
 GPS week: 1131   Day: 6   MJD: 52167                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2655      0     0.26    -0.03     5.26     0.00
 cod |   288     0  26156     42     3.78    -3.24     0.08    19.55
 emr |    96     0   3807      0   265.29     9.65     0.09    18.97
 esa |   288     0  18103   1955   263.18     9.74     0.17     8.06
 gfz |   288     0  15682    588     0.63    -1.36     0.09    17.85
 igu |    96     0   2496     13     0.04     0.39     4.43     0.00
 jpl |   279     0  10442    681     0.95    -1.32     0.11    12.87
 ngs |    96     0   2655      0     0.25    -0.02     5.01     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  25655    356   651.90     6.21     0.07    22.71

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  3049    -3   -71  -126   128 10171   -86  2365     -   -10 |
    2 | -6509    -4   -64  -129    35 -3196   155 -5445     -    -4 |
    3 | -9300    85   -56   -60   144 -5263    17 -8497     -  -154 |
    4 | -3605    51  -146   363   182  7835  -258 -3381     -  -205 |
    5 | -4038   -14   -65   399   -53 -5631   145 -3764     -  -107 |
    6 |  1663   119   -58   242    60 -4759  -118  1266     -  -188 |
    7 | -5462    48   -60    46    26   162  -187 -5208     -   -10 |
    8 |-13047   135   -70   -89     1-33842   -83-11230     -   -45 |
    9 |  2832   174  -158    48   -94  4149   121  1884     -   -82 |
   10 |  2146    58  -190   517  -129  3545   -30  2003     -   -71 |
   11 |  2874   -18    74    99   128  4511     1  2966     -  -141 |
   13 |  4908    99    60   -43   121   569  -158  4884     -  -139 |
   14 |  4870   122    47    41    25   307   -83  4410     -  -129 |
   15 |  6470    81   -41     -  -201  5558   335  4928     -    10 |
   17 |  6244     -    35     X     -     -   877  6148     -  -401 |
   18 |  5620   111    10     X  -120  4114   -26  5514     -     3 |
   20 |  4253     9   118    -9    48  3667    35  4289     -   -84 |
   21 | -9082   252   -87     X    10     -   189 -8394     -  -246 |
   22 |  1975   173   135   -93   -37  4860   298  1715     -  -206 |
   23 |  2040   216   -99     X   -45 -8580   198  2437     -  -178 |
   24 |  1865    80  -220   545   -33  7216   -57  1029     -  -160 |
   25 |  2198    81   -31   357   143  3790   -84  1988     -  -279 |
   26 | -1808    88  -148   372    37  -816   -27 -1861     -  -189 |
   27 |  6058    39   -98    56   194  4974  -244  5914     -  -115 |
   28 |  7694   -42    19  -106   -90  1006    68  6763     -   121 |
   29 | -1813   201  -160    81    89  6829   -10 -1763     -  -224 |
   30 | -7477   -35    32   449   146-20700  -198 -6992     -  -199 |
   31 | -2572    43     0  -167    21  4878   123 -1960     -   -37 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -240     -     X     -     -    19     -     -   198 |
 ALGO |     -    46   171     X   -64     -  -153     -     -    47 |
 AMC2 |     -   -71     -     -     -     -  -193     -     -   168 |
 ANKR |     -    96     -  -233     -     -     -     -     -     - |
 AOML |     -   -69     -     -     -     -     -     -     -    59 |
 AREQ |     -   -29     -    -8     -     -     -     -     -    28 |
 AUCK |     -   -17     -   173     X     -     -     -     -   -46 |
 BAHR |     -    98    10  -174   -17     -   -84     -     -    33 |
 BILI |     -    38     -     -   -41     -     -     -     -     - |
 BOR1 |     -   -20     -     -     -     -     -     -     -    17 |
 BRMU |     -   113     -   -62   -65     -     -     -     -   -24 |
 BRUS |     -    48     -     -     -     -   -35     -     -   -22 |
 CAS1 |     -   -60     -     -   -82     -    16     -     -   109 |
 CRO1 |     -  -425     -   -53     -     -     4     -     -   206 |
 DAV1 |     -   140     -     -  -172     -     -     -     -    15 |
 DRAO |     -  -115    27     -     -     -     -     -     -    91 |
 EISL |     -  -367     -   890     -     -     -     -     -     - |
 GALA |     -    27     -     -    81     -    26     -     -  -101 |
