 |
 GALA |     -   -48     -  -276    69     -     -     -     -   173 |
 GODE |     -   -57     -  -231     -     -     -     -     -   220 |
 GOLD |     -   123     -     -     -     -     -     -     -  -182 |
 GUAM |     -  -135     -    33   148     -     -     -     -    -5 |
 HOB2 |     -    89     -   -66     -     -     -     -     -   -88 |
 HRAO |     -    90     -     -     -     -     -     -     -  -134 |
 IISC |     -  -110     -    94     -     -     -     -     -    66 |
 KARR |     -   -63     -     -    76     -     -     -     -     - |
 KERG |     -    56     -     -     -     -     -     -     -   -83 |
 KIRU |     -    22     -   -48     -     -     -     -     -     - |
 KOKB |     -     X     -  -112   128     -     -     -     -   -77 |
 KOSG |     -     -     -    51     -     -     -     -     -   -34 |
 KWJ1 |     -     -     -  -120   210     -     -     -     -  -113 |
 LPGS |     -     -     -     X   -89     -     -     -     -   110 |
 MAC1 |     -    52     -     -  -143     -     -     -     -   101 |
 MALI |     -   307     -   290  -579     -     -     -     -    79 |
 MATE |     -    19    29     -     -     -     -     -     -   -36 |
 MAW1 |     -   -56     -     -     -     -     -     -     -    83 |
 MCM4 |     -     -     -  -277    51     -     -     -     -    91 |
 MDO1 |     -  -168  -115     -     -     -     -     -     -   280 |
 MEDI |     -     0     -     -     -     -     -     -     -     0 |
 METS |     -    16     -     -     -     -     -     -     -   -24 |
 MKEA |     -     -     -  -156     -     -     -     -     -   104 |
 NKLG |     -     -     -   -24     -     -     -     -     -    16 |
 NLIB |     -   -67    24     -     -     -     -     -     -    93 |
 NPLD |     -   -26     -     -     -     -     -     -     -    39 |
 NRC2 |     -  -189   110     -     -     -     -     -     -   250 |
 NTUS |     -   -79     -     -     -     -     -     -     -   118 |
 NYA1 |     -   102     -     -  -140     -     -     -     -    23 |
 NYAL |     -     -    29     -     -     -     -     -     -   -25 |
 OHIG |     -    55     -  -220  -100     -     -     -     -   191 |
 ONSA |     -   -24     -   115   -73     -     -     -     -    49 |
 PENC |     -   237     -     -     -     -     -     -     -  -352 |
 PERT |     -   134     -  -155     -     -     -     -     -   -97 |
 PIE1 |     -  -167     -  -442     -     -     -     -     -   526 |
 POTS |     -     -     -     4     -     -     -     -     -    -3 |
 REYK |     -   -42     -     -     -     -     -     -     -    62 |
 RIOG |     -   100     -    20  -132     -     -     -     -     2 |
 SANT |     -    11     -   -84    -6     -     -     -     -    48 |
 SFER |     -  -238     -     -     -     -     -     -     -   354 |
 STJO |     -  -148   212     -  -128     -     -     -     -   322 |
 SUTH |     -  -145     -   176     -     -     -     -     -    44 |
 TRO1 |     -    23     -     -   -27     -     -     -     -     - |
 TROM |     -     -     -   189     -     -     -     -     -  -127 |
 TSKB |     -   135   -88  -254     -     -     -     -     -     - |
 URUM |     -    71     -     -  -111     -     -     -     -    31 |
 USNO |     -    51     -  -509     -     -     -     -     -   265 |
 USUD |     -   -98     -    47     -     -     -     -     -   115 |
 VILL |     -   -17     -    82     -     -     -     -     -   -30 |
 WES2 |     -   -47     -     -     -     -     -     -     -    70 |
 WHIT |     -   -42     -     -    50     -     -     -     -     - |
 WSRT |     -    10     -     -     -     -     -     -     -   -15 |
 WTZR |     -    11     -  -142     -     -     -     -     -    79 |
 WUHN |     -   114     -   171    -5     -     -     -     -  -277 |
 YAR2 |     -    57     -   120     -     -     -     -     -  -165 |
 YELL |     -   -66    21   123     -     -     -     -     -    10 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6258   114   111   198    78     -     -  6556     -   115 |  288   3.13
    2 |  8312   204    85   402   228     -     -  7539     -   121 |  288   2.89
