
 GPS week: 1107   Day: 2   MJD: 51995                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2631      3     0.24    -0.20     5.80     0.00
 cod |    96     0   2631      0     0.27    -0.13     5.84     0.00
 emr |    96     0   3339    107  2158.86    14.82     0.14    14.51
 esa |   288     0  14611    827    -2.37    15.37     0.17    12.43
 gfz |   288     0  11135    320     0.43    -1.74     0.08    26.95
 igu |    96     0   2304      0    -0.35    -0.72     4.45     0.00
 jpl |   283     0   7734      0     3.87    -1.98     0.09    23.43
 ngs |    96     0   2631     11     0.14    -0.06     5.39     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  14035    353  2158.93    15.00     0.09    22.68

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |    -6   -49    33   277   -32-83936    57   193     -  -144 |
    2 |   175   163   199   142   -75******   335   335     -  -228 |
    3 |    71    52  -303  -133    50******    33  1853     -    66 |
    4 | -1318 -1393   209     X   -24******  -126 -1070     -    64 |
    5 | -6607 -6660    71   -79     4******   132 -6431     -   -29 |
    6 |  6723  6713  -252   384     1******  -313  5628     -    28 |
    7 |   979   906    23    -6   137******   103   975     -  -224 |
    8 |  3446  3397   200   205  -100******   302  3658     -  -212 |
    9 |   903   829   -60   116    54******   -60   598     -   -89 |
   10 | -6099 -6163   -68   103   117******   130 -6173     -  -235 |
   11 |  -279  -307    84  -154  -105******    82    52     -   155 |
   13 |  3967  3951   308   -90   -87******    18  3996     -    78 |
   14 |  5495  5432  -112  -332   121******     7  5546     -    62 |
   15 |-12126-12163     -     -     -     -   245-11602     -  -253 |
   17 | -1013 -1082  -334    47     -     -   114   313     -     5 |
   18 |  9331  9343  -394  -178    50******    44  8899     -   106 |
   19 | 18033 18774    38   591  -158******  -366 13043     -     - |
   20 |  5511  5480   284  -207   -57******   276  5589     -   -40 |
   21 | -5772 -5844     X  -207    43     -    99 -5522     -     X |
   22 | -8894 -8943  -417    14   105******   110 -7867     -   -89 |
   23 |   130    45  -616    -4   299     -    70   484     -  -226 |
   24 |   468   416   -10   440  -190******   107   291     -   -78 |
   25 | -7660 -7713  -203   -76   136******   -84 -6925     -   -42 |
   26 | -3720 -3757     2   226    47******   -91 -3672     -  -127 |
   27 | -4721 -4744   286   334   -23******     5 -4156     -  -220 |
   29 | -1747 -1868  -225  -139   148******    10 -1507     -   -49 |
   30 | -1304 -1375   -19   110    63******  -248  -729     -    17 |
   31 |  -160  -200   -94   184  -124******   149  -745     -     4 |
 -----+-------------------------------------------------------------+
 ALBH |     -     -     -    32     -     -   -17     -     -     - |
 ALGO |     -     -   213     X   -64     -  -167     -     -   200 |
 AREQ |     -     -     -  -128     -     -     -     -     -    70 |
 AUCK |     -     -     -  -118     -     -    -4     -     -    83 |
 BRMU |     -     -     -     -   -67     -     -     -     -    79 |
 CAS1 |     -     -     -  -235   -18     -     -     -     -   156 |
 DRAO |     -     -    82     -     -     -     -     -     -   -52 |
 EISL |     -     -     -   360  -172     -     -     -     -   -19 |
 FAIR |     -     -   138   102     -     -   -96     -     -    20 |
 GUAM |     -     -     -   106   -38     -    40     -     -   -54 |
 HOB2 |     -     -     -  -161     -     -     -     -     -    88 |
 HRAO |     -     -     -     -    58     -   -67     -     -     - |
 KOKB |     -     -     -  -108     -     -     -     -     -    59 |
 KWJ1 |     -     -     -   -28   101     -   -44     -     -   -63 |
 LPGS |     -     -     -  -423     X     -   224     -     -     - |
 MAS1 |     -     -    59  -108   -70     -   -20     -     -   150 |
 MCM4 |     -     -     -   -85   410     -     -     -     -  -332 |
 MKEA |     -     -   171  -200     -     -     -     -     -     - |
 NLIB |     -     -   116     -     -     -     -     -     -   -74 |
 OHIG |     -     -     -  -206  -106     -     -     -     -   232 |
 ONSA |     -     -     -   184  -184     -     -     -     -   118 |
 PIE1 |     -     -     -   190     -     -     -     -     -  -104 |
 POTS |     -     -     -   146     -     -     -     -     -   -80 |
 SANT |     -     -     -  -201   173     -     -     -     -   -89 |
 STJO |     -     -   334     -  -180     -     -     -     -     - |
 SUTH |     -     -     -    -9  -208     -     -     -     -   249 |
 TSKB |     -     -     -  -316     -     -     -     -     -   173 |
 USUD |     -     -     -   101     -     -   -54     -     -     - |
 WSRT |     -     -     -     -     -     -  -133     -     -   137 |
 WTZR |     -     -     -    19     -     -  -131     -     -   122 |
 YAR2 |     -     -     -  -608     -     -   -95     -     -   430 |
 YELL |     -     -   296   -61     -     -   -29     -     -     - |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  4228  4268    71    73    49  4072    53  4216     -    66 |  288   3.63