 GRAZ |     -   -62     -     -     -     -     -     -     -    53 |
 GUAM |     -   -96     -   435   -26     -  -284     -     -   100 |
 HOB2 |     -   -46     -  -113     -     -     -     -     -    56 |
 HRAO |     -  -167     -     -     -     -  -265     -     -   288 |
 IISC |     -    59     -  -370     -     -     -     -     -    86 |
 KARR |     -     4     -     -    -5     -     -     -     -     - |
 KERG |     -    22     -     -     -     -   286     -     -  -167 |
 KIRU |     -   175     -  -425     -     -     -     -     -     - |
 KOKB |     -     -     -   203   209     -     X     -     -  -266 |
 KOSG |     -   -46     -  -185     -     -     -     -     -   106 |
 LPGS |     -     4     -  -381     X     -   129     -     -    67 |
 MALI |     -  -211     -  -139   477     -     -     -     -  -156 |
 MAS1 |     -    49   152  -388  -139     -     -     -     -   163 |
 MATE |     -   -39     -     -     -     -     X     -     -    34 |
 MAW1 |     -   103     -     -     -     -     -     -     -   -88 |
 MCM4 |     -   301     -     X  -330     -     -     -     -     X |
 MDO1 |     -  -140     -     -     -     -     -     -     -   120 |
 MEDI |     -   -49     -     -     -     -     -     -     -    42 |
 METS |     -  -102     -     -     -     -     -     -     -    88 |
 MKEA |     -   -80   213   153     -     -     -     -     -   -47 |
 MSKU |     -   117     -     -  -128     -     -     -     -     - |
 NKLG |     -     -     -  -160     -     -     -     -     -    57 |
 NLIB |     -    17     -     -     -     -     -     -     -   -15 |
 NPLD |     -  -167     -     -     -     -     -     -     -   144 |
 NRC2 |     -   -93   149  -295     -     -   -29     -     -   160 |
 NTUS |     -   -35     -     -     -     -     -     -     -    30 |
 NYA1 |     -    28     -     -   -62     -   -76     -     -    65 |
 NYAL |     -     -    12   101     -     -     -     -     -   -38 |
 OHIG |     -   -43     -  -171   -38     -    73     -     -    89 |
 ONSA |     -   -51    94  -163     -     -     -     -     -    75 |
 PENC |     -   185     -     -     -     -     -     -     -  -159 |
 PERT |     -   105     -    46     -     -     -     -     -  -108 |
 PETP |     -   -37     -     -    41     -     -     -     -     - |
 PIE1 |     -  -309     -   206     -     -     -     -     -   153 |
 POTS |     -   -13     -  -164    -9     -     -     -     -    77 |
 REYK |     -   -19     -     -     -     -     -     -     -    17 |
 RIOG |     -   -97     -   294    91     -     -     -     -   -93 |
 SANT |     -   -85     -   206   -27     -     -     -     -   -27 |
 SFER |     -  -752     -     -     -     -     -     -     -   648 |
 STJO |     -  -193   206     -  -106     -     -     -     -   194 |
 THTI |     -     -     -     -     5     -  -137     -     -    70 |
 TLSE |     -   141     -     -     -     -     -     -     -  -121 |
 TSKB |     -   121   111  -112  -161     -     -     -     -    37 |
 USNO |     -    20     -  -319     -     -   -25     -     -   109 |
 USUD |     -   -84     -    73     -     -     -     -     -    47 |
 VILL |     -    -3    41  -136     -     -     -     -     -    40 |
 WES2 |     -   -73     -     -     -     -     -     -     -    63 |
 WHIT |     -   -16     -     -    18     -     -     -     -     - |
 WSRT |     -    -9     -     -     -     -  -108     -     -    66 |
 WTZR |     -   -84     -  -111     -     -   -14     -     -   119 |
 WUHN |     -  -171     -  -463  -129     -   183     -     -   314 |
 YELL |     -    46   153  -242     -     -  -207     -     -   117 |
 YSSK |     -    44     -     -     -     -   -66     -     -     - |
 ZWEN |     -     -     -  -258    18     -     -     -     -    78 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4729    44    69   104    36  2900    63  4146     -    65 |  288   3.46
    2 |  8035    85   117   189    84  3267   168  6382     -    58 |  288   3.63
    3 |  3960   106   142   107    85  2014   116  3703     -    50 |  288   1.58
    4 |  1708    59    46    77    43  2830   114  1708     -    50 |  288   0.77