    3 |  2451    76    99   104    56  2212     -  2473     -    65 |  288   1.89
    4 |  3407    92   406   110    50  2411     -  3610     -    54 |  288   0.81
    5 |  4542   125    82   119    63  3652     -  4009     -   143 |  288   3.31
    6 | 13593    88   222   154    55  4417     - 13381     -    92 |  288  10.51
    7 |  5416    97   134   248    89  2491     -  5247     -    86 |  288   0.98
    8 |  5274   265   443   278   236  3056     -  5388     -   404 |  288   4.87
    9 |  2785    57    92    76    59  1937     -  2947     -   129 |  288   2.16
   10 |  3304   150    94   183   240     -     -  3749     -   222 |  283   1.88
   11 |  1408   103    88   207    69   862     -  1349     -    82 |  288   0.90
   13 |   855   129    60    87   159  1487     -   964     -    72 |  288   0.21
   14 |  1545   121   104   257   142   412     -  1654     -   164 |  288   0.34
   15 |  7790    72   223     -    67  4085     -  7480     -    85 |  288   3.38
   17 |  2296   150   230   133   105     -     -  2452     -   117 |  287   2.83
   18 |  1226   163   199   200   150  1123     -  1354     -   147 |  288   0.35
   20 |   960   101    98   174   300  1156     -  1041     -   168 |  288   0.33
   21 |  4485   206   163   286   265     -     -  4593     -   174 |  282   3.32
   22 |  4339   146   217   118    68  2390     -  4351     -    48 |  288   0.66
   23 | 11053   134   291     X   125     -     -  9499     -   234 |  277   6.66
   24 |  4202   101    72   152    45     -     -  3851     -    47 |  288   2.53
   25 |  1698    61     X   135    54  2110     -  1727     -     X |  288   1.59
   26 |  1097   169   386   191   126   772     -  1145     -   104 |  288   0.48
   27 |  4652    99    80   109   201  4839     -  4047     -   283 |  288   3.52
   28 |  2000   164    97   375   191   723     -  2086     -   239 |  288   0.47
   29 |  1995    97    81     X   131  1515     -  1789     -    56 |  288   0.54
   30 |   700    57   101   280   168  2062     -   728     -    62 |  288   1.27
   31 |  5952   141   138     X   101  5225     -  4920     -    70 |  288   4.25
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    87     -   278     -     -     -     -     -    70 |  288   0.14
 ALGO |     -    49   161     X    51     -     -     -     -    34 |  288   0.03
 AMC2 |     -    54     -     -     -     -     -     -     -    81 |  286   0.04
 ANKR |     -    34     -    76     -     -     -     -     -     - |  288  12.14
 AOML |     -    33     -     -     -     -     -     -     -    49 |  282  30.08
 AUCK |     -     -     -   314     -     -     -     -     -   211 |  264  15.81
 BILI |     -    44     -     -    53     -     -     -     -     - |  287  16.51
 BOR1 |     -    59     -     -     -     -     -     -     -    88 |  286   2.54
 BRMU |     -   177     -   443   214     -     -     -     -   808 |  288  39.35
 BRUS |     -    25     -     -     -     -     -     -     -    37 |  286   0.04
 CAS1 |     -   220     -     -   157     -     -     -     -   138 |  288   9.57
 CRO1 |     -    25     -     -     -     -     -     -     -    38 |  285   0.09
 DAEJ |     -    71     -     -     -     -     -     -     -   105 |  285   2.11
 DAV1 |     -    48     -     -    86     -     -     -     -    65 |  287  19.02
 DRAO |     -   105   224     -     -     -     -     -     -    92 |  288   0.06
 FAIR |     -     -   168   305     -     -     -     -     -   178 |  281   0.45
 GALA |     -    86     -   187    55     -     -     -     -    74 |  288  37.50
 GODE |     -    83     -   346     -     -     -     -     -   103 |  286   0.20
 GOLD |     -    87     -     -     -     -     -     -     -   130 |  237  25.69
 GUAM |     -    38     -   210    44     -     -     -     -   152 |  288  36.12
 HOB2 |     -    84     -   169     -     -     -     -     -    72 |  288   0.07
 HRAO |     -   117     -     -     -     -     -     -     -   173 |  288  34.02
 IISC |     -   280     -   293     -     -     -     -     -   196 |  287  39.65
 KARR |     -   108     -     -   129     -     -     -     -     - |  288  18.63
