
 GPS week: 1119   Day: 3   MJD: 52080                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2671      0     0.07    -0.19     5.48     0.00
 cod |   288     0  18844      5    -1.96     2.71     0.06    25.43
 emr |    96     0   3420      0   770.31     3.09     0.11    13.29
 esa |   288     0  13472    276   764.90     2.97     0.48     0.00
 gfz |   288     0  14365     34    -0.05     0.09     0.07    22.88
 igu |    96     0   2383      0     0.06    -0.18     3.50     0.00
 jpl |   279     0   7645   1617   -12.47     4.34     0.10    15.28
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14641    158 -1012.20     3.59     0.07    23.12

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   sio   usn |
 -----+-------------------------------------------------------+
    2 |  -315    53   -73  1700   -38 -4839   -11     -    -2 |
    3 |  3941  -113  -329  -849   189  5877  -117     -    35 |
    4 |  1045   120   246   992  -147 -1936  -100     -    -7 |
    5 | -6582   137    40  1080   -60 -9646   186     -  -164 |
    6 |-10822   184   -49   734  -125-10285   -12     -   -63 |
    7 |  5103    45    69 -1347   -98  1017  -164     -    68 |
    8 | -4344   180    23  -983  -154 -5321    -9     -   -47 |
    9 | -5806   137    30 -1007    83 -9674   330     -  -324 |
   10 | -3193   105   226  1044    26   519  -112     -  -149 |
   11 |  4714  -106    98 -1132    50  3690   -90     -    69 |
   13 |  5656   135    63    56  -260  6278     X     -    97 |
   14 |  6382    86   -31  1720     3  6211   157     -  -145 |
   15 |  1391   -43   -14 -1479   188  -177   -46     -  -120 |
   17 | -8092   152   -89 -1778   187     -   -58     -  -319 |
   18 |  6952   -14   115 -2002   127 -1117   -75     -  -106 |
   19 |  3021   -99  -371 -3612   107  6595     X     -    85 |
   20 |  7211    65   -31  2717   -12  4540     X     -   -54 |
   21 |  -466   133  -210 -2573    75     -   -87     -  -153 |
   22 |  1057  -133  -452 -2687   257  -246   -92     -     4 |
   23 |  2748    41    -6  2004   172     -   357     -  -311 |
   24 |  4578   102   126 -1360  -133  3362   -16     -     - |
   25 | -3185    52  -170    22   112   428   -49     -  -121 |
   26 |  1712   175   182  1683    37  2081   234     -  -322 |
   27 | -5754   -16   -27  1964    -6 -7161     X     -    29 |
   28 |  -768    48    88  1841  -239   243   -28     -   175 |
   29 | -1173    51  -153  1871   142  4080    60     -  -189 |
   30 | -6789   132  -107 -1448    57 -7451     X     -  -181 |
   31 |  1771   -37   -38   419    82 13456     X     -   -34 |
 -----+-------------------------------------------------------+
 ALBH |     -   -75     -     -     -     -   125     -     - |
 ALGO |     -   -27   127  5600  -122     -     -     -   126 |
 AREQ |     -  -161     -  -253     -     -     X     -   177 |
 AUCK |     -  -101     -   -58  -195     -    54     -   271 |
 BAHR |     -    11     -  -493  -166     -     -     -   176 |
 BJFS |     -  -129     -     -   143     -     -     -     - |
 BRMU |     -   -50     -     -   -84     -     -     -   138 |
 CAS1 |     -    27     -   -10  -120     -     -     -    94 |
 CRO1 |     -   -38     -     -     -     -    63     -     - |
 DAV1 |     -   -80     -     -   -37     -     -     -   124 |
 DRAO |     -   -56     5     -     -     -     -     -    60 |
 FORT |     -  -284     -   415   316     -     -     -     X |
 GALA |     -    45     -     -     9     -   -91     -     - |
 GOLD |     -    49     -     X     -     -   -81     -     - |
 GUAM |     -    22     -  -186     -     -  -101     -    25 |
 HOB2 |     -   174     -  -266     -     -     -     -  -191 |
 HRAO |     -   -75     -     -    84     -     X     -     - |
 JPLM |     -     -     -     -    40     -   -59     -     - |
