
 GPS week: 1123   Day: 1   MJD: 52106                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2774      0     0.17    -0.26     4.66     0.00
 cod |   288     0  18293     16    -2.38     0.63     0.12    16.89
 emr |    96     0   3821    185   859.92     1.38     0.08    26.33
 esa |   288     0  16301    182   853.17     1.15     0.14    13.99
 gfz |   288     0  14513    152     0.05    -0.44     0.11    18.53
 igu |    96     0   2382      0     0.05    -0.12     4.07     0.00
 jpl |     0     0      0      0     3.88     0.00     0.00     0.00
 ngs |    96     0   2774      0     0.18    -0.29     4.42     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16405    575   160.68     4.05     0.08    24.27

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |  -947    75   -35    15   -51   984     -  -781     -   -10 |
    2 | -1039   214     X    -6  -106 -3118     -  -953     -   -67 |
    3 | -4926  -128   -97    87   157-13402     - -4251     -   -44 |
    4 |  -378    39    32   -58    -6  4731     -  -593     -     X |
    5 |  -144   267   -29    55   -17   404     -  -487     -  -190 |
    6 |  2024    77   -54   122   132  1161     -  1437     -  -203 |
    7 | -1952   221     9    86  -181 -4657     - -2150     -   -68 |
    8 | -1168   142     7    80  -106  8322     - -1268     -   -68 |
    9 | -4192   130   -39   205    52 -1193     - -3394     -  -234 |
   10 |  2336   201    69   108  -217  4983     -  2223     -   -65 |
   11 |  1365  -246   138   160    10  -433     -  1822     -    21 |
   13 |  1414   -85   119   -95   102  1752     -  1554     -    -4 |
   14 |  4258   -15   -46    38   -44  1184     -  4342     -    37 |
   15 |  3324   145   -13     -    61     -     -  3027     -  -143 |
   17 | -6965   185   -75   -19   294     -     - -6450     -  -298 |
   18 |  2306  -181    46   -32   152 -8079     -  2403     -    13 |
   19 | 17392  -107  -250   415    69     -     - 16216     -  -122 |
   20 |  3236   -23    19  -145   103  -332     -  3217     -    14 |
   21 | -2995   -27  -188   153    33     -     - -4215     -   -17 |
   22 | -6850   104   -72    17     2-15805     - -5860     -   -57 |
   23 |  1302    52  -146    45   -13  3754     -  1496     -     - |
   24 |  3901   161    62    63   -81 10563     -  3232     -  -110 |
   25 |  3368   -66  -122   210   204  3696     -  2937     -  -186 |
   26 | -6183   109     X  -205    53  -885     - -5690     -     X |
   27 |  2196   -47   -37   174   156 13609     -  1757     -  -171 |
   28 |   415     1   175  -155  -163  7268     -   947     -   150 |
   29 |  3468    15  -171    36   230 -3425     -  3200     -  -145 |
   30 | -5389   -26   -75   161   248   214     - -5001     -  -236 |
   31 | -9473   -99    15   235   -52-10910     - -8988     -   -33 |
 -----+-------------------------------------------------------------+
 ALBH |     -   212     -  -256     -     -     -     -     -     - |
 ALGO |     -  -120    45     X     X     -     -     -     -    51 |
 AUCK |     -  -148     -    -1     -     -     -     -     -   104 |
 BAHR |     -    60    80    36  -126     -     -     -     -     4 |
 CAS1 |     -   -39     -    28   -57     -     -     -     -    54 |
 DAV1 |     -    -8     -     -  -113     -     -     -     -    92 |
 DRAO |     -  -147    -5     -     -     -     -     -     -   104 |
 FAIR |     -     -   100  -169     -     -     -     -     -    58 |
 FORT |     -     -     -   332     -     -     -     -     -  -191 |
 GALA |     -     -     -  -175   -27     -     -     -     -   121 |
 GODE |     -   -29     -    35     -     -     -     -     -     - |
 GUAM |     -   -28     -  -260   112     -     -     -     -    83 |
 HOB2 |     -   174     -  -388     -     -     -     -     -   102 |
 HRAO |     -   176     -     -     -     -     -     -     -  -123 |
 KIRU |     -   162     -  -196     -     -     -     -     -     - |
 KOKB |     -     -     -     -  -217     -     -     -     -   165 |
 KOSG |     -   -25     -    30     -     -     -     -     -     - |
 LPGS |     -     -     -    20   -15     -     -     -     -     - |
 MAC1 |     -   101     -   -73   -37     -     -     -     -     - |
 MALI |     -     -     -     2     -     -     -     -     -    -1 |
 MATE |     -   -87    26     -     -     -     -     -     -    51 |
