
 GPS week: 1118   Day: 2   MJD: 52072                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2762      1    -0.08    -0.01     4.19     0.00
 cod |   288     0  18393    256    -6.56     5.02     0.08    29.59
 emr |    96     0   3707    190   770.52     5.88     0.13    14.65
 esa |   288     0  16065    931   764.05     6.00     0.16    11.82
 gfz |   288     0  14222      0    -0.09    -0.42     0.09    25.25
 igu |    96     0   2382      1     0.06    -0.16     3.24     0.00
 jpl |     0     0      0      0     0.00     0.00     0.00     0.00
 ngs |    96     0   2762      1    -0.07    -0.08     4.04     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15599    296 -1541.16   -89.87     0.11    18.69

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -1628    21    13   238  -134 -2504     - -1385     -    -6 |
    2 | -2104   154   -94   -85   -52  6675     - -2100     -   -90 |
    3 | -1943  -201  -148    81   223 -4277     - -1479     -    -5 |
    4 |  1580    42    78    12   -51 -1126     -  1548     -   -26 |
    5 |  1148    79  -132     2   105  6859     -  -214     -  -231 |
    6 |  4825     8  -284    23   181  9357     -  3045     -  -198 |
    7 |   590   159   107   -89  -109   781     -   757     -   -73 |
    8 | -1979   179   108    49  -165 -7355     - -1806     -  -113 |
    9 | -4556    61  -153   287   128 -3535     - -4334     -  -409 |
   10 | -4937   169   136   -81    -6  2529     - -4597     -  -236 |
   11 |  5019   -52   255    24     1 -1418     -  4930     -     X |
   13 |  5908    42   258  -251  -161 -4369     -  6192     -   244 |
   14 |  5447   -19   118   -35    64 -1681     -  5347     -   -65 |
   15 |  -943  -112  -166   133   120 12619     -  -831     -   -25 |
   17 | -6681   137  -362   -72   135     -     - -6493     -  -255 |
   18 |  5875   -95  -128  -172   207 -4307     -  6035     -    11 |
   19 |  8617  -162   -26   320   -44  1035     -  8044     -   111 |
   20 |  4521   144   119   -22  -192 -1333     -  4578     -    18 |
   21 | -1936     -   -42   328     -     -     - -2749     -  -165 |
   22 | -2241   -48  -171    78   155 -1050     - -2096     -  -138 |
   23 | -7666   126  -366  -115   223     -     - -6951     -  -343 |
   24 | -6282    33     X     X   -39 -2574     - -5837     -     - |
   25 | -4152   -65  -100    -7   119 -4777     - -3444     -   -28 |
   26 |  -908    56   -57   213    85 -2698     -  -762     -  -321 |
   27 |  7700    70    95  -148   -33  9610     -  6684     -     6 |
   28 |  2748   -68   257  -189   -28 -4665     -  2948     -   196 |
   29 |  1135  -111   -59    90   173 -1495     -  1091     -  -101 |
   30 | -1690     1  -192     4   205  -245     - -1367     -  -230 |
   31 | -5287    35   -79     X    36     -     - -4627     -   -82 |
 -----+-------------------------------------------------------------+
 ALBH |     -   268     -  -670     -     -     -     -     -     - |
 ALGO |     -   -86   163     X   -43     -     -     -     -   150 |
 AREQ |     -  -122     -    32   -32     -     -     -     -   214 |
 AUCK |     -  -141     -   130     -     -     -     -     -   139 |
 BRMU |     -  -113     -     -   -18     -     -     -     -   202 |
 CAS1 |     -   185     -   -16   -89     -     -     -     -   -85 |
 DAV1 |     -    17     -     -   -19     -     -     -     -     - |
 EISL |     -   -30     -    75     -     -     -     -     -     - |
 FAIR |     -     -     X  -195     -     -     -     -     -   123 |
 FORT |     -   659     -   -64  -431     -     -     -     -    24 |
 GALA |     -   -34     -     -    39     -     -     -     -     - |
 GODE |     -   -27     -    68     -     -     -     -     -     - |
 GUAM |     -  -109     -   422  -131     -     -     -     -    79 |
 HOB2 |     -  -198   -96   290     -     -     -     -     -   153 |
 KARR |     -  -166     -     -   194     -     -     -     -     - |
 KERG |     -    73     -     -     -     -     -     -     -  -115 |
 KIRU |     -   102     -  -256     -     -     -     -     -     - |
