
 GPS week: 1116   Day: 4   MJD: 52060                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2751      0    -0.17     0.19     5.05     0.00
 cod |   288     1  20196     35    -1.30     1.09     0.08    20.02
 emr |    96     0   3771    171   683.35     9.27     0.11    13.69
 esa |   288     0  16678   1283   678.03     9.24     0.12    12.33
 gfz |   288     0  14645    492     0.29    -1.25     0.08    19.43
 igu |    96     0   2383      0    -0.06    -0.03     3.50     0.00
 jpl |   281     0   8789    284     4.65    -4.53     0.09    18.62
 ngs |    96     0   2751      0    -0.16     0.19     4.90     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16065    292   322.66    33.22     0.10    15.90

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 | -7374   -22   -46   279   -96  3249   -58 -7236     -   -25 |
    2 |  1846   134  -188   -94    47  -921   190  1821     -  -203 |
    3 | -1410   -60  -107   285   -71     2  -112 -1380     -    50 |
    4 | -1395   115   167   171  -176  2044   -10 -1388     -  -105 |
    5 |   513   120  -197  -103   106   215    47   915     -  -171 |
    6 | -4057   151  -270  -215   189  1834  -232 -2601     -   -60 |
    7 | -1673   128    67    64   -27 -5052   166 -1603     -  -286 |
    8 |  -955    79    28   -39    75-13239   161 -1259     -  -258 |
    9 | -8076    97  -211    84    92 -5212   107 -7412     -  -298 |
   10 |  -957   211    16   -61    -1   222   -59 -1313     -  -194 |
   11 |  2706  -225   142   367   -90   456  -103  2923     -   126 |
   13 |  4460    21   161   141  -265  1849   -55  4389     -   174 |
   14 |  2621   -15    94    49   -23  1432    89  2884     -   -69 |
   15 | -3571    49  -160     -    90 -1997    14 -3865     -  -133 |
   17 |  -922    94     X     X     -     -  -111  -812     -   -51 |
   18 |  3376   -77    23   -77   112  -917    -3  3480     -    20 |
   19 | 13840  -118  -271   281   -35     -   425 12651     -  -207 |
   20 |  4743   -75   -17   -61     6  1795   191  4707     -    34 |
   21 |  6403    94   -63  -150   128     -   -88  5633     -  -107 |
   22 | -2387    22  -150    73    18 -2889    83 -3405     -  -116 |
   23 |  -470   183  -112  -290    92     -   322   -92     -  -279 |
   24 | -3106    76    25   114  -163 -3633    14 -2848     -     - |
   25 |  3138   -46   -73   171   130  7435   -74  2514     -  -172 |
   26 | -2464   144    82    25   -40  1866   118 -2255     -  -244 |
   27 | -1996   -26  -142   -73   160 10965   253 -1740     -  -205 |
   28 |  6101   -47   312   -26  -126   904   113  4910     -    80 |
   29 |  -807   -82   -25   162    80   115    32  -728     -  -132 |
   30 | -8148   118  -171    -2   167 -6661  -267 -7145     -  -153 |
   31 |  -378   -99   -85   112    60  6339    66   -50     -   -44 |
 -----+-------------------------------------------------------------+
 ALBH |     -   -84     -     X     -     -    90     -     -     - |
 ALGO |     -   -10   154     X   -75     -     -     -     -    59 |
 AREQ |     -   -98     -    73     -     -   -96     -     -   174 |
 AUCK |     -  -116     -    33     X     -    52     -     -    62 |
 BAHR |     -    68    48  -118   -38     -     -     -     -    40 |
 BRMU |     -   -50     -     -   -54     -     -     -     -   135 |
 CAS1 |     -    42     -    27  -122     -     -     -     -    76 |
 DRAO |     -   -62    78     -     -     -     -     -     -    55 |
 EISL |     -     4     -    -7     -     -     -     -     -     - |
 FAIR |     -     -   118  -217     -     -   -78     -     -   223 |
 FORT |     -     -     -  -494     -     -     -     -     -   383 |
 GALA |     -    63     -     -    28     -   -98     -     -     - |
 GODE |     -    72     -  -117     -     -     -     -     -     - |
 GOLD |     -   128     -     X     -     -  -137     -     -     - |
 GRAZ |     -    -4     -     -     -     -     -     -     -     5 |
 GUAM |     -  -131     -  -203   187     -    -5     -     -    97 |
 HOB2 |     -    46     -  -324     -     -     -     -     -   194 |
 HRAO |     -    51     -     -    81     -  -142     -     -     - |
 JPLM |     -     -     -     -   -94     -    98     -     -     - |
 KARR |     -  -189     -     -   195     -     -     -     -     - |
 KERG |     -    51     -     -   -74     -     -     -     -    26 |
 KIRU |     -   116     -  -189     -     -     -     -     -     - |
