
 GPS week: 1105   Day: 2   MJD: 51981                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2666      0    -0.13    -0.08     4.88     0.00
 cod |   288     0  19683    145    -1.23     1.54     0.09    21.66
 emr |    96     0   3760    203   634.73    17.96     0.13    12.91
 esa |   288     0  17500    658   629.66    18.33     0.11    17.42
 gfz |   288     0  13674      0     0.02     0.12     0.06    32.68
 igp |    96     0   2378      1    -0.22    -0.11     6.51     0.00
 igu |    96     0   2474      0    -0.08    -0.19     3.98     0.00
 jpl |   288     0   8658     27    13.53    -7.51     0.13     0.00
 ngs |    96     0   2666      0    -0.14    -0.07     5.00     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  15612    597   634.68    18.28     0.12    15.34

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------------+
    1 | -5969   112    27    12    85  6807 -4725   206 -6316     -  -360 |
    2 |  8397   277   205  -422    39 13715 12261   458  7458     -   -61 |
    3 |  4403     4  -205   182   -26  6432 13058   263  3633     -  -101 |
    4 |  -292    71  -276   179    77  -875  -941   390  -532     -  -384 |
    5 |  2512   109  -350   286   -86-11623  8377   305  1858     -  -196 |
    6 | -8192   -55  -323   -29   147  1785-15176   179 -7102     -  -112 |
    7 |  5811   275   -26  -186    63-13101  6081   453  5023     -  -304 |
    8 |  1063   240   241  -418    30-10072  3121   205   886     -   -26 |
    9 | -5167   116  -123  -165    86 -5669 -3007   270 -5278     -  -136 |
   10 | -7319    33  -170   -31   120 11084 -7826  -164 -6850     -  -220 |
   11 |  5797   104    32   -56     7  9025  1315   415  5835     -  -107 |
   13 |  6035   124    34   -27   -27 16594  3526   405  5662     -   -95 |
   14 |  8261   -72  -102    58    48  8632  2164   265  8071     -   -38 |
   17 |-17702    -3  -219   -89    41     -     -  -289-16082     -    82 |
   18 |  3812  -166    17    16   -19  6558 -3513    10  4011     -   252 |
   19 | -9979   134   256  -259    87******-17387   276 -6360     -  -154 |
   20 |  5245    29   250   -89    10  9390  -813   491  5099     -   -32 |
   21 | -3260    32     X    59   -44     -     -  -114 -2256     -   -19 |
   22 | -2220   -93   -45   226   -90  7486  4252    77 -2723     -    79 |
   23 | -4668   -32   -46     X    17     --10880   -35 -3803     -    19 |
   24 |  2575    -2  -173   508  -125 -5449  7601   -88  2757     -  -121 |
   25 | -1365   -69     X   111   -11  5118  1073   215 -1689     -     X |
   26 |  -421    32   -72  -166   100 -9481  2468   249  -748     -   -51 |
   27 |  1729   125   244  -360   152 18018 12076   231   211     -  -178 |
   28 | 10831   -23   120   219  -169 12610 -1291   311  9897     -   111 |
   29 | -3205   -96  -304   133    33 -9742  -685   117 -2978     -     X |
   30 |  2522  -125  -279   453   -31 21223 -2607   257  2087     -  -194 |
   31 |   745   197   -77  -304    79 31400 -7671   308   133     -   -80 |
 -----+-------------------------------------------------------------------+
 ALGO |     -    59   143     X  -101     -     -   104     -     -    91 |
 AREQ |     -   -45     -   -98    28     -     -   160     -     -   114 |
 AUCK |     -   -79     -     3     -     -     - -5324     -     -   107 |
 BAHR |     -  -406   121   198    31     -     -   312     -     -   240 |
 BRMU |     -  -148     -   342  -175     -     -     -     -     -   189 |
 CAS1 |     -   -31     -  -144   -26     -     -     -     -     -   271 |
 CRO1 |     -    47     -   -59     -     -     -     -     -     -     - |
 DRAO |     -    10    15     -     -     -     -     -     -     -   -18 |
