
 GPS week: 1131   Day: 2   MJD: 52163                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2683      0    -0.02    -0.08     5.65     0.00
 cod |   288     0  22870      9    -2.88     5.97     0.07    24.11
 emr |    96     0   3810    195   207.43    19.93     0.11    15.79
 esa |   288     0  17403    943   205.74    19.91     0.12    15.00
 gfz |   288     0  14713    108    -0.30     0.30     0.11    15.94
 igu |    96     0   2303      0    -0.02     0.01     3.86     0.00
 jpl |   285     0  10299    390    -1.42     2.06     0.09    20.08
 ngs |    96     0   2683      0    -0.03    -0.08     5.04     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  13811    149   937.94    19.18     0.17     9.08

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  8885   -21     6  -210   149 13623     9  7165     -   142 |
    2 |  1552   -42     X   -79    78     -    94  1096     -     - |
    3 | -4384    62    38     3    24 -6273    72 -4337     -  -334 |
    4 |  3401   -22  -158   340   -68  1964  -224  3101     -   -72 |
    5 | -5221   -59   -95   355  -157-11675   107 -4851     -  -254 |
    6 | -4532    74  -166   263     2 -2974  -197 -4466     -  -377 |
    7 | -3242   -48  -167   140    29   732   -56 -3243     -     4 |
    8 |-11419   -10  -118   -95   170  5231   -68-10285     -    30 |
    9 |  4030    41  -177   217  -135 13136   -60  3166     -   -63 |
   10 | -6887   -89  -196   299   -78 -2846    97 -6148     -  -116 |
   11 |  7485  -160    88   124   115  1919   -20  6912     -   -15 |
   13 |  5233    79    92  -194   -36  2723  -186  5287     -   367 |
   14 |   940    96   121   -61   -76  3317   -58  1139     -   -34 |
   15 |  -457   147   -18     -  -220     -   320  -104     -  -406 |
   17 |  3897   198  -243     X   -74     -    -1  4000     -  -350 |
   18 |  5283   122    94   -80  -216   869    18  5305     -   126 |
   20 |  6221   -90   130   -99    93  1764    89  6086     -    72 |
   21 |  5774   133  -153   143  -191     -    34  4718     -  -220 |
   22 | -3464    53    68   -77     7  -173   174 -3085     -  -258 |
   23 |  2544   223   -47  -414   -52 -2631   192  2711     -  -170 |
   24 |  1936   -67  -173   504  -243 -6304  -115  1382     -     - |
   25 | -4521    46    20  -141   204 -2120   -56 -4362     -  -215 |
   26 |  -220   -74  -229   306    -3  1070  -117  -348     -   -55 |
   27 | -1654   -50     X   -72   264  3479  -219  -320     -    26 |
   28 | 11659    78    92  -348    67  6307    98 10824     -    95 |
   29 | -2054    51  -135   -18   113   252   -47 -2242     -  -196 |
   30 |-14187    47   -50   359   -32-11001  -301-12204     -  -369 |
   31 | -6588   -10    39   -11   136-10338    66 -6865     -  -321 |
 -----+-------------------------------------------------------------+
 ALBH |     -  -178     -  -225     -     -   379     -     -     - |
 ALGO |     -    37   133     X     4     -   -83     -     -     - |
 AMC2 |     -    91     -     -     -     -  -109     -     -     - |
 ANKR |     -   -27     -    43     -     -     -     -     -     - |
 AUCK |     -  -140     -   225     -     -     -     -     -     - |
 BAHR |     -   -43     -    69     -     -     -     -     -     - |
 BILI |     -    21     -     -   -32     -     -     -     -     - |
 BRMU |     -    17     -   -92    61     -     -     -     -     - |
 BRUS |     -   -14     -     -     -     -    15     -     -     3 |
 CAS1 |     -   -15     -     -    -4     -   -41     -     -   143 |
 CRO1 |     -  -137     -    83     -     -   105     -     -     - |
 DAV1 |     -   -24     -     -   -82     -     -     -     -   209 |
 DRAO |     -   -85   129     -     -     -     -     -     -     - |
 FAIR |     -     -   -20    21     -     -     -     -     -     - |