 KERG |     -    15     -     -     -     -     -     -   -17 |
 LPGS |     -     -     -  -968   -67     -     -     -    66 |
 MAC1 |     -   121     -     -  -134     -     -     -     - |
 MALI |     -   -51     -  -181     -     -     -     -    56 |
 MATE |     -   -67   128     -     -     -     -     -     - |
 MCM4 |     -     -     -    30  -212     -     -     -   210 |
 MDO1 |     -   -49   129     -     -     -    45     -     - |
 NLIB |     -   -18     -     -     -     -     -     -    20 |
 NRC2 |     -   -53   102     -     -     -     -     -     - |
 NYA1 |     -    26     -     -   -29     -     -     -     - |
 OHIG |     -   -27     -    66  -212     -     -     -   238 |
 ONSA |     -   -29   169  -130  -108     -     -     -   107 |
 POTS |     -  -104     -  -417     -     -     -     -   114 |
 STJO |     -   -67    73     -    60     -     -     -     - |
 SUTH |     -   217     -   293     -     -  -361     -     - |
 THTI |     -     -     -     -   -19     -     -     -    19 |
 TRO1 |     -  -179     -     -   199     -     -     -     - |
 TSKB |     -  -139     -  -188     -     -     -     -   153 |
 USNO |     -   -52     -  -264     -     -     -     -    57 |
 USUD |     -   -88     -  -132     -     -   147     -     - |
 WHIT |     -   -63     -     -    70     -     -     -     - |
 WILL |     -   -52     -     -     -     -    86     -     - |
 WSRT |     -   -78     -     -     -     -     -     -    86 |
 WTZR |     -  -152     -  -313     -     -     -     -   167 |
 WUHN |     -  -100     -     -    30     -     -     -    79 |
 YELL |     -   -55   105  -281     -     -     -     -     - |
 YSSK |     -   -62     -     -   103     -   -52     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    2 |  4728    82    74   145    73  2886   131     -    78 |  288   1.73
    3 |  4400    51    94   445    67  3882    72     -    74 |  277   2.53
    4 |  1873    69   188   374    45  1422   169     -    58 |  288   1.12
    5 |  6412    62    40    96    43  6913   128     -    40 |  288   3.19
    6 |  9921   145    71  1181   106  7053   115     -    64 |  277   7.85
    7 |  2256   140   115  1164   173  1555    59     -    73 |  276   0.87
    8 |  6690    39    43    61    71  4699   149     -    60 |  288   4.56
    9 |  6551    57    75    83    69  3618   169     -    80 |  288   2.95
   10 |  7094    55    97   100    78  4339    68     -    64 |  288   2.70
   11 |   948    73    78   121    86  1808   112     -    68 |  288   0.30
   13 |  2216    65    45    71    33  1994     X     -    57 |  288   0.60
   14 |  1483    81    42    65    59  3060   117     -    84 |  288   0.25
   15 |  4455    76    73   874   106  3000    60     -   155 |  287   4.43
   17 |  6593    65   179   506    78     -    55     -    91 |  288   3.54
   18 |  1808    55    76    82    54   796    95     -    49 |  288   0.38
   19 |  5623   110   129   322    96  6106     X     -    65 |  277   4.06
   20 |  1406    56    93    66    53  2031     X     -    55 |  288   0.16
   21 |  9010   107   100  1724   131     -    59     -   158 |  287   3.92
   22 |  2617    81   119  1321   171   970   137     -   181 |  288   0.79
   23 |  9518   154    98   475    92     -    49     -    93 |  288   5.01
   24 |  2644    57   239    89    48  1308   143     -     - |  288   2.02
   25 |  3385    83    72   203    69  1790    99     -    43 |  288   1.12
   26 |  1787    85   179   131    62  1525   152     -    62 |  288   0.59
   27 |  5750    33    69   123    66  4129     X     -    67 |  288   2.84
   28 |  7950    65    89   136    57  2905    93     -    50 |  288   1.04
   29 |  1348    85    88   153    55  1619   160     -    81 |  288   0.80
