
 GPS week: 1123   Day: 6   MJD: 52111                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2774      0    -0.05     0.18     5.26     0.00
 cod |   288     0  18383      0    13.03     6.17     0.09    23.65
 emr |    96     0   3914      2   879.05     8.68     0.09    26.78
 esa |   288     0  15785    574   872.17     8.34     0.12    18.38
 gfz |   288     0  14775      0     0.06    -0.31     0.07    31.19
 igu |    96     0   2488      0    -0.15     0.29     3.50     0.00
 ngs |    96     0   2774      0    -0.07     0.20     4.91     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio |
 -----+-------------------------------------------------+
    1 | -3589    50     4   -44   -15  3678 -3601     - |
    2 | -8120   100    57    95  -147 -9355 -7121     - |
    3 |  -414   -83  -136   157     7   998  -585     - |
    4 |  -433    56   -32    64   -70  1518  -373     - |
    5 | -5330   158    29    44  -154  -730 -4938     - |
    6 |  -724    54  -179     0    11   588  -878     - |
    7 | -2420   185    90    10  -170  1231 -2164     - |
    8 |   901    23   -22   212  -135 -9419   529     - |
    9 |   126    34   -65    -3    -4 12362   -17     - |
   10 |   907   168   -21  -149   -33 10919  1149     - |
   11 |  7349  -163   205    55    31  2795  7139     - |
   13 |  7129    61   123  -105   -19  2862  6626     - |
   14 |  5080    37    76  -172    54  3334  5140     - |
   15 |  2546    23  -118     -    17     -  3244     - |
   17 | -5538    70  -253  -107    83  -963 -5754     - |
   18 |  6827   -59    -8    19    36  -114  6899     - |
   19 |  6722  -265   -65   409   -32     -  5562     - |
   20 |  7339   -57    67   147   -63  2109  7006     - |
   21 |-12965   109  -154   -17   -28-16308-11389     - |
   22 | -1872   -19  -123   -48    78  1997 -2137     - |
   23 | -1014    -7  -128  -145   127 -1988 -1172     - |
   24 |  4686   128   -55   -85   -31     -  3752     - |
   25 |  2184   -54  -153    -2    86  3833  2053     - |
   26 | -1401   119   -70  -103   -15  2268 -1332     - |
   27 | -6059  -166   -84    83    99 -6890 -5318     - |
   28 |   397    21   166    65  -102 -4635   589     - |
   29 |  -913   107  -100  -107     9  3521  -640     - |
   30 |  2689   -16  -189    -7    71  4757  2429     - |
   31 | -3941  -124   -41    37    84 -8149 -4587     - |
 -----+-------------------------------------------------+
 ALBH |     -   213     -  -274     -     -     -     - |
 ALGO |     -    -5   113     X   -29     -     -     - |
 AREQ |     -  -169     -    61    92     -     -     - |
 ARTU |     -    85     -     -   -64     -     -     - |
 AUCK |     -  -131     -   168     -     -     -     - |
 BAHR |     -    81   116   -84   -42     -     -     - |
 BJFS |     -   -36     -     -    28     -     -     - |
 CAS1 |     -   -41     -   104   -31     -     -     - |
 DAV1 |     -    41     -     -   -31     -     -     - |
 DRAO |     -   -42    37     -     -     -     -     - |
 FAIR |     -     -    73  -106     -     -     -     - |
 GALA |     -    18     -  -151    76     -     -     - |
 GRAZ |     -    15     -   -19     -     -     -     - |
 GUAM |     -   -61     -   -26    60     -     -     - |
 KIRU |     -   168     -  -217     -     -     -     - |
 KOKB |     -     -     -   -96    57     -     -     - |
 KOSG |     -     2     -    -3     -     -     -     - |
 MAC1 |     -    47     -     -   -36     -     -     - |
 MAS1 |     -     9   130   -11   -38     -     -     - |
 MATE |     -   -53    47     -     -     -     -     - |
 MAW1 |     -    48     -     -   -36     -     -     - |
 MCM4 |     -   -32     -   230  -111     -     -     - |
 MDO1 |     -  -107    95     -     -     -     -     - |
 NLIB |     -   -43    38     -     -     -     -     - |
 NRC2 |     -  -138   122     -     -     -     -     - |
 ONSA |     -   -74     -    52    26     -     -     - |
 PERT |     -    84     -  -108     -     -     -     - |
 PIE1 |     -  -101     -   130     -     -     -     - |
 REYK |     -   -49     -    62     -     -     -     - |
 SANT |     -     -     -    24   -14     -     -     - |
 STJO |     -   -35    77     -     4     -     -     - |
 TIDB |     -     4     -     X    -3     -     -     - |
 TRO1 |     -  -137     -     -   104     -     -     - |
 TSKB |     -   -22   136   -38     -     -     -     - |
 USNO |     -    77     -   -99     -     -     -     - |
 USUD |     -   -24     -    31     -     -     -     - |
 VILL |     -   134     -  -172     -     -     -     - |
 WHIT |     -   -45     -     -    34     -     -     - |
 WTZR |     -     0     -     0     -     -     -     - |
 WUHN |     -   -50     -   -31    56     -     -     - |
 YAR2 |     -  -261     -   336     -     -     -     - |
 YELL |     -     0   189  -149    34     -     -     - |
 YSSK |     -  -130     -     -    98     -     -     - |
 -----+-------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   ngs   sio | NEPO RMS (ns)
 -----+-------------------------------------------------+--------------
    1 |  6995   141    76   166    32  2163  5952     - |  277   2.47
