
 GPS week: 1105   Day: 1   MJD: 51980                        

 RESULTS OF FINAL WEIGHTED COMBINATION 
 ------------------------------------- 

 CEN | NREPO NBEPO  NRCLK  NRBAD   OFFSET    DRIFT   CLKRMS   WEIGHT
     |                               (ns)   (ns/d)     (ns)      (%)
 ----+--------------------------------------------------------------
 brd |    96     0   2551     12    -0.19     0.46     4.29     0.00
 cod |    96     0   2551     79     0.11     0.55     4.05     0.00
 esa |   288     0  14001    805   611.82    18.42     0.16    22.05
 gfz |   288     0  12313      0    -0.23     0.42     0.09    36.37
 igp |    96     0   2269      0    -0.18     0.40     6.42     0.00
 igu |    96     0   1898      2    -0.40     0.40     3.95     0.00
 jpl |   288     0   6355    244     1.62     1.02     0.16     0.00
 ngs |    96     0   2551      5    -0.26     0.40     4.28     0.00
 sio |    96    96      0      0     0.00     0.00     0.00     0.00
 usn |   288     0  13654    244   617.67    18.26     0.08    41.59

      | MEAN (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn |
 -----+-------------------------------------------------------------+
    1 |   356    59    58   160 25225     -   197   488     -  -170 |
    2 |  1609  1299   145    71-14710     -    70  2003     -  -138 |
    3 | -7370 -7141   363   -42  9935 -7651    95 -6422     -  -156 |
    4 |  -647  -975   234   125-13375  1525   185  -448     -  -228 |
    5 | -6254 -5612    10    48-11713  4563    97 -5252     -   -47 |
    6 |  2552  2015  -156   109 22519 -2003   121  1697     -   -13 |
    7 | -5135 -5455    -4   182-19710 -2184    63 -4359     -  -157 |
    8 |  2481  2194    28    48  5498 -7262   -72  2446     -   -55 |
    9 | -2435 -2827   -44    91 25638 -5969  -133 -2145     -   -57 |
   10 | -1800 -2112    40   219  8139   113  -254 -2280     -  -213 |
   11 |  2001  1703   348   -59 16925     -   157  2373     -  -132 |
   13 |  3267  2992  -229   -11  4879 -4304   206  3341     -   131 |
   14 |  4718  4396   144    -5 14971   824   -27  4891     -   -72 |
   17 |  9654  8574     X    56     -     -  -287  8752     -   -49 |
   18 |  8061  7793  -124   -91     -   918  -365  7527     -   144 |
   19 |-17295-12018   -10     6-84284     -   215-16124     -     - |
   20 |  1972  1681   -73   183 17130  3024   185  2143     -  -121 |
   22 |  1208   903   435   -50-76618 19918    11   493     -  -187 |
   23 | -5386 -5622    49   -23     -     -  -149 -5212     -    -6 |
   24 | -5738 -6069   204   -75 -5745     -    -4 -5258     -   -38 |
   25 |  -636  -965   -49    13 28143  2765    73  -699     -    13 |
   26 | -2315 -2659  -236    19  9515 -4684  -112 -2281     -   108 |
   27 | -2443 -2762   -22   128 14302  1410   130 -2703     -  -101 |
   28 |  2570  2272   -94   -12  1476  7562   189  3327     -    60 |
   29 |  2231  1924   245   -14 -6562 -4209   201  1943     -  -117 |
   30 |  3405  3101   255     9 18373  2644   100  2865     -  -143 |
   31 |  7674  6885   203    -6  4385 -7095   326  6666     -  -102 |
 -----+-------------------------------------------------------------+
 ALGO |     -     -     X  -138     -     -   -41     -     -   121 |
 AREQ |     -     -  -118     -     -     -  -146     -     -    63 |
 AUCK |     -     -    85     -     -     -     X     -     -   -45 |
 BAHR |     -     -   210  -112     -     -   -24     -     -   -13 |
 BRMU |     -     -   -55  -232     -     -     -     -     -   232 |
 CAS1 |     -     -    97  -328     -     -     -     -     -   268 |
 DAV1 |     -     -     -  -116     -     -     -     -     -   102 |
 FAIR |     -     -   -62     -     -     -  -152     -     -    33 |
 FORT |     -     -  -382     -     -     -     -     -     -   203 |
 GALA |     -     -  -180   109     -     -    80     -     -     - |
 GUAM |     -     -     0     0     -     -   -32     -     -     - |
 KOKB |     -     -   108     -     -     -     -     -     -   -57 |
 KOSG |     -     -  -116     -     -     -     -     -     -    62 |
 KWJ1 |     -     -  -387   221     -     -   -77     -     -     1 |
 MAC1 |     -     -   116   -70     -     -     -     -     -     - |
 MAS1 |     -     -    59  -178     -     -     -     -     -   125 |
 MCM4 |     -     -   -36    22     -     -     -     -     -     X |
 OHIG |     -     -  -224   136     -     -     -     -     -     - |
 ONSA |     -     -   -86     -     -     -     -     -     -    45 |
 PIE1 |     -     -  -214     -     -     -     -     -     -   114 |
 POTS |     -     -   142   -86     -     -     -     -     -     - |
 SANT |     -     -     X   -67     -     -     -     -     -    58 |
 SUTH |     -     -     -    10     -     -  -168     -     -    -9 |
 TSKB |     -     -  -238     -     -     -     -     -     -   126 |
 URUM |     -     -     -   -96     -     -     -     -     -    84 |
 USNO |     -     -  -158     -     -     -     -     -     -    84 |
 WTZR |     -     -   -69     -     -     -     -     -     -    37 |
 YAR2 |     -     -  -533     -     -     -  -254     -     -   283 |
 ZWEN |     -     -     -   -67     -     -     -     -     -    58 |
 -----+-------------------------------------------------------------+