    5 |  5881    62    80   178    61  3424    93  5795     -    25 |  288   2.93
    6 | 13228    67    90   301   151  7318    84 12175     -    36 |  288   8.74
    7 |  1073   148    38   163    77  1325    52  1400     -    43 |  288   1.74
    8 |  4192   201    58    97   131 15183    61  4432     -    51 |  288   2.00
    9 |  4913   149   118   233    74  2024   134  4963     -    72 |  288   1.77
   10 |  3046    72    70   308    68  2325    45  3087     -    68 |  288   2.37
   11 |   723   139   104   199    89  1883    45   987     -    29 |  288   0.45
   13 |   987    51    62   168    76   630    78  1005     -   107 |  288   0.21
   14 |  2007    57   111   130   174  1025    70  1968     -   172 |  288   0.29
   15 |  5503   125   132     -    44  2925    87  5575     -    69 |  288   2.82
   17 |  5014     -   194     X     -     -   219  5152     -   150 |  136   2.14
   18 |   854    97   119     X    58  1105    84   957     -   112 |  288   0.46
   20 |   854    60    58   105   161   901    76   947     -    92 |  288   0.22
   21 |  4148   120   127     X   286     -   206  4131     -   237 |  288   2.47
   22 |  1597   130    93   126   162  2812   161  1832     -    71 |  288   1.35
   23 |  7882    65    72     X    68  1949   149  7944     -    49 |  288   6.37
   24 |  9349    80    57   170    56  4170    78  9055     -    69 |  288   4.07
   25 |  2028    91   132   194   119  2461    50  2255     -   101 |  288   1.58
   26 |  1167    69   115   139    82  1004    35  1328     -    82 |  288   0.35
   27 | 10993   135   122   125    57  6382   101 10587     -    82 |  288   4.49
   28 |  5620    92    85   168   154  2527    92  5233     -    45 |  288   1.47
   29 |   793   121    69   123    48  2405    78   822     -    84 |  288   0.60
   30 |  1715    43    90   170    75  9800    96  1470     -    28 |  288   1.27
   31 |  4525   124    89   269    84  2527   108  4436     -    29 |  288   2.57
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    28     -     X     -     -    61     -     -    25 |  288   0.10
 ALGO |     -    27    36     X    50     -    85     -     -    21 |  288   0.10
 AMC2 |     -    41     -     -     -     -    64     -     -    33 |  288   0.11
 ANKR |     -    50     -   120     -     -     -     -     -     - |  288  42.55
 AOML |     -    74     -     -     -     -     -     -     -    63 |  283  22.96
 AREQ |     -    75     -   101     -     -     -     -     -    78 |  288  26.25
 AUCK |     -    50     -   224     X     -     -     -     -    79 |  288  17.63
 BAHR |     -    37    76    62    37     -   108     -     -    66 |  288   0.26
 BILI |     -    53     -     -    58     -     -     -     -     - |  287  12.85
 BOR1 |     -   105     -     -     -     -     -     -     -    90 |  286   1.57
 BRMU |     -    46     -    88    69     -     -     -     -    37 |  288  28.00
 BRUS |     -    75     -     -     -     -   102     -     -    30 |  288   0.06
 CAS1 |     -    84     -     -    57     -    68     -     -   112 |  287  10.11
 CRO1 |     -   304     -   168     -     -    88     -     -   116 |  288   0.42
 DAV1 |     -    42     -     -    47     -     -     -     -    62 |  288  27.17
 DRAO |     -    50    53     -     -     -     -     -     -    33 |  288   0.04
 EISL |     -    37     -    90     -     -     -     -     -     - |  145  27.71
 GALA |     -   118     -     -    52     -   104     -     -    59 |  288  27.91
 GRAZ |     -    38     -     -     -     -     -     -     -    33 |  282  14.37
 GUAM |     -    54     -   179    51     -   125     -     -    48 |  288  20.85
 HOB2 |     -   120     -   203     -     -     -     -     -    75 |  288  41.16
 HRAO |     -    29     -     -     -     -   101     -     -    47 |  288  34.43
 IISC |     -   121     -   134     -     -     -     -     -    67 |  276  32.83
 KARR |     -    47     -     -    52     -     -     -     -     - |  287  28.37
 KERG |     -   109     -     -     -     -    68     -     -    73 |  287   2.03
