
 GPS week: 1126   Day: 1   MJD: 52127                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2664     24     0.01     0.13     4.89     0.00
 cod |   288     0  18895      5    -0.69    -0.34     0.09    27.11
 emr |    96     0   3808      0   990.50    10.65     0.12    20.15
 esa |   288     0  16035   1268   982.53    10.57     0.17    13.73
 gfz |   288     0  14532    285    -0.42     0.59     0.14    16.11
 igu |    96     0   2205      0     2.00    -2.68     2.95     0.00
 jpl |   281     0   9401    289     2.87     1.08     0.11    22.89
 ngs |    96     0   2664     20     0.21    -0.13     4.75     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio |
 -----+-------------------------------------------------------+
    1 |  4351   -91   -77    59   212     -  -114  4448     - |
    2 |  1628   -42  -137     4   118   675     8   574     - |
    3 | -6143   -15  -210   228   -84-16754     4 -5909     - |
    4 | -4397    25   -43    11   136 -2412  -235 -4188     - |
    5 | -7314   178   -64  -236  -244 -4373   239 -6359     - |
    6 | -1480   141  -214    99  -128  -462  -157 -1807     - |
    7 |  -471   106  -113  -276    64 -6196    62  -368     - |
    8 | -5938   -50   -54   -86   174  8578     9 -5740     - |
    9 |  6087    82   -46    64  -122  7126   -73  5711     - |
   10 |   705   -59   -90   -62    23  1304   239   666     - |
   11 |  6589   -99    77    70    51  2555    36  6846     - |
   13 |  3905    89    43  -275   130  -218  -127  3948     - |
   14 |  2705    92    74   -17  -164  3046   -11  3060     - |
   17 | -2948     -    29    49  -126     -   122 -2520     - |
   18 |  3274    53   112   -51  -103 -2659    12  3299     - |
   19 |  9128  -117    24     X   107     -    84  6568     - |
   20 |  5996  -182    67   127   130   206    56  6060     - |
   21 | -4340    84  -205     X   -41   417   -10 -4047     - |
   22 |  1019  -114  -229   808  -340     -    51  1071     - |
   23 |  3099   158   -65  -100  -240  1950   129  2585     - |
   24 | -2176    34  -102  -106   -37     -   151 -1879     - |
   25 |  -333   -20  -156   180    10 -3573   -89    98     - |
   26 | -3865   160   -87    57  -210   750  -105 -3547     - |
   27 | -2663   -73   -16   -41   252 -3665  -156 -2188     - |
   28 | -1351    26   123  -226    55  1258    62  -377     - |
   29 |  -258   -66  -115    32    86  5181    71  -560     - |
   30 |  1379   135   -92   -49   -23  -824  -192  1263     - |
   31 | -5337     6    -2  -102   -60  8030   205 -6176     - |
 -----+-------------------------------------------------------+
 ALBH |     -   -55     -   109     -     -     X     -     - |
 ALGO |     -   -48    89     X    14     -    21     -     - |
 AMC2 |     -    -6     -     -     -     -     7     -     - |
 AUCK |     -    37     -   -74     X     -     -     -     - |
 BAHR |     -    28   198   -39   -97     -     -     -     - |
 BRMU |     -    11     -     -   -19     -     -     -     - |
 BRUS |     -    22     -     -     -     -   -26     -     - |
 DRAO |     -    -2     3     -     -     -     -     -     - |
 FORT |     -  -317     -     X     -     -   376     -     - |
 GALA |     -    -3     -     -    -8     -     9     -     - |
 GOLD |     -    15     -     X     -     -   -17     -     - |
 GUAM |     -    45     -     6    67     -  -107     -     - |
 HRAO |     -   138     -     -     -     -  -163     -     - |
 IISC |     -   126     -  -249     -     -     -     -     - |
 KERG |     -   198     -     -  -333     -     -     -     - |
 KIRU |     -    58     -  -114     -     -     -     -     - |
 KOKB |     -     -     -   -55    66     -   -11     -     - |
 KOSG |     -   -46     -    90     -     -     -     -     - |
 KOUR |     -   -47     -    92     -     -     -     -     - |
 LPGS |     -     -     -  -120   103     -     -     -     - |
