
 GPS week: 1124   Day: 1   MJD: 52113                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2774      4     0.30    -0.13     5.39     0.00
 cod |   288     0  18150      3    -0.91    -1.62     0.08    27.73
 emr |    96     0   3913      0   891.59     4.91     0.09    24.61
 gfz |   288     0  14706      6    -0.20     0.29     0.08    28.68
 igu |    96     0   2580      0     0.17     0.17     4.87     0.00
 ngs |    96     0   2774      0     0.34    -0.06     5.01     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15042      7   208.35     6.73     0.12    18.98

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn |
 -----+-------------------------------------------------+
    1 |   300   -33  -156   -18  1916   129     -   143 |
    2 | -2236    85     8  -138  -885 -2696     -    76 |
    3 |  2284    34  -176  -114  8071  2125     -   194 |
    4 |  1036    90    65    24 -4974   695     -  -196 |
    5 | -4198   190     0    64 -1333 -3313     -  -370 |
    6 | -3499   218   -24   -27 -9550 -3186     -  -266 |
    7 |    19    36    22   -67 -1246  -735     -    39 |
    8 |  1082    45    28   -87  1113   100     -    54 |
    9 | -2950    68   -96   235 -5044 -2121     -  -412 |
   10 |  -164   107    29   -26 -4737  -827     -  -129 |
   11 |   369  -111    55  -103    55   284     -   286 |
   13 |  2615    23   124   -92 -3000  2381     -    49 |
   14 |  3311    39   -44    59 -1852  3150     -  -123 |
   15 |-14507   108   -26   -21     --12188     -  -115 |
   17 | -2988   223   -68   101-28611 -2766     -  -443 |
   18 |  1814   -46    35    89 -6298  1683     -   -83 |
   19 | 26100     0    20    34 26672 23681     -   -55 |
   20 |  2727   -57  -105   -35 -1159  2727     -   181 |
   21 |  -232   217  -177  -129 11650  -336     -   -43 |
   22 |  2204    45  -180   -24  1916  4326     -    48 |
   23 | -9330   -46  -163    92     - -8995     -     - |
   24 | -2379   131    74   -28 16019 -3162     -  -182 |
   25 | 10698    44  -118   155  9546 10072     -  -247 |
   26 | -3849    69    90   212 -3532 -3788     -  -465 |
   27 | -1894   -39   -36   -34  4409 -1508     -   124 |
   28 |  4196    58    92  -182 -5364  3861     -   150 |
   29 |   139    53  -248   181  -361     4     -  -245 |
   30 |  2086   112   -59   158 -4980  1553     -  -377 |
   31 |-11061   -98  -135   -19  2705-10616     -   230 |
 -----+-------------------------------------------------+
 ALGO |     -   -26   125  -122     -     -     -   167 |
 AUCK |     -   -71     -     -     -     -     -   104 |
 BAHR |     -    42    96   -72     -     -     -     6 |
 BJFS |     -   -26     -    25     -     -     -     - |
 CAS1 |     -     5     -   -56     -     -     -    77 |
 DAV1 |     -    41     -   -40     -     -     -     - |
 DRAO |     -   -54    11     -     -     -     -    73 |
 EISL |     -  -180     -     -     -     -     -   262 |
 FAIR |     -     -    49  -107     -     -     -   127 |
 FORT |     -   -18     -     -     -     -     -    26 |
 GALA |     -   -29     -    28     -     -     -     - |
 GUAM |     -    -7     -     7     -     -     -     - |
 HOB2 |     -  -115     -     -     -     -     -   168 |
 HRAO |     -   -13     -     -     -     -     -    18 |
 KARR |     -   -35     -    34     -     -     -     - |
 KERG |     -   -13     -     -     -     -     -    19 |
 KOKB |     -     -     -    91     -     -     -  -138 |
 KOUR |     -  -151     -   146     -     -     -     - |
 MAC1 |     -    42     -   -41     -     -     -     - |
 MALI |     -   -94     -     -     -     -     -   137 |
 MAS1 |     -   -39   122   -66     -     -     -   104 |
 MATE |     -  -111   115     -     -     -     -   112 |
 MCM4 |     -     -     -   -47     -     -     -    71 |
 MDO1 |     -   -69    78     -     -     -     -     - |
 NLIB |     -  -114    38     -     -     -     -   148 |
 NRC2 |     -  -116   130     -     -     -     -     - |
 NYA1 |     -    -3     -     3     -     -     -     - |
 ONSA |     -   -58     -   -27     -     -     -   125 |
 PIE1 |     -  -113     -     -     -     -     -   166 |
 SANT |     -     -     -  -114     -     -     -   173 |
 STJO |     -    53   198  -108     -     -     -     - |
 TIDB |     -    27     -   -26     -     -     -     - |
 TRO1 |     -  -176     -   170     -     -     -     - |
 TSKB |     -   -97    38     -     -     -     -   125 |
 USNO |     -   -83     -     -     -     -     -   122 |
 WSRT |     -   -21     -     -     -     -     -    31 |
 WTZR |     -   -78     -     -     -     -     -   114 |
 WUHN |     -   109     -     1     -     -     -  -158 |
 YELL |     -   -42   166    -6     -     -     -     - |
 YSSK |     -   -63     -    61     -     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   gfz   igu   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  5270   108   100    85  3479  5172     -    67 |  278   3.74