 KOKB |     -     -    73   -92    35     -     -     -     -    -7 |
 KOSG |     -   -74     -  -149     -     -     -     -     -   210 |
 MAC1 |     -    32     -   509  -275     -     -     -     -     - |
 MALI |     -   104     -  -349     -     -     -     -     -    62 |
 MAS1 |     -   -24   157  -119   -22     -     -     -     -   100 |
 MCM4 |     -    17     -   271  -127     -     -     -     -   -25 |
 MDO1 |     -   -48   134     -     -     -     -     -     -    40 |
 NRC2 |     -   -88   177     -     -     -     -     -     -     - |
 NYA1 |     -    36     -     -   -43     -     -     -     -     - |
 OHIG |     -   -92     -   229  -115     -     -     -     -   149 |
 ONSA |     -   -43     -   -87     -     -     -     -     -   123 |
 PIE1 |     -   -60     -    -9     -     -     -     -     -   100 |
 POTS |     -   -64     -  -146     -     -     -     -     -   194 |
 STJO |     -   -25   288     -   -27     -     -     -     -     - |
 SUTH |     -    43     -  -108     -     -     -     -     -     - |
 THTI |     -     -     -     -   -62     -     -     -     -    84 |
 TRO1 |     -  -156     -     -   182     -     -     -     -     - |
 TSKB |     -     -   133  -165     -     -     -     -     -    70 |
 URUM |     -     -     -     -   -89     -     -     -     -   120 |
 USNO |     -   -31     -  -147     -     -     -     -     -   141 |
 USUD |     -   -63     -   157     -     -     -     -     -     - |
 WHIT |     -   -48     -     -    56     -     -     -     -     - |
 WTZR |     -   -94     -   -89     -     -     -     -     -   203 |
 WUHN |     -  -134     -     -    89     -     -     -     -    93 |
 YAR2 |     -  -208     -   521     -     -     -     -     -     - |
 YELL |     -   -59   148  -271     -     -     -     -     -   220 |
 YSSK |     -   -38     -     -    44     -     -     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3206    36    66    71    43  5796     -  3168     -    67 |  288   3.36
    2 |  3286    71   212   106    46  3186     -  3258     -    92 |  288   3.15
    3 |  7332   187   125   376    87  2294     -  7214     -    94 |  281   1.37
    4 |   920   149   154   117   132  1901     -  1236     -    81 |  288   1.11
    5 |  4382    65   110   174    75  5368     -  5705     -    53 |  288   3.74
    6 | 12118   136    85   110    83  5566     - 11294     -    62 |  282   8.34
    7 |  2303   117   137   359    75  1808     -  2239     -   129 |  282   0.77
    8 |  5664    52    33    54    82  4486     -  5627     -    99 |  288   5.74
    9 |  1731    65    64   234    37  2820     -  1570     -   130 |  288   1.39
   10 |  3879    73   180   160   174  2985     -  4265     -   128 |  288   2.05
   11 |  1444    71   160    70    76  1137     -  1451     -     X |  288   0.40
   13 |  1172    71   127   158    52  2487     -  1029     -   102 |  288   0.55
   14 |   572    58   102   242    53   912     -   580     -    79 |  288   0.26
   15 |  2857    82   109   158    37  4057     -  2676     -    62 |  288   2.56
   17 |  2607    40    87   236    57     -     -  2434     -    98 |  288   2.94
   18 |  1239    59    77   222    50  2408     -  1165     -   101 |  288   0.49
   19 |  3794   105   229   121    59  6736     -  4463     -   133 |  288   4.44
   20 |   628    79   147    75    57  1237     -   593     -    50 |  288   0.40
   21 |  6638     -   324   284     -     -     -  6575     -   230 |  220   2.24
   22 |  1730    63   144    97    87   530     -  1693     -    62 |  288   0.62
   23 |  5649    55    66   370   106     -     -  5133     -   103 |  288   5.41
   24 |  2532    93     X     X   109  1993     -  2266     -     - |  284   2.31
   25 |  3926    95   122   225    40  2094     -  3452     -    65 |  288   1.94
   26 |   696    64   151   103    80  1446     -   811     -    49 |  288   0.76
   27 |  5639    56    76    77    78  2927     -  4950     -    45 |  288   2.57
   28 |   735    57    92   155    58  3219     -   653     -   105 |  288   0.63
