
 GPS week: 1126   Day: 6   MJD: 52132                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2770      0     0.10    -0.17     4.67     0.00
 cod |   288     0  21527     59    -0.16     0.61     0.10    25.10
 esa |   288     0  17432    957  1037.26     2.47     0.14    13.34
 gfz |   288     0  14275     16     0.00    -0.24     0.09    26.71
 igu |    96     0   2393      0     0.07    -0.03     3.70     0.00
 jpl |   272     0   2548      1    16.88    -4.14    43.07     0.00
 ngs |    96     0   2770      0     0.10    -0.17     4.31     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  22283    140   355.75     6.16     0.07    34.85

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------+
    1 |  7956  -145   -28    -9 10192     -  6844     -   122 |
    2 |-12794     0   289  -185-18356-29163-10436     -    31 |
    3 | -4985    35   154    71 -7061     - -4909     -  -137 |
    4 | -2864   195    98     2 -1460     - -2648     -  -152 |
    5 |  -153   313    90     6  4951 -3301 -1421     -  -264 |
    6 |  8200   358    31   125  4800     -  7422     -  -363 |
    7 | -1691    15    49  -166 -9642     - -1604     -    98 |
    8 |  3140   216   -41  -105 -8499     -  2555     -   -60 |
    9 |  1571   247   144   109  1397     -  1269     -  -316 |
   10 | -3109     4   -98   -17   -13     - -2807     -    48 |
   11 |  4740  -615   238   -73  1677     -  4933     -   407 |
   13 |  6705   -20   105   -86  1069 -2808  6673     -    40 |
   14 |  4387   160   -68    -5  2561 28526  4573     -   -85 |
   15 |  1163   368     -   154     -     -  1482     -  -374 |
   17 | -5317   421   225   105     -     - -5304     -  -469 |
   18 |  1406   224   -61   109 -2104     -  1544     -  -221 |
   19 |-12875  -126   193  -121     -     --12666     -    97 |
   20 |  4819  -199  -163   -36   463     -  4904     -   232 |
   21 |  1327   289     X   216  -973     -  1378     -  -378 |
   22 | -9018   178   120    61     -  4530 -8573     -  -218 |
   23 | -5781   338     X   152 -2557     - -5497     -  -359 |
   24 |  3001   179    90   -60 14379     -  2128     -  -116 |
   25 |   345    51   106   112   764     -   374     -  -163 |
   26 | -1979   244   -15   278 -1564-13647 -1899     -  -383 |
   27 |  4388  -200   265   -66  5030     -  3777     -    93 |
   28 | 10319     5   168  -219  4503     - 10153     -   100 |
   29 | -1829    15   119   175 -1770     - -1406     -  -190 |
   30 | -2986   264   157   252 -2930-10669 -2803     -  -443 |
   31 |  1696  -129   330  -215  5385     -  1739     -   131 |
 -----+-------------------------------------------------------+
 ALBH |     -  -192  -314     -     - 39494     -     -   260 |
 ALGO |     -   -30     X   -76     - 19041     -     -    79 |
 AMC2 |     -  -106     -     -     - 37643     -     -    77 |
 AOML |     -  -121     -     -     -     -     -     -    87 |
 AREQ |     -   -70  -250     -     -     -     -     -   146 |
 BAHR |     -    23     1   -28     -     -     -     -     5 |
 BJFS |     -  -103     -    96     -     -     -     -     - |
 BOR1 |     -    70     -     -     -     -     -     -   -50 |
 BRUS |     -    78     -     -     - 28662     -     -   -56 |
 CAS1 |     -     9   123   -70     --37938     -     -     - |
 CRO1 |     -  -135     -     -     -     -     -     -    97 |
 DAEJ |     - -1331     -     -     -     -     -     -   958 |
 DAV1 |     -    26     -  -106     -     -     -     -    63 |
 DRAO |     -   -23     -     -     -     -     -     -    16 |
 EISL |     -  -209  -195     -     -     -     -     -   191 |
 FORT |     -    58   315     -     -108856     -     -  -156 |
 GALA |     -    29  -371    60     -     -     -     -    76 |
 GODE |     -   -20  -250     -     -     -     -     -   101 |
 GUAM |     -   -84  -140    55     --21277     -     -    72 |
 HRAO |     -    13     -     -     --15320     -     -    -9 |
 IISC |     -   -52   -48     -     -     -     -     -    50 |
 KERG |     -   118     -     -     -     -     -     -   -85 |
 KIRU |     -   164  -309     -     -     -     -     -     - |
 KOKB |     -     -  -546   272     -     -     -     -     X |
 KOSG |     -   -42  -114     -     -     -     -     -    75 |
 LPGS |     -     -    20  -122     -     -     -     -    92 |
