
 GPS week: 1133   Day: 2   MJD: 52177                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2688      0    -0.01    -0.04     4.22     0.00
 cod |   288     0  25215    246    -0.16    -2.37     0.07    20.38
 emr |    96     0   3814      0   720.97     5.65     0.08    20.08
 esa |   288     0  18496   2910   368.48     4.58     0.16     5.96
 gfz |   288     0  15522    234    -0.49     0.90     0.10    14.94
 igu |    96     0   2304      0     0.00     0.00     4.88     0.00
 jpl |   279     0  10408    557     2.14     2.62     0.06    24.32
 ngs |    96     0   2688      0    -0.01    -0.04     4.18     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  25132   1208   720.75     5.92     0.09    14.32

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -6706   -57   -71  -120   218 -3918    34 -5493     -  -108 |
    2 | -1032   105   -67     X  -111     -    -8 -1145     -     - |
    3 | -2967    50   131     7    88    97    15 -2501     -  -233 |
    4 |   -79    31    16   181   212 -2091  -157  -356     -  -276 |
    5 | -2999   -84   -86   202    76 13657   142 -2456     -   -53 |
    6 | -9735    21   -61    62   263 -9796  -215 -8546     -  -215 |
    7 |  1647    91   148    10  -109  4075   -92  1723     -    23 |
    8 |  6404   128  -111   133   -20  2313  -314  5310     -   -33 |
    9 |  5796   129  -159   -27   -70  -514    64  4924     -  -103 |
   10 | -6406    21  -117   122   -63  1053    43 -6416     -    -9 |
   11 |  3368   -23    98   -16    -4  2633    75  3511     -   -94 |
   13 |  5143    75    69   -64    63  4045   -99  5011     -   -58 |
   14 |  2417    96   -11   110   -70  2262   -88  2431     -   -65 |
   15 |  4680    41   -61     -  -111 20365   225  4116     -  -189 |
   17 |  2887   126    98     X   -75     -    83  2973     -  -248 |
   18 |  3873   107    90  -228  -174  3447   117  4007     -    31 |
   20 |  4556   -30   162  -157   105  3090   -99  4430     -   -41 |
   21 | -4113    90  -127     X  -192     -   226 -6241     -  -145 |
   22 |   874    77     1    97    46 -3511    35   612     -  -209 |
   23 |  2372   181   -27    35  -138     -   356  2360     -  -256 |
   24 |  5036    -2   -85   240    33 12264   269  3992     -  -193 |
   25 | -3794    15  -211   -32   390  -418    27 -3662     -  -350 |
   26 |  2447   106   -66   240  -169  7906   -77  2104     -     X |
   27 | -9620    81   -22    85    86-15693  -315 -7196     -  -101 |
   28 |  1490    15   -97     X  -111   556    37  1585     -    95 |
   29 | -1416    95  -189   -12   146   -54    83 -1339     -  -296 |
   30 | -3262    26   -19   211   209-32071  -114 -3048     -  -186 |
   31 |  -791   -75   152   -24    83 -9637   125  -623     -  -192 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -246     -     X     -     -   -45     -     -   428 |
 ALGO |     -   140   174     X   -49     -  -118     -     -   -35 |
 AMC2 |     -   111     -     -     -     -  -233     -     -   228 |
 ANKR |     -   -15     -    50     -     -     -     -     -     - |
 AOML |     -   -24     -     -     -     -     -     -     -    34 |
 AREQ |     -   -35     -   180     -     -     -     -     -   -19 |
 ARTU |     -   134     -     -  -183     -     -     -     -     - |
 AUCK |     -    48     -   -53     -     -     -     -     -   -45 |
 BAHR |     -    27   100   -45   -87     -   -11     -     -    43 |
 BILI |     -    50     -     -   -68     -     -     -     -     - |
 BOR1 |     -  -356     -     -     -     -     -     -     -   506 |
 BRMU |     -     -     -   -97   126     -     -     -     -   -90 |
 BRUS |     -    85     -     -     -     -   -53     -     -   -34 |
 CAS1 |     -  -158     -     -  -118     -    96     -     -   194 |
 COCO |     -   -53     -     -   -28     -     -     -     -   101 |
 CRO1 |     -  -240     -     3     -     -    12     -     -   320 |
 DAV1 |     -     1     -     -  -142     -     -     -     -   150 |
 DRAO |     -   -66     3     -     -     -     -     -     -    93 |
 FAIR |     -     -    80   -85     -     -     X     -     -    -4 |
