
 GPS week: 1116   Day: 0   MJD: 52056                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2764      0     0.32    -0.13     4.88     0.00
 cod |   288     1  19086     39    -2.55    -0.55     0.10    17.27
 emr |    96     0   3904     22   661.97     6.51     0.09    19.72
 esa |   288     0  16492    560   656.45     6.41     0.14    11.58
 gfz |   288     0  14390    167     0.74    -0.55     0.08    23.99
 igu |    96     0   2384      0     0.54    -0.05     3.64     0.00
 jpl |   280     6   7943    309     0.59    -0.36     0.13    12.06
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  16328    389   193.26    33.59     0.11    15.39

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   sio   usn |
 -----+-------------------------------------------------------+
    1 | 11665    29   -28   153   -39 17242  -136     -   -23 |
    2 | -3338    14  -124    77    22  4259   218     -  -137 |
    3 | -3080   -27   -66   631    10  7227  -143     -  -378 |
    4 |  4673    32    63    -7    76    28  -198     -  -106 |
    5 |   201   116   -80    39   -58 -6762   192     -  -110 |
    6 | -3942   104  -153    93   155-11345  -434     -  -212 |
    7 |  2261   137    11   -69   -21  5428   248     -  -169 |
    8 |   851   157   152  -155   -81-12520   246     -   -91 |
    9 | -1215    10  -153   283    61 -3062   167     -  -311 |
   10 |    99   217  -131    86   -28  3663   217     -  -290 |
   11 |  2098  -102   113    86    35 -1673   -87     -   -23 |
   13 |  4714   -47   365    69  -120 -1510  -340     -   160 |
   14 |  2907   151    94  -210   -82  -286     3     -    76 |
   15 | -2110    66  -231     -   121 -8497    11     -  -169 |
   17 | -4760   260  -195   192     4     -  -147     -  -311 |
   18 |  2758   -30    88  -137    54 -7373    16     -    12 |
   19 | -3725     0  -117   177   -40     -   142     -   -68 |
   20 |  4640    56   -30    52   -94  -384   137     -     4 |
   21 | -8755   268  -345   -86   127     -   -79     -  -377 |
   22 |  1088   200  -101   -46   -36  2719   202     -  -162 |
   23 | -7232   193  -152  -152     -     -   481     -  -237 |
   24 | -3615    29  -171    92    15  4826  -148     -     - |
   25 |  4912    70   -94   133    35 12448  -228     -  -113 |
   26 |  1205   -85   -55   278   140 -1854   -59     -  -289 |
   27 |    82     8    82  -204   128  1410   194     -  -161 |
   28 |  2282   -60   293   -93   -52 -2090    26     -    83 |
   29 | -2726    64   -62   -16    55 -1546  -171     -   -51 |
   30 |   629   157  -156    29   115 -3462  -472     -  -124 |
   31 | -3231   -12   -28   542  -229  3213    19     -     X |
 -----+-------------------------------------------------------+
 ALBH |     -   -59     -  -400     -     -   389     -     - |
 ALGO |     -   -69   150     X  -155     -     -     -   255 |
 AREQ |     -   -69     -   -52     -     -  -143     -   222 |
 AUCK |     -  -136     -   177     -     -   -97     -    91 |
 BAHR |     -    53    74    50   -58     -     -     -   -38 |
 BRMU |     -     -     -  -130   -95     -     -     -   246 |
 CAS1 |     -    88     -   -41   -62     -     -     -    28 |
 CRO1 |     -  -114     -     -     -     -   163     -     - |
 DAEJ |     -  -928     -     -     -     -     -     -  1042 |
 DAV1 |     -    15     -     -   -66     -     -     -    87 |
 DRAO |     -  -123    26     -     -     -     -     -   125 |
 FAIR |     -     -    24  -265     -     -     X     -   181 |
 FORT |     -     -     -  -746     -     -     -     -   561 |
 GODE |     -    75     -  -112     -     -     -     -     - |
 GOLD |     -    30     -     X     -     -   -43     -     - |
 GUAM |     -   -30     -    86    31     -   -63     -   -32 |
 HOB2 |     -     8   128  -157     -     -     -     -    54 |
 HRAO |     -   -79     -     -     -     -   114     -     - |
 KARR |     -  -127     -     -    91     -     -     -     - |
 KERG |     -   112     -     -     -     -     -     -  -125 |
 KOKB |     -     -   -13    44   114     -   -36     -  -180 |