 MCM4 |     -    89     -  -244   178     -     -     -     -   -56 |
 MDO1 |     -  -159   102     -     -     -     -     -     -     - |
 MKEA |     -     -     -  -105    79     -     -     -     -     - |
 NLIB |     -   -93     -     -     -     -     -     -     -    64 |
 NRC2 |     -  -162   104     -     -     -     -     -     -     - |
 NYA1 |     -     0     -     -     0     -     -     -     -     - |
 NYAL |     -     -     6     -     -     -     -     -     -    -7 |
 OHIG |     -   -88     -   254  -210     -     -     -     -    77 |
 PERT |     -   -53     -    65     -     -     -     -     -     - |
 PIE1 |     -  -178     -    41     -     -     -     -     -   101 |
 POTS |     -     -     -  -145   110     -     -     -     -     - |
 SANT |     -     -     -   -17  -191     -     -     -     -   152 |
 SELE |     -   137     -  -165     -     -     -     -     -     - |
 SFER |     -  -243     -     -     -     -     -     -     -   169 |
 STJO |     -    -1    95     -   -44     -     -     -     -     - |
 TIXI |     -     5     -     -    -4     -     -     -     -     - |
 TRO1 |     -  -130     -     -   119     -     -     -     -     - |
 TROM |     -     -     -    46     -     -     -     -     -   -27 |
 TSKB |     -  -148    24    24     -     -     -     -     -    81 |
 URUM |     -   -78     -     -   -53     -     -     -     -    94 |
 USNO |     -   -22     -  -227     -     -     -     -     -   146 |
 USUD |     -  -112     -   135     -     -     -     -     -     - |
 WHIT |     -   -53     -     -    48     -     -     -     -     - |
 WSRT |     -   -72     -     -     -     -     -     -     -    50 |
 WTZR |     -   -43     -   -89     -     -     -     -     -    81 |
 WUHN |     -  -202     -     -   -11     -     -     -     -   149 |
 YELL |     -    -3   176  -315  -109     -     -     -     -   203 |
 ZWEN |     -     -     -     -  -495     -     -     -     -   377 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4633   158    82   209   136  4623     -  4500     -   191 |  281   3.97
    2 |  2698   129     X    41   116  2031     -  2200     -    50 |  288   1.46
    3 |  3699   160   169   120    42  2739     -  3422     -    63 |  288   2.63
    4 |  1669    85    75   125    36  3015     -  1653     -     X |  288   0.79
    5 |  8282    58    46    98    93  6439     -  8551     -    41 |  288   2.11
    6 | 10944    83   126    82    68  6998     -  9877     -    68 |  288   9.14
    7 |  2212   168    30    24    39  2586     -  2263     -    93 |  288   0.69
    8 |  3886   116    71   130    70  5403     -  3607     -    65 |  288   2.93
    9 |  3228   130    26    78    81  1860     -  3873     -    74 |  288   1.89
   10 | 10117    95    68    83    85  5174     -  9299     -    68 |  288   2.98
   11 |  1254   119    57   113   119   504     -  1334     -    75 |  288   0.40
   13 |   947   180    77    79   143   670     -   714     -    59 |  288   0.36
   14 |   935   110   112   111    68   978     -   914     -    77 |  288   0.27
   15 |  5011    59    37     -    75     -     -  5166     -    76 |  288   2.85
   17 |  1760   202   117   261   141     -     -  1920     -    78 |  288   3.10
   18 |  1133    95    32   222    87  3688     -  1087     -   133 |  288   0.49
   19 |  3591   196    59    75   169     -     -  3550     -    43 |  286   4.85
   20 |   907    88   111    68    74   444     -   787     -    37 |  288   0.19
   21 |  7039   214   202   307   183     -     -  5805     -   128 |  288   2.71
   22 |  6471   121    86    47   196  8976     -  5978     -   110 |  288   0.40
   23 |  4664    82    47    75    74  2318     -  4735     -     - |  288   4.67
   24 |  4114    87    53    36    38  5615     -  3858     -    52 |  288   1.67
   25 |  5048   141    73    94   155  3999     -  5028     -    28 |  288   2.96
   26 |  1890   163     X   200   277   469     -  2011     -     X |  269   0.28
   27 |  3717   108    62    54    88  2902     -  3226     -    30 |  288   2.23
   28 |  4759    83    60    34    75  5299     -  4765     -    29 |  288   0.24
   29 |  1981   107    93   120   138  2271     -  1848     -    98 |  282   0.77
   30 |  2558    71    63    93   210  2761     -  2533     -    61 |  288   1.15
   31 |  4139   151   168   204   103  4649     -  3959     -    39 |  288   4.05