 FORT |     -  -101     -   344     -     -     -     -     -     - |
 GALA |     -    39     -     -   -67     -    13     -     -    -6 |
 GUAM |     -    84     -    46   248     -  -238     -     -     X |
 HOB2 |     -   193     -  -427   -36     -     -     -     -   -73 |
 HRAO |     -   -25     -     -     -     -  -126     -     -   242 |
 IISC |     -    -6     -  -283     -     -     -     -     -   120 |
 KERG |     -  -331     -     -     -     -   637     -     -  -500 |
 KIRU |     -    60     -  -205     -     -     -     -     -     - |
 KOKB |     -     -     -    75    88     -   -73     -     -     X |
 KOSG |     -   -89     -   -48     -     -     -     -     -   148 |
 LPGS |     -    -3     -  -314     X     -    75     -     -     X |
 MAC1 |     -   114     -   -24  -256     -     -     -     -   117 |
 MAS1 |     -     -  -223  -304   668     -     -     -     -  -478 |
 MAW1 |     -   -23     -     -     -     -     -     -     -    32 |
 MCM4 |     -   289     -     X    -5     -     -     -     -  -460 |
 MDO1 |     -   -47   -99     -     -     -     -     -     -   115 |
 MEDI |     -  -115     -     -     -     -     -     -     -   163 |
 METS |     -   -26     -     -     -     -     -     -     -    37 |
 MKEA |     -     -    20  -147     -     -     -     -     -    51 |
 MSKU |     -    34     -     -   -47     -     -     -     -     - |
 NKLG |     -     -     -  -488     -     -     -     -     -   203 |
 NLIB |     -   -51     -     -     -     -     -     -     -    72 |
 NPLD |     -  -129     -     -     -     -     -     -     -   184 |
 NRC2 |     -    18   191     -     -     -  -107     -     -    61 |
 NTUS |     -   -95     -     -     -     -     -     -     -   135 |
 OHIG |     -   -23     -  -125  -116     -    86     -     -    59 |
 ONSA |     -   -79   114   -25     -     -     -     -     -    70 |
 PENC |     -    93     -     -     -     -     -     -     -  -132 |
 PERT |     -    72     -  -115     -     -     -     -     -   -55 |
 PIE1 |     -   -79     -    35     -     -     -     -     -    92 |
 POTS |     -   -54     -    50     -     -     -     -     -    57 |
 REYK |     -   -63     -     -     -     -     -     -     -    90 |
 RIOG |     -  -122     -   266    87     -     -     -     -   -16 |
 SANT |     -     -     -   239    43     -     -     -     -  -147 |
 SELE |     -   147     -  -502     -     -     -     -     -     - |
 SFER |     -  -540     -     -     -     -     -     -     -   769 |
 STJO |     -   -22   220     -  -122     -     -     -     -    56 |
 THTI |     -     -     -     -  -224     -   -28     -     -   274 |
 TIDB |     -     X     -     X     -     -   -57     -     -    97 |
 TRO1 |     -  -104     -     -   142     -     -     -     -     - |
 TROM |     -     -     -   186     -     -     -     -     -   -78 |
 TSKB |     -    82    33  -328     -     -     -     -     -     - |
 URUM |     -   -20     -     -   -26     -     -     -     -    55 |
 USNO |     -    88     -  -485     -     -    11     -     -    37 |
 USUD |     -   -35     -   -12     -     -     -     -     -    54 |
 VILL |     -    25     -   -52     -     -     -     -     -   -14 |
 WES2 |     -    47     -     -     -     -     -     -     -   -67 |
 WHIT |     -    34     -     -   -47     -     -     -     -     - |
 WSRT |     -    54     -     -     -     -   -89     -     -    70 |
 WTZR |     -    -8     -    36     -     -   -54     -     -    85 |
 WUHN |     -     0     -    -2   246     -   -81     -     -  -124 |
 YELL |     -    14   123  -263     -     -     X     -     -    31 |
 YSSK |     -   -98     -     -     -     -    82     -     -     - |
 ZWEN |     -     -     -     -  -553     -     -     -     -   577 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  8040    58    67   112    61  2871    32  7179     -    44 |  288   3.70
    2 |  6208    69    60     X    76     -    35  6676     -     - |  288   2.88
    3 |  4889    75   108   137    64  3696    41  5658     -    77 |  288   3.03
    4 |  1314    62    54   136   146   736    24  1548     -   152 |  288   0.69