   30 |  2687    78   130   123   119  3367     X     -    37 |  288   1.36
   31 | 10699    83    80   130    50  4052     X     -    57 |  278   4.13
 -----+-------------------------------------------------------+--------------
 ALBH |     -    19     -     -     -     -    32     -     - |  279   0.11
 ALGO |     -    39    34    62    51     -     -     -    51 |  288   0.06
 AREQ |     -    23     -    69     -     -     X     -    25 |  287  24.51
 AUCK |     -    30     -   114    37     -   129     -    60 |  288  18.67
 BAHR |     -    26     -    49    28     -     -     -    31 |  288   0.60
 BJFS |     -    17     -     -    19     -     -     -     - |  288   0.99
 BRMU |     -    19     -     -    39     -     -     -    31 |  288  26.45
 CAS1 |     -    45     -   153    56     -     -     -    98 |  287  11.45
 CRO1 |     -    19     -     -     -     -    32     -     - |  272   0.23
 DAV1 |     -    30     -     -    42     -     -     -    42 |  288  21.22
 DRAO |     -    33    32     -     -     -     -     -    38 |  288   0.14
 FORT |     -    46     -    97    51     -     -     -     X |  104   0.10
 GALA |     -    63     -     -    49     -    75     -     - |  288  23.99
 GOLD |     -    21     -     X     -     -    35     -     - |  279  16.48
 GUAM |     -    83     -   771     -     -   126     -    46 |  286  15.94
 HOB2 |     -    30     -    56     -     -     -     -    33 |  288   0.10
 HRAO |     -    43     -     -    47     -     X     -     - |  288  22.39
 JPLM |     -     -     -     -    38     -    56     -     - |  269  22.38
 KERG |     -    24     -     -     -     -     -     -    27 |  286   0.90
 LPGS |     -     -     -   672    32     -     -     -    32 |  280 289.07
 MAC1 |     -    26     -     -    29     -     -     -     - |  288  12.03
 MALI |     -    34     -   245     -     -     -     -    38 |  284  40.59
 MATE |     -    95   181     -     -     -     -     -     - |   78   0.15
 MCM4 |     -     -     -   212   149     -     -     -   147 |  254    >>>
 MDO1 |     -    43    72     -     -     -    58     -     - |  287  86.95
 NLIB |     -    27     -     -     -     -     -     -    30 |  273   0.06
 NRC2 |     -    15    29     -     -     -     -     -     - |   96   0.11
 NYA1 |     -    28     -     -    31     -     -     -     - |  288   0.12
 OHIG |     -    66     -   138    45     -     -     -    43 |  288  20.24
 ONSA |     -    40    57    90    22     -     -     -    58 |  288   0.27
 POTS |     -    53     -    82     -     -     -     -    58 |  288  13.29
 STJO |     -    22    37     -    24     -     -     -     - |  288   2.06
 SUTH |     -    87     -   147     -     -   145     -     - |  229  12.49
 THTI |     -     -     -     -    33     -     -     -    32 |  287   1.15
 TRO1 |     -    36     -     -    40     -     -     -     - |  288  15.36
 TSKB |     -    42     -    94     -     -     -     -    46 |  287   0.88
 USNO |     -    23     -   144     -     -     -     -    25 |  287   0.08
 USUD |     -    26     -    96     -     -    43     -     - |  272   0.19
 WHIT |     -    28     -     -    31     -     -     -     - |  288  35.81
 WILL |     -    27     -     -     -     -    45     -     - |  273   2.31
 WSRT |     -    55     -     -     -     -     -     -    60 |  288   0.05
 WTZR |     -    35     -   264     -     -     -     -    38 |  286   0.08
 WUHN |     -    53     -     -    44     -     -     -    54 |  287  22.48
 YELL |     -    89   170   445     -     -     -     -     - |   96 209.44
 YSSK |     -    29     -     -    26     -    64     -     - |  287  12.66
 -----+-------------------------------------------------------+--------------
 TOT  |  5484    62   106   478    71  3498    97     -    71 |


 BEST CLOCK FIT: WSRT   288   0.05 (ns) 