 KOKB |     -     -     X     X   115     -  -120     -     -     X |
 KOSG |     -   -89     -   -43     -     -     -     -     -   145 |
 KOUR |     -     2     -    -4     -     -     -     -     -     - |
 LPGS |     -     -     -    30     X     -     -     -     -   -23 |
 MAC1 |     -   -11     -   205  -119     -     -     -     -     - |
 MALI |     -    72     -  -446     -     -     -     -     -   260 |
 MAS1 |     -     -    94   -20   -64     -     -     -     -    67 |
 MCM4 |     -   117     -   370  -185     -     -     -     -  -208 |
 MDO1 |     -   -83   121     -     -     -    60     -     -     - |
 MKEA |     -  -103     -   161     -     -     4     -     -     - |
 NRC2 |     -  -103   151     -     -     -     -     -     -     - |
 OHIG |     -  -144     -   432  -226     -     -     -     -   121 |
 ONSA |     -   -45    93    -9   -85     -     -     -     -   138 |
 PIE1 |     -   -67     -   -25     -     -     X     -     -   104 |
 POTS |     -   -79     -   -34    -4     -     -     -     -   131 |
 STJO |     -   -38   130     -     9     -     -     -     -     - |
 SUTH |     -   199     -   -67     -     -  -174     -     -     - |
 THTI |     -    57     -     -  -113     -     -     -     -    67 |
 TRO1 |     -   -81     -     -    84     -     -     -     -     - |
 URUM |     -  -190     -     -     -     -     -     -     -   240 |
 USNO |     -   -24     -    12     -     -     -     -     -    21 |
 USUD |     -  -135     -   -88     -     -    18     -     -   315 |
 WHIT |     -   -52     -     -    54     -     -     -     -     - |
 WILL |     -   -48     -     -     -     -    52     -     -     - |
 WTZR |     -   -40     -  -100     -     -     -     -     -   129 |
 YAR2 |     -     -     -   -87     -     -     -     -     -    67 |
 YELL |     -    -8   137  -268     -     -     -     -     -   178 |
 YSSK |     -   -68     -     -   100     -   -29     -     -     - |
 ZIMM |     -   155     -     -     -     -  -166     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  3481    43   193    52    27  3813    72  3395     -    41 |  288   3.38
    2 |  2886    72    96    44    51  2875    53  2985     -    42 |  288   2.35
    3 |  3276   174   102   187   176  2347    64  3082     -   103 |  277   2.71
    4 |   918    99    49   151    45  1953    73   923     -    58 |  288   0.68
    5 |  4070    60   109    33    44  3378    88  4098     -    55 |  288   3.39
    6 |  9455   188   166   159   168  6259    60  9057     -   140 |  278   7.60
    7 |  1761    85    57    99    53  4012   112  1981     -    40 |  278   1.97
    8 |  6091    77    51    40    68  8290    59  5480     -    28 |  288   4.28
    9 |  4612    53    73   132    72  3189    46  4614     -   226 |  288   2.92
   10 |  3278   160    68   222   126  3258    64  3502     -    77 |  280   2.19
   11 |   684    97   120    83    61   545   113   702     -    77 |  288   0.42
   13 |   755   101    60    92    87  1426   133   817     -    67 |  288   0.42
   14 |   532    86    53   112    25   872    51   635     -    70 |  288   0.17
   15 |  9645    69    93     -    47  6530    57  9722     -    39 |  288   4.00
   17 |  1552   161     X     X     -     -   206  1540     -   203 |  265   2.61
   18 |  1093    81    71   139   118   393    49  1198     -    63 |  288   0.52
   19 |  8215    65    91   105   146     -   107  9017     -   142 |  288   5.31
   20 |   836   103    85   102   101  1021   132   840     -    62 |  288   0.23
   21 |  6715    74   148   227    66     -   131  6195     -    86 |  288   4.28
   22 |  8424    74    71   104   104  3915    66  7651     -    82 |  288   1.73
   23 |  5244    80   207   277    77     -   124  4938     -   123 |  280   4.47
   24 |  7258    96   204   116    59  2277    59  6935     -     - |  288   2.14
   25 |  2702    55    34    62   142  2909    40  3296     -   151 |  288   2.53
   26 |   945    92    99    72    69  1349    82   913     -    41 |  288   0.52
   27 |  8470    50    72    66   138  3716    57  7337     -    66 |  288   3.14
   28 |  5757    53   140   105    40  1816   111  5505     -    64 |  288   1.58
   29 |   908    98    94   142    46  1060    94  1023     -    36 |  288   0.91
   30 |  3984    71    77    60    66  1496    58  3644     -    47 |  288   1.96
   31 |  6717   167   301   232   118  4895    61  6665     -    70 |  276   2.55