 FAIR |     -     X   117   -59     -     -     -   354     -     -    32 |
 FORT |     -     -   -59  -153     -     -     -     -     -     -   182 |
 GALA |     -    64     -   -89     5     -     -   290     -     -     - |
 GUAM |     -  -207     -   354   -21     -     -    27     -     -   -76 |
 HOB2 |     -   -32     -  -162     -     -     -     -     -     -   229 |
 KARR |     -   -17     -     -    11     -     -     -     -     -     - |
 KERG |     -   -91     -     -     -     -     -     -     -     -   129 |
 KIRU |     -    70     -   -87     -     -     -   336     -     -     - |
 KOKB |     -     -     -   192     -     -     -     -     -     -  -218 |
 KOSG |     -  -101     -   126     -     -     -     -     -     -     - |
 KOUR |     -   -50     -    62     -     -     -   242     -     -     - |
 KWJ1 |     -     -     -  -121     -     -     -     -     -     -   137 |
 MAC1 |     -    33     -    88   -69     -     -     -     -     -     - |
 MAS1 |     -    18   184  -106   -57     -     -   236     -     -   165 |
 MATE |     -  -162     -     -     -     -     -     -     -     -   228 |
 MCM4 |     -     -     -   268  -109     -     -     -     -     -   -59 |
 MDO1 |     -     -   290  -215     -     -     -     -     -     -     - |
 MKEA |     -   -73   109    63     -     -     -   289     -     -     - |
 NLIB |     -   -41     -     -     -     -     -     -     -     -    59 |
 NRC2 |     -   -68     -    85     -     -     -     -     -     -     - |
 NYA1 |     -    14     -     -    -9     -     -     -     -     -     - |
 NYAL |     -     -    68   -51     -     -     -     -     -     -     - |
 OHIG |     -    39     -   -78    16     -     -     -     -     -     - |
 ONSA |     -   -41     -    52     -     -     -     -     -     -     - |
 PIE1 |     -     -     -  -142     -     -     -     -     -     -   161 |
 POTS |     -   -12     -    14     -     -     -     -     -     -     - |
 REYK |     -   -67     -    84     -     -     -   298     -     -     - |
 SANT |     -     -     -   824     -     -     -     -     -     -  -936 |
 STJO |     -   -57   227     -     8     -     -     -     -     -     - |
 SUTH |     -   127     -     -   -84     -     -   -49     -     -     - |
 THTI |     -   132     -     -     -     -     -     -     -     -  -187 |
 THU1 |     -   -19     -     -     -     -     -   129     -     -    27 |
 TRO1 |     -   -80     -     -    53     -     -     -     -     -     - |
 TROM |     -     -     -    -6     -     -     -     -     -     -     7 |
 TSKB |     -     -   109  -313     -     -     -     -     -     -   319 |
 USNO |     -    83     -  -164     -     -     -     -     -     -    69 |
 USUD |     -  -147     -   183     -     -     -   119     -     -     - |
 WHIT |     -   -14     -     -     9     -     -     -     -     -     - |
 WSRT |     -   -71     -     -     -     -     -     -     -     -   100 |
 WTZR |     -  -108     -   -27     -     -     -     -     -     -   183 |
 WUHN |     -    24     -     -   -16     -     -     -     -     -     - |
 YAR2 |     -    99     -  -284     -     -     -     0     -     -   183 |
 YELL |     -    28    51   -48     -     -     -  -122     -     -     - |
 YSSK |     -    37     -     -   -24     -     -     -     -     -     - |
 ZWEN |     -     -     -     -   -56     -     -     -     -     -   119 |
 -----+-------------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   emr   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------------+--------------
    1 |  4965    86    82    63    37  3810  2636    61  4998     -    42 |  288   3.85