 GALA |     -    48     -  -132    87     -   -22     -     -     - |
 GRAZ |     -   -53     -     -     -     -     -     -     -   139 |
 GUAM |     -   -29     -     X   285     -  -204     -     -     - |
 HOB2 |     -  -122     -   145     -     -     -     -     -   226 |
 HRAO |     -   101     -     -     -     -  -121     -     -     - |
 IRKT |     -     -     -   -66     -     -     -     -     -   109 |
 KARR |     -  -101     -     -   153     -     -     -     -     - |
 KERG |     -  -180     -     -     -     -   216     -     -     - |
 KIRU |     -   188     -  -303     -     -     -     -     -     - |
 KOKB |     -     -     -    53    28     -   -62     -     -     - |
 KOUR |     -   -75     -   121     -     -     -     -     -     - |
 LPGS |     -     -     -  -499    22     -   337     -     -     - |
 MAC1 |     -    98     -   158  -363     -     -     -     -   268 |
 MAS1 |     -    31   131  -113    -2     -     -     -     -    32 |
 MATE |     -   -47     -     -     -     -     X     -     -   124 |
 MAW1 |     -     7     -     -     -     -     -     -     -   -19 |
 MCM4 |     -   101     -  -208    77     -     -     -     -     - |
 METS |     -   -31     -     -     -     -     -     -     -    83 |
 MKEA |     -     -   145  -153     -     -     -     -     -     - |
 MSKU |     -    31     -     -   -47     -     -     -     -     - |
 NPLD |     -    21     -     -     -     -     -     -     -   -55 |
 NRC2 |     -   -84   128     -     -     -     X     -     -     - |
 NTUS |     -   -89     -     -     -     -     -     -     -   235 |
 NYA1 |     -    14     -     -  -115     -    37     -     -    85 |
 NYAL |     -     -    30   -25     -     -     -     -     -    23 |
 OHIG |     -   -25     -   -72   -61     -    32     -     -   223 |
 ONSA |     -   -65    86    54     -     -     -     -     -    33 |
 PERT |     -  -159     -   255     -     -     -     -     -     - |
 PIE1 |     -   -30     -    49     -     -     -     -     -     - |
 POTS |     -    -5     -     7     -     -     -     -     -     - |
 REYK |     -    42     -     -     -     -     -     -     -  -112 |
 RIOG |     -   -51     -   104   -20     -     -     -     -     - |
 SANT |     -     7     -   -30    22     -     -     -     -     - |
 SFER |     -  -252     -     -     -     -     -     -     -   669 |
 STJO |     -    48    92     -  -103     -     -     -     -     - |
 THTI |     -     -     -     -     4     -    -3     -     -     - |
 TLSE |     -     2     -     -     -     -     -     -     -    -7 |
 TRO1 |     -   -78     -     -   119     -     -     -     -     - |
 TROM |     -     -     -    18     -     -     -     -     -   -30 |
 TSKB |     -   144   170  -288     -     -     -     -     -     - |
 USNO |     -   259     -  -675     -     -   195     -     -     - |
 USUD |     -    -4     -     6     -     -     -     -     -     - |
 VILL |     -   -29    61     2     -     -     -     -     -    39 |
 WHIT |     -   -25     -     -    38     -     -     -     -     - |
 WSRT |     -    17     -     -     -     -   -67     -     -   100 |
 WTZR |     -   -58     -    96     -     -   -42     -     -    87 |
 WUHN |     -     7     -     9   174     -  -157     -     -     - |
 YAR2 |     -     -     -     -     -     -   -48     -     -   105 |
 YELL |     -    20   228     9     -     -   -92     -     -     - |
 YSSK |     -    48     -     -     -     -   -58     -     -     - |
 ZWEN |     -     -     -    49   -47     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  6835    93   109    66    93  5591    24  6215     -    96 |  288   4.81
    2 |  3397    78     X   150    63     -    61  3614     -     - |  288   2.99
    3 |  3473    70   163    68    58  2788    62  3362     -   115 |  288   2.18