 MALI |     -     -    87     -     -     -     -     -   -33 |
 MAS1 |     -    64   -77   -99     -     -     -     -    59 |
 MATE |     -  -133     -     -     -     -     -     -    96 |
 MAW1 |     -    56     -     -     -     -     -     -   -40 |
 MCM4 |     -   -22   304   -23     -     -     -     -   -83 |
 MDO1 |     -  -151     -     -     -     -     -     -   109 |
 METS |     -   148     -     -     -     -     -     -  -107 |
 MKEA |     -   -85  -113     -     -     -     -     -   104 |
 NRC2 |     -  -120     -     -     -******     -     -    87 |
 NYA1 |     -    16     -  -139     -     -     -     -    96 |
 OHIG |     -     -   361  -180     -     -     -     -     - |
 ONSA |     -    -9   -84    15     -     -     -     -    27 |
 PERT |     -   -43   242    -1     -     -     -     -   -60 |
 PIE1 |     -    17  -319     -     -     -     -     -   110 |
 POTS |     -    42  -147     -     -     -     -     -    26 |
 REYK |     -     8     -     -     -     -     -     -    -6 |
 SANT |     -     -   134   -85     -     -     -     -    13 |
 SEY1 |     -  -261   -80   -58     -     -     -     -   260 |
 THTI |     -     -     -   -42     -     -     -     -    32 |
 TRO1 |     -  -110     -   104     -     -     -     -     - |
 TROM |     -     -   -35     -     -     -     -     -    13 |
 TSKB |     -   -57  -213     -     -     -     -     -   122 |
 USNO |     -    53  -309     -     - 14444     -     -    80 |
 USUD |     -   -74    68     -     -     -     -     -    27 |
 VILL |     -   109  -145     -     -     -     -     -   -23 |
 WSRT |     -    -8     -     -     - 33751     -     -     5 |
 WTZR |     -    13  -113     -     - 35214     -     -    34 |
 WUHN |     -  -225    62   -63     -     -     -     -   187 |
 YELL |     -     -  -203   101     -     -     -     -     - |
 ZWEN |     -     -     -   -75     -     -     -     -    58 |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  7907    73   110    54  5467     -  7574     -    71 |  288   5.24
    2 |  7199    84   194   114  8439 65105  5848     -   106 |  288   3.85
    3 |  3388    82    98   157  4176     -  3139     -    98 |  288   2.65
    4 |  1471   255   140    84  1049     -  1483     -    92 |  278   0.74
    5 |  7523    51    87    96  2758 54365  7109     -    59 |  288   2.67
    6 |  8156    65    59    78  2088     -  7446     -    66 |  288   6.29
    7 |  1441   102    77   149  4381     -  1280     -    72 |  288   0.71
    8 |  4721    86    92    86  5543     -  4089     -    83 |  288   2.08
    9 |  1937    54   150    88  1820     -  1720     -    36 |  288   2.09
   10 |  4032   132   189    38  2385     -  4222     -    35 |  288   1.74
   11 |  1296   124   206    72   423     -  1301     -   100 |  288   0.39
   13 |  1249   107   174    94   429 43272  1087     -   107 |  288   0.22
   14 |  1376    60   121    48   650 50406  1590     -    33 |  288   0.28
   15 |  2854   260     -   142     -     -  2769     -   106 |  274   1.85
   17 |  2447   169   143   142     -     -  2258     -   116 |  281   2.82
   18 |  1105   102    84    80  1244     -   891     -    49 |  288   0.38
   19 |  3165   182   284   215     -     -  3044     -    94 |  281   2.94
   20 |  1133   114   186    73   537     -   994     -    80 |  288   0.28
   21 |  2864   155     X   110  2399     -  2855     -   141 |  286   2.66
   22 |  2522   121   176   118     - 54398  2511     -    44 |  288   2.64
   23 |  7072   115     X    69  2625     -  7193     -    58 |  288   6.78
   24 |  5136   143   236    52  6289     -  5335     -    62 |  282   2.87
   25 |  2295    81   135    47  2543     -  2379     -    50 |  288   2.09
   26 |   911    54   106    81  1373 52110   884     -    51 |  288   0.42
   27 | 12605    83   133   120  6523     - 10544     -    88 |  288   4.80
   28 |  2056   143   141    38  2002     -  1907     -   115 |  288   1.08
   29 |  2941    73   142    71   599     -  2983     -   103 |  288   0.74
   30 |  1161    38    91    94  1720 52088  1268     -    89 |  288   1.12
   31 |  6291   156   267    81  6538     -  6278     -    89 |  288   3.24
 -----+-------------------------------------------------------+--------------
 ALBH |     -   117   121     -     - 27646     -     -    77 |  288   0.10