 MAS1 |     -   -80   181    87   -92     -    57     -     - |
 MATE |     -  -126   169     -     -     -     -     -     - |
 MCM4 |     -     -     -  -100    85     -     -     -     - |
 MDO1 |     -   -42    56     -     -     -     -     -     - |
 MKEA |     -   -55   348   -66     -     -     -     -     - |
 NLIB |     -   -34    46     -     -     -     -     -     - |
 NRC2 |     -    47    73     -     -     -   -79     -     - |
 NTUS |     -   -20     -     -    33     -     -     -     - |
 NYA1 |     -   -26     -     -   -13     -    42     -     - |
 OHIG |     -  -237     -   528  -165     -    79     -     - |
 ONSA |     -   -11     -   -44    56     -     -     -     - |
 PERT |     -    17     -   118  -128     -     -     -     - |
 PIE1 |     -   -48     -    96     -     -     -     -     - |
 POTS |     -     7     -   -13     -     -     -     -     - |
 SANT |     -     -     -   122   -66     -   -29     -     - |
 SEY1 |     -  -181     -  -171   389     -     -     -     - |
 STJO |     -   -27    55     -    23     -     -     -     - |
 TRO1 |     -   -84     -     -   141     -     -     -     - |
 TSKB |     -   -86   157    89   -23     -    19     -     - |
 URUM |     -   -37     -     -    62     -     -     -     - |
 USNO |     -   -67     -   114     -     -    -5     -     - |
 USUD |     -    81     -  -159     -     -     -     -     - |
 VILL |     -     7     -   -15     -     -     -     -     - |
 WHIT |     -   -79     -     -   132     -     -     -     - |
 WSRT |     -     1     -     -     -     -    -2     -     - |
 WTZR |     -    -3     -   -42     -     -    29     -     - |
 WUHN |     -   114     -  -222   164     -  -121     -     - |
 YELL |     -    44   184   -72     -     -   -66     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  4424    91   119   119   182     -   113  4461     - |  280   3.85
    2 |  7035   286    84   186   242  3313   129  7015     - |  287   3.54
    3 |  1670   127   135   273    76  6275    91  1595     - |  288   2.11
    4 |   818   119    74    81   109  1092    79   768     - |  282   0.61
    5 |  4196    70   102   176   139  3245    91  4845     - |  288   2.79
    6 | 11534    67    51    59   101  5483    63 10606     - |  288   5.96
    7 |  2453    86    98   113    66  1588    45  2370     - |  288   0.72
    8 |  2928   114    53   125   153  3752   117  3051     - |  288   2.93
    9 |  2039   114    52    75   102  4051   116  1633     - |  288   2.62
   10 |  3830    92   125   120    77  2306   187  3776     - |  288   3.01
   11 |  2318    85    76   434   317   877   103  2202     - |  288   0.31
   13 |   728    96   136   324   141   591   179   695     - |  288   0.47
   14 |   926    64   109    92   106  1743    86   962     - |  288   0.31
   17 |  2014     -    90   138   226     -   203  2086     - |  269   3.10
   18 |  1003    64   121   240   103  1360   138   938     - |  288   0.40
   19 | 12896   190   318     X   497     -   250 12530     - |  229   3.08
   20 |   989    92    82   185   144   470   127  1032     - |  288   0.22
   21 |  4728   103   316     X   161  2643   133  5263     - |  277   2.96
   22 |   854   235   146   176   220     -   231   749     - |  284   3.53
   23 |  5740    77   242   365   201  3359   116  5809     - |  288   4.90
   24 |  1987   119    85   161   147     -   279  1864     - |  281   1.95
   25 |  5958    79   103   206   210  3906    72  5473     - |  288   2.58
   26 |   988   130   180   156    95   493   296   719     - |  288   0.43
   27 |  5927    88    66   157    94  3096    74  6244     - |  288   4.82
   28 |  6309    69    72   134    59  2583    71  6085     - |  288   0.53
   29 |  2951    55   160   120   177  2131    75  2867     - |  288   0.96
   30 |  2529    90    71   165    78  1622    98  2553     - |  288   0.88
   31 |  7852    86    86   186    98  2779    63  7169     - |  288   2.43