    4 |  2408    65    85    49    71   614    29  2516     -   170 |  288   0.82
    5 | 12564    50    53    82    41  9181    40 11163     -   107 |  288   2.65
    6 |  6196    75   123    78   106  2098   103  6109     -   177 |  288   6.24
    7 |  1184    83   193   110    64   819    48  1196     -   206 |  288   1.69
    8 |  4209   127    99   153   267  5754    58  4426     -   143 |  286   1.87
    9 |  3664    81   121   274   186  4670    99  4125     -   319 |  286   2.23
   10 |  4180    60   332    96    65  2237    74  4334     -    91 |  288   2.47
   11 |  2337   137    69   109   159  1014   107  2372     -   153 |  288   0.55
   13 |  2240    70    84   110   144  1794    79  2217     -   129 |  288   0.21
   14 |  2860    27    84    39    87  2189    36  3004     -   179 |  288   0.19
   15 | 16286    73    65     -   151     -    69 12896     -   200 |  286   9.35
   17 |  3252   149   150     X   229     -   190  3291     -   191 |  277   2.72
   18 |  2908    42   137    39    57   984    46  2867     -   142 |  288   0.44
   20 |  1897    81    45   130   114  1017    51  1900     -   212 |  288   0.23
   21 |  7224    77    53    79    29     -    58  7466     -   248 |  288   4.05
   22 |  1927    76   121    64   150  2740    56  2000     -    95 |  288   2.56
   23 |  6115   198    90   307   144  2338   139  6031     -   450 |  288   5.68
   24 |  1984    65   108    89    75  6409    54  2124     -     - |  288   1.37
   25 |  1945    90    63   130    57  1333    68  1916     -   196 |  288   1.65
   26 |  1788    51    86    73    61   808    54  1509     -   175 |  288   0.41
   27 |  9713    56     X   188   271  5756    86  7527     -   166 |  288   5.25
   28 |  3668    46   143    60   100  3760   143  2817     -   111 |  288   0.61
   29 |  1476    68    50    58    94   782    37  1296     -   114 |  288   0.85
   30 |  4950    55    54    84    40  5450    73  4805     -   123 |  288   1.21
   31 |  5925    83   146   207    76  5260    94  5154     -   203 |  288   3.58
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    78     -   251     -     -   109     -     -     - |  287   0.12
 ALGO |     -    88    87     X    50     -    59     -     -     - |  288   0.04
 AMC2 |     -    19     -     -     -     -    23     -     -     - |  282   0.03
 ANKR |     -    19     -    31     -     -     -     -     -     - |  288  38.83
 AUCK |     -    26     -    41     -     -     -     -     -     - |  287  21.11
 BAHR |     -    65     -   105     -     -     -     -     -     - |  187    >>>
 BILI |     -    64     -     -    97     -     -     -     -     - |  287  12.57
 BRMU |     -    75     -   104    43     -     -     -     -     - |  288  25.35
 BRUS |     -    18     -     -     -     -    62     -     -   141 |  276   0.05
 CAS1 |     -   119     -     -   136     -   148     -     -   346 |  288   7.78
 CRO1 |     -    31     -    44     -     -    41     -     -     - |  288   0.15
 DAV1 |     -    37     -     -    38     -     -     -     -   154 |  288  24.46
 DRAO |     -    44    67     -     -     -     -     -     -     - |   96   0.08
 FAIR |     -     -   168   177     -     -     -     -     -     - |   78   0.12
 GALA |     -   102     -    82   139     -    61     -     -     - |  288  23.21
 GRAZ |     -    52     -     -     -     -     -     -     -   139 |  284  61.92
 GUAM |     -   106     -     X   169     -   243     -     -     - |  277  19.46
 HOB2 |     -    22     -    37     -     -     -     -     -    68 |  288   0.11
 HRAO |     -    99     -     -     -     -   119     -     -     - |  277  33.93
 IRKT |     -     -     -   107     -     -     -     -     -   177 |  288   0.12
 KARR |     -   103     -     -   156     -     -     -     -     - |  248  21.50