    2 |  7123   151    45   196    44  5057  6810     - |  288   3.36
    3 |  2279    60    32   235   110  1336  1998     - |  288   1.21
    4 |  1284    64    59    45    50   747  1475     - |  288   0.77
    5 |  5758    49    43    62    22  5432  6061     - |  288   2.88
    6 | 12891    85    51   125    46  4556 11608     - |  288   9.07
    7 |  3613    72    43    46    53  1394  3574     - |  288   0.74
    8 |  3841   104    66   119    34  6356  3266     - |  288   2.90
    9 |  1845    41   127    77    29  4563  1744     - |  288   1.33
   10 |  6815    83    37    56    69  6949  5576     - |  288   2.43
   11 |  1906    79   104   221   122   909  1607     - |  288   0.32
   13 |  1655   137    62    79    63  1387  1731     - |  288   0.30
   14 |   943    92    66    58    71  1768   856     - |  288   0.25
   15 |  9990    56    75     -    43     -  9366     - |  283   5.17
   17 |  3702    83   134    70    42  1008  3300     - |  288   2.78
   18 |  1448    87    76   189   155   452  1404     - |  288   0.40
   19 |  5513   127   246   115   194     -  5699     - |  271   2.34
   20 |   645    53    63   139    94  1173   840     - |  288   0.23
   21 |  5117    98    94   152    45  6586  4533     - |  287   2.36
   22 |  2446    49    97    92    69   927  1860     - |  288   0.49
   23 |  5949    84   101   123    90  1665  5979     - |  288   5.57
   24 |  6895    89    93    51    85     -  6809     - |  288   1.77
   25 |  2095    92    55    91    48  1816  1922     - |  288   1.79
   26 |   998   176   105   150   190  1187  1037     - |  286   0.61
   27 |  8706    45    62    83    37  3100  7859     - |  288   4.82
   28 |  1931    59    97    42    75  4639  1867     - |  288   0.60
   29 |  2319    59    70    64    51  2867  2460     - |  276   0.82
   30 |  2631    42    64   142    92  3599  2796     - |  288   1.31
   31 |  7803   155    61   252    52  3845  7675     - |  288   4.64
 -----+-------------------------------------------------+--------------
 ALBH |     -   209     -   269     -     -     -     - |  193   0.11
 ALGO |     -    25    37     X    18     -     -     - |  288   0.04
 AREQ |     -    35     -    47    42     -     -     - |  288  24.10
 ARTU |     -   159     -     -   121     -     -     - |  282   9.49
 AUCK |     -    32     -    41     -     -     -     - |  286  17.56
 BAHR |     -    45    44    33    33     -     -     - |  288   0.38
 BJFS |     -    16     -     -    12     -     -     - |  288   0.89
 CAS1 |     -   303     -   156   137     -     -     - |  287   8.35
 DAV1 |     -    72     -     -    55     -     -     - |  288  20.83
 DRAO |     -    20    18     -     -     -     -     - |   96   0.09
 FAIR |     -     -   129   188     -     -     -     - |   96   0.28
 GALA |     -   119     -    55   110     -     -     - |  288  19.43
 GRAZ |     -    93     -   119     -     -     -     - |  263   7.57
 GUAM |     -    30     -    37    20     -     -     - |  288  15.97
 KIRU |     -    25     -    32     -     -     -     - |  288   1.36
 KOKB |     -     -     -   132    78     -     -     - |  278   1.26
 KOSG |     -    33     -    43     -     -     -     - |  286   9.88
 MAC1 |     -    52     -     -    40     -     -     - |  286  12.75
 MAS1 |     -    25    30    50    24     -     -     - |  288   1.67
 MATE |     -    27    24     -     -     -     -     - |   95   0.10
 MAW1 |     -   132     -     -   100     -     -     - |  281  28.90
 MCM4 |     -    54     -    53    36     -     -     - |  288  22.10
 MDO1 |     -    60    53     -     -     -     -     - |   96   5.94
 NLIB |     -   290   256     -     -     -     -     - |   95  85.96
 NRC2 |     -    41    36     -     -     -     -     - |   95   0.10
 ONSA |     -    33     -    34    22     -     -     - |  288   0.93
 PERT |     -    75     -    96     -     -     -     - |  288  14.00
 PIE1 |     -    32     -    41     -     -     -     - |  288 112.35
 REYK |     -    19     -    25     -     -     -     - |  288  11.16
 SANT |     -     -     -    93    55     -     -     - |  261  15.51
 STJO |     -    34    31     -    28     -     -     - |  288   2.62
 TIDB |     -    59     -     X    45     -     -     - |  288   0.08
 TRO1 |     -    37     -     -    28     -     -     - |  282  16.21
 TSKB |     -    66    51    73     -     -     -     - |  288   0.76
 USNO |     -    36     -    46     -     -     -     - |  286   0.07
 USUD |     -    27     -    34     -     -     -     - |  286   0.19
 VILL |     -   178     -   229     -     -     -     - |  209   4.29
 WHIT |     -    34     -     -    26     -     -     - |  286  31.08
 WTZR |     -    19     -    25     -     -     -     - |  288   0.09
 WUHN |     -    28     -    27    22     -     -     - |  287  15.49
 YAR2 |     -   101     -   130     -     -     -     - |  197 391.46
 YELL |     -    59    60   221    83     -     -     - |  288   0.19
 YSSK |     -    29     -     -    22     -     -     - |  275  12.26
 -----+-------------------------------------------------+--------------
 TOT  |  5258    92    88   117    75  3502  4908     - |


 BEST CLOCK FIT: ALGO   288   0.04 (ns) 