 -----+-------------------------------------------------------------+--------------
 ALBH |     -    29     -     X     -     -    31     -     -     - |  281   0.09
 ALGO |     -    27    31     X    14     -     -     -     -    32 |  288   0.03
 AREQ |     -    29     -    66     -     -    41     -     -    30 |  288  31.98
 AUCK |     -    56     -   145     X     -    57     -     -    52 |  288  21.52
 BAHR |     -    59    25    69    12     -     -     -     -    35 |  288   0.48
 BRMU |     -   182     -     -   117     -     -     -     -   367 |  288  33.32
 CAS1 |     -    45     -   116    51     -     -     -     -    36 |  288  14.66
 DRAO |     -    37    33     -     -     -     -     -     -    46 |  288   0.07
 EISL |     -    84     -   136     -     -     -     -     -     - |  281  20.87
 FAIR |     -     -   147   252     -     -   156     -     -   222 |  287   0.17
 FORT |     -     -     -   122     -     -     -     -     -    95 |  145   0.12
 GALA |     -    39     -     -    65     -    52     -     -     - |  287  23.75
 GODE |     -   145     -   235     -     -     -     -     -     - |  136   0.16
 GOLD |     -    29     -     X     -     -    31     -     -     - |  209  20.43
 GRAZ |     -   136     -     -     -     -     -     -     -   171 |  215    >>>
 GUAM |     -    67     -    74    64     -    65     -     -    43 |  288  10.69
 HOB2 |     -    28     -    36     -     -     -     -     -    34 |  288   0.10
 HRAO |     -    63     -     -    66     -    85     -     -     - |  282   1.44
 JPLM |     -     -     -     -    59     -    61     -     -     - |  273  37.27
 KARR |     -    36     -     -    37     -     -     -     -     - |  286  85.04
 KERG |     -    57     -     -    38     -     -     -     -    52 |  287   1.91
 KIRU |     -    35     -    57     -     -     -     -     -     - |  287   2.38
 KOKB |     -     -     X     X   253     -   264     -     -     X |  231  11.33
 KOSG |     -    40     -    56     -     -     -     -     -    32 |  288  66.12
 KOUR |     -   153     -   248     -     -     -     -     -     - |  231  27.12
 LPGS |     -     -     -   212     X     -     -     -     -   165 |  204  97.31
 MAC1 |     -    29     -    42    26     -     -     -     -     - |  288  17.41
 MALI |     -    24     -    50     -     -     -     -     -    38 |  288  26.39
 MAS1 |     -     -    24    36    37     -     -     -     -    37 |  288   2.84
 MCM4 |     -    93     -   129    54     -     -     -     -   152 |  288   6.37
 MDO1 |     -    36    31     -     -     -    39     -     -     - |  279   7.75
 MKEA |     -    26     -    48     -     -    45     -     -     - |  287  28.47
 NRC2 |     -    21    30     -     -     -     -     -     -     - |   95   0.08
 OHIG |     -    74     -    86    49     -     -     -     -    25 |  288  11.87
 ONSA |     -    28    53    50    29     -     -     -     -    31 |  286   0.35
 PIE1 |     -    20     -    27     -     -     X     -     -    28 |  288   0.06
 POTS |     -    38     -   108    67     -     -     -     -    48 |  277  11.38
 STJO |     -    13    46     -    15     -     -     -     -     - |  288   2.20
 SUTH |     -    56     -    67     -     -    57     -     -     - |  287  13.42
 THTI |     -    78     -     -    98     -     -     -     -    37 |  287   1.93
 TRO1 |     -    24     -     -    24     -     -     -     -     - |  287  11.47
 URUM |     -    25     -     -     -     -     -     -     -    31 |  287  48.74
 USNO |     -    37     -    53     -     -     -     -     -    35 |  288   0.03
 USUD |     -    24     -    53     -     -    38     -     -    68 |  288   0.20
 WHIT |     -    35     -     -    36     -     -     -     -     - |  287  15.84
 WILL |     -    22     -     -     -     -    24     -     -     - |  273   1.98
 WTZR |     -    32     -    48     -     -     -     -     -    30 |  288   0.16
 YAR2 |     -     -     -    54     -     -     -     -     -    42 |  227 307.89
 YELL |     -    42    67    52     -     -     -     -     -    45 |  288   0.04
 YSSK |     -    30     -     -    41     -    47     -     -     - |  287  12.58
 ZIMM |     -    45     -     -     -     -    49     -     -     - |  224    >>>
 -----+-------------------------------------------------------------+--------------
 TOT  |  5054    79   106   120    84  3498    88  4901     -    97 |


 BEST CLOCK FIT: USNO   288   0.03 (ns) 