      | RMS (ps) OF AC CLOCK COMPARED TO COMBINATION
      |   brd   cod   esa   gfz   igp   igu   jpl   ngs   sio   usn | NEPO RMS (ns)
 -----+-------------------------------------------------------------+--------------
    1 |  5282  5189   109    62  8095     -    95  5356     -    26 |  288   3.37
    2 |  3907  3846   101    98  5262     -   140  4043     -    48 |  288   2.88
    3 |  5859  5613    91   104  2719  6164   164  5097     -    71 |  288   1.90
    4 |   926   814   149    98  3977   728    59   921     -    34 |  276   0.99
    5 |  6773  6075    68    63  3770  3189    84  6013     -    81 |  288   3.40
    6 |  7804  7658   228   127  6354  5193   246  8319     -   159 |  288   5.60
    7 |  3999  3995    53    37  8319  1745   116  4261     -    28 |  288   0.88
    8 |  2557  2504   116    56  4286  3830   179  2567     -    60 |  274   2.48
    9 |  1796  1826   114    65  4446  3237   212  1967     -    59 |  275   1.74
   10 |  7473  7496   240    97  3249  3362    77  6270     -    48 |  288   2.48
   11 |  1403  1394   106    23  3197     -   144  1566     -    47 |  288   0.51
   13 |  1496  1425   161    94  2259  1875   107  1471     -    35 |  288   0.53
   14 |   990   896   107    26  3501   631    90   948     -    54 |  288   0.23
   17 |  4544  4003     X    65     -     -   147  5766     -    57 |  266   2.83
   18 |  3124  3136   190   102     -   862   204  3114     -    47 |  288   0.39
   19 |  7047  4291   229   139 20332     -   107  6706     -     - |  262   3.19
   20 |  1034  1015    52    49  3572  1367   108  1021     -    34 |  288   0.27
   22 |  3949  3936    73   176 11756 11076   159  4121     -   151 |  288   0.71
   23 |  5121  4982   238    76     -     -   149  5050     -   110 |  288   4.45
   24 |  2064  2083   196    87  2624     -   129  2501     -    49 |  274   1.73
   25 |  3347  3289   170    55  7025  1898   137  2974     -    82 |  276   2.35
   26 |  1183  1174   109    33  1756  1553   122  1280     -    61 |  288   0.58
   27 |  5339  5302   440   170  5540  3868   112  5688     -   109 |  276   4.85
   28 |  4572  4520    98    20  1789  6131   118  4423     -    59 |  288   0.52
   29 |  1721  1704    62    49  2352  1785   556  1625     -    22 |  288   0.63
   30 |  2642  2641   117    35  6437  2747    88  2476     -    42 |  288   1.57
   31 |  5944  5934    84    91  3204  1724    57  6608     -    45 |  288   1.81
 -----+-------------------------------------------------------------+--------------
 ALGO |     -     -     X    24     -     -    62     -     -    21 |  288   0.01
 AREQ |     -     -    64     -     -     -   116     -     -    34 |  283  32.14
 AUCK |     -     -   327     -     -     -     X     -     -   174 |  233  19.57
 BAHR |     -     -   230    80     -     -    72     -     -    57 |  288   0.89
 BRMU |     -     -    41    39     -     -     -     -     -    40 |  288  26.34
 CAS1 |     -     -    99   108     -     -     -     -     -   135 |  288  12.84
 DAV1 |     -     -     -    38     -     -     -     -     -    33 |  284  13.82
 FAIR |     -     -   160     -     -     -    95     -     -    85 |  160   0.15
 FORT |     -     -   271     -     -     -     -     -     -   144 |  145   0.86
 GALA |     -     -    63    38     -     -   144     -     -     - |  283  48.35
 GUAM |     -     -   173   105     -     -   208     -     -     - |  281  27.17
 KOKB |     -     -   246     -     -     -     -     -     -   130 |  166   0.16
 KOSG |     -     -    38     -     -     -     -     -     -    20 |  288  23.23
 KWJ1 |     -     -   229   167     -     -   193     -     -   173 |  237  68.86
 MAC1 |     -     -   216   131     -     -     -     -     -     - |  285  15.99
 MAS1 |     -     -    77    28     -     -     -     -     -    33 |  276   2.41
 MCM4 |     -     -   271   164     -     -     -     -     -     X |  232  10.25
 OHIG |     -     -   263   159     -     -     -     -     -     - |  221  12.68
 ONSA |     -     -    54     -     -     -     -     -     -    29 |  288   0.09
 PIE1 |     -     -   135     -     -     -     -     -     -    72 |  288   0.05
 POTS |     -     -    45    27     -     -     -     -     -     - |  288  15.15
 SANT |     -     -     X   179     -     -     -     -     -   157 |  288   7.27
 SUTH |     -     -     -    68     -     -   112     -     -    59 |  287  30.69
 TSKB |     -     -    88     -     -     -     -     -     -    47 |  258   0.70
 URUM |     -     -     -    33     -     -     -     -     -    29 |  288  74.37
 USNO |     -     -    50     -     -     -     -     -     -    27 |  288   0.04
 WTZR |     -     -    50     -     -     -     -     -     -    26 |  288   0.04
 YAR2 |     -     -   242     -     -     -   127     -     -   129 |  286  12.40
 ZWEN |     -     -     -    21     -     -     -     -     -    18 |  277  15.95
 -----+-------------------------------------------------------------+--------------
 TOT  |  4289  4053   164    91  6425  3953   159  4284     -    78 |


 BEST CLOCK FIT: ALGO   288   0.01 (ns) 