   29 |   890    95   161   271    34   958     -  1020     -    48 |  254    >>>
   30 |  2391   110    92   148    53  1899     -  2270     -    48 |  288   1.74
   31 |  6704    82   113     X   136     -     -  5405     -   134 |  278   4.01
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    41     -   103     -     -     -     -     -     - |  171   0.24
 ALGO |     -    67    67     X    40     -     -     -     -    50 |  288   0.16
 AREQ |     -    95     -   109    76     -     -     -     -    59 |  288  37.54
 AUCK |     -    66     -    68     -     -     -     -     -    84 |  288  21.89
 BRMU |     -    89     -     -    81     -     -     -     -    83 |  287  31.69
 CAS1 |     -    37     -    65   179     -     -     -     -   249 |  288  16.44
 DAV1 |     -    39     -     -    45     -     -     -     -     - |  277  24.16
 EISL |     -    38     -    95     -     -     -     -     -     - |  279  20.90
 FAIR |     -     -     X   136     -     -     -     -     -    86 |  284   0.29
 FORT |     -   142     -   163   131     -     -     -     -   106 |  288   0.13
 GALA |     -    65     -     -    77     -     -     -     -     - |  287  23.23
 GODE |     -    90     -   226     -     -     -     -     -     - |  184 355.75
 GUAM |     -    55     -    93    85     -     -     -     -   117 |  288  12.21
 HOB2 |     -    66    72   110     -     -     -     -     -    61 |  288   0.16
 KARR |     -    50     -     -    58     -     -     -     -     - |  287  90.97
 KERG |     -    87     -     -     -     -     -     -     -   137 |  287   1.38
 KIRU |     -    18     -    44     -     -     -     -     -     - |  280   2.03
 KOKB |     -     -   275   343   187     -     -     -     -   359 |  287   0.36
 KOSG |     -    61     -    80     -     -     -     -     -    80 |  288  12.87
 MAC1 |     -    51     -    69    39     -     -     -     -     - |  288  21.23
 MALI |     -    36     -    70     -     -     -     -     -    35 |  288  20.33
 MAS1 |     -    41    64    63    36     -     -     -     -    50 |  288   1.67
 MCM4 |     -   119     -   141   216     -     -     -     -   147 |  280    >>>
 MDO1 |     -    53    75     -     -     -     -     -     -    71 |  287  11.25
 NRC2 |     -    46    93     -     -     -     -     -     -     - |   95   0.20
 NYA1 |     -    60     -     -    70     -     -     -     -     - |  287   0.13
 OHIG |     -   110     -    90    92     -     -     -     -    83 |  288  14.22
 ONSA |     -    53     -    68     -     -     -     -     -    57 |  288   0.27
 PIE1 |     -    56     -    84     -     -     -     -     -    46 |  288   0.15
 POTS |     -    81     -    76     -     -     -     -     -   128 |  279  12.90
 STJO |     -    62    82     -    61     -     -     -     -     - |  287   2.11
 SUTH |     -    46     -   116     -     -     -     -     -     - |  287  10.85
 THTI |     -     -     -     -    97     -     -     -     -   131 |  287   2.36
 TRO1 |     -    56     -     -    66     -     -     -     -     - |  286  12.84
 TSKB |     -     -    46    54     -     -     -     -     -    30 |  288   1.18
 URUM |     -     -     -     -   168     -     -     -     -   227 |  247    >>>
 USNO |     -    57     -    92     -     -     -     -     -    43 |  288   0.13
 USUD |     -    36     -    90     -     -     -     -     -     - |  283   0.23
 WHIT |     -    47     -     -    55     -     -     -     -     - |  287  22.94
 WTZR |     -    62     -    72     -     -     -     -     -    70 |  288   0.18
 WUHN |     -    67     -     -    86     -     -     -     -   115 |  287  25.71
 YAR2 |     -    27     -    67     -     -     -     -     -     - |  148 255.64
 YELL |     -    86    97   185     -     -     -     -     -   106 |  279    >>>
 YSSK |     -    50     -     -    58     -     -     -     -     - |  287  14.99
 -----+-------------------------------------------------------------+--------------
 TOT  |  4193    76   133   161    91  3241     -  4043     -   112 |


 BEST CLOCK FIT: NYA1   287   0.13 (ns) 