 KERG |     -    32     -     -     -     -    39     -     -     - |  272   1.98
 KIRU |     -    32     -    51     -     -     -     -     -     - |  288   1.57
 KOKB |     -     -     -   143   113     -    76     -     -     - |  287   0.55
 KOUR |     -    12     -    19     -     -     -     -     -     - |  288  32.67
 LPGS |     -     -     -   255   268     -   309     -     -     - |  240  58.31
 MAC1 |     -    29     -    34    29     -     -     -     -    69 |  288  14.47
 MAS1 |     -    51    39    75    57     -     -     -     -   150 |  288   1.42
 MATE |     -    61     -     -     -     -     X     -     -   161 |  287   0.08
 MAW1 |     -    27     -     -     -     -     -     -     -    71 |  287  27.79
 MCM4 |     -    60     -   162   140     -     -     -     -     - |  281  28.85
 METS |     -    54     -     -     -     -     -     -     -   144 |  287   0.60
 MKEA |     -     -    43    45     -     -     -     -     -     - |   96  40.75
 MSKU |     -    42     -     -    63     -     -     -     -     - |  261  36.53
 NPLD |     -    45     -     -     -     -     -     -     -   119 |  287   0.03
 NRC2 |     -    51    78     -     -     -     X     -     -     - |   96   0.10
 NTUS |     -   121     -     -     -     -     -     -     -   322 |  288   6.76
 NYA1 |     -    31     -     -    90     -    49     -     -   185 |  288   0.11
 NYAL |     -     -    91    52     -     -     -     -     -    81 |  288   0.11
 OHIG |     -    56     -   122    60     -    28     -     -   152 |  288  20.41
 ONSA |     -    35    41    67     -     -     -     -     -   163 |  288   0.72
 PERT |     -    33     -    53     -     -     -     -     -     - |  288  18.71
 PIE1 |     -    67     -   108     -     -     -     -     -     - |  288   0.06
 POTS |     -    31     -    49     -     -     -     -     -     - |  280  14.45
 REYK |     -    55     -     -     -     -     -     -     -   147 |  262  10.46
 RIOG |     -    81     -    87    49     -     -     -     -     - |  288  12.27
 SANT |     -    65     -   119    82     -     -     -     -     - |  270  22.10
 SFER |     -    36     -     -     -     -     -     -     -    95 |  234   0.96
 STJO |     -    50    75     -    58     -     -     -     -     - |  288   2.31
 THTI |     -     -     -     -    43     -    34     -     -     - |  266   3.59
 TLSE |     -    53     -     -     -     -     -     -     -   142 |  250   0.36
 TRO1 |     -    44     -     -    67     -     -     -     -     - |  287  13.35
 TROM |     -     -     -    76     -     -     -     -     -   125 |  288  14.26
 TSKB |     -   115    87   160     -     -     -     -     -     - |  271   1.00
 USNO |     -    76     -    85     -     -    42     -     -     - |  288   0.06
 USUD |     -    59     -    95     -     -     -     -     -     - |  288   0.56
 VILL |     -    32    21    93     -     -     -     -     -   149 |  288  25.39
 WHIT |     -    21     -     -    32     -     -     -     -     - |  288  25.47
 WSRT |     -    65     -     -     -     -    71     -     -   171 |  288   0.05
 WTZR |     -    27     -    86     -     -    42     -     -   179 |  288   0.04
 WUHN |     -    60     -    61    50     -    30     -     -     - |  287  23.84
 YAR2 |     -     -     -     -     -     -    21     -     -    47 |  251   3.44
 YELL |     -   125    55   256     -     -    56     -     -     - |  288   0.07
 YSSK |     -    40     -     -     -     -    48     -     -     - |  279  13.86
 ZWEN |     -     -     -    33    31     -     -     -     -     - |  288  16.28
 -----+-------------------------------------------------------------+--------------
 TOT  |  5652    72   110   119   114  3860    94  5044     -   174 |


 BEST CLOCK FIT: AMC2   282   0.03 (ns) 

