
 GPS week: 1139   Day: 2   MJD: 52219                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     1   2648      0    -0.18     0.27     5.29     0.00
 cod |   288     0  23469    291     5.31     0.04     0.11    26.25
 emr |    95     0   3541      0   -73.34    -1.66     0.10    29.88
 esa |   288     3  16051    492   917.90     2.54     0.37     0.00
 gfz |   288     0  14930    265    -0.28     0.16     0.13    21.96
 igu |    96     1   2466      0    -0.19     0.30     2.91     0.00
 jpl |     0     0      0      0     0.00     0.00     0.00     0.00
 ngs |    96     1   2648      0    -0.17     0.27     4.97     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  23370    352   644.92     2.54     0.13    21.91

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -3057   274   -65   117   -26  4328     - -3565     -  -271 |
    2 | -5956   126  -172  -143  -274 -3962     - -5161     -   209 |
    3 | -2241    86   -34   134   204  1684     - -2961     -  -291 |
    4 | -3436    19   -30    88   232 -1261     - -3588     -  -242 |
    5 |  3118  -141    54    23   -10 -1045     -  2382     -   156 |
    6 |   431   -96    51   265   158  2503     -   438     -   -66 |
    7 | -3359    -1    28  -196   103 -3343     - -3498     -  -114 |
    8 |  6510    72   -74  -115  -130  4899     -  5275     -    78 |
    9 | -1516    58    19  -338   -51 -4754     - -1459     -   -25 |
   10 | -1393    39   -74   -67  -177  8409     - -1115     -   159 |
   11 |  2023    77   141   256   117  -980     -  2089     -  -268 |
   13 |  7049   185   157   242   -99 -5906     -  6626     -  -192 |
   14 |  7012    70   146   181   -56  1044     -  6650     -   -92 |
   15 |  4330  -161    45     -    49  9173     -  3653     -   122 |
   17 |  2184     3   -16  -175    46  -311     -  1898     -   -42 |
   18 |  6229   -96   194  -120    81  -955     -  6152     -   -49 |
   20 |  5824   190   -53   270    -4 -1063     -  5600     -  -200 |
   21 | -4533    79   -85   210   110     -     - -4464     -  -164 |
   22 |  4805   175  -213  -209   -66  -891     -  4819     -   -48 |
   23 | -3097     -  -209   403    93     -     - -1679     -     0 |
   24 |  2852    14   -32    44    98  6624     -  2688     -  -100 |
   25 |  1890   254  -164   142   205  1121     -  1741     -  -436 |
   26 | -5207    84   -35   -39    28  4900     - -4799     -  -111 |
   27 | -6822   128  -201   169    55-18807     - -4993     -  -118 |
   28 | -3676     3    31  -218   -65 -1303     - -3431     -    47 |
   29 | -1710   158   -11 -2587   105 -6005     - -1371     -  -288 |
   30 | -5972    24   -51    73   242 -2575     - -5663     -  -249 |
   31 | -2641   133  -113   185    78  8872     - -2533     -  -186 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -114     -  -511     -     -     -     -     -   137 |
 ALGO |     -    -2   159     X   -65     -     -     -     -     9 |
 AMC2 |     -   -20     -     -     -     -     -     -     -    24 |
 AOML |     -   -71     -     -     -     -     -     -     -    86 |
 AUCK |     -    79     -  -275     X     -     -     -     -   -95 |
 BAHR |     -    71    38  3949  -102     -     -     -     -     X |
 BILI |     -    36     -     -   -43     -     -     -     -     - |
 BOR1 |     -    50     -     -     -     -     -     -     -   -60 |
 BRUS |     -    40     -     -     -     -     -     -     -   -48 |
 CAS1 |     -    -7     -     -   -66     -     -     -     -    75 |
 CRO1 |     -  -236     -  -179     -     -     -     -     -   283 |
 DAEJ |     -  -831     -     -     -     -     -     -     -   995 |
 DAV1 |     -     7     -     -   -67     -     -     -     -    59 |
 DRAO |     -   -25    35     -     -     -     -     -     -    17 |