    5 |  5273    75    48   114    53  6388    57  5080     -    85 |  288   2.03
    6 |  6757   113    89   219   135  5464    57  7955     -   148 |  288   5.99
    7 |  2554   102    90   180    44  2084    34  2452     -   134 |  288   2.12
    8 |  5168    52    59   121    68  3077    58  4121     -    49 |  288   2.89
    9 |  3701    57    68   107    50  2536    24  4002     -   113 |  288   2.51
   10 |  3915    98    49   205    98  2033    55  3980     -   314 |  288   2.43
   11 |   819    66    97   207    88  1713    43   804     -    92 |  288   0.44
   13 |   935    71   117   143    71  2332    62   924     -    80 |  288   0.20
   14 |   572    68    55   152   119  1816    35   661     -    63 |  288   0.37
   15 |  4449    79    53     -   124  5315    39  4933     -    61 |  288   2.13
   17 |  1091   110   120     X    83     -    62   932     -   158 |  288   2.95
   18 |  1036    51    62   219   136  1798    46  1070     -    62 |  288   0.46
   20 |  1086   116    90   128   138  1603    23  1022     -    61 |  288   0.31
   21 |  5968    57   178     X   138     -    63  2777     -   132 |  288   1.80
   22 |  1770    60   112   128   211  1494    68  2062     -   172 |  288   1.47
   23 |  5297   112    53   314   140     -    99  5256     -   224 |  288   5.80
   24 |  7226   126    43   263    84  3686   110  6747     -   141 |  288   2.52
   25 |  2477    87   122   152    51  2602    40  2615     -   147 |  288   1.63
   26 |  2201    54    60   174    82  2535    16  1874     -     X |  288   0.40
   27 |  6361    60    41   177    37  6619    58  7230     -    84 |  288   4.62
   28 |  2442    87   100     X   110  2008    80  2535     -    48 |  286   1.00
   29 |   818   134    49    86   146  1369    37   835     -    39 |  288   1.01
   30 |  1212    83    51   108    96 17505    50  1007     -    44 |  288   1.11
   31 |  6032    73    36   167   130  5490    84  5810     -    37 |  288   3.67
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    34     -     X     -     -    31     -     -    29 |  288   0.08
 ALGO |     -    48    35     X    37     -    69     -     -    82 |  288   0.07
 AMC2 |     -    61     -     -     -     -    36     -     -    38 |  288   0.06
 ANKR |     -    44     -   149     -     -     -     -     -     - |  288  42.70
 AOML |     -    21     -     -     -     -     -     -     -    29 |  273  22.68
 AREQ |     -    23     -   106     -     -     -     -     -    30 |  288  32.29
 ARTU |     -    91     -     -   124     -     -     -     -     - |  281  22.91
 AUCK |     -    67     -   164     -     -     -     -     -   125 |  288  20.73
 BAHR |     -    59    37   129    27     -    44     -     -    27 |  288   0.40
 BILI |     -    30     -     -    41     -     -     -     -     - |  286  15.36
 BOR1 |     -    16     -     -     -     -     -     -     -    23 |  230   3.35
 BRMU |     -     -     -   140    36     -     -     -     -    52 |  288  44.13
 BRUS |     -    19     -     -     -     -    47     -     -    73 |  288   0.05
 CAS1 |     -    60     -     -    58     -    41     -     -    93 |  288   9.11
 COCO |     -    71     -     -    56     -     -     -     -    63 |  288  11.62
 CRO1 |     -    45     -   104     -     -    59     -     -   106 |  288   0.16
 DAV1 |     -    87     -     -    78     -     -     -     -    96 |  288  23.24
 DRAO |     -    34    34     -     -     -     -     -     -    52 |  288   0.09
 FAIR |     -     -    67   199     -     -     X     -     -    69 |  276   0.21
 FORT |     -    44     -   150     -     -     -     -     -     - |  107   0.14
 GALA |     -   132     -     -   154     -    45     -     -    69 |  284  26.00
 GUAM |     -    73     -   135   155     -   147     -     -     X |  288  26.14
 HOB2 |     -    65     -   199    45     -     -     -     -    88 |  288   0.13
 HRAO |     -    43     -     -     -     -    25     -     -    46 |  288  40.33
 IISC |     -   141     -    90     -     -     -     -     -   133 |  288  40.35