 KOSG |     -    47     -   -70     -     -     -     -     - |
 KOUR |     -    44     -   -66     -     -     -     -     - |
 LPGS |     -     -     -  -357     X     -     -     -   269 |
 MAC1 |     -   208     -   100  -198     -     -     -     - |
 MAS1 |     -   -44   118  -124    25     -     -     -    53 |
 MCM4 |     -     -     -    27   -17     -     -     -     5 |
 MDO1 |     -     -    14     -     -     -   -53     -    33 |
 MKEA |     -  -197     -   -60   194     -   -48     -     - |
 NRC2 |     -  -157   137     -     -     -     -     -     - |
 NYA1 |     -     9     -     -    -7     -     -     -     - |
 NYAL |     -     -     -   -34     -     -     -     -    26 |
 OHIG |     -     -     -   193  -202     -     -     -   163 |
 ONSA |     -   -28   107    55   -51     -     -     -    23 |
 PIE1 |     -     -     -  -205     -     -     -     -   154 |
 POTS |     -   -44     -   -28     -     -     -     -    71 |
 REYK |     -  -160     -   238     -     -     -     -     - |
 STJO |     -    17   187     -   -64     -     -     -     - |
 SUTH |     -   -56     -    65   127     -  -246     -     - |
 THTI |     -  -110     -     -   -97     -     -     -   266 |
 TRO1 |     -  -163     -     -   117     -     -     -     - |
 USNO |     -    -2     -  -332     -     -     -     -   252 |
 USUD |     -     9     -    11     -     -   -23     -    -2 |
 WHIT |     -   -17     -     -    12     -     -     -     - |
 WILL |     -   -85     -     -     -     -   122     -     - |
 WSRT |     -   -23     -     -     -     -     -     -    26 |
 WTZR |     -   -76     -   -37     -     -     -     -   113 |
 WUHN |     -   -50     -     -   163     -     -     -  -198 |
 YELL |     -    32   152  -133     -     -     -     -     - |
 YSSK |     -    93     -     -   -74     -    15     -     - |
 -----+-------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------+--------------
    1 |  6393   111   145   118   105  6307   188     -    81 |  288   2.79
    2 |  3526    72   173   318   133  3858   122     -   216 |  288   2.74
    3 |  3867   164    73   116   210  3694   132     -   277 |  280   1.74
    4 |  2316   147    49    97    72   758    76     -    31 |  288   0.86
    5 |  7907    70    93    49    55  3371    92     -    76 |  288   3.28
    6 | 13556   177    38   143    77  6076   123     -   111 |  276   8.89
    7 |  1699   170    54    96    75  1424   148     -   123 |  280   0.70
    8 |  7983   152    48    37   115  8872   132     -    63 |  288   4.81
    9 |  2607   123   117   178    67  2264    92     -    99 |  288   2.06
   10 |  1778   142   161   131    53  2147   206     -    59 |  278   1.66
   11 |  1736   184    31   110    30  1203    86     -   136 |  288   0.35
   13 |  1534    72   111    66   100   885   356     -    75 |  288   0.41
   14 |  1980    84    75   143    57   606   191     -    70 |  288   0.18
   15 |  4259    88    69     -    63  5232   244     -    94 |  288   2.82
   17 |  2647   114    48   109    77     -   114     -    83 |  288   2.81
   18 |  1248    85    28    83    50  3533    60     -    71 |  288   0.52
   19 |  8804   119    59   116    89     -   195     -    94 |  288   3.66
   20 |  1326   194    65   285    46   527    95     -    77 |  288   0.28
   21 |  3975    93   267   116    91     -   191     -   186 |  285   2.51
   22 |  1344   164    59   142   120  2489   107     -    95 |  288   0.84
   23 |  4887   199   162   177     -     -   128     -   137 |  276   5.51
   24 |  3631    63   167    85    78  3226    82     -     - |  288   3.68
   25 |  2206    74    44   276    44  4944   107     -    78 |  288   1.30
   26 |  1318   117    52   112   115  1324   106     -    50 |  288   0.40
   27 |  5809   152    41    71    64  4113   142     -    68 |  288   3.38
   28 |  2709   137    87    82    70  1895   134     -   194 |  288   0.46
   29 |  2566    74   127   113    84   760   246     -    74 |  288   0.80
   30 |  2263    55    67    47    55  3297   188     -    76 |  288   1.31
   31 |  8948   198   106   421    56  3158   196     -     X |  277   3.75