 GALA |     -     X     -  -145   139     -     -     -     -  -139 |
 GODE |     -  -119     -  -157     -     -     -     -     -   143 |
 GOLD |     -   -77     -     -     -     -     -     -     -    92 |
 GUAM |     -   113     -   276   120     -     -     -     -  -314 |
 HOB2 |     -    23     -  -225     -     -     -     -     -   -27 |
 HRAO |     -  -247     -     -     -     -     -     -     -   297 |
 IISC |     -   -34     -   605     -     -     -     -     -    40 |
 KARR |     -    -1     -     -     1     -     -     -     -     - |
 KERG |     -    92     -     -     -     -     -     -     -  -110 |
 KOKB |     -     -     - -1855  -258     -     -     -     -   259 |
 KOSG |     -   -85     -    50     -     -     -     -     -   102 |
 KWJ1 |     -     -     -  -377   190     -     -     -     -  -191 |
 LPGS |     -     -     - -1596  -169     -     -     -     -   170 |
 MAC1 |     -     7     -  -306   -58     -     -     -     -    52 |
 MALI |     -   166     -  -391  -262     -     -     -     -    64 |
 MATE |     -     -    10     -     -     -     -     -     -   -13 |
 MAW1 |     -    49     -     -     -     -     -     -     -   -59 |
 MCM4 |     -    59     -  -531   102     -     -     -     -  -174 |
 MDO1 |     -   -81   -99     -     -     -     -     -     -   142 |
 MEDI |     -   -90     -     -     -     -     -     -     -   108 |
 METS |     -  -201     -     -     -     -     -     -     -   241 |
 NKLG |     -  -118     -  -139     -     -     -     -     -   141 |
 NLIB |     -   -89    78     -     -     -     -     -     -     - |
 NPLD |     -    14     -     -     -     -     -     -     -   -16 |
 NRC2 |     -    21   164     -     -     -     -     -     -   -95 |
 NYA1 |     -    15     -     -   -68     -     -     -     -    51 |
 NYAL |     -     -    30     -     -     -     -     -     -   -41 |
 OHIG |     -     -     -  -248   -51     -     -     -     -    51 |
 ONSA |     -    31     -   194  -174     -     -     -     -   138 |
 PENC |     -   271     -     -     -     -     -     -     -  -325 |
 PERT |     -    90     -  -347     -     -     -     -     -  -108 |
 PETP |     -   121     -     -  -144     -     -     -     -     - |
 PIE1 |     -  -126     -  -582     -     -     -     -     -   150 |
 POTS |     -   -16     -   -64     -     -     -     -     -    19 |
 REYK |     -  -135     -     -     -     -     -     -     -   162 |
 RIOG |     -    37     -    14  -117     -     -     -     -    73 |
 SANT |     -     -     -   -80    75     -     -     -     -   -75 |
 SFER |     -  -230     -     -     -     -     -     -     -   275 |
 STJO |     -  -188   176     -   -29     -     -     -     -   180 |
 SUTH |     -   -40     -  -239     -     -     -     -     -    48 |
 TRO1 |     -   -55     -     -    66     -     -     -     -     - |
 USNO |     -  -138   171  -270     -     -     -     -     -    88 |
 USUD |     -    29     -  -282     -     -     -     -     -   -35 |
 VILL |     -     9     -    96     -     -     -     -     -   -11 |
 WES2 |     -   -47     -     -     -     -     -     -     -    57 |
 WHIT |     -    -7     -     -     8     -     -     -     -     - |
 WSRT |     -   -30     -     -     -     -     -     -     -    36 |
 WUHN |     -    22     -  -362  -270     -     -     -     -   243 |
 YAR2 |     -   241     -  -448     -     -     -     -     -  -289 |
 YELL |     -   -20   148    32   -17     -     -     -     -    10 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  9569   128    66   257    55  6217     -  9274     -   119 |  287   4.95
    2 |  5209   270   192   511   189  3771     -  5128     -   113 |  287   2.81
    3 |  7141    56   105   375    33  3695     -  6161     -    39 |  287   3.91