 -----+-------------------------------------------------------+--------------
 ALBH |     -    34     -    66     -     -     X     -     - |  275   0.08
 ALGO |     -    55    36     X    53     -    59     -     - |  288   0.05
 AMC2 |     -    38     -     -     -     -    46     -     - |  281   0.03
 AUCK |     -    58     -   114     X     -     -     -     - |  281  19.67
 BAHR |     -    33    55    78    50     -     -     -     - |  288   0.58
 BRMU |     -    24     -     -    40     -     -     -     - |  284  31.25
 BRUS |     -    61     -     -     -     -    72     -     - |  280   0.07
 DRAO |     -    35    48     -     -     -     -     -     - |   96   0.12
 FORT |     -   100     -     X     -     -   119     -     - |  165    >>>
 GALA |     -    42     -     -    63     -    84     -     - |  288  18.35
 GOLD |     -    44     -     X     -     -    52     -     - |  172  16.99
 GUAM |     -    37     -   128    36     -    70     -     - |  288  18.86
 HRAO |     -    36     -     -     -     -    43     -     - |  271  27.44
 IISC |     -    41     -    82     -     -     -     -     - |  286  27.45
 KERG |     -    92     -     -   155     -     -     -     - |  227   1.55
 KIRU |     -   112     -   222     -     -     -     -     - |  254   1.41
 KOKB |     -     -     -   133   147     -    98     -     - |  286   0.28
 KOSG |     -    26     -    51     -     -     -     -     - |  288  68.99
 KOUR |     -    20     -    39     -     -     -     -     - |  287  20.97
 LPGS |     -     -     -   335   286     -     -     -     - |  184 141.82
 MAS1 |     -    30    60    72    83     -    83     -     - |  288   1.18
 MATE |     -    34    45     -     -     -     -     -     - |   95   0.16
 MCM4 |     -     -     -    88    75     -     -     -     - |  249    >>>
 MDO1 |     -    55    73     -     -     -     -     -     - |   96  19.97
 MKEA |     -    46    83    84     -     -     -     -     - |  282  29.79
 NLIB |     -    36    48     -     -     -     -     -     - |   93   0.07
 NRC2 |     -    49    30     -     -     -    54     -     - |  288   0.10
 NTUS |     -    26     -     -    44     -     -     -     - |  288   7.92
 NYA1 |     -    42     -     -    53     -    31     -     - |  288   0.12
 OHIG |     -    98     -    99    44     -    86     -     - |  288  18.11
 ONSA |     -    26     -    47    31     -     -     -     - |  288   0.14
 PERT |     -    83     -   134    63     -     -     -     - |  288  15.10
 PIE1 |     -    52     -   102     -     -     -     -     - |  288   0.06
 POTS |     -   145     -   287     -     -     -     -     - |  277  24.24
 SANT |     -     -     -   211   218     -    59     -     - |  284  17.75
 SEY1 |     -    64     -    82   117     -     -     -     - |  262  46.21
 STJO |     -    22    41     -    32     -     -     -     - |  288   2.36
 TRO1 |     -    47     -     -    80     -     -     -     - |  288  14.67
 TSKB |     -    51    76   137    49     -    86     -     - |  288   0.94
 URUM |     -    69     -     -   116     -     -     -     - |  284  80.92
 USNO |     -    89     -   104     -     -    86     -     - |  286   0.07
 USUD |     -    74     -   145     -     -     -     -     - |  288   0.19
 VILL |     -    20     -    40     -     -     -     -     - |  288  18.51
 WHIT |     -    24     -     -    41     -     -     -     - |  288  10.34
 WSRT |     -    55     -     -     -     -    65     -     - |  280   0.08
 WTZR |     -    47     -    41     -     -    60     -     - |  288   0.17
 WUHN |     -    57     -    89    59     -    95     -     - |  287  19.65
 YELL |     -    73    55   196     -     -    51     -     - |  288   0.05
 -----+-------------------------------------------------------+--------------
 TOT  |  4885    86   118   167   144  2947   109  4751     - |


 BEST CLOCK FIT: AMC2   281   0.03 (ns) 