    2 |  2934   104   190   170    83  5025  5712   112  3485     -   157 |  288   1.55
    3 |  1428    49    37   143    59  5536  5070   126  1452     -    60 |  288   1.09
    4 |  1069   100   157   115   103  1868   707   109   970     -    34 |  278   0.62
    5 |  3869    78   203   107    57  4463  6512   151  3339     -   106 |  288   2.42
    6 |  9555    49   123    71    78  6850  7337   258  9781     -   100 |  288   6.54
    7 |  2222    95   131    87    42  6876  1970   111  2337     -    68 |  288   0.60
    8 |  2833   114    69   166    37  6617  1981    71  2910     -   123 |  277   2.77
    9 |  2194   104   108   220    36  2233  2471   226  2057     -   157 |  278   1.72
   10 |  2915   117    93    71    58  1249  3446    70  3255     -   177 |  288   1.25
   11 |  1596    82    81    91    36  2519  1379    64  1892     -   103 |  288   0.40
   13 |   992    52    66    97    41  3055   959    45  1049     -    30 |  288   0.52
   14 |  1156   115    94    48    40  2420  1089    80  1173     -   147 |  288   0.17
   17 |  6660   226   197   186    86     -     -   180  6497     -   279 |  284   2.13
   18 |  2879    59   287    65    73  1869  1872   125  2968     -   110 |  288   0.38
   19 |  7056   120    60    89    99 23950 11129   235  8237     -    94 |  288   3.96
   20 |   611    37    43   195    85  1909   914    44   617     -    41 |  288   0.28
   21 |  7840   174     X    46    82     -     -   113  8378     -   138 |  288   3.63
   22 |  2960    59    33    43    52  2065  1985   209  2966     -    71 |  288   1.82
   23 |  8351   169   197     X    74     -  3342   170  8809     -   136 |  284   6.68
   24 |  4786   150   106   233    45  3269  4583   135  4238     -    39 |  278   1.74
   25 |  5432    75     X   183    75  2224  3513   194  5476     -     X |  277   1.75
   26 |  1286   107   205   174   117  3238   859   132  1317     -   174 |  288   0.97
   27 | 12951    82    67    67    52  7389  6103    81 12789     -    88 |  277   7.28
   28 |  1546    32   103    82   115  4918   809   174  1844     -   157 |  288   0.48
   29 |  2450    44   146    85    47  3507  1235    58  2601     -     X |  288   0.68
   30 |  1763    58   258    96    87  4555  1056   178  1577     -    59 |  288   1.53
   31 |  5183   172    64    46    33  9354  2614    64  5148     -   210 |  288   2.56
 -----+-------------------------------------------------------------------+--------------
 ALGO |     -    43    72     X    22     -     -    40     -     -    44 |  288   0.02
 AREQ |     -    35     -    41    24     -     -    51     -     -    55 |  288  20.12
 AUCK |     -    90     -    89     -     -     -    77     -     -    58 |  288  22.62
 BAHR |     -   210   111    83    51     -     -    65     -     -   100 |  288   0.44
 BRMU |     -    35     -    55    20     -     -     -     -     -    56 |  288  16.78
 CAS1 |     -    69     -   105    83     -     -     -     -     -   166 |  288  13.12
 CRO1 |     -    27     -    33     -     -     -     -     -     -     - |  284    >>>
 DRAO |     -    37    75     -     -     -     -     -     -     -    44 |  288   0.05
 FAIR |     -     X   125   164     -     -     -   270     -     -   153 |  235   0.31
 FORT |     -     -   267   231     -     -     -     -     -     -   198 |  195   0.20
 GALA |     -    24     -    35    11     -     -    87     -     -     - |  288  50.60
 GUAM |     -   130     -    75    28     -     -   145     -     -   154 |  288  27.61
 HOB2 |     -    48     -    38     -     -     -     -     -     -    62 |  288   0.07
 KARR |     -    39     -     -    26     -     -     -     -     -     - |  286 160.15