    4 |  1941    65    45   106    94  1076     -  1768     -   101 |  287   0.55
    5 |  4147    93    74    76   110  3084     -  3316     -    92 |  287   3.26
    6 |  9008    95    61   158    55  3808     -  9303     -    68 |  287   9.00
    7 |  3718    84    57   122   105  3365     -  3488     -   132 |  287   1.59
    8 |  7342    76   241   324    88  3316     -  6737     -   216 |  287   4.79
    9 |  5086   113   145   152   118  2884     -  5247     -    68 |  287   2.39
   10 |  6098   125   110   445   149  4350     -  5372     -   145 |  275   1.95
   11 |  1293   101    78   428   105  1136     -  1292     -    78 |  287   0.49
   13 |  2682    91    55   120   174  1704     -  2628     -   104 |  287   0.16
   14 |  1102    88    57    88    62   523     -  1253     -    96 |  287   0.43
   15 |  2323    91    43     -    47  4894     -  2109     -    80 |  287   2.66
   17 |   900    88    76   454    82   597     -   987     -   124 |  287   2.41
   18 |   785    61    94   118    82   607     -   687     -    80 |  287   0.40
   20 |  2558   103   123   290   268  1366     -  2417     -   164 |  287   0.41
   21 |  5265   195   130   134    77     -     -  5164     -   188 |  275   3.42
   22 |  3491   196   149   265   231   608     -  3613     -    83 |  287   1.11
   23 | 13113     -   205  1072   167     -     - 11468     -   197 |  275   8.27
   24 |  1941   234    89   433   131  2724     -  2016     -   125 |  287   1.91
   25 |  2048    59   109   588    47  1092     -  2074     -    65 |  287   1.32
   26 |  2141   112    90    97    75  2163     -  1954     -    78 |  287   0.30
   27 | 10223   141    83   124   136  4978     -  9352     -   272 |  287   3.51
   28 |  4161   113   104   146    65  1464     -  4556     -   106 |  287   0.38
   29 |  1187   144    51   818    65  2038     -  1190     -   159 |  287   0.79
   30 |  2991    89    69   200   128   819     -  2999     -    81 |  287   0.72
   31 |  3951   121   155   265    61  2139     -  3870     -   146 |  287   3.18
 -----+-------------------------------------------------------------+--------------
 ALBH |     -   154     -   488     -     -     -     -     -   184 |  285   0.19
 ALGO |     -    54    89     X    61     -     -     -     -    82 |  288   0.14
 AMC2 |     -    28     -     -     -     -     -     -     -    34 |  286   0.09
 AOML |     -    40     -     -     -     -     -     -     -    48 |  286  25.38
 AUCK |     -    50     -   405     X     -     -     -     -    60 |  264  26.76
 BAHR |     -    48    63   106    40     -     -     -     -     X |  287   1.26
 BILI |     -    64     -     -    76     -     -     -     -     - |  287  20.13
 BOR1 |     -   224     -     -     -     -     -     -     -   268 |  286   2.27
 BRUS |     -    21     -     -     -     -     -     -     -    26 |  286   0.09
 CAS1 |     -    95     -     -    35     -     -     -     -   106 |  287   8.14
 CRO1 |     -   214     -   312     -     -     -     -     -   256 |  284   0.24
 DAEJ |     -    67     -     -     -     -     -     -     -    80 |  285   3.03
 DAV1 |     -    49     -     -    40     -     -     -     -    69 |  287  16.36
 DRAO |     -   114    88     -     -     -     -     -     -   110 |  288   0.10
 GALA |     -     X     -   103    43     -     -     -     -    43 |  285  28.34
 GODE |     -    37     -   530     -     -     -     -     -    45 |  282  91.57
 GOLD |     -    59     -     -     -     -     -     -     -    71 |  285  27.85
 GUAM |     -    59     -   595    72     -     -     -     -    56 |  287  41.89
 HOB2 |     -    68     -   105     -     -     -     -     -    81 |  285   0.14
 HRAO |     -   213     -     -     -     -     -     -     -   256 |  286  27.04