 ALGO |     -    63     X    33     - 26358     -     -    51 |  288   0.17
 AMC2 |     -    65     -     -     - 24623     -     -    47 |  286   0.15
 AOML |     -    89     -     -     -     -     -     -    64 |  279  21.84
 AREQ |     -    34    42     -     -     -     -     -    19 |  288  26.52
 BAHR |     -    46   139    68     -     -     -     -    86 |  288   0.41
 BJFS |     -    37     -    34     -     -     -     -     - |  288   1.04
 BOR1 |     -    20     -     -     -     -     -     -    15 |  286   4.17
 BRUS |     -    53     -     -     - 25427     -     -    38 |  286   0.12
 CAS1 |     -    58   105    17     - 43022     -     -     - |  288  11.09
 CRO1 |     -   112     -     -     -     -     -     -    81 |  277   0.20
 DAEJ |     -    61     -     -     -     -     -     -    44 |  287   1.67
 DAV1 |     -    42     -    22     -     -     -     -    27 |  286  22.39
 DRAO |     -    54     -     -     -     -     -     -    39 |  288   0.12
 EISL |     -   120   118     -     -     -     -     -    62 |  276  25.92
 FORT |     -    62    66     -     - 42489     -     -    38 |  288   0.38
 GALA |     -    67    80    54     -     -     -     -    36 |  288  22.83
 GODE |     -    96   260     -     -     -     -     -    68 |  287  13.59
 GUAM |     -   136   244   214     - 48657     -     -   170 |  287  21.37
 HRAO |     -    57     -     -     - 70441     -     -    41 |  281  22.68
 IISC |     -   195   136     -     -     -     -     -    98 |  288  19.21
 KERG |     -    60     -     -     -     -     -     -    43 |  287   1.55
 KIRU |     -    54   103     -     -     -     -     -     - |  288   2.63
 KOKB |     -     -   375   187     -     -     -     -     X |  105   4.35
 KOSG |     -    72   112     -     -     -     -     -    25 |  288  33.89
 LPGS |     -     -   303   270     -     -     -     -   259 |  213 133.17
 MALI |     -     -    99     -     -     -     -     -    38 |  288 521.01
 MAS1 |     -    63   119    36     -     -     -     -    27 |  288   2.66
 MATE |     -    39     -     -     -     -     -     -    28 |  287   0.19
 MAW1 |     -    54     -     -     -     -     -     -    39 |  286  22.38
 MCM4 |     -    90   154    26     -     -     -     -    23 |  288  20.42
 MDO1 |     -   119     -     -     -     -     -     -    85 |  276 118.82
 METS |     -    39     -     -     -     -     -     -    28 |  285   0.40
 MKEA |     -    56   124     -     -     -     -     -    59 |  287  31.37
 NRC2 |     -    22     -     -     - 26724     -     -    15 |  286   0.14
 NYA1 |     -    37     -    38     -     -     -     -    15 |  288   0.15
 OHIG |     -     -    91    45     -     -     -     -     - |  288  11.89
 ONSA |     -    70    91    27     -     -     -     -    40 |  288   1.44
 PERT |     -   103   127    29     -     -     -     -    46 |  288  14.96
 PIE1 |     -    72   130     -     -     -     -     -    29 |  288   0.16
 POTS |     -    73   117     -     -     -     -     -    35 |  267  13.42
 REYK |     -   101     -     -     -     -     -     -    73 |  271  12.63
 SANT |     -     -   133   110     -     -     -     -    95 |  285  21.34
 SEY1 |     -    90   140    27     -     -     -     -    32 |  288  46.44
 THTI |     -     -     -    69     -     -     -     -    53 |  286   3.03
 TRO1 |     -    59     -    55     -     -     -     -     - |  288  13.25
 TROM |     -     -    73     -     -     -     -     -    28 |  286  14.90
 TSKB |     -   114    94     -     -     -     -     -    60 |  288   1.02
 USNO |     -    71   104     -     - 26232     -     -    40 |  288   0.16
 USUD |     -    41    78     -     -     -     -     -    21 |  288   0.34
 VILL |     -    32   135     -     -     -     -     -    39 |  288  18.62
 WSRT |     -    32     -     -     - 31197     -     -    23 |  288   0.16
 WTZR |     -    68    90     -     - 31486     -     -    31 |  288   0.12
 WUHN |     -    49    63    47     -     -     -     -    52 |  287  21.68
 YELL |     -     -    71    35     -     -     -     -     - |  288   0.16
 ZWEN |     -     -     -    57     -     -     -     -    43 |  277  16.73
 -----+-------------------------------------------------------+--------------
 TOT  |  4669    96   144    94  3703 43071  4313     -    71 |


 BEST CLOCK FIT: ALBH   288   0.10 (ns) 