 -----+-------------------------------------------------------------+--------------
 ALBH |     -   173     -   209     -     -     -     -     -     - |  288   0.08
 ALGO |     -    37    30     X     X     -     -     -     -    40 |  144   0.03
 AUCK |     -    84     -   120     -     -     -     -     -    37 |  276  14.94
 BAHR |     -    59    35    80    29     -     -     -     -    21 |  288   0.41
 CAS1 |     -   115     -    69    34     -     -     -     -    82 |  288  11.82
 DAV1 |     -   108     -     -    43     -     -     -     -    58 |  288  15.04
 DRAO |     -    47    28     -     -     -     -     -     -    28 |  288   0.04
 FAIR |     -     -   110   328     -     -     -     -     -   162 |  238   0.27
 FORT |     -     -     -    50     -     -     -     -     -    29 |  288   0.34
 GALA |     -     -     -    80    31     -     -     -     -    39 |  288  18.14
 GODE |     -   173     -   208     -     -     -     -     -     - |  249   0.17
 GUAM |     -    43     -    93    30     -     -     -     -    78 |  288  14.47
 HOB2 |     -    67     -    79     -     -     -     -     -    27 |  288   0.13
 HRAO |     -   204     -     -     -     -     -     -     -   142 |  288  21.92
 KIRU |     -    82     -    99     -     -     -     -     -     - |  287   3.06
 KOKB |     -     -     -     -    66     -     -     -     -    50 |  206   0.12
 KOSG |     -    27     -    33     -     -     -     -     -     - |  288   6.39
 LPGS |     -     -     -   235   178     -     -     -     -     - |  280  95.00
 MAC1 |     -    82     -    80    34     -     -     -     -     - |  288  14.79
 MALI |     -     -     -   304     -     -     -     -     -   175 |  268  74.15
 MATE |     -    43    29     -     -     -     -     -     -    37 |  287   0.15
 MCM4 |     -   130     -   343   259     -     -     -     -   135 |  288    >>>
 MDO1 |     -    35    23     -     -     -     -     -     -     - |   96   6.00
 MKEA |     -     -     -    43    33     -     -     -     -     - |  288  29.39
 NLIB |     -   279     -     -     -     -     -     -     -   194 |  262   0.09
 NRC2 |     -    34    21     -     -     -     -     -     -     - |   96   0.10
 NYA1 |     -    71     -     -    65     -     -     -     -     - |  288   0.04
 NYAL |     -     -    41     -     -     -     -     -     -    45 |   96   0.05
 OHIG |     -   155     -   139    53     -     -     -     -    54 |  288  23.45
 PERT |     -    25     -    31     -     -     -     -     -     - |  288  12.82
 PIE1 |     -    36     -    38     -     -     -     -     -    28 |  288   0.06
 POTS |     -     -     -    66    50     -     -     -     -     - |  277  31.15
 SANT |     -     -     -    99    81     -     -     -     -    91 |  282  15.81
 SELE |     -   171     -   206     -     -     -     -     -     - |  282  33.34
 SFER |     -   204     -     -     -     -     -     -     -   142 |  286  57.39
 STJO |     -    31    61     -    30     -     -     -     -     - |  288   2.99
 TIXI |     -    75     -     -    68     -     -     -     -     - |  273   9.16
 TRO1 |     -    92     -     -    83     -     -     -     -     - |  286  13.40
 TROM |     -     -     -    83     -     -     -     -     -    48 |  288  17.61
 TSKB |     -    50    32    94     -     -     -     -     -    47 |  288   0.94
 URUM |     -    89     -     -    46     -     -     -     -    36 |  288  29.25
 USNO |     -    58     -    32     -     -     -     -     -    33 |  288   0.03
 USUD |     -    31     -    37     -     -     -     -     -     - |  288   0.29
 WHIT |     -    34     -     -    31     -     -     -     -     - |  288   8.57
 WSRT |     -    45     -     -     -     -     -     -     -    31 |  288   0.05
 WTZR |     -    62     -    40     -     -     -     -     -    34 |  288   0.07
 WUHN |     -    48     -     -    23     -     -     -     -    32 |  287  14.74
 YELL |     -    86    59    60    37     -     -     -     -    40 |  288   0.09
 ZWEN |     -     -     -     -    21     -     -     -     -    16 |  288  17.16
 -----+-------------------------------------------------------------+--------------
 TOT  |  4665   117    82   138   106  4075     -  4424     -    81 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