 KERG |     -    37     -     -     -     -     -     -     -     -    52 |  287    >>>
 KIRU |     -    26     -    33     -     -     -    52     -     -     - |  276   1.61
 KOKB |     -     -     -   220     -     -     -     -     -     -   250 |  179   0.13
 KOSG |     -    27     -    34     -     -     -     -     -     -     - |  288  31.53
 KOUR |     -    39     -    49     -     -     -    50     -     -     - |  288   2.73
 KWJ1 |     -     -     -   152     -     -     -     -     -     -   173 |  181 109.29
 MAC1 |     -    53     -    60    39     -     -     -     -     -     - |  287  14.70
 MAS1 |     -    75    68    51    28     -     -    99     -     -    30 |  288   1.50
 MATE |     -    36     -     -     -     -     -     -     -     -    51 |  287   0.21
 MCM4 |     -     -     -   349   172     -     -     -     -     -    95 |  267    >>>
 MDO1 |     -     -   124    92     -     -     -     -     -     -     - |   96  24.98
 MKEA |     -    42    43    53     -     -     -   115     -     -     - |  280  40.18
 NLIB |     -   268     -     -     -     -     -     -     -     -   378 |  233   0.23
 NRC2 |     -    43     -    53     -     -     -     -     -     -     - |  288   0.06
 NYA1 |     -    21     -     -    14     -     -     -     -     -     - |  288   0.08
 NYAL |     -     -   149   111     -     -     -     -     -     -     - |   92   0.11
 OHIG |     -    75     -   106    26     -     -     -     -     -     - |  288  15.23
 ONSA |     -    16     -    20     -     -     -     -     -     -     - |  288   0.06
 PIE1 |     -     -     -    42     -     -     -     -     -     -    48 |  285   0.08
 POTS |     -    64     -    80     -     -     -     -     -     -     - |  278  16.05
 REYK |     -    47     -    58     -     -     -    63     -     -     - |  286   6.74
 SANT |     -     -     -    19     -     -     -     -     -     -    21 |   98   4.40
 STJO |     -    37   107     -    19     -     -     -     -     -     - |  288   2.50
 SUTH |     -   106     -     -    70     -     -    88     -     -     - |  287  34.72
 THTI |     -    30     -     -     -     -     -     -     -     -    43 |  286   2.46
 THU1 |     -    80     -     -     -     -     -   101     -     -   113 |  246  13.71
 TRO1 |     -    44     -     -    29     -     -     -     -     -     - |  287  11.95
 TROM |     -     -     -    80     -     -     -     -     -     -    90 |  283  15.89
 TSKB |     -     -    87    39     -     -     -     -     -     -    56 |  281   1.01
 USNO |     -    59     -    42     -     -     -     -     -     -    65 |  288   0.05
 USUD |     -    47     -    58     -     -     -   186     -     -     - |  288   0.24
 WHIT |     -    35     -     -    23     -     -     -     -     -     - |  286  12.84
 WSRT |     -    16     -     -     -     -     -     -     -     -    23 |  287   0.05
 WTZR |     -    38     -    41     -     -     -     -     -     -    21 |  288   0.24
 WUHN |     -    58     -     -    38     -     -     -     -     -     - |  287  35.79
 YAR2 |     -    44     -    79     -     -     -   184     -     -    57 |  288  10.68
 YELL |     -    28    69    26     -     -     -    73     -     -     - |  287   0.04
 YSSK |     -    47     -     -    31     -     -     -     -     -     - |  286  14.75
 ZWEN |     -     -     -     -     9     -     -     -     -     -    20 |  277  15.88
 -----+-------------------------------------------------------------------+--------------
 TOT  |  4875    87   132   110    63  6506  3983   127  4996     -   120 |


 BEST CLOCK FIT: ALGO   288   0.02 (ns) 