 IISC |     -   220     -   730     -     -     -     -     -   264 |  247  31.35
 KARR |     -    40     -     -    47     -     -     -     -     - |  288  19.38
 KERG |     -   163     -     -     -     -     -     -     -   195 |  236   1.65
 KOKB |     -     -     -  1772   150     -     -     -     -   150 |  104   1.35
 KOSG |     -    36     -   157     -     -     -     -     -    43 |  286  18.07
 KWJ1 |     -     -     -   412   285     -     -     -     -   285 |  196 112.46
 LPGS |     -     -     -  1297   428     -     -     -     -   429 |  165  82.92
 MAC1 |     -   103     -   243    96     -     -     -     -   210 |  288  13.29
 MALI |     -    44     -   125    56     -     -     -     -    97 |  287  21.79
 MATE |     -     -    32     -     -     -     -     -     -    44 |   94   0.12
 MAW1 |     -    54     -     -     -     -     -     -     -    65 |  283  29.73
 MCM4 |     -    91     -   330   101     -     -     -     -   192 |  287  25.19
 MDO1 |     -    35    81     -     -     -     -     -     -    63 |  281  23.19
 MEDI |     -    36     -     -     -     -     -     -     -    43 |  286   0.25
 METS |     -    44     -     -     -     -     -     -     -    52 |  242   1.33
 NKLG |     -    35     -   180     -     -     -     -     -    42 |  285    >>>
 NLIB |     -   117   103     -     -     -     -     -     -     - |   76 594.26
 NPLD |     -    23     -     -     -     -     -     -     -    27 |  285   0.12
 NRC2 |     -    86   104     -     -     -     -     -     -    69 |  249   0.09
 NYA1 |     -    33     -     -    51     -     -     -     -    71 |  288   0.14
 NYAL |     -     -    40     -     -     -     -     -     -    55 |   94   0.12
 OHIG |     -     -     -   188   156     -     -     -     -   156 |  279  14.24
 ONSA |     -    85     -   102    53     -     -     -     -    62 |  287   5.96
 PENC |     -    57     -     -     -     -     -     -     -    69 |  285   5.49
 PERT |     -    65     -    84     -     -     -     -     -    78 |  286  17.60
 PETP |     -    81     -     -    97     -     -     -     -     - |  282  33.02
 PIE1 |     -    27     -   124     -     -     -     -     -    32 |  287   0.11
 POTS |     -    48     -   102     -     -     -     -     -    58 |  286  20.21
 REYK |     -   124     -     -     -     -     -     -     -   148 |  238   8.98
 RIOG |     -    31     -   144    37     -     -     -     -    46 |  288  19.79
 SANT |     -     -     -   407   352     -     -     -     -   353 |  235  31.60
 SFER |     -    49     -     -     -     -     -     -     -    59 |  286   0.99
 STJO |     -    53    83     -    49     -     -     -     -    79 |  288  24.53
 SUTH |     -   238     -   315     -     -     -     -     -   286 |  285  23.46
 TRO1 |     -    18     -     -    21     -     -     -     -     - |  287  11.11
 USNO |     -    48    75   129     -     -     -     -     -    71 |  285   0.14
 USUD |     -    46     -    74     -     -     -     -     -    56 |  287   0.49
 VILL |     -    24     -   118     -     -     -     -     -    29 |  287  35.94
 WES2 |     -    97     -     -     -     -     -     -     -   117 |  278   0.16
 WHIT |     -   238     -     -   284     -     -     -     -     - |  288   6.06
 WSRT |     -    24     -     -     -     -     -     -     -    29 |  286   0.10
 WUHN |     -    85     -    82    72     -     -     -     -    48 |  286  41.35
 YAR2 |     -    46     -   221     -     -     -     -     -    55 |  265  13.01
 YELL |     -   202    75   426   198     -     -     -     -   211 |  288   0.22
 -----+-------------------------------------------------------------+--------------
 TOT  |  5290   110   104   375   131  2905     -  4970     -   135 |


 BEST CLOCK FIT: BRUS   286   0.09 (ns) 