 KERG |     -    62     -     -     -     -    56     -     -    96 |  285   1.86
 KIRU |     -    39     -   134     -     -     -     -     -     - |  288   6.01
 KOKB |     -     -     -   178   129     -    59     -     -     X |  287   0.55
 KOSG |     -    25     -   145     -     -     -     -     -    38 |  288  10.54
 LPGS |     -   138     -   235     X     -   110     -     -     X |  250  52.24
 MAC1 |     -    84     -   136    46     -     -     -     -    91 |  288  15.30
 MAS1 |     -     -    63   126    47     -     -     -     -    46 |  288   3.89
 MAW1 |     -    43     -     -     -     -     -     -     -    61 |  282  27.02
 MCM4 |     -   138     -     X   114     -     -     -     -   291 |  211  52.74
 MDO1 |     -    38    33     -     -     -     -     -     -    47 |  274  19.65
 MEDI |     -    29     -     -     -     -     -     -     -    41 |  286   0.50
 METS |     -    24     -     -     -     -     -     -     -    34 |  285   0.64
 MKEA |     -     -    42   113     -     -     -     -     -    40 |  286  52.93
 MSKU |     -    91     -     -   124     -     -     -     -     - |  234  41.82
 NKLG |     -     -     -   207     -     -     -     -     -    86 |  268    >>>
 NLIB |     -    40     -     -     -     -     -     -     -    57 |  287   0.12
 NPLD |     -   180     -     -     -     -     -     -     -   256 |  284   0.18
 NRC2 |     -    42    43     -     -     -    44     -     -    59 |  288   0.06
 NTUS |     -    27     -     -     -     -     -     -     -    39 |  288   7.26
 OHIG |     -    79     -   144    38     -    76     -     -    30 |  288  12.89
 ONSA |     -    27    50   132     -     -     -     -     -    33 |  288   1.38
 PENC |     -    25     -     -     -     -     -     -     -    36 |  285   3.03
 PERT |     -    29     -   134     -     -     -     -     -    48 |  288  20.65
 PIE1 |     -    38     -    97     -     -     -     -     -    51 |  288   0.06
 POTS |     -    31     -   107     -     -     -     -     -    57 |  288  13.55
 REYK |     -    20     -     -     -     -     -     -     -    28 |  286   9.43
 RIOG |     -    65     -   116    65     -     -     -     -    45 |  288  16.00
 SANT |     -     -     -   129   143     -     -     -     -   164 |  286  23.81
 SELE |     -    34     -   118     -     -     -     -     -     - |  274  38.00
 SFER |     -    13     -     -     -     -     -     -     -    18 |  209   1.20
 STJO |     -    38    79     -    44     -     -     -     -    42 |  288   2.41
 THTI |     -     -     -     -   146     -    76     -     -    50 |  287   4.00
 TIDB |     -     X     -     X     -     -    63     -     -   108 |  231  23.09
 TRO1 |     -    35     -     -    48     -     -     -     -     - |  288  13.59
 TROM |     -     -     -   106     -     -     -     -     -    44 |  276  14.74
 TSKB |     -    78    79   255     -     -     -     -     -     - |  218   0.61
 URUM |     -    45     -     -    31     -     -     -     -    44 |  288  26.46
 USNO |     -    69     -   223     -     -    62     -     -    91 |  288   0.06
 USUD |     -    25     -    95     -     -     -     -     -    33 |  288   0.36
 VILL |     -    30     -   123     -     -     -     -     -    49 |  288  29.89
 WES2 |     -    35     -     -     -     -     -     -     -    50 |  286   0.10
 WHIT |     -    18     -     -    25     -     -     -     -     - |  288  11.23
 WSRT |     -    36     -     -     -     -    52     -     -    43 |  288   0.06
 WTZR |     -    51     -   102     -     -    55     -     -    39 |  288   0.08
 WUHN |     -    56     -   122    58     -    47     -     -    38 |  287  30.64
 YELL |     -    38    61   186     -     -     X     -     -    64 |  287   0.08
 YSSK |     -    95     -     -     -     -    80     -     -     - |  275  14.98
 ZWEN |     -     -     -     -    34     -     -     -     -    35 |  278  23.74
 -----+-------------------------------------------------------------+--------------
 TOT  |  4223    69    75   157    97  4884    61  4176     -    94 |


 BEST CLOCK FIT: BRUS   288   0.05 (ns) 