    2 |  5530  5430   131   129    85  4142   118  5563     -    55 |  288   2.92
    3 |  9864  9820    60   135    43  2265   101  8949     -   157 |  288   1.41
    4 |  1461  1452   249     X    51  2761    73  1341     -    45 |  288   1.02
    5 |  5947  5999   261    56    45  4485    48  5645     -    50 |  288   1.69
    6 |  8942  8938    69   105   105  9799    57  7659     -   129 |  288   5.98
    7 |  1898  1942   162   132    81 11303    82  1750     -   108 |  288   0.77
    8 |  4033  4043   101   157   160  4706   182  4298     -    85 |  288   2.70
    9 |  2309  2302    68   152    40  2235    72  2451     -    48 |  288   2.04
   10 |  4649  4671   108   179    56  2284    73  3986     -   115 |  288   1.50
   11 |  2384  2500    40   123    51  1613   173  2416     -    52 |  288   1.23
   13 |  1526  1566   180    68    86  2579    98  1531     -    64 |  288   0.44
   14 |   695   667   273   178    70  2627   107   821     -    74 |  288   0.23
   15 |  3405  3456     -     -     -     -   130  3182     -   134 |  157   2.21
   17 | 11164 11208   193   331     -     -    75 10425     -   126 |  281   4.45
   18 |  2878  2785   235   193   105  1961    89  3252     -    55 |  288   0.37
   19 | 16230 16429   159    68    74  6720   162 14917     -     - |  285   3.37
   20 |  1212  1218    44   119    79   852    89  1250     -    45 |  288   0.29
   21 |  2470  2498     X   173    65     -    70  2523     -     X |  278   2.48
   22 |  5253  5234   108   133    31  1802    57  5670     -    58 |  288   2.10
   23 |  5170  5196   195   361   141     -   177  5134     -    87 |  288   4.52
   24 |  2926  2901   121   323    72  4088    55  2043     -    76 |  288   1.71
   25 |  1776  1789   241   128   123  1524   138  2236     -    48 |  288   1.52
   26 |  2525  2576   117   167   123  5016    71  2190     -    53 |  288   0.57
   27 |  8825  8791   110   119    54  4418    38  8194     -    49 |  288   4.40
   29 |  1514  1501   198   211    83  2335   132  1281     -   134 |  288   0.57
   30 |  3248  3205   130    92   138  2641    46  3303     -   158 |  288   2.28
   31 |  6975  6911    98    40    32  3457    74  6774     -    57 |  288   3.52
 -----+-------------------------------------------------------------+--------------
 ALBH |     -     -     -    38     -     -    20     -     -     - |  259   0.13
 ALGO |     -     -    77     X    32     -    32     -     -    47 |  288   0.03
 AREQ |     -     -     -    76     -     -     -     -     -    42 |  288  33.14
 AUCK |     -     -     -   240     -     -   155     -     -    67 |  288  33.97
 BRMU |     -     -     -     -    34     -     -     -     -    40 |  285  49.77
 CAS1 |     -     -     -   139    99     -     -     -     -   180 |  288  15.62
 DRAO |     -     -    42     -     -     -     -     -     -    27 |   96   0.03
 EISL |     -     -     -   212   152     -     -     -     -   109 |  201  70.73
 FAIR |     -     -   173   358     -     -   164     -     -   139 |  283   0.83
 GUAM |     -     -     -   103    49     -    31     -     -    58 |  288  32.06
 HOB2 |     -     -     -    60     -     -     -     -     -    33 |  288   0.07
 HRAO |     -     -     -     -    31     -    35     -     -     - |  265    >>>
 KOKB |     -     -     -   365     -     -     -     -     -   200 |  241   0.52
 KWJ1 |     -     -     -   350   154     -   122     -     -   173 |  251  81.76
 LPGS |     -     -     -   180     X     -    95     -     -     - |  274  42.57
 MAS1 |     -     -    43    88    45     -    51     -     -    34 |  270   2.24
 MCM4 |     -     -     -   263    64     -     -     -     -   168 |  215   8.58
 MKEA |     -     -    58    68     -     -     -     -     -     - |   96  49.43
 NLIB |     -     -    18     -     -     -     -     -     -    12 |   96  86.49
 OHIG |     -     -     -   207    40     -     -     -     -    86 |  288  16.59
 ONSA |     -     -     -    70    18     -     -     -     -    47 |  288   0.22
 PIE1 |     -     -     -    79     -     -     -     -     -    43 |  277   0.08
 POTS |     -     -     -    75     -     -     -     -     -    41 |  288  17.23
 SANT |     -     -     -    85    94     -     -     -     -   115 |  264   9.40
 STJO |     -     -    54     -    29     -     -     -     -     - |   96   2.27
 SUTH |     -     -     -   145    35     -     -     -     -    44 |  263  45.74
 TSKB |     -     -     -   138     -     -     -     -     -    76 |  229   1.70
 USUD |     -     -     -    55     -     -    29     -     -     - |  283   0.26
 WSRT |     -     -     -     -     -     -    24     -     -    25 |  283   0.04
 WTZR |     -     -     -    96     -     -    38     -     -    35 |  288   0.12
 YAR2 |     -     -     -   181     -     -    85     -     -    30 |  287  14.89
 YELL |     -     -   148    73     -     -    36     -     -     - |  288   0.05
 -----+-------------------------------------------------------------+--------------
 TOT  |  5802  5842   144   171    82  4448    92  5385     -    90 |


 BEST CLOCK FIT: ALGO   288   0.03 (ns) 