 KIRU |     -    63     -   153     -     -     -     -     -     - |  274  11.22
 KOKB |     -     -     -   149   138     -     X     -     -   109 |  250   0.40
 KOSG |     -    60     -   134     -     -     -     -     -    40 |  288  20.35
 LPGS |     -   160     -   235     X     -   282     -     -   209 |  268  30.41
 MALI |     -    55     -   127    40     -     -     -     -    54 |  288  36.54
 MAS1 |     -    39    41   123    41     -     -     -     -    23 |  288   1.80
 MATE |     -    32     -     -     -     -     X     -     -    28 |  287   0.14
 MAW1 |     -    68     -     -     -     -     -     -     -    58 |  279  30.00
 MCM4 |     -    39     -     X    43     -     -     -     -     X |  264   7.75
 MDO1 |     -    43     -     -     -     -     -     -     -    37 |  253   5.39
 MEDI |     -    23     -     -     -     -     -     -     -    20 |  286   0.09
 METS |     -    28     -     -     -     -     -     -     -    24 |  285   0.11
 MKEA |     -    37    49   112     -     -     -     -     -    26 |  288  53.34
 MSKU |     -    60     -     -    66     -     -     -     -     - |  286  39.77
 NKLG |     -     -     -   142     -     -     -     -     -    50 |  287    >>>
 NLIB |     -   133     -     -     -     -     -     -     -   115 |  288   0.08
 NPLD |     -    40     -     -     -     -     -     -     -    35 |  285   0.04
 NRC2 |     -    42    35    60     -     -    44     -     -    30 |  288   0.08
 NTUS |     -    68     -     -     -     -     -     -     -    59 |  288  13.08
 NYA1 |     -    39     -     -    66     -    71     -     -    42 |  288   0.06
 NYAL |     -     -    89   292     -     -     -     -     -    85 |  282   0.11
 OHIG |     -    93     -   257    30     -   126     -     -    63 |  288  17.18
 ONSA |     -    59    40   148     -     -     -     -     -    38 |  288   1.83
 PENC |     -    30     -     -     -     -     -     -     -    26 |  285   2.77
 PERT |     -    46     -   133     -     -     -     -     -    45 |  288  18.48
 PETP |     -    53     -     -    58     -     -     -     -     - |  283  16.00
 PIE1 |     -    50     -   206     -     -     -     -     -    46 |  277   0.06
 POTS |     -    34     -   179    60     -     -     -     -    50 |  277  13.13
 REYK |     -    49     -     -     -     -     -     -     -    42 |  284   8.31
 RIOG |     -    94     -   187   124     -     -     -     -    47 |  288  17.23
 SANT |     -   213     -   124   236     -     -     -     -   178 |  280  29.97
 SFER |     -    29     -     -     -     -     -     -     -    25 |  208   1.06
 STJO |     -    96    74     -    71     -     -     -     -   134 |  288   2.57
 THTI |     -     -     -     -    56     -   125     -     -    43 |  287   1.92
 TLSE |     -    35     -     -     -     -     -     -     -    30 |  241   0.42
 TSKB |     -   113    77   257    35     -     -     -     -    52 |  288   1.25
 USNO |     -    56     -    90     -     -    52     -     -    21 |  288   0.07
 USUD |     -    79     -   159     -     -     -     -     -    57 |  288   0.63
 VILL |     -    39    37    98     -     -     -     -     -    27 |  288  25.45
 WES2 |     -    18     -     -     -     -     -     -     -    16 |  283   0.08
 WHIT |     -    49     -     -    54     -     -     -     -     - |  288   4.43
 WSRT |     -    68     -     -     -     -    96     -     -    30 |  288   0.06
 WTZR |     -    44     -   145     -     -    83     -     -    30 |  288   0.09
 WUHN |     -    65     -   143    42     -    77     -     -    68 |  287  27.11
 YELL |     -    36    74   206     -     -    81     -     -    54 |  288   0.08
 YSSK |     -    69     -     -     -     -   105     -     -     - |  278  10.93
 ZWEN |     -     -     -   154    55     -     -     -     -    37 |  283  18.95
 -----+-------------------------------------------------------------+--------------
 TOT  |  5256    83    89   169    94  4433   106  5014     -    73 |


 BEST CLOCK FIT: NPLD   285   0.04 (ns) 