    2 |  6564    72   147    59  3533  6587     -    88 |  287   2.59
    3 |  3962    94    41    35  4826  4112     -   114 |  288   2.01
    4 |   840   158    50   138  2358   862     -    54 |  283   0.95
    5 |  9100    46    42    64  3821  8816     -    96 |  288   2.43
    6 |  8516   127    59   102  5454  8055     -    46 |  288   6.88
    7 |  3150    84    47    33  4044  3450     -    96 |  288   0.77
    8 |  5914    60   113    32  1464  5186     -    58 |  288   2.50
    9 |  7522   198   175    42  2660  6767     -   208 |  288   2.63
   10 |  2938    76    84    79  2338  3249     -   201 |  288   1.84
   11 |  1701    69    64    46   725  1611     -    56 |  288   0.44
   13 |  1111   122   123    89  1691   993     -    63 |  287   0.36
   14 |  1498    63    32    35  1348  1343     -    64 |  287   0.25
   15 |  5464    76    71   100     -  4237     -   109 |  288   2.15
   17 |  1694   141    76   117 13585  1483     -    86 |  288   3.37
   18 |  1273   124   110    85  2712  1085     -    52 |  288   0.49
   19 | 10643   120   179    99 13840 10237     -   204 |  274   5.29
   20 |  1961   128    53   132  1032  1821     -    39 |  288   0.18
   21 |  3388    67    71    42  6055  3406     -   119 |  288   3.17
   22 | 11776    73    76   108  2582  8836     -   146 |  288   0.60
   23 |  8247    55    71    59     -  7971     -     - |  284   6.48
   24 |  4658    88    79    98  4271  4890     -    55 |  288   1.98
   25 |  3613   108    66    53  3797  4083     -    71 |  288   2.31
   26 |  1756   117    99    69  1157  1888     -   120 |  288   0.40
   27 |  8163    80   109    85  4870  7398     -    69 |  288   2.97
   28 |  1368    53   184   110  2376  1438     -    83 |  288   0.59
   29 |  1010   111   151    67  1069   966     -   116 |  280   1.14
   30 |  3131    68    53    33  3998  2761     -    81 |  288   2.27
   31 |  2982    56    66    67  3399  3445     -    57 |  288   3.76
 -----+-------------------------------------------------+--------------
 ALGO |     -    47    30    57     -     -     -    47 |  288   0.06
 AUCK |     -    34     -     -     -     -     -    50 |  288  18.44
 BAHR |     -    28    28    34     -     -     -    37 |  288   0.44
 BJFS |     -    15     -    15     -     -     -     - |  287   0.81
 CAS1 |     -    41     -    47     -     -     -    65 |  288   9.61
 DAV1 |     -    53     -    52     -     -     -     - |  288  24.02
 DRAO |     -    23    26     -     -     -     -    36 |  288   0.09
 EISL |     -    46     -     -     -     -     -    67 |  286  21.29
 FAIR |     -     -    56    79     -     -     -    97 |  254   0.16
 FORT |     -    95     -     -     -     -     -   139 |  239   0.29
 GALA |     -    44     -    42     -     -     -     - |  286  17.74
 GUAM |     -    41     -    39     -     -     -     - |  288  12.68
 HOB2 |     -    36     -     -     -     -     -    53 |  288   0.09
 HRAO |     -    47     -     -     -     -     -    68 |  285  20.20
 KARR |     -    30     -    29     -     -     -     - |  288  80.17
 KERG |     -    51     -     -     -     -     -    75 |  287   1.77
 KOKB |     -     -     -   271     -     -     -   409 |  251   0.51
 KOUR |     -    39     -    38     -     -     -     - |  287  16.37
 MAC1 |     -    38     -    37     -     -     -     - |  287  11.75
 MALI |     -    23     -     -     -     -     -    34 |  282  14.63
 MAS1 |     -    28    25    27     -     -     -    62 |  288   2.75
 MATE |     -   238   175     -     -     -     -   420 |  287   0.19
 MCM4 |     -     -     -    87     -     -     -   132 |  288    >>>
 MDO1 |     -    16    18     -     -     -     -     - |   96  26.63
 NLIB |     -    28    33     -     -     -     -    39 |  286   0.10
 NRC2 |     -    34    39     -     -     -     -     - |   95   0.08
 NYA1 |     -    27     -    26     -     -     -     - |  288   0.08
 ONSA |     -    30     -    27     -     -     -    32 |  288   0.21
 PIE1 |     -    68     -     -     -     -     -   100 |  287  50.16
 SANT |     -     -     -    90     -     -     -   136 |  265  16.43
 STJO |     -    37    69    43     -     -     -     - |  287   1.33
 TIDB |     -    76     -    73     -     -     -     - |  288   0.10
 TRO1 |     -    43     -    41     -     -     -     - |  288  14.22
 TSKB |     -   111    86     -     -     -     -   191 |  288   0.87
 USNO |     -    29     -     -     -     -     -    42 |  288   0.08
 WSRT |     -    71     -     -     -     -     -   103 |  288   0.08
 WTZR |     -    30     -     -     -     -     -    44 |  288   0.10
 WUHN |     -    40     -    41     -     -     -    48 |  287  16.65
 YELL |     -    45   138    51     -     -     -     - |  288   0.12
 YSSK |     -    37     -    36     -     -     -     - |  287  11.09
 -----+-------------------------------------------------+--------------
 TOT  |  5388    82    92    77  4874  5005     -   122 |


 BEST CLOCK FIT: ALGO   288   0.06 (ns) 