 KERG |     -   123     -     -     -     -     -     -     -   183 |  287   1.71
 KIRU |     -    44     -    97     -     -     -     -     -     - |  288   5.96
 KOKB |     -     X     -   204   253     -     -     -     -   364 |  287   0.39
 KOSG |     -     -     -    59     -     -     -     -     -    39 |  286  38.90
 KWJ1 |     -     -     -   275   137     -     -     -     -   225 |  243    >>>
 LPGS |     -     -     -     X   284     -     -     -     -   353 |  217    >>>
 MAC1 |     -    70     -     -    52     -     -     -     -   147 |  288  19.58
 MALI |     -    61     -   363    83     -     -     -     -   102 |  288  98.51
 MATE |     -    58   216     -     -     -     -     -     -    42 |  288   0.18
 MAW1 |     -    88     -     -     -     -     -     -     -   131 |  274  29.36
 MCM4 |     -     -     -   370   191     -     -     -     -    68 |  279    >>>
 MDO1 |     -    54   168     -     -     -     -     -     -    39 |  276   4.58
 MEDI |     -    28     -     -     -     -     -     -     -    41 |  286   0.12
 METS |     -    68     -     -     -     -     -     -     -   101 |  281   1.02
 MKEA |     -     -     -   112     -     -     -     -     -    75 |  286  48.10
 NKLG |     -     -     -   247     -     -     -     -     -   165 |  287    >>>
 NLIB |     -    74   183     -     -     -     -     -     -    60 |  287   0.06
 NPLD |     -    24     -     -     -     -     -     -     -    36 |  285   0.04
 NRC2 |     -    43   141     -     -     -     -     -     -    41 |  286   0.04
 NTUS |     -    51     -     -     -     -     -     -     -    76 |  288   8.49
 NYA1 |     -    58     -     -    37     -     -     -     -   100 |  288   0.11
 NYAL |     -     -    73     -     -     -     -     -     -    63 |   78   0.33
 OHIG |     -   110     -   177    56     -     -     -     -    90 |  286  15.56
 ONSA |     -    40     -   108    42     -     -     -     -    39 |  288   7.01
 PENC |     -    29     -     -     -     -     -     -     -    44 |  285   4.67
 PERT |     -   139     -   190     -     -     -     -     -   129 |  288  17.67
 PIE1 |     -   124     -   272     -     -     -     -     -    44 |  288   0.05
 POTS |     -     -     -   159     -     -     -     -     -   106 |  285  25.75
 REYK |     -    18     -     -     -     -     -     -     -    27 |  285   9.91
 RIOG |     -    89     -   165    44     -     -     -     -    77 |  288  12.56
 SANT |     -    71     -   392   102     -     -     -     -    61 |  284  25.35
 SFER |     -   310     -     -     -     -     -     -     -   461 |  287  30.04
 STJO |     -    63   177     -    60     -     -     -     -    84 |  288  24.38
 SUTH |     -    77     -   208     -     -     -     -     -   111 |  288  39.26
 TRO1 |     -    22     -     -    26     -     -     -     -     - |  288  10.48
 TROM |     -     -     -    80     -     -     -     -     -    54 |  286  11.49
 TSKB |     -    52   102   118     -     -     -     -     -     - |  204   1.50
 URUM |     -    87     -     -   103     -     -     -     -   104 |  287  27.07
 USNO |     -    47     -   114     -     -     -     -     -    34 |  288   0.05
 USUD |     -    95     -   210     -     -     -     -     -   188 |  288   0.48
 VILL |     -    52     -   172     -     -     -     -     -    57 |  288  35.00
 WES2 |     -    41     -     -     -     -     -     -     -    60 |  285   0.06
 WHIT |     -    32     -     -    39     -     -     -     -     - |  288   4.20
 WSRT |     -    28     -     -     -     -     -     -     -    42 |  288   0.06
 WTZR |     -    55     -   125     -     -     -     -     -    25 |  288   0.27
 WUHN |     -    87     -   125    53     -     -     -     -   184 |  287  38.55
 YAR2 |     -   102     -   236     -     -     -     -     -    99 |  288   6.15
 YELL |     -   119   131   299     -     -     -     -     -   104 |  288   0.10
 -----+-------------------------------------------------------------+--------------
 TOT  |  5063   108   185   223   134  2692     -  4827     -   163 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