 -----+-------------------------------------------------------+--------------
 ALBH |     -    40     -    35     -     -    57     -     - |  283   0.09
 ALGO |     -    24    30     X    17     -     -     -    29 |  288   0.03
 AREQ |     -    44     -    43     -     -    51     -    52 |  288  35.69
 AUCK |     -    44     -    60     -     -   103     -   111 |  288  16.81
 BAHR |     -    81    39    77    29     -     -     -    38 |  288   0.54
 BRMU |     -     -     -    77    34     -     -     -    27 |  288  22.99
 CAS1 |     -    39     -    37    19     -     -     -    51 |  288  11.84
 CRO1 |     -    24     -     -     -     -    34     -     - |  274  24.57
 DAEJ |     -    48     -     -     -     -     -     -    54 |  259    >>>
 DAV1 |     -    64     -     -    42     -     -     -    31 |  288  24.16
 DRAO |     -    43    14     -     -     -     -     -    51 |  288   0.05
 FAIR |     -     -    90   152     -     -     X     -   137 |  264   0.08
 FORT |     -     -     -   145     -     -     -     -   109 |  202   0.09
 GODE |     -   197     -   294     -     -     -     -     - |  104   0.19
 GOLD |     -    32     -     X     -     -    45     -     - |  183  22.63
 GUAM |     -    68     -    52    50     -    36     -   150 |  288  17.34
 HOB2 |     -    41    53    45     -     -     -     -    47 |  288   0.05
 HRAO |     -    33     -     -     -     -    47     -     - |  270   1.45
 KARR |     -    42     -     -    30     -     -     -     - |  285 107.25
 KERG |     -    97     -     -     -     -     -     -   109 |  287   1.68
 KOKB |     -     -   198   133   113     -   200     -   234 |  285   0.58
 KOSG |     -    46     -    69     -     -     -     -     - |  287  13.55
 KOUR |     -   175     -   261     -     -     -     -     - |  242  30.23
 LPGS |     -     -     -   312     X     -     -     -   235 |  195 134.15
 MAC1 |     -    20     -    37    11     -     -     -     - |  288  11.64
 MAS1 |     -    48    39    72    20     -     -     -    45 |  288   1.72
 MCM4 |     -     -     -   227   152     -     -     -   253 |  264    >>>
 MDO1 |     -     -    31     -     -     -    50     -    41 |  284  15.36
 MKEA |     -    54     -    49    46     -    83     -     - |  288  30.99
 NRC2 |     -    20    18     -     -     -     -     -     - |   95   0.08
 NYA1 |     -    54     -     -    39     -     -     -     - |  287   0.06
 NYAL |     -     -     -    34     -     -     -     -    26 |  288   0.10
 OHIG |     -     -     -   129    86     -     -     -    90 |  288  16.96
 ONSA |     -    67    25    72    24     -     -     -    43 |  288   0.17
 PIE1 |     -     -     -    82     -     -     -     -    61 |  287   0.05
 POTS |     -    63     -    70     -     -     -     -    65 |  277  11.95
 REYK |     -    44     -    65     -     -     -     -     - |  287  10.35
 STJO |     -    43    54     -    38     -     -     -     - |  288   2.70
 SUTH |     -    23     -    60    84     -   154     -     - |  288  35.19
 THTI |     -    65     -     -    46     -     -     -   132 |  287   1.57
 TRO1 |     -    36     -     -    26     -     -     -     - |  280  16.49
 USNO |     -    35     -    70     -     -     -     -    25 |  288   0.06
 USUD |     -    52     -    68     -     -    45     -    74 |  288   0.21
 WHIT |     -    45     -     -    33     -     -     -     - |  287  22.78
 WILL |     -    50     -     -     -     -    72     -     - |  270   2.76
 WSRT |     -    54     -     -     -     -     -     -    60 |  285   0.07
 WTZR |     -   114     -    58     -     -     -     -   107 |  288   0.11
 WUHN |     -    38     -     -    85     -     -     -   102 |  287  20.33
 YELL |     -    30    45    35     -     -     -     -     - |  288   0.11
 YSSK |     -    34     -     -    27     -    74     -     - |  287  12.28
 -----+-------------------------------------------------------+--------------
 TOT  |  4881    97    94   138    76  3641   131     -   108 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

